目錄

簡介

必要條件

需求

採用元件

概觀

慣例

逐步程序

輸出示例

相關資訊

簡介

本檔案介紹如何在搭載Supervisor 720的Catalyst 6500系列交換器(執行Cisco IOS®系統軟體(版本低於12.2(17)SX)上復原密碼。

12.2(17)SX之前的Cisco IOS軟體版本中的程式不同是因為思科錯誤ID CSCec36997(僅限註冊客戶)(在sup720-native上復原密碼會導致交換器處理器(SP)崩潰)。 當您的交換機受此錯誤影響時，您在進入RP ROMMON後，大約有10秒的時間將配置暫存器更改為0x2142。在這10秒之後，交換機將重新載入，並進行Software Forced reload。但是，如果在崩潰之前將配置暫存器更改為此值，則配置暫存器將在重新載入後生效，您可以繼續執行其餘過程。

必要條件

需求

本文件沒有特定需求。

採用元件

本檔案適用於執行Cisco IOS軟體版本12.2(17)SX之前的Supervisor 720型系統。如果您的Supervisor 720執行Cisco IOS軟體版本12.2(17)SX或更新版本，請參閱執行Cisco IOS系統軟體的Catalyst 6000/6500系列交換器的密碼復原程式檔案。

概觀

由於硬體不同，執行Cisco IOS的Catalyst 6500/6000上的開機順序與Cisco 7200系列路由器上的不同。重新通電後，SP將啟動。大約25-60秒後，它將控制檯所有權轉移到路由處理器(RP(MSFC))。 RP繼續載入捆綁的軟體映像。在SP將控制檯的控制權交給RP之後，立即按Ctrl-Break至關重要。如果您傳送中斷序列太快，則最終會進入SP的ROMMON，而不是您應該處於的位置。在主控台上看到以下訊息後，傳送中斷順序：

00:00:03: %OIR-6-CONSOLE: Changing console ownership to route processor

在此之後，口令恢復與普通路由器相同。

註：從現在起，運行Cisco IOS軟體的Catalyst 6500系列交換機稱為路由器。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

逐步程序

由於Cisco IOS作業系統在交換機上運行，因此該交換機被配置為路由器。密碼復原程式與Cisco 7200系列路由器執行的步驟相同。例外情況是，您必須等待大約25至60秒才能開始中斷順序。

1. 將終端機或具有終端模擬的PC連線到路由器的控制檯埠。使用以下終端機設定：

9600 baud rate

No parity

8 data bits

1 stop bit

No flow control

電纜規格檔案中介紹了所需的控制檯電纜規格。模組安裝指南中提供了有關如何連線到控制檯埠的說明。連線到控制檯埠 — 僅Supervisor Engine部分提供了有用的資訊。

2. 如果仍然可以訪問路由器，請發出show version命令，並記錄配置暫存器的設定。它通常為0x2102或0x102。按一下此處檢視show version命令的輸出示例。

3. 如果您無法訪問路由器（由於登入或TACACS密碼丟失），可以安全地假設您的配置暫存器設定為0x2102。

4. 關閉電源，然後在電源開關的幫助下開啟路由器電源。

5. 在RP獲得控制檯埠的控制權後，立即按終端鍵盤上的Break。在執行Cisco IOS的Catalyst 6500上，SP首先啟動。然後將控制權交給RP。RP獲得控制後，啟動中斷順序。當您看到此訊息時，RP已控制主控台連線埠。（在看到以下消息之前不要啟動中斷順序）：

00:00:03: %OIR-6-CONSOLE: Changing console ownership to route processor

由於Cisco錯誤ID CSCec36997(僅供註冊客戶使用)（sup720-native上的密碼恢復會導致在SP上崩潰），您大約需要10秒才能完成步驟6，然後交換器就會崩潰。

如果Break按鍵順序不起作用，請參閱密碼復原期間的標準Break按鍵順序組合以瞭解其他按鍵組合。

6. 在rommon 1>提示符下鍵入confreg 0x2142，以便在不載入配置的情況下從快閃記憶體啟動。

7. 交換器因軟體強制崩潰而崩潰：

rommon 1 >

00:00:41: %SYS-SP-3-LOGGER_FLUSHED: System was paused for 00:00:00 to ensure co.

00:00:41: %SYS-SP-2-INTSCHED: 't_idle' at level 7

-Process= "SCP Download Process", ipl= 7, pid= 57

-Traceback= 4013991C 401232B4 402827F4 40282994 40283010 405CB010 402A9858 4013C

00:00:41: %SYS-SP-2-INTSCHED: 't_idle' at level 7

-Process= "SCP Download Process", ipl= 7, pid= 57

-Traceback= 4013991C 401232B4 402827F4 40282994 40283010 405CB010 402A9858 4013C

00:00:41: %SYS-SP-2-INTSCHED: 't_idle' at level 7

-Process= "SCP Download Process", ipl= 7, pid= 57

-Traceback= 4013991C 401232B4 402827F4 40282994 40283010 405CB010 402A9858 4013C

00:00:41: %OIR-SP-6-CONSOLE: Changing console ownership to switch processor

*** System received a Software forced crash ***

signal= 0x17, code= 0x24, context= 0x4269f6f4

PC = 0x401370d8, Cause = 0x3020, Status Reg = 0x34008002

路由器重新啟動。但是，由於配置暫存器設定為0x2142，因此它忽略其儲存的配置。如果您看到路由器配置仍然存在（仍是以前的主機名），則表明配置暫存器在崩潰之前沒有及時更改為0x2142。如果是這種情況，請重新開始（步驟4）。 如果配置暫存器已正確更改為0x2142，則重新載入後會遇到初始配置問題。

8. 在每個設定問題後鍵入no，或按Ctrl-C跳過初始設定過程。

9. 在Router>提示時鍵入enable。您處於enable模式。將顯示Router#提示。

10. 發出configure memory或copy start running命令將非易失性RAM(NVRAM)複製到記憶體中非常重要。不要發出configure terminal命令。

11. 發出write terminal或show running命令。這些命令顯示路由器的配置。在此配置中，您將在所有介面下看到shutdown命令。這意味著所有介面當前均已關閉。您會看到加密或未加密格式的密碼。

12. 發出configure terminal命令以進入全域性配置模式並進行更改。現在提示符為hostname(config)#。

13. 在全域性配置模式下發出enable secret<password >以更改啟用密碼。

14. 發出config-register 0x2102命令，或是在全域性配置模式下步驟2中記錄的值(Router(config)#)，將配置值設回其原始值。

15. 更改任何虛擬終端密碼（如果存在）：

Router(config)#line vty 0 4

Router(config-line)#password cisco

Router(config-line)#^Z

Router#

16. 在正常使用的每個介面上發出no shutdown命令。發出show ip interface brief命令以檢視介面及其當前狀態的清單。您必須處於啟用模式(Router#)才能執行show ip interface brief命令。以下是一個介面的範例：

Router#show ip interface brief

Interface                  IP-Address      OK? Method Status                Prol

Vlan1                      172.17.10.10    YES TFTP   administratively down dow

Vlan10                     10.1.1.1        YES TFTP   administratively down dow

GigabitEthernet1/1         unassigned      YES unset  administratively down dow

GigabitEthernet1/2         unassigned      YES TFTP   administratively down dow

GigabitEthernet2/1         unassigned      YES TFTP   administratively down dow

GigabitEthernet2/2         unassigned      YES TFTP   administratively down dow

FastEthernet3/1            172.16.84.110   YES TFTP   administratively down dow

<snip>...

Router#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

Router(config)#interface fastEthernet 3/1

Router(config-if)#no shutdown

Router(config-if)#exit

Router(config)# <do other interfaces as necessary...>

17. 按Ctrl-Z離開配置模式。提示符現在為hostname#。

18. 發出write memory或copy running startup命令以提交更改。

輸出示例

此處的示例顯示了實際的密碼恢復過程。此範例是在Catalyst 6500系列交換器的幫助下建立。從show version和show module命令開始，檢視此示例中使用的元件。

Press RETURN to get started.

sup720>enable

Password:

sup720#

sup720#show version

Cisco Internetwork Operating System Software

IOS (tm) s72033_rp Software (s72033_rp-PS-M), Version 12.2(14)SX1, EARLY DEPLOY)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2003 by cisco Systems, Inc.

Compiled Tue 27-May-03 20:40 by ccai

Image text-base: 0x40008C10, data-base: 0x41ACE000

ROM: System Bootstrap, Version 12.2(14r)S9, RELEASE SOFTWARE (fc1)

BOOTLDR: s72033_rp Software (s72033_rp-PS-M), Version 12.2(14)SX1, EARLY DEPLOY)

sup720 uptime is 18 minutes

Time since sup720 switched to active is 17 minutes

System returned to ROM by power-on (SP by reload)

System image file is "disk0:s72033-ps-mz.122-14.SX1.bin"

cisco Catalyst 6000 (R7000) processor with 458752K/65536K bytes of memory.

Processor board ID

SR71000 CPU at 600Mhz, Implementation 0x504, Rev 1.2, 512KB L2 Cache

Last reset from power-on

X.25 software, Version 3.0.0.

Bridging software.

3 Virtual Ethernet/IEEE 802.3  interface(s)

96 FastEthernet/IEEE 802.3 interface(s)

58 Gigabit Ethernet/IEEE 802.3 interface(s)

1917K bytes of non-volatile configuration memory.

8192K bytes of packet buffer memory.

65536K bytes of Flash internal SIMM (Sector size 512K).

Configuration register is 0x2102

sup720#

sup720#show module

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

1   16  16 port GE RJ45                        WS-X6316-GE-TX     SAD04100A9R

2   48  48 port 10/100 mb RJ-45 ethernet       WS-X6248-RJ-45     SAD041402P9

4   16  SFM-capable 16 port 1000mb GBIC        WS-X6516A-GBIC     SAL0705CD7X

5    2  Supervisor Engine 720 (Active)         WS-SUP720-BASE     SAD070600MU

7   24  aCEF720 24 port 1000mb SFP             WS-X6724-SFP       SAD0725035Y

9   48  48-port 10/100 mb RJ45                 WS-X6148-RJ45V     SAL06282HGE

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

1  00d0.9738.702a to 00d0.9738.7039   0.202 5.3(1)       7.7(0.74)APP Ok

2  0001.9709.5c90 to 0001.9709.5cbf   1.2   5.1(1)CSX    7.7(0.74)APP Ok

4  0009.11f6.aa28 to 0009.11f6.aa37   1.0   7.2(1)       7.7(0.74)APP Ok

5  000c.3042.844c to 000c.3042.844f   1.0   7.7(1)       12.2(14)SX1  Ok

7  0030.f272.2666 to 0030.f272.267d   1.0   12.2(14r)S5  12.2(14)SX1  PwrDown

9  0009.127c.8d40 to 0009.127c.8d6f   1.0   5.4(2)       7.7(0.74)APP Ok

Mod Sub-Module                  Model              Serial        Hw     Status

--- --------------------------- ------------------ ------------ ------- -------

5 Policy Feature Card 3       WS-F6K-PFC3A       SAD070601DR   1.0    Ok

5 MSFC3 Daughterboard         WS-SUP720          SAD070500YF   1.0    Ok

7 unknown FRU type (major = 0 WS-F6700-CFC       SAD073201KC   1.0    PwrDown

9 Inline Power Module         WS-F6K-PWR                       1.0    Ok

Mod Online Diag Status

--- -------------------

1 Pass

2 Pass

4 Pass

5 Pass

7 Unknown

9 Pass

sup720#

sup720#

sup720#reload

Proceed with reload? [confirm]

!--- Here you turn off the power and then turn it back on. !--- Here it is done with a reload instead of a hard power-cycle.

*Sep 29 04:21:13: %SYS-5-RELOAD: Reload requested by console.

*Sep 29 04:21:16: %OIR-SP-6-CONSOLE: Changing console ownership to switch procer

*Sep 29 04:21:18: %SYS-SP-5-RELOAD: Reload requested

*Sep 29 04:21:18: %OIR-SP-6-CONSOLE: Changing console ownership to switch procer

***

*** --- SHUTDOWN NOW ---

***

!--- First, the switch processor comes up.

System Bootstrap, Version 7.7(1)

Copyright (c) 1994-2003 by cisco Systems, Inc.

Cat6k-Sup720/SP processor with 524288 Kbytes of main memory

Autoboot executing command: "boot disk0:s72033-ps-mz.122-14.SX1.bin"

Self decompressing the image : ################################################]

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco Internetwork Operating System Software

IOS (tm) s72033_sp Software (s72033_sp-SP-M), Version 12.2(14)SX1, EARLY DEPLOY)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2003 by cisco Systems, Inc.

Compiled Tue 27-May-03 20:48 by ccai

Image text-base: 0x40020C10, data-base: 0x40B98000

00:00:03: %PFREDUN-6-ACTIVE: Initializing as ACTIVE processor

00:00:03: %OIR-6-CONSOLE: Changing console ownership to route processor

!--- The RP now has control of the console. !--- This is when you send the break sequence.

System Bootstrap, Version 12.2(14r)S9, RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/tac

Copyright (c) 2003 by cisco Systems, Inc.

Cat6k-Sup720/RP platform with 524288 Kbytes of main memory

Download Start

*** Mistral Interrupt on line 4 ***

System memory 1 bit ECC correctable error interrupt ..

PC = 0x8000841c, SP = 0x80007f00, RA = 0x80008488

Cause Reg = 0x00004400, Status Reg = 0x3041c003

rommon 1 >

!--- You are now in ROMMON mode on the RP. Continue the password !--- recovery procedure just as on any router. Changing the configuration !--- register from 0x2102 to 0x2142 causes the router to ignore the existing !--- configuration. It needs to be ignored because it has passwords that are not !--- known. Due to Cisco bug ID CSCec36997 : Password recovery on sup720-native leads to crash !--- on SP. You have about 10 seconds to change the configuration register to 0x2142. !--- After these 10 seconds, the SP crashes. If the config register is not changed !--- in time, start again.

rommon 1 > confreg 0x2142

You must reset or power cycle for new config to take effect.

rommon 2 >

!--- Without any intervention, the switch crashes in about 10 seconds !--- after you break into RP ROMMON.

00:00:31: %SYS-SP-3-LOGGER_FLUSHED: System was paused for 00:00:00 to ensure co.

00:00:31: %SYS-SP-2-INTSCHED: 't_idle' at level 7

-Process= "SCP Download Process", ipl= 7, pid= 57

-Traceback= 4013991C 401232B4 402827F4 40282994 40283010 405CB010 402A9858 4013C

00:00:31: %SYS-SP-2-INTSCHED: 't_idle' at level 7

-Process= "SCP Download Process", ipl= 7, pid= 57

-Traceback= 4013991C 401232B4 402827F4 40282994 40283010 405CB010 402A9858 4013C

00:00:31: %SYS-SP-2-INTSCHED: 't_idle' at level 7

-Process= "SCP Download Process", ipl= 7, pid= 57

-Traceback= 4013991C 401232B4 402827F4 40282994 40283010 405CB010 402A9858 4013C

00:00:31: %OIR-SP-6-CONSOLE: Changing console ownership to switch processor

*** System received a Software forced crash ***

signal= 0x17, code= 0x24, context= 0x4269f6f4

PC = 0x401370d8, Cause = 0x3020, Status Reg = 0x34008002

System Bootstrap, Version 7.7(1)

Copyright (c) 1994-2003 by cisco Systems, Inc.

Cat6k-Sup720/SP processor with 524288 Kbytes of main memory

Autoboot executing command: "boot disk0:s72033-ps-mz.122-14.SX1.bin"

Self decompressing the image : ################################################]

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco Internetwork Operating System Software

IOS (tm) s72033_sp Software (s72033_sp-SP-M), Version 12.2(14)SX1, EARLY DEPLOY)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2003 by cisco Systems, Inc.

Compiled Tue 27-May-03 20:48 by ccai

Image text-base: 0x40020C10, data-base: 0x40B98000

00:00:03: %PFREDUN-6-ACTIVE: Initializing as ACTIVE processor

00:00:03: %OIR-6-CONSOLE: Changing console ownership to route processor

System Bootstrap, Version 12.2(14r)S9, RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/tac

Copyright (c) 2003 by cisco Systems, Inc.

Cat6k-Sup720/RP platform with 524288 Kbytes of main memory

Download Start

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Download Completed! Booting the image.

Self decompressing the image : ################################################]

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco Internetwork Operating System Software

IOS (tm) s72033_rp Software (s72033_rp-PS-M), Version 12.2(14)SX1, EARLY DEPLOY)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2003 by cisco Systems, Inc.

Compiled Tue 27-May-03 20:40 by ccai

Image text-base: 0x40008C10, data-base: 0x41ACE000

cisco Catalyst 6000 (R7000) processor with 458752K/65536K bytes of memory.

Processor board ID

SR71000 CPU at 600Mhz, Implementation 0x504, Rev 1.2, 512KB L2 Cache

Last reset from power-on

X.25 software, Version 3.0.0.

Bridging software.

1 Virtual Ethernet/IEEE 802.3  interface(s)

96 FastEthernet/IEEE 802.3 interface(s)

58 Gigabit Ethernet/IEEE 802.3 interface(s)

1917K bytes of non-volatile configuration memory.

8192K bytes of packet buffer memory.

65536K bytes of Flash internal SIMM (Sector size 512K).

--- System Configuration Dialog ---

Would you like to enter the initial configuration dialog? [yes/no]: n

!--- The router ignores the saved configuration and enters !--- the initial configuration mode.

Press RETURN to get started!

00:00:03: %SYS-3-LOGGER_FLUSHED: System was paused for 00:00:00 to ensure conso.

00:00:46: curr is 0x10000

00:00:46: RP: Currently running ROMMON from F1 region

00:01:00: %SYS-5-RESTART: System restarted --

Cisco Internetwork Operating System Software

IOS (tm) s72033_rp Software (s72033_rp-PS-M), Version 12.2(14)SX1, EARLY DEPLOY)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2003 by cisco Systems, Inc.

Compiled Tue 27-May-03 20:40 by ccai

00:01:00: %SNMP-5-COLDSTART: SNMP agent on host Router is undergoing a cold stat

00:01:00: %SYS-6

Router>-BOOTTIME: Time taken to reboot after reload = 1807 seconds

Firmware compiled 19-May-03 10:54 by integ Build [100]

00:00:54: %SPANTREE-SP-5-EXTENDED_SYSID: Extended SysId enabled for type vlan

00:00:54: SP: SP: Currently running ROMMON from F1 region

00:01:00: %SYS-SP-5-RESTART: System restarted --

Cisco Internetwork Operating System Software

IOS (tm) s72033_sp Software (s72033_sp-SP-M), Version 12.2(14)SX1, EARLY DEPLOY)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2003 by cisco Systems, Inc.

Compiled Tue 27-May-03 20:48 by ccai

00:01:01: %OIR-SP-6-INSPS: Power supply inserted in slot 1

00:01:01: %C6KPWR-SP-4-PSOK: power supply 1 turned on.

00:01:01: %OIR-SP-6-INSPS: Power supply inserted in slot 2

00:01:01: %C6KPWR-SP-4-PSOK: power supply 2 turned on.

00:01:01: %C6KPWR-SP-4-PSREDUNDANTBOTHSUPPLY: in power-redundancy mode, system .

00:01:05: %FABRIC-SP-5-FABRIC_MODULE_ACTIVE: the switching fabric module in sloe

00:01:06: %DIAG-SP-6-RUN_MINIMUM: Module 5: Running Minimum Diagnostics...

Router>

Router>

00:01:18: %DIAG-SP-6-DIAG_OK: Module 5: Passed Online Diagnostics

00:01:18: %OIR-SP-6-INSCARD: Card inserted in slot 5, interfaces are now online

00:01:21: %DIAG-SP-6-RUN_MINIMUM: Module 4: Running Minimum Diagnostics...

Router>

Router>

Router>

00:01:36: %DIAG-SP-6-RUN_MINIMUM: Module 9: Running Minimum Diagnostics...

Router>

Router>

00:01:42: %DIAG-SP-6-RUN_MINIMUM: Module 1: Running Minimum Diagnostics...

00:01:44: %DIAG-SP-6-DIAG_OK: Module 4: Passed Online Diagnostics

00:01:45: %OIR-SP-6-INSCARD: Card inserted in slot 4, interfaces are now online

00:01:54: %DIAG-SP-6-DIAG_OK: Module 9: Passed Online Diagnostics

00:01:54: %OIR-SP-6-INSCARD: Card inserted in slot 9, interfaces are now online

00:01:57: %DIAG-SP-6-DIAG_OK: Module 1: Passed Online Diagnostics

00:01:57: %OIR-SP-6-INSCARD: Card inserted in slot 1, interfaces are now online

00:02:06: %DIAG-SP-6-RUN_MINIMUM: Module 2: Running Minimum Diagnostics...

00:02:15: %DIAG-SP-6-DIAG_OK: Module 2: Passed Online Diagnostics

00:02:15: %OIR-SP-6-INSCARD: Card inserted in slot 2, interfaces are now online

Router>

Router>enable

Router#

!--- You go right into privilege mode without needing a password. !--- At this point, the configuration running-config is a default configuration !--- with all the ports administratively down (shutdown).

Router#copy startup-config running-config

Destination filename [running-config]? <press enter>

!--- This pulls in your original configuration. Since you are already in privilege !--- mode, the passwords in this configuration (that are not known) do not affect you.

4864 bytes copied in 2.48 secs (2432 bytes/sec)

sup720#

sup720#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

sup720(config)#enable secret < password > [Choose a strong password with at least one capital letter, one number, and one special character.]

!--- Overwrite the password that you do not know. This is your new enable password.

sup720#show ip interface brief

Interface                  IP-Address      OK? Method Status                Prol

Vlan1                      10.48.72.142    YES TFTP   administratively down dow

Vlan500                    10.1.1.1        YES TFTP   administratively down dow

Vlan501                    10.2.2.1        YES TFTP   administratively down dow

GigabitEthernet1/1         unassigned      YES TFTP   administratively down dow

GigabitEthernet1/2         unassigned      YES TFTP   administratively down dow

GigabitEthernet1/3         unassigned      YES TFTP   administratively down dow

GigabitEthernet1/4         unassigned      YES TFTP   administratively down dow

GigabitEthernet1/5         unassigned      YES TFTP   administratively down dow

GigabitEthernet1/6         unassigned      YES TFTP   administratively down dow

GigabitEthernet1/7         unassigned      YES TFTP   administratively down dow

<snip>...

!--- Issue the no shut command on all interfaces that you want to bring up.

sup720#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

sup720(config)#interface gig 1/1

sup720(config-if)#no shut

sup720(config-if)#^Z

sup720#

!--- Overwrite the virtual terminal passwords.

sup720#configure terminal

sup720(config)#line vty 0 4

sup720(config-line)#password XXX

sup720(config-line)#^Z

sup720#

!--- Restore the configuration register to its normal state !--- so that it no longer ignores the stored configuration file.

sup720#show version

Cisco Internetwork Operating System Software

IOS (tm) s72033_rp Software (s72033_rp-PS-M), Version 12.2(14)SX1, EARLY DEPLOY)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2003 by cisco Systems, Inc.

Compiled Tue 27-May-03 20:40 by ccai

Image text-base: 0x40008C10, data-base: 0x41ACE000

ROM: System Bootstrap, Version 12.2(14r)S9, RELEASE SOFTWARE (fc1)

BOOTLDR: s72033_rp Software (s72033_rp-PS-M), Version 12.2(14)SX1, EARLY DEPLOY)

sup720 uptime is 4 minutes

Time since sup720 switched to active is 4 minutes

System returned to ROM by power-on (SP by error - a Software forced crash, PC 0)

System image file is "disk0:s72033-ps-mz.122-14.SX1.bin"

cisco Catalyst 6000 (R7000) processor with 458752K/65536K bytes of memory.

Processor board ID

SR71000 CPU at 600Mhz, Implementation 0x504, Rev 1.2, 512KB L2 Cache

Last reset from power-on

X.25 software, Version 3.0.0.

Bridging software.

3 Virtual Ethernet/IEEE 802.3  interface(s)

96 FastEthernet/IEEE 802.3 interface(s)

58 Gigabit Ethernet/IEEE 802.3 interface(s)

1917K bytes of non-volatile configuration memory.

8192K bytes of packet buffer memory.

65536K bytes of Flash internal SIMM (Sector size 512K).

Configuration register is 0x2142

sup720#

sup720#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

sup720(config)#config-register 0x2102

sup720(config)#

!--- Verify that the configuration register is changed for the next reload.

sup720#show version

Cisco Internetwork Operating System Software

IOS (tm) s72033_rp Software (s72033_rp-PS-M), Version 12.2(14)SX1, EARLY DEPLOY)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2003 by cisco Systems, Inc.

Compiled Tue 27-May-03 20:40 by ccai

Image text-base: 0x40008C10, data-base: 0x41ACE000

ROM: System Bootstrap, Version 12.2(14r)S9, RELEASE SOFTWARE (fc1)

BOOTLDR: s72033_rp Software (s72033_rp-PS-M), Version 12.2(14)SX1, EARLY DEPLOY

sup720 uptime is 4 minutes

Time since sup720 switched to active is 4 minutes

System returned to ROM by power-on (SP by error - a Software forced crash, PC 0)

System image file is "disk0:s72033-ps-mz.122-14.SX1.bin"

cisco Catalyst 6000 (R7000) processor with 458752K/65536K bytes of memory.

Processor board ID

SR71000 CPU at 600Mhz, Implementation 0x504, Rev 1.2, 512KB L2 Cache

Last reset from power-on

X.25 software, Version 3.0.0.

Bridging software.

3 Virtual Ethernet/IEEE 802.3  interface(s)

96 FastEthernet/IEEE 802.3 interface(s)

58 Gigabit Ethernet/IEEE 802.3 interface(s)

1917K bytes of non-volatile configuration memory.

8192K bytes of packet buffer memory.

65536K bytes of Flash internal SIMM (Sector size 512K).

Configuration register is 0x2142 (will be 0x2102 at next reload)

sup720#

sup720#copy running-config startup-config

Destination filename [startup-config]?

Building configuration...

[OK]

sup720#

!--- Optional: If you want to test that the router operates properly and that you have changed the passwords, !--- reload and test.

sup720#reload

Proceed with reload? [confirm]

相關資訊

- LAN 產品支援頁面

- LAN 交換支援頁面

- 技術支援 - Cisco Systems