目錄

簡介

必要條件

需求

採用元件

慣例

設定

網路圖表

組態

驗證

測試1:TCP到X.25的轉換

測試2:X.25到TCP的轉換

疑難排解

相關資訊

簡介

XOT(X.25 Over TCP)由Cisco Systems設計，並詳述於要求建議(RFC)1613中，以透過IP網際網路傳輸X.25。這允許透過傳輸控制通訊協定/網際網路通訊協定(TCP/IP)網路而不是連結存取程式平衡(LAPB)連結傳送X.25封包。XOT是一種通過IP網際網路透過TCP封包中X.25封包層級封裝傳送X.25封包的方法。

本文檔提供一個示例配置，說明這兩個轉換：

- 傳輸控制通訊協定(TCP)到X.25的轉譯。

- X.25到TCP的轉換。

必要條件

需求

本文件沒有特定需求。

採用元件

此轉換需要ENTERPRISE功能集，該功能集僅在思科路由器平台26xx及更高版本上受支援。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

設定

本節提供用於設定本文件中所述功能的資訊。

注意：要查詢有關本文檔中使用的命令的其他資訊，請使用命令查詢工具(僅限註冊客戶)。

網路圖表

本檔案會使用以下網路設定：

如圖所示，路由器1和2之間以及路由器2和3之間使用背對背鏈路。

組態

本檔案會使用以下設定：

- Router1

- Router2

- Router3

注意：我們已截斷以下配置以顯示相關資訊。

Router1

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname Router1

!

interface Serial0

description DCE connection to s1 Router2

ip address 10.0.0.6 255.255.255.252

no ip mroute-cache

clockrate 56000

!

ip route 192.168.7.0 255.255.255.0 10.0.0.5

Router2

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname Router2

!

x25 routing

!

interface Loopback0

ip address 192.168.7.1 255.255.255.0

!

interface Serial0

description DCE connection to s1 Router3

encapsulation x25 dce

no ip mroute-cache

clockrate 64000

!

interface Serial1

description DTE connection to s0 Router1

ip address 10.0.0.5 255.255.255.252

!

x25 route 123 interface Serial0

!

translate tcp 192.168.7.2 x25 123

translate x25 345 tcp 10.0.0.6

Router3

Router3#show running-config

Building configuration...

Current configuration:

!

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

hostname Router3

!

ip subnet-zero

!

x25 routing

!

interface Serial1

description DTE connection to s0 Router2

encapsulation x25

x25 address 123

!

x25 route 345 interface Serial1

驗證

使用以下命令測試網路是否正常運行：

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

- show debug — 用於顯示各種調試資訊或執行特定的故障排除活動。

- telnet 192.168.7.2 -以提示模式連線到Internet上的電腦系統。

- pad 345 — 將您登入到PAD。

- show x25 vc — 在特權EXEC模式下顯示有關活動交換虛擬電路(SVC)和永久虛擬電路(PVC)的資訊。

以下測試中的輸出是在上述網路圖所示的裝置上輸入這些命令的結果。此輸出表明網路運行正常。

測試1:TCP到X.25的轉換

在本測試中，我們執行從Router1到Router2的IP位址的Telnet作業階段：

1. 從Router1通過Telnet 192.168.7.2。

注意：此地址屬於Router2中的網路192.168.7.0 /24。此地址不能分配給網路中的任何其他系統。

2. Router2會執行TCP到X.25的轉譯以到達Router3。以下輸出所示。

Router2#show debug

TCP:

TCP special event debugging is on

X.29 PAD:

X25 PAD debugging is on

X.25:

X.25 special event debugging is on

Protocol translation:

Protocol Translation debugging is on

Router2#

Router1#telnet 192.168.7.2

Trying 192.168.7.2 ... Open

Trying 123...Open

User Access Verification

Password:

Router3>

Router2#

*Mar  1 01:50:28.759: TCP0: state was LISTEN -> SYNRCVD [23 -> 10.0.0.6(11007)]

*Mar  1 01:50:28.763: TCB00499CAC setting property TCP_TOS (11) C0094

*Mar  1 01:50:28.767: tcppad2: fork started

*Mar  1 01:50:28.767: TCP: sending SYN, seq 3338770911, ack 4026886977

*Mar  1 01:50:28.771: TCP2: Connection to 10.0.0.6:11007, advertising MSS 1460

*Mar  1 01:50:28.775: TCP2: Connection to 10.0.0.6:11007, received MSS 556, MSS is 556

*Mar  1 01:50:28.791: TCP2: state was SYNRCVD -> ESTAB [23 -> 10.0.0.6(11007)]

*Mar  1 01:50:28.803: pad_open_connection: found a valid route

*Mar  1 01:50:28.807: Serial0: X.25 O R1 Call (11) 8 lci 1

*Mar  1 01:50:28.811: From (0):  To (3): 123

*Mar  1 01:50:28.811: Facilities: (0)

*Mar  1 01:50:28.815: Call User Data (4): 0x01000000 (pad)

*Mar  1 01:50:28.827: Serial0: X.25 I R1 Call Confirm (5) 8 lci 1

*Mar  1 01:50:28.831: From (0):  To (0):

*Mar  1 01:50:28.835: Facilities: (0)

*Mar  1 01:50:28.835: PAD2: Call completed

*Mar  1 01:50:28.839: PAD2: Control packet received.

*Mar  1 01:50:28.851: PAD2: Input X29 packet type 4 (Read X.3 param) len 1

*Mar  1 01:50:28.855: PAD2: Output X29 packet type 0 (Parameter indication) len 45

1:1, 2:1, 3:2, 4:1, 5:0, 6:0, 7:4,

8:0, 9:0, 10:0, 11:14, 12:0, 13:0, 14:0, 15:0,

16:127, 17:21, 18:18, 19:0, 20:0, 21:0, 22:0,

*Mar  1 01:50:28.879: PAD2: Control packet received.

*Mar  1 01:50:28.883: PAD2: Input X29 packet type 6 (Set and Read) len 9

2:0, 4:1, 15:0, 7:21,

*Mar  1 01:50:28.887: tcppad2: Sending WILL ECHO

*Mar  1 01:50:28.891: PAD2: Output X29 packet type 0 (Parameter indication) len 9

2:0, 4:1, 15:0, 7:21,

Router2#show x25 vc

SVC 1, State: D1, Interface: Serial0

Started 00:00:25, last input 00:00:22, output 00:00:22

Line: 2 vty 0 Location: Host: 10.0.0.6

connected to 123 PAD <--> X25

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 5  PR: 4  ACK: 4  Remote PR: 5 RCNT: 0 RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 57/62 packets 5/4 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

Router2#

測試2:X.25到TCP的轉換

在本測試中，我們從Router3對Router2的X.25位址啟動封包裝配器/分解器(PAD)作業階段：

1. 從Router3對345執行PAD命令。

2. Router2會執行X.25到TCP的轉譯以到達Router1。輸出如下。

Router2#show debug

TCP:

TCP special event debugging is on

X.29 PAD:

X25 PAD debugging is on

X.25:

X.25 special event debugging is on

Protocol translation:

Protocol Translation debugging is on

Router2#

Router3#pad 345

Trying 345...Open

Trying 10.0.0.6 ... Open

User Access Verification

Password: CCCC

Router1>

Router2#

*Mar  1 01:51:31.475: Serial0: X.25 I R1 Call (12) 8 lci 1024

*Mar  1 01:51:31.479: From (3): 123 To (3): 345

*Mar  1 01:51:31.483: Facilities: (0)

*Mar  1 01:51:31.483: Call User Data (4): 0x01000000 (pad)

*Mar  1 01:51:31.487: PAD: translate call to 345

*Mar  1 01:51:31.491: Call User Data (4): 0x01000000 (pad)

*Mar  1 01:51:31.495: PAD: Creating proto translation on tty2 for vc 1024

*Mar  1 01:51:31.499: Serial0: X.25 O R1 Call Confirm (5) 8 lci 1024

*Mar  1 01:51:31.503: From (0):  To (0):

*Mar  1 01:51:31.503: Facilities: (0)

*Mar  1 01:51:31.507: PAD2: Call completed

*Mar  1 01:51:31.511: padtcp2: fork started

*Mar  1 01:51:31.515: PAD2: Output X29 packet type 4 (Read X.3 param) len 1

*Mar  1 01:51:31.523: TCB0049E7A4 created

*Mar  1 01:51:31.523: TCB0049E7A4 setting property TCP_TOS (11) 49C853

*Mar  1 01:51:31.527: TCB0049E7A4 bound to UNKNOWN.44034

*Mar  1 01:51:31.531: PAD2: Control packet received.

*Mar  1 01:51:31.531: TCP: sending SYN, seq 3401534831, ack 0

*Mar  1 01:51:31.535: TCP2: Connection to 10.0.0.6:23, advertising MSS 1460

*Mar  1 01:51:31.539: TCP2: state was CLOSED -> SYNSENT [44034 -> 10.0.0.6(23)]

*Mar  1 01:51:31.559: TCP2: state was SYNSENT -> ESTAB [44034 -> 10.0.0.6(23)]

*Mar  1 01:51:31.563: TCP2: Connection to 10.0.0.6:23, received MSS 1460, MSS is 1460

*Mar  1 01:51:31.567: TCB0049E7A4 connected to 10.0.0.6.23

*Mar  1 01:51:31.571: PAD2: Input X29 packet type 0 (Parameter indication) len 45

1:1, 2:1, 3:2, 4:1, 5:0, 6:0, 7:4,

8:0, 9:0, 10:0, 11:14, 12:0, 13:0, 14:0, 15:0,

16:127, 17:21, 18:18, 19:0, 20:0, 21:0, 22:0,

*Mar  1 01:51:31.583: PAD2: Setting ParamsIn, length 44

*Mar  1 01:51:31.587: PAD2: Output X29 packet type 6 (Set and Read) len 9

2:0, 4:1, 15:0, 7:21,

*Mar  1 01:51:31.599: PADTCP2: Telnet received WILL ECHO (1)

*Mar  1 01:51:31.599: PAD2: Control packet received.

*Mar  1 01:51:31.607: PADTCP2: Telnet received DO TTY-TYPE (24)

*Mar  1 01:51:31.611: PAD2: Output X29 packet type 6 (Set and Read) len 3 2:0,

*Mar  1 01:51:31.619: PAD2: Input

*Mar  1 01:51:31.619: PAD2: Control packet received.X29 packet type 0

(Parameter indication) len 9 2:0, 4:1, 15:0, 7:21,

*Mar  1 01:51:31.627: PAD2: Setting ParamsIn, length 8

*Mar  1 01:51:31.631: PAD2: Input X29 packet type 0 (Parameter indication) len 3 2:0,

*Mar  1 01:51:31.635: PAD2: Setting ParamsIn, length 2

*Mar  1 01:51:31.643: PADTCP2: Telnet received DONT TTY-LOCATION (23)

*Mar  1 01:51:31.647: PADTCP2: Telnet received DONT TTY-SPEED (32)

Router2#

Router2#show x25 vc

SVC 1024,  State: D1,  Interface: Serial0

Started 00:00:10, last input 00:00:07, output 00:00:05

Line: 2   vty 0    Location:  Host: 123

123 connected to 345 PAD <--> X25

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 1  PR: 6  ACK: 6  Remote PR: 1  RCNT: 0  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 3057/60 packets 33/6 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

Router2#

Router2#

發出debug指令之前，請先參閱有關Debug指令的重要資訊。

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

相關資訊

- 更多X.25技術提示

- 技術支援 - Cisco Systems