目錄

簡介

必要條件

需求

採用元件

慣例

背景資訊

相關資訊

簡介

本文提供如何對E1錯誤事件進行故障排除的資訊。

必要條件

需求

本文件沒有特定需求。

採用元件

本文件所述內容不限於特定軟體和硬體版本。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

背景資訊

有關「錯誤事件」圖表的詳細資訊，請按一下與圖形中的命令框對應的連結：

- 在Configure terminal controller e1x clock source line primary框中，可以連結到E1錯誤事件故障排除的Slip Secs Counter Increasing部分。

- 使用show controller e1x命令框連結到E1錯誤事件故障排除簡介部分。

- 在Configure terminal controller e1x framing cr4 / no-crc4框中，可以連結到E1 Error Events Troubleshooting的Framing Loss Seconds Increasing部分。

- Configure terminal controller e1x framing cr4 / no-crc4框連結到E1 Error Events Troubleshooting的Line Code Violations Increasing部分。

- Configure terminal controller isdn switch-type primary-net5框連結到Verifying the isdn switch-type and pri-group timeslots Configuration部分的Error Events Troubleshooting。

- 使用show interface ser x:15命令檢查d通道框連結到Verifying the Signaling Channel部分（E1錯誤事件故障排除）。

- Configure terminal interface serial x:15 no shutdown 框連結到Verifying the Signaling Channel部分（E1錯誤事件故障排除）。

- Configure terminal interface serial x:15 encapsulation ppp框連結到Verifying the Signaling Channel部分（在E1錯誤事件故障排除中）。

- 在Configure terminal interface serial x:15 no loopback框中，選擇Verifying the Signaling Channel一節的Error Events Troubleshooting。

相關資訊

- E1故障排除

- E1第1層故障排除

- E1警報故障排除

- E1 PRI故障排除

- 適用於E1線路的硬塞回送測試

- 技術支援與文件 - Cisco Systems