目錄

簡介

硬體故障

乙太網埠故障

風扇故障

磁碟故障

簡介

本文說明如何對影片通訊伺服器(VCS)上的乙太網埠、風扇和磁碟故障進行故障排除。

硬體故障

乙太網埠故障

VCS硬體上有四個乙太網埠。以root使用者身份登入並輸入ifconfig -a命令。應顯示所有四個埠。

~ # ifconfig -a

eth0      Link encap:Ethernet  HWaddr 00:10:F3:18:2F:AE

inet addr:10.104.214.202  Bcast:10.104.214.255  Mask:255.255.255.192

UP BROADCAST RUNNING MULTICAST  MTU:1500  Metric:1

RX packets:7726332 errors:0 dropped:0 overruns:0 frame:0

TX packets:7436734 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:1000

RX bytes:1329156143 (1267.5 Mb)  TX bytes:3590189626 (3423.8 Mb)

Interrupt:18 Memory:fdae0000-fdb00000

eth1      Link encap:Ethernet  HWaddr 00:10:F3:18:2F:AF

inet addr:192.168.0.100  Bcast:192.168.0.255  Mask:255.255.255.0

UP BROADCAST MULTICAST  MTU:1500  Metric:1

RX packets:0 errors:0 dropped:0 overruns:0 frame:0

TX packets:0 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:1000

RX bytes:0 (0.0 b)  TX bytes:0 (0.0 b)

Interrupt:19 Memory:fd8e0000-fd900000

eth2      Link encap:Ethernet  HWaddr 00:10:F3:18:2F:B0

BROADCAST MULTICAST  MTU:1500  Metric:1

RX packets:0 errors:0 dropped:0 overruns:0 frame:0

TX packets:0 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:1000

RX bytes:0 (0.0 b)  TX bytes:0 (0.0 b)

Interrupt:16 Memory:fd6e0000-fd700000

eth3      Link encap:Ethernet  HWaddr 00:10:F3:18:2F:B1

BROADCAST MULTICAST  MTU:1500  Metric:1

RX packets:0 errors:0 dropped:0 overruns:0 frame:0

TX packets:0 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:1000

RX bytes:0 (0.0 b)  TX bytes:0 (0.0 b)

Interrupt:17 Memory:fd4e0000-fd500000

ip6tnl0   Link encap:UNSPEC  HWaddr 00-00-00-00-00-00-00-00-00-00-00-00-00-00-00-00

NOARP  MTU:1452  Metric:1

RX packets:0 errors:0 dropped:0 overruns:0 frame:0

TX packets:0 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:0

RX bytes:0 (0.0 b)  TX bytes:0 (0.0 b)

lo        Link encap:Local Loopback

inet addr:127.0.0.1  Mask:255.0.0.0

inet6 addr: ::1/128 Scope:Host

UP LOOPBACK RUNNING  MTU:16436  Metric:1

RX packets:30151925 errors:0 dropped:0 overruns:0 frame:0

TX packets:30151925 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:0

RX bytes:30219125820 (28819.2 Mb)  TX bytes:30219125820 (28819.2 Mb)

sit0      Link encap:UNSPEC  HWaddr 00-00-00-00-00-00-00-00-00-00-00-00-00-00-00-00

NOARP  MTU:1480  Metric:1

RX packets:0 errors:0 dropped:0 overruns:0 frame:0

TX packets:0 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:0

RX bytes:0 (0.0 b)  TX bytes:0 (0.0 b)

~ #

如果未顯示所有四個埠，則VCS出現問題，需要將其更換為網路介面控制器(NIC)出現故障。

VCS虛擬機器(VM)有三個而不是四個NIC埠。因此，當您排除VCS VM上的NIC故障時，ifconfig -a 命令應顯示三個乙太網埠。以root使用者身份登入並輸入ifconfig -a命令。

~ # ifconfig -a

eth0      Link encap:Ethernet  HWaddr 00:10:F3:18:2F:AE

inet addr:10.104.214.202  Bcast:10.104.214.255  Mask:255.255.255.192

UP BROADCAST RUNNING MULTICAST  MTU:1500  Metric:1

RX packets:7726332 errors:0 dropped:0 overruns:0 frame:0

TX packets:7436734 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:1000

RX bytes:1329156143 (1267.5 Mb)  TX bytes:3590189626 (3423.8 Mb)

Interrupt:18 Memory:fdae0000-fdb00000

eth1      Link encap:Ethernet  HWaddr 00:10:F3:18:2F:AF

inet addr:192.168.0.100  Bcast:192.168.0.255  Mask:255.255.255.0

UP BROADCAST MULTICAST  MTU:1500  Metric:1

RX packets:0 errors:0 dropped:0 overruns:0 frame:0

TX packets:0 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:1000

RX bytes:0 (0.0 b)  TX bytes:0 (0.0 b)

Interrupt:19 Memory:fd8e0000-fd900000

eth2      Link encap:Ethernet  HWaddr 00:10:F3:18:2F:B0

BROADCAST MULTICAST  MTU:1500  Metric:1

RX packets:0 errors:0 dropped:0 overruns:0 frame:0

TX packets:0 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:1000

RX bytes:0 (0.0 b)  TX bytes:0 (0.0 b)

Interrupt:16 Memory:fd6e0000-fd700000

ip6tnl0   Link encap:UNSPEC  HWaddr 00-00-00-00-00-00-00-00-00-00-00-00-00-00-00-00

NOARP  MTU:1452  Metric:1

RX packets:0 errors:0 dropped:0 overruns:0 frame:0

TX packets:0 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:0

RX bytes:0 (0.0 b)  TX bytes:0 (0.0 b)

lo        Link encap:Local Loopback

inet addr:127.0.0.1  Mask:255.0.0.0

inet6 addr: ::1/128 Scope:Host

UP LOOPBACK RUNNING  MTU:16436  Metric:1

RX packets:30151925 errors:0 dropped:0 overruns:0 frame:0

TX packets:30151925 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:0

RX bytes:30219125820 (28819.2 Mb)  TX bytes:30219125820 (28819.2 Mb)

sit0      Link encap:UNSPEC  HWaddr 00-00-00-00-00-00-00-00-00-00-00-00-00-00-00-00

NOARP  MTU:1480  Metric:1

RX packets:0 errors:0 dropped:0 overruns:0 frame:0

TX packets:0 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:0

RX bytes:0 (0.0 b)  TX bytes:0 (0.0 b)

~ #

風扇故障

如果兩個或多個風扇出現故障，VCS版本7會報告風扇故障。但是，VCS仍可能運行正常。如果VCS上的溫度過高，則可以處理RMA。

VCS有5個風扇，但每次只報告3個風扇的狀態。一個風扇故障實際上可能是三個風扇故障。

以root使用者身份登入並輸入sensors命令以檢查VCS上的溫度。

~ # sensors

acpitz-virtual-0

Adapter: Virtual device

it8712.7-isa-0290

Adapter: ISA adapter

VCore:       +1.17 V  (min =  +0.83 V, max =  +1.39 V)

DDR 1.8V:    +1.78 V  (min =  +1.62 V, max =  +1.98 V)

VCC 3.3V:    +3.31 V  (min =  +3.14 V, max =  +3.47 V)

VCC 5V:      +5.00 V  (min =  +4.76 V, max =  +5.24 V)

+12V:       +12.22 V  (min =  +9.60 V, max = +14.40 V)

VCC 1.5V:    +1.49 V  (min =  +1.42 V, max =  +1.57 V)

VBat:        +3.28 V  (min =  +2.99 V)

Fan 1:         0 RPM  (min = 3516 RPM, div = 8)  ALARM

Fan 2:      10546 RPM  (min = 3516 RPM, div = 8)

Fan 3:      10546 RPM  (min = 3516 RPM, div = 8)

Sys Temp1:   +29.0 C  (high = +58.0 C)                  sensor = thermistor

Sys Temp2:   +31.0 C  (high = +58.0 C)                  sensor = thermistor

CPU Temp:    +28.0 C  (high = +58.0 C)                  sensor = thermal diode

coretemp-isa-0000

Adapter: ISA adapter

Core 0:      +43.0 C  (high = +74.0 C, crit = +100.0 C)

coretemp-isa-0001

Adapter: ISA adapter

Core 1:      +42.0 C  (high = +74.0 C, crit = +100.0 C)

~ #

只要溫度看起來良好，您就不需要對VCS進行RMA。

磁碟故障

VCS上有兩種型別的磁碟：

- SDA — 這是VCS上的主磁碟。此磁碟故障會導致VCS完全無法啟動。如果此操作失敗，VCS根本不會載入映像。

- SDB — 這是輔助磁碟。此磁碟故障可能導致VCS出現問題。

以root使用者身份登入並輸入smartctl命令，以確定測試是否通過（SDB正常）。PASSED以外的結果不正確。

?~ # smartctl --all /dev/sdb

?smartctl 7.40 2013-12-03 r3189 [x86_64-pc-linux-gnu] (local build)

?Copyright (C) 2002-10 by Bruce Allen, http://smartmontools.sourceforge.net

?

?=== START OF INFORMATION SECTION ===

?Model Family:     Seagate Barracuda 7200.12 family

?Device Model:     ST3250318AS

?Serial Number:    5A347D45

?Firmware Version: CC38

?User Capacity:    250,059,350,016 bytes

?Device is:        In smartctl database [for details use: -P show]

?ATA Version is:   8

?ATA Standard is:  ATA-8-ACS revision 4

?Local Time is:    Fri Dec 04 01:38:51 2013 GMT

?SMART support is: Available - device has SMART capability.

?SMART support is: Enabled

?

?=== START OF READ SMART DATA SECTION ===

?SMART overall-health self-assessment test result: PASSED

可以輸入ls -l /dev/sd*命令以同時顯示SDB。

?ls -l /dev/sd*

?brw-rw---- 1 root root 8,  0 2013-12-04 01:25 /dev/sda

?brw-rw---- 1 root root 8,  1 2013-12-04 01:25 /dev/sda1

?brw-rw---- 1 root root 8,  2 2013-12-04 01:25 /dev/sda2

?brw-rw---- 1 root root 8,  3 2013-12-04 01:25 /dev/sda3

?brw-rw---- 1 root root 8,  5 2013-12-04 01:25 /dev/sda5

?brw-rw---- 1 root root 8,  6 2013-12-04 01:25 /dev/sda6

?brw-rw---- 1 root root 8,  7 2013-12-04 01:25 /dev/sda7

?brw-rw---- 1 root root 8,  8 2013-12-04 01:25 /dev/sda8

?brw-rw---- 1 root root 8, 16 2013-12-04 01:25 /dev/sdb

?brw-rw---- 1 root root 8, 17 2013-12-04 01:25 /dev/sdb1

?brw-rw---- 1 root root 8, 18 2013-12-04 01:25 /dev/sdb2

需要裝載SDB。輸入df | grep sdb命令以顯示SDB是否已裝載。

?~ # df | grep sdb

?/dev/sdb2            320471385   3781378 324252763   1% /mnt/harddisk

?~ #