目錄

簡介

必要條件

需求

採用元件

慣例

背景理論

設定

網路圖表

組態

驗證

Catalyst 2948G show命令

Catalyst 2948G-L3 show命令

疑難排解

相關資訊

簡介

本文討論並提供執行Cisco IOS®軟體的Catalyst 2948G-L3交換器與執行CatalystOS的交換器（所有型號，包括Catalyst 4000、5000和6000系列交換器）之間的快速EtherChannel(FEC)和802.1Q主幹組態範例。

必要條件

需求

有關支援802.1Q和ISL中繼封裝的Catalyst交換機的清單，請參閱實施中繼的系統要求。

EtherChannel和中繼的配置遵循特定准則。請參閱您的交換器軟體的檔案。例如，如果您在Catalyst 6500/6000上執行Catalyst OS(CatOS)軟體版本8.2.x，請參閱Catalyst 6500系列軟體組態設定指南8.2，並仔細檢查設定乙太網路VLAN主幹和設定EtherChannel一節中的任何組態原則及限制。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 已安裝CatOS 7.1.2的Catalyst 2948G（僅限802.1Q）

- 已安裝Cisco IOS軟體版本12.0(14)W5(20)的Catalyst 2948G-L3

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

背景理論

使用EtherChannel可提供更高的頻寬和備援。EtherChannel非常方便，因為它可以擴展頻寬，而不會增加設計的複雜性。跨距樹狀目錄將EtherChannel套件視為單一連結，因此不會匯入回圈。路由協定還將EtherChannel視為具有公用IP地址的單個路由介面。EtherChannel捆綁提供高達1600 Mbps FEC（快速EtherChannel）、全雙工或16 Gbps Gigabit EtherChannel(GEC)。 中繼通過兩台裝置之間的點對點鏈路傳輸來自多個VLAN的流量。中繼的兩種方法是交換機間鏈路協定（ISL，思科專有協定）或802.1Q（IEEE標準）。 本文檔專門介紹802.1Q中繼。

設定

在本節中，顯示的配置將包括2948G-L3和CatOS交換機之間的四埠FEC和802.1Q中繼。

注意：要查詢有關本文檔中命令的其他資訊，請使用命令查詢工具(僅限註冊客戶)。

網路圖表

本檔案會使用以下網路設定：

組態

本檔案會使用以下設定：

- Catalyst 2948G

- Catalyst 2948G-L3

Catalyst 2948G

CatOS (enable) show config

This command shows non-default configurations only.

Use 'show config all' to show both default and non-default

configurations.

............

.......................

..

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Thu Nov 21 2002, 15:24:27

!

#version 7.1(2)

!

!

#system web interface version(s)

set prompt CatOS

!

#test

!

#frame distribution method

set port channel all distribution mac both

!

#ip

set interface sc0 1 10.10.10.1/255.255.255.0 10.10.10.255

set interface sl0 down

set interface me1 down

set ip alias default         0.0.0.0

set ip alias cat             10.10.10.2

!

#spantree

#vlan                         <VlanID>

!

#set boot command

set boot config-register 0x2102

clear boot system all

!

!--- Ports 2/1 to 2/4 are assigned to a port channel.

#port channel

set port channel 2/1-4 29

!

#multicast filter

set igmp filter disable

!

#module 1 : 0-port Switching Supervisor

!

!--- The trunking mode is specified as 802.1Q, because it !--- is the only encapsulation that is supported on the !--- 2948G. The mode is set to nonegotiate, because the !--- 2948G-L3 does not support Dynamic Trunking Protocol (DTP).

#module 2 : 50-port 10/100/1000 Ethernet

set trunk 2/1  nonegotiate 802.1Q 1-1005

set trunk 2/2  nonegotiate 802.1Q 1-1005

set trunk 2/3  nonegotiate 802.1Q 1-1005

set trunk 2/4  nonegotiate 802.1Q 1-1005

!--- The channel mode is set to on, because 2948G-L3 !--- does not support Port Aggregation Protocol (PAgP).

set port channel 2/1-4 mode on

end

Catalyst 2948G-L3

2948G-L3# show run

Building configuration...

Current configuration:

!

version 12.0

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 2948G-L3

!

enable secret 5 $1$bNvR$33puy1WCyrdKMvlnj61Js.

!

ip subnet-zero

!

!

!--- The logical port-channel interface must be created !--- before you put the physical interfaces into the !--- channel group.interface port-channel1.

no ip address

no ip directed-broadcast

hold-queue 300 in

!

!--- Specify the native VLAN: VLAN 1 in this example, !--- which is the default. For performance and security !--- reasons, it is recommended that you keep the user !--- traffic off of the native or management VLAN.

interface Port-channel1.1

encapsulation 802.1Q 1 native

ip address 10.10.10.2 255.255.255.0

no ip redirects

no ip directed-broadcast

!

interface Port-channel1.2

encapsulation 802.1Q 2

ip address 10.10.11.2 255.255.255.0

no ip directed-broadcast

!

!--- Specify all of the physical ports that are part !--- of the logical port channel interface.

interface FastEthernet1

no ip address

no ip directed-broadcast

channel-group 1

!

interface FastEthernet2

no ip address

no ip directed-broadcast

channel-group 1

!

interface FastEthernet3

no ip address

no ip directed-broadcast

channel-group 1

!

interface FastEthernet4

no ip address

no ip directed-broadcast

channel-group 1

!

!--- Output suppressed.

!

ip classless

!

!

line con 0

transport input none

line aux 0

line vty 0 4

password cisco

login

!

end

驗證

本節提供的資訊用於確認您的組態是否正常運作。

Catalyst 2948G show命令

- show port channel — 顯示EtherChannel資訊。它還顯示負載均衡或幀分配方案、埠和埠通道資訊。

!--- Verify that the port channel is UP (connected, on) and that !--- all the physical ports are members (channel ID).

CatOS (enable) show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

2/1  connected  on                      29   801

2/2  connected  on                      29   801

2/3  connected  on                      29   801

2/4  connected  on                      29   801

Port  Device-ID                       Port-ID                Platform

----- ------------------------------- ---------------------- --------------

2/1  2948G-L3                        FastEthernet1          cisco Cat2948G

2/2   Not directly connected to switch

2/3  2948G-L3                        FastEthernet3          cisco Cat2948G

2/4  2948G-L3                        FastEthernet4          cisco Cat2948G

註：連線埠2/2不直接連線到交換器是非常正常的。在連線到路由器的交換器上，show port channel命令的輸出通常如下例所示。由於路由器不參與PAgP（用於協商通道）且通道已開啟，因此連線埠會使用思科探索通訊協定(CDP)資料顯示FEC鄰居資訊。Cisco IOS軟體在通道介面和物理介面上傳送CDP資料包。其中一個Catalyst埠看到多個CDP鄰居，並且報告未直接連線到交換機。這是一個表面問題，更多資訊請參閱Cisco錯誤ID CSCdp04017(僅限註冊客戶)。

- show port channel statistics — 顯示埠通道的管理組並顯示埠通道上是否正在使用PAgP。

檢驗鏈路上是否未使用PAgP。

CatOS (enable) show port channel status

Port  Admin   PAgP Pkts   PAgP Pkts PAgP Pkts PAgP Pkts PAgP Pkts PAgP Pkts

Group   Transmitted Received  InFlush   RetnFlush OutFlush  InError

----- ------- ----------- --------- --------- --------- --------- ---------

2/1       29           0         0         0         0         0         0

2/2       29           0         0         0         0         0         0

2/3       29           0         0         0         0         0         0

2/4       29           0         0         0         0         0         0

- show trunk — 顯示中繼模式、封裝和本地VLAN。

檢驗物理介面和埠通道介面上是否已啟用中繼。此外，驗證是否已正確將中繼模式設定為nonegotiate。

注意：在802.1Q中繼上，兩端的本徵VLAN必須匹配。

CatOS (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

2/1      nonegotiate  802.1Q          trunking      1

2/2      nonegotiate  802.1Q          trunking      1

2/3      nonegotiate  802.1Q          trunking      1

2/4      nonegotiate  802.1Q          trunking      1

Port      Vlans allowed on trunk

--------  -----------------------------------------------------------------

2/1      1-1005

2/2      1-1005

2/3      1-1005

2/4      1-1005

Port      Vlans allowed and active in management domain

--------  -----------------------------------------------------------------

2/1      1

2/2      1

2/3      1

2/4      1

Port      Vlans in spanning tree forwarding state and not pruned

--------  -----------------------------------------------------------------

2/1      1

2/2      1

2/3      1

2/4      1

Catalyst 2948G-L3 show命令

- show interfaces port-channel 1 — 提供連線埠通道的狀態以及作為連線埠通道組成員的連線埠。

驗證作為EtherChannel一部分的所有物理介面是否可以視為成員。

2948G-L3# show interfaces port-channel 1

Port-channel1 is up, line protocol is up

Hardware is FEChannel, address is 0008.a308.1c07 (bia 0000.0000.0000)

MTU 1500 bytes, BW 400000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set, keepalive set (10 sec)

Half-duplex, Unknown Speed, Media type unknown

ARP type: ARPA, ARP Timeout 04:00:00

No. of active members in this channel: 4

Member 0 : FastEthernet2

Member 1 : FastEthernet1

Member 2 : FastEthernet4

Member 3 : FastEthernet3

Last input 00:00:00, output 00:00:55, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/300, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

596128 packets input, 50714549 bytes, 0 no buffer

Received 7 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

0 watchdog, 0 multicast

0 input packets with dribble condition detected

44294 packets output, 17498215 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

- show cdp neighbor — 列出通過CDP發現的所有直連Cisco裝置。

確認另一端上的交換機通過所有物理埠可見。

2948G-L3# show cdp neighbor

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater

Device ID        Local Intrfce     Holdtme    Capability  Platform  Port ID

JAB032400H2      Port-channel1.1    126         T S       WS-C2948  2/3

JAB032400H2      Port-channel1.1    124         T S       WS-C2948  2/4

JAB032400H2      Port-channel1.1    123         T S       WS-C2948  2/1

JAB032400H2      Port-channel1.1    123         T S       WS-C2948  2/2

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

相關資訊

- 在CatOS交換機和外部路由器之間配置ISL和802.1q中繼（InterVLAN路由）

- Catalyst 2948G-L3示例配置 — 連線到網路核心的單VLAN、多VLAN和多VLAN分佈層

- Catalyst 2948G-L3/4908G-L3系列交換機的硬體故障排除

- LAN 產品支援

- LAN 交換技術支援

- 技術支援與文件 - Cisco Systems