目錄

簡介

必要條件

需求

採用元件

慣例

配置Microsoft NetMeeting for VoIP

網路圖表

逐步說明

配置網關

驗證

疑難排解

使用Microsoft NetMeeting發起呼叫

相關資訊

簡介

Microsoft NetMeeting是基於Windows的應用程式，支援通過Internet或Intranet從一台PC進行多使用者互動和合作。如果另一台客戶端或網關的目標IP地址可訪問，則客戶端或網關可以直接彼此連線。

必要條件

需求

本文件沒有特定需求。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 採用T1 PRI控制器卡的Cisco AS5300

- Cisco IOS®軟體版本12.1及更高版本（含IP Plus）

- Microsoft NetMeeting版本3.01

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

配置Microsoft NetMeeting for VoIP

本節提供用於設定本文件中所述功能的資訊。

注意：要查詢有關本文檔中使用的命令的其他資訊，請使用命令查詢工具(僅限註冊客戶)。

網路圖表

本檔案會使用以下網路設定：

逐步說明

要配置Microsoft NetMeeting以使用VoIP網關，請執行以下步驟：

1. 開啟Microsoft NetMeeting，然後選擇「工具」>「選項」。

2. 按一下General頁籤，然後輸入您的名字、姓氏和電子郵件地址。

3. 在「音訊」頁籤上，按一下高級。

4. 選中Manually configure compression settings，然後從Preferred codec for audio compression下拉選單中選擇CCITT u-Law， 8.000kHz， 8 Bit， Mono。在兩個對話方塊中按一下OK。

5. 從NetMeeting工具選單中，選擇選項>常規>高級呼叫。

6. 在「網關」設定區域中，選中使用網關呼叫電話和視訊會議系統，然後在「網關」欄位中輸入172.16.13.48。

配置網關

要配置VoIP以支援Microsoft NetMeeting，請建立包含以下資訊的VoIP對等體：

- Session Target — 運行NetMeeting的PC的IP地址或域名系統(DNS)名稱

- 編解碼器 — g711ulaw、g711alaw或g723r63

驗證

本節提供的資訊可用於確認您的配置是否正常工作。

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

- show run — 發出此命令以驗證網關的源IP地址。

AS5300（聖何塞）

zshaikh# show run

Building configuration...

Current configuration:

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

service internal

!

hostname zshaikh

enable password cisco

!

username 3006 password 0 1234

isdn switch-type primary-ni

interface Ethernet0

ip address 172.16.13.48 255.255.255.224

no ip route-cache

no ip mroute-cache

!

interface Serial0:23

no ip address

isdn switch-type primary-ni

isdn incoming-voice modem

no cdp enable

!

controller T1 0

framing esf

clock source line primary

linecode b8zs

pri-group timeslots 1-24

!

controller T1 1

clock source internal

!

voice service voip

!--- Enters voice service configuration mode and specifies a voice encapsulation !--- type as VoIP encapsulation. Voice service configuration mode is used for !--- packet Telephony service commands that affect the gateway globally.

h323

!--- Used to enable the H.323 voice service configuration commands.

h245 caps mode restricted

!--- The h245 caps mode restricted prevents Dual Tone Multifrequency (DTMF) !--- Named Telephone Events (NTEs) as well as T.38 capability indication in the !--- H.245 Terminal Capability Set packet. When these options are present, it !--- can prevent the H.245 negotiation from completing with some devices, !--- specifically with NetMeeting. Without the h245 caps mode restricted !--- command, calls in either direction will fail.

h245 tunnel disable

!--- By default, H.245 tunneling is enabled. This H.323 feature allows any H.245 !--- message to use the existing H.225 TCP session instead of bringing up a !--- second TCP session for H.245. Issue the h245 tunnel disable command to !--- disable this feature.

dial-peer voice 1 voip

!--- Configure Microsoft NetMeeting for Voice over IP.

destination-pattern 1000

codec g711ulaw

!--- CODEC: g711ulaw, g711alaw, or g723r63

session target ipv4:172.16.13.49

!--- Session Target: IP address or DNS name of the PC that is running NetMeeting

!

dial-peer voice 2 pots

destination-pattern .T

direct-inward-dial

port 0:D

疑難排解

有關故障排除資訊，請參閱對源自NetMeeting或類似第三方H.323裝置的ISDN呼叫失敗進行故障排除。

注意：如果您正在運行Cisco IOS軟體版本12.2(11)T，並且H.323版本4正在您的路由器上運行，則您可能會遇到NetMeeting問題。請參閱Cisco錯誤ID CSCdw49975(僅限註冊客戶)。

使用Microsoft NetMeeting發起呼叫

要使用Microsoft NetMeeting發起呼叫，請執行以下步驟：

1. 在Microsoft NetMeeting應用程式中，按一下呼叫圖示（電話）以開啟NetMeeting呼叫對話方塊。

2. 在NetMeeting呼叫對話方塊中，選擇Call > H.323 gateway。

3. 在發出呼叫對話方塊中，在「收件人」欄位中輸入電話號碼，然後按一下呼叫，從Microsoft NetMeeting發起對思科AS5300系列路由器的呼叫。

相關資訊

- 瞭解Cisco IOS平台上的撥號對等體和呼叫段

- 瞭解Cisco IOS平台上的傳入和傳出撥號對等體

- 瞭解IOS語音數位(T1/E1)介面上的直接撥入(DID)

- 區別思科AS5xxx網關上的數據機和語音呼叫

- 語音技術支援

- 語音和整合通訊產品支援

- Cisco IP電話故障排除

- 技術支援與文件 - Cisco Systems