目錄

簡介

必要條件

需求

採用元件

慣例

背景資訊

設定

網路圖表

組態

驗證

疑難排解

相關資訊

簡介

本檔案將提供透過TCP/IP傳輸的光纖通道(FCIP)多層次導向器交換器(MDS)到MDS的範例組態。

FCIP介紹的機制允許光纖通道(FC)儲存區域網路(SAN)的孤島透過基於IP的網路互連，以在單個FC網狀架構中形成整合SAN。FCIP依靠基於IP的網路服務在區域網、都會網路或廣域網上的SAN孤島之間提供連線。

圖1 — 通過FCIP連線的光纖通道SAN

FCIP在連線埠3225上使用傳輸控制通訊協定(TCP)作為網路層傳輸。

必要條件

需求

嘗試此組態之前，請確保符合以下要求：

- IP骨幹必須可操作，並交付所需的頻寬，以支援跨FCIP鏈路運行的應用 — 這可以是第2層(L2)或第3層(L3)拓撲。

- 如果是L3拓撲，必須設定並配置中間路由器或多層交換機，以在FCIP隧道的源和目標IP地址之間正確轉發IP流量。如果在FCIP對等點之間的路徑中的任何網路裝置上強制執行服務品質(QoS)或流量調節，則在多層導向器交換器(MDS)FCIP設定檔上設定任何TCP相關引數和功能之前，應徵詢管理IP基礎架構的網路管理員以取得必要的詳細資訊。

- 如果在MDS IP儲存(IPS)服務模組上配置了子介面，則與MDS相鄰的乙太網交換機必須支援並配置為802.1Q中繼。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 運行1.2.(2a)版的MDS 9509和IPS服務模組(DS-X9308-SMIP)

- 運行1.2.(2a)版的MDS 9216，帶IPS服務模組(DS-X9308-SMIP)

- 執行Catalyst OS(CatOS)7.4(3)的Catalyst 6509

- 採用Emulex LP9K HBA的Win2003伺服器(HPQ Pro-Liant-P4)

- IBM儲存陣列(ESS-2105-F20)

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

背景資訊

FCIP由以下規範組成：

ANSI T11

1. FC-SW-2描述了FC交換機的操作和互動，包括E_Port和交換矩陣操作。

2. FC-BB-2對映屬於跨TCP網路骨幹網的FC交換網路擴展，並定義支援E_Port和B_Port的參考模型。

IETF IPS工作組

1. 使用TCP的FC涵蓋通過IP網路傳輸FC幀的TCP/IP要求。

2. FC幀封裝定義了常見的光纖封裝格式。

跨FCIP的兩個SAN交換器或網狀架構之間的互連稱為FCIP連結，且可包含一個或多個的TCP連線。FCIP連結的每個端都與一虛擬E連線埠(VE_port)或B_port相關聯，視實施而定。FC-BB和FC-BB-2描述了兩種方法的區別。IPS服務模組(DS-X9308-SMIP)支援這兩種模式，但預設情況下為VE_Port，如果所有相關對等體都是DS-X9308-SMIP模組，則此模式也是建議運行的模式。在此拓撲示例中，討論了PortChannel上的FCIP、要配置的TCP引數以及FSF（特殊幀）配置引數。

設定

本節提供用於設定本文件中所述功能的資訊。

在MDSes上，您需要熟悉兩個平台的IPS配置指南。您可以在Cisco.com上的配置IP儲存中找到最新版本的手冊。

註：使用Command Lookup Tool(僅限註冊客戶)查詢有關本文檔中使用的命令的更多資訊。

網路圖表

本檔案會使用以下網路設定：

圖2 — 拓撲3

拓撲3描述由兩個單獨FCIP隧道構成的一個FCIP埠通道；對等介面通過IP雲。IP網雲被摺疊成一台多層交換機(Catalyst 6500)，該交換機將流量從子網A路由到子網C，從子網C路由到子網A（以及從子網B路由到子網D，從子網D路由到子網A）。 子網定義如下：

- 子網A :100.100.100.0/30 - Bison Gig4/1

- 子網B:100.100.100.4/30 - Bison Gig4/2

- 子網C:200.200.200.0/30-坎特伯里Gig2/1

- 子網D:200.200.200.4/30 - Canterbury Gig2/2

此拓撲提供已知的最大頻寬100 Mbps和最小頻寬100 Mbps，這是通過此IP雲為相關IP流量運行的配置檔案。初始配置顯示了基於FCIP的埠通道和TCP流量調節的各個方面。在後續各節中，將進一步說明FSF、被動TCP介面和FCIP時間戳。

組態

本檔案會使用以下設定：

- 採用IPS-8模組的MDS 9509(Bison)

- 含IPS-8模組的MDS 9612(Canterbury)

採用IPS-8模組的MDS 9509(Bison)

bison# sh ver

Cisco Storage Area Networking Operating System (SAN-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2003 by Cisco Systems, Inc. All rights reserved.

The copyright for certain works contained herein are owned by

Andiamo Systems, Inc. and/or other third parties and are used and

distributed under license.

Software

BIOS: version 1.0.8

loader: version 1.2(2)

kickstart: version 1.2(2a)

system: version 1.2(2a)

BIOS compile time: 08/07/03

kickstart image file is: bootflash:/k122a

kickstart compile time: 9/23/2003 11:00:00

system image file is: bootflash:/s122a

system compile time: 10/8/2003 18:00:00

Hardware

RAM 1024584 kB

bootflash: 500736 blocks (block size 512b)

slot0: 0 blocks (block size 512b)

bison uptime is 1 days 15 hours 45 minute(s) 44 second(s)

Last reset

Reason: Unknown

System version: 1.2(2a)

Service:

bison# sh run

Building Configuration ...

fcip profile 1

ip address 100.100.100.1

tcp max-bandwidth-mbps 100 min-available-bandwidth-mbps 100 round-trip-time-ms 10

!--- TCP bandwidth parameters defined specifically for this FCIP tunnel. !--- Restricted to 100 Mbps max and min. See the Note on TCP Parameters !--- comment section in this table below for more details.

fcip profile 2

ip address 100.100.100.5

tcp max-bandwidth-mbps 100 min-available-bandwidth-mbps 100 round-trip-time-ms 10

!--- TCP max and min bandwidth parameter are configured here exactly the !--- same as for FCIP 1 because both tunnels are combined in one PortChannel !--- interface and are subject to the same bandwidth restrictions in the IP core.

vsan database

vsan 600

vsan 601

fcdomain domain 1 preferred vsan 600

fcdomain domain 1 preferred vsan 601

interface port-channel 1

switchport trunk allowed vsan 600-601

interface fcip1

channel-group 1 force

no shutdown

use-profile 1

peer-info ipaddr 200.200.200.1

!--- Interface FCIP 1 is a member of channel-group 1. The force keyword makes it !--- adopt the specific settings configured on interface port-channel 1.

interface fcip2

channel-group 1 force

no shutdown

use-profile 2

peer-info ipaddr 200.200.200.5

!--- Interface FCIP 2 is also member of channel-group 1.

boot system bootflash:/s122a sup-1

boot kickstart bootflash:/k122a sup-1

boot system bootflash:/s122a sup-2

boot kickstart bootflash:/k122a sup-2

ip domain-name cisco.com

ip name-server 144.254.10.123

ip route 200.200.200.0 255.255.255.252 100.100.100.2 distance 2

ip route 200.200.200.4 255.255.255.252 100.100.100.6 distance 2

!--- FCIP interfaces are on separate IP subnets, so in order to reach the FCIP !--- peer IP address, you need adequate static routes to an L3 device that !--- knows how to forward the packets to the final destination. Multiple routes !--- to the same destination IP subnet are allowed, and the distance parameter !--- can be used to specify a preferred next hop. Multiple next hops would !--- require a subnet mask providing for a larger number of host; for example, !--- a 28-bit subnet mask.

ssh key dsa 768 force

ssh server enable

switchname bison

zone default-zone permit vsan 600-601

interface GigabitEthernet4/1

ip address 100.100.100.1 255.255.255.252

switchport mtu 3000

no shutdown

!--- MTU size is defined as 3000 bytes. Make sure that all intermediate network !--- devices between this interface and the peer IP address are capable of !--- switching and routing Jumbo frames. In order to avoid FC Frame split, !--- an MTU value of 2300 is required; 3000 is used in the configuration example !--- for simplicity. FCIP TCP segments will normally never exceed 2264 bytes for !--- TE ports or 2256 bytes for E ports, regardless of the configured MTU size.

interface GigabitEthernet4/2

ip address 100.100.100.5 255.255.255.252

switchport mtu 3000

no shutdown

interface fc3/1

interface fc3/2

interface fc3/3

interface fc3/4

interface fc3/5

interface fc3/6

interface fc3/7

interface fc3/8

interface fc3/9

interface fc3/10

interface fc3/11

interface fc3/12

interface fc3/13

interface fc3/14

interface fc3/15

interface fc3/16

interface mgmt0

ip address 10.48.69.151 255.255.255.128

!--- Note on TCP Parameters !--- The following TCP parameters can be individually configured per FCIP profile:

bison(config-profile)# tcp ?

cwm Enable congestion window monitoring

keepalive-timeout Set keep alive timeout in sec

max-bandwidth-kbps Configure maximum available path bandwidth in Kbps

max-bandwidth-mbps Configure maximum available path bandwidth in Mbps

max-retransmissions Maximum number of retransmissions

min-retransmit-time Set minimum retransmit time in millisecond

pmtu-enable Enable PMTU Discovery

sack-enable Enable SACK option for TCP

send-buffer-size Send buffer size in KBytes

!--- The CWM parameter default value is 10K and should be left untouched under !--- normal conditions. Congestion window monitoring (CWM) is a way of !--- controlling burstiness after long idle times or loss of Acks.

!--- The keepalive-timeout is the TCP keepalive timeout value and is !--- set to 60 seconds by default, though it can range between 1 and 7200 seconds.

!--- The max- and min-bandwidth parameters program the TCP Maximum Window Size !--- (scaling factor) and engages an internal “shaper” functionality. !--- These values should be carefully chosen and requires understanding of the !--- intermediate network’s end-to-end topology. The default values are to be !--- changed according to the aforementioned requirements. !--- The Round-trip-time can be derived once you have your FCIP tunnel up and !--- running by issuing the following command:

bison# ips measure 200.200.200.1 interface gigabitethernet 4/1

Round trip time is 53 micro seconds (0.05 milliseconds )

!--- Always add an additional margin of at least a few microseconds to this value. !--- The max-retransmissions counter is set to 4 by default. In a healthy network !--- environment, this value should be left unchanged.

!--- The max-retransmission timer is set to 200 milliseconds. If you experience !--- extremely high retransmission counters, this value can be increased; but, !--- in general, changing this parameter is not required unless the RTT is !--- above 200 milliseconds.

!--- The PMTU (Path MTU discovery) is enabled by default. Best practice is to know !--- what is the maximum MTU size supported by all interfaces along the logical !--- path between both peers.

!--- The SACK feature (Selective Acknowledgment) is not enabled by default. !--- Consider enabling it when you have a lot of retransmissions occurring between !--- the two peers. SACK allows selective retransmissions of your window, which is !--- beneficial if larger maximum window sizes are configured and retransmissions !--- occur frequently. It is enabled in this sample configuration; when you do so, !--- make sure that it is enabled at both sides of the link.

!--- The send-buffer-size is the amount of buffers in addition to the TCP window !--- that are allowed to be transmitted out before starting to flow control the FC !--- sources. The default value is set to 0.

- 有關PMTU的詳細資訊，請參閱RFC 1191 — 路徑MTU探索 。

- 有關SACK的詳細資訊，請參閱RFC 2018 - TCP選擇性確認選項 和RFC 2883 - TCP選擇性確認(SACK)選項的擴展

含IPS-8模組的MDS 9216(Canterbury)

canterbury# sh run

Building Configuration ...

fcip profile 200

ip address 200.200.200.1

tcp max-bandwidth-mbps 100 min-available-bandwidth-mbps 100 round-trip-time-ms 10

fcip profile 201

ip address 200.200.200.5

tcp max-bandwidth-mbps 100 min-available-bandwidth-mbps 100 round-trip-time-ms 10

!--- The TCP parameters are identical to what is configured on the peering !--- FCIP interfaces. Only in very specific cases should different values be !--- considered, for example, if the return-path(s) are running across a different !--- part of the network or if the application dictates asymmetrical values.

vsan database

vsan 600

vsan 601

fcdomain domain 2 preferred vsan 600

fcdomain domain 2 preferred vsan 601

interface port-channel 2

switchport trunk mode auto

switchport trunk allowed vsan 600-601

interface fcip1

channel-group 2 force

no shutdown

use-profile 200

peer-info ipaddr 100.100.100.1

interface fcip2

channel-group 2 force

no shutdown

use-profile 201

peer-info ipaddr 100.100.100.5

!--- Both FCIP 1 and FCIP 2 are bound to the same channel-group 2. Also note that !--- there is no strict relationship between profile-id and FCIP interface !--- numbering here, as this is not a requirement. From a management and !--- troubleshooting perspective, however, a “strict” relationship of both values !--- is recommended.

vsan database

vsan 600 interface fc1/1

vsan 601 interface fc1/8

boot system bootflash:/s122a

boot kickstart bootflash:/k122a

ip domain-name cisco.com

ip name-server 144.254.10.123

ip default-gateway 10.48.69.129

ip route 100.100.100.0 255.255.255.252 200.200.200.2 distance 2

ip route 100.100.100.4 255.255.255.252 200.200.200.6 distance 2

!--- IP routes are defined for both FCIP peer IP addresses. The next hop must be !--- aware of the best route to the peer’s addresses or to the relevant IP subnets.

ssh key dsa 768 force

ssh server enable

switchname canterbury

system default switchport trunk mode auto

username admin password 5 $1$KcCrqxlu$mtU03/60PRUIfjl.aeEEc0 role network-admin

zone default-zone permit vsan 600-601

zoneset distribute full vsan 1-4093

interface GigabitEthernet2/1

ip address 200.200.200.1 255.255.255.252

switchport mtu 3000

no shutdown

interface GigabitEthernet2/2

ip address 200.200.200.5 255.255.255.252

switchport mtu 3000

no shutdown

interface GigabitEthernet2/3

interface GigabitEthernet2/4

interface GigabitEthernet2/5

interface GigabitEthernet2/6

interface GigabitEthernet2/7

interface GigabitEthernet2/8

interface fc1/1

interface fc1/2

interface fc1/3

interface fc1/4

interface fc1/5

interface fc1/6

interface fc1/7

interface fc1/8

interface fc1/9

interface fc1/10

interface fc1/11

interface fc1/12

interface fc1/13

interface fc1/14

interface fc1/15

interface fc1/16

interface mgmt0

ip address 10.48.69.156 255.255.255.128

interface iscsi2/1

interface iscsi2/2

interface iscsi2/3

interface iscsi2/4

interface iscsi2/5

interface iscsi2/6

interface iscsi2/7

interface iscsi2/8

驗證

使用本節內容，確認您的組態是否正常運作。

輸出直譯器工具(僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

- show interface gig x/y — 顯示繫結到FCIP配置檔案的相關Gigabit介面的狀態。

- show ips stats tcp int gig x/y — 顯示相關Gigabit介面的TCP統計資訊和活動連線。

- show ips arp int gig x/y — 顯示相關Gigabit介面的所有位址解析通訊協定(ARP)專案；下一個躍點或對等點應位於此清單中。

- show ips ip route int gig x/y — 顯示通過相關Gigabit介面的特定路由。

- show interface fcip x — 顯示FCIP介面狀態及與此FCIP通道相關的所有詳細資訊。

- show profile fcip x — 顯示將配置檔案繫結到的IP地址和所有配置的TCP引數。

- show int fcip x counters — 用於檢查是否有任何訊框通過FCIP通道。

- show fcdomain vsan x — 列出所有與域相關的詳細資訊；用於驗證是否已在FCIP通道中形成交換矩陣。

- show fcns da vsan x — 顯示相關VSAN的所有pwwn、FC4-Types和FCID;用於驗證是否所有期望的條目都通過FCIP隧道分發。

疑難排解

使用本節內容，對組態進行疑難排解。

確保多次發出show命令以構建計數器歷史記錄。與某個時間點無關且僅收集一次的計數器基本上是無用的。

使用以下配置進行進一步的故障排除。

- MDS 9509（野牛）

- MDS 9216（坎特伯里）

- 特殊訊框組態(Bison)

- 特殊幀配置(Canterbury)

- 來自拜森和坎特伯雷的顯示器 — 坎特伯雷被動

- 從Bison和Canterbury顯示 — 時間戳設定

MDS 9509（野牛）

bison# sh int gig 4/1

GigabitEthernet4/1 is up

Hardware is GigabitEthernet, address is 0005.3000.a85a

Internet address is 100.100.100.1/30

MTU 3000 bytes

Port mode is IPS

Speed is 1 Gbps

Beacon is turned off

Auto-Negotiation is turned on

5 minutes input rate 312 bits/sec, 39 bytes/sec, 0 frames/sec

5 minutes output rate 312 bits/sec, 39 bytes/sec, 0 frames/sec

8685 packets input, 976566 bytes

0 multicast frames, 0 compressed

0 input errors, 0 frame, 0 overrun 0 fifo

8679 packets output, 972382 bytes, 0 underruns

0 output errors, 0 collisions, 0 fifo

0 carrier errors

bison# sh int gig 4/2

GigabitEthernet4/2 is up

Hardware is GigabitEthernet, address is 0005.3000.a85b

Internet address is 100.100.100.5/30

MTU 3000 bytes

Port mode is IPS

Speed is 1 Gbps

Beacon is turned off

Auto-Negotiation is turned on

5 minutes input rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

5 minutes output rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

590 packets input, 46496 bytes

0 multicast frames, 0 compressed

0 input errors, 0 frame, 0 overrun 0 fifo

547 packets output, 30898 bytes, 0 underruns

0 output errors, 0 collisions, 0 fifo

0 carrier errors

bison# sh ips stats tcp int gig 4/1

TCP Statistics for port GigabitEthernet4/1

Connection Stats

14 active openings, 4 accepts

4 failed attempts, 0 reset received, 14 established

Segment stats

8897 received, 8505 sent, 0 retransmitted

0 bad segments received, 0 reset sent

TCP Active Connections

Local Address        Remote Address      State      Send-Q  Recv-Q

100.100.100.1:65480  200.200.200.1:3225  ESTABLISH  0       0

100.100.100.1:65482  200.200.200.1:3225  ESTABLISH  0       0

100.100.100.1:3225   0.0.0.0:0           LISTEN     0       0

bison# sh ips stats tcp int gig 4/2

TCP Statistics for port GigabitEthernet4/2

Connection Stats

2 active openings, 0 accepts

0 failed attempts, 0 reset received, 2 established

Segment stats

598 received, 43 sent, 0 retransmitted

0 bad segments received, 0 reset sent

TCP Active Connections

Local Address        Remote Address      State      Send-Q  Recv-Q

100.100.100.5:65531  200.200.200.5:3225  ESTABLISH  0       0

100.100.100.5:65533  200.200.200.5:3225  ESTABLISH  0       0

100.100.100.5:3225   0.0.0.0:0           LISTEN     0       0

bison# sh int fcip1-2

fcip1 is trunking

Hardware is GigabitEthernet

Port WWN is 20:c2:00:05:30:00:7a:de

Peer port WWN is 20:42:00:0c:30:6c:24:40

Admin port mode is auto, trunk mode is on

Port mode is TE

vsan is 1

Belongs to port-channel 1

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 1 (interface GigabitEthernet4/1)

Peer Information

Peer Internet address is 200.200.200.1 and port is 3225

Special Frame is disabled

Maximum number of TCP connections is 2

Time Stamp is disabled

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 100.100.100.1:65480, Remote 200.200.200.1:3225

Data connection: Local 100.100.100.1:65482, Remote 200.200.200.1:3225

28 Attempts for active connections, 7 close of connections

TCP Parameters

Path MTU 3000 bytes

Current retransmission timeout is 200 ms

Round trip time: Smoothed 5 ms, Variance: 6

Advertized window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 10 KB, Slow start threshold: 118 KB

5 minutes input rate 120 bits/sec, 15 bytes/sec, 0 frames/sec

5 minutes output rate 120 bits/sec, 15 bytes/sec, 0 frames/sec

4077 frames input, 379836 bytes

4071 Class F frames input, 379100 bytes

6 Class 2/3 frames input, 736 bytes

0 Error frames timestamp error 0

4077 frames output, 381064 bytes

4071 Class F frames output, 380364 bytes

6 Class 2/3 frames output, 700 bytes

0 Error frames 0 reass frames

fcip2 is trunking

Hardware is GigabitEthernet

Port WWN is 20:c6:00:05:30:00:7a:de

Peer port WWN is 20:46:00:0c:30:6c:24:40

Admin port mode is auto, trunk mode is on

Port mode is TE

vsan is 1

Belongs to port-channel 1

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 2 (interface GigabitEthernet4/2)

Peer Information

Peer Internet address is 200.200.200.5 and port is 3225

Special Frame is disabled

Maximum number of TCP connections is 2

Time Stamp is disabled

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 100.100.100.5:65531, Remote 200.200.200.5:3225

Data connection: Local 100.100.100.5:65533, Remote 200.200.200.5:3225

2 Attempts for active connections, 0 close of connections

TCP Parameters

Path MTU 3000 bytes

Current retransmission timeout is 200 ms

Round trip time: Smoothed 0 ms, Variance: 0

Advertized window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 8 KB, Slow start threshold: 118 KB

5 minutes input rate 32 bits/sec, 4 bytes/sec, 0 frames/sec

5 minutes output rate 32 bits/sec, 4 bytes/sec, 0 frames/sec

8 frames input, 1232 bytes

8 Class F frames input, 1232 bytes

0 Class 2/3 frames input, 0 bytes

0 Error frames timestamp error 0

8 frames output, 1228 bytes

8 Class F frames output, 1228 bytes

0 Class 2/3 frames output, 0 bytes

0 Error frames 0 reass frames

bison# sh fcip pro 1

FCIP Profile 1

Internet Address is 100.100.100.1 (interface GigabitEthernet4/1)

Listen Port is 3225

TCP parameters

SACK is enabled

PMTU discovery is enabled, reset timeout is 3600 sec

Keep alive is 60 sec

Minimum retransmission timeout is 200 ms

Maximum number of re-transmissions is 4

Send buffer size is 0 KB

Maximum allowed bandwidth is 100000 kbps

Minimum available bandwidth is 100000 kbps

Estimated round trip time is 10000 usec

Congestion window monitoring is enabled, burst size is 10 KB

bison# sh fcip pro 2

FCIP Profile 2

Internet Address is 100.100.100.5 (interface GigabitEthernet4/2)

Listen Port is 3225

TCP parameters

SACK is enabled

PMTU discovery is enabled, reset timeout is 3600 sec

Keep alive is 60 sec

Minimum retransmission timeout is 200 ms

Maximum number of re-transmissions is 4

Send buffer size is 0 KB

Maximum allowed bandwidth is 100000 kbps

Minimum available bandwidth is 100000 kbps

Estimated round trip time is 10000 usec

Congestion window monitoring is enabled, burst size is 10 KB

bison# sh int port-channel 1

port-channel 1 is trunking

Hardware is Fibre Channel

Port WWN is 24:01:00:05:30:00:7a:de

Admin port mode is auto, trunk mode is on

Port mode is TE

Port vsan is 1

Speed is 2 Gbps

Trunk vsans (admin allowed and active) (600-601)

Trunk vsans (up)                       (600-601)

Trunk vsans (isolated)                 ()

Trunk vsans (initializing)             ()

5 minutes input rate 120 bits/sec, 15 bytes/sec, 0 frames/sec

5 minutes output rate 120 bits/sec, 15 bytes/sec, 0 frames/sec

3969 frames input, 369812 bytes

3963 Class F frames input, 369076 bytes

6 Class 2/3 frames input, 736 bytes

0 Error frames timestamp error 0

3969 frames output, 371040 bytes

3963 Class F frames output, 370340 bytes

6 Class 2/3 frames output, 700 bytes

0 Error frames 0 reass frames

Member[1] : fcip1

Member[2] : fcip2

bison# sh ips ip route interface gigabitethernet 4/1

Codes: C - connected, S - static

No default gateway

S 200.200.200.0/30 via 100.100.100.2, GigabitEthernet4/1

C 100.100.100.0/30 is directly connected, GigabitEthernet4/1

bison# sh ips ip route interface gigabitethernet 4/2

Codes: C - connected, S - static

No default gateway

S 200.200.200.4/30 via 100.100.100.6, GigabitEthernet4/2

C 100.100.100.4/30 is directly connected, GigabitEthernet4/2

bison# sh ips arp int gig 4/1

Protocol         Address   Age (min)   Hardware Addr  Type   Interface

Internet   100.100.100.2        8     0008.e21e.c7bc  ARPA  GigabitEthernet4/1

!--- Verify that the hardware address listed belongs to the !--- next hop networking device.

bison# sh ips arp int gig 4/2

Protocol         Address   Age (min)   Hardware Addr  Type   Interface

Internet   100.100.100.6        5     0008.e21e.c7bc  ARPA  GigabitEthernet4/2

bison# sh int port-channel 1 trunk vsan 600-601

port-channel 1 is trunking

Vsan 600 is up, FCID is 0x010000

Vsan 601 is up, FCID is 0x010000

bison# sh fcdomain vsan 600

The local switch is the Principal Switch.

Local switch run time information:

State: Stable

Local switch WWN: 22:58:00:05:30:00:7a:df

Running fabric name: 22:58:00:05:30:00:7a:df

Running priority: 2

Current domain ID: 0x01(1)

Local switch configuration information:

State: Enabled

FCID persistence: Disabled

Auto-reconfiguration: Disabled

Contiguous-allocation: Disabled

Configured fabric name: 20:01:00:05:30:00:28:df

Configured priority: 128

Configured domain ID: 0x01(1) (preferred)

Principal switch run time information:

Running priority: 2

Interface        Role          RCF-reject

---------------- ------------- ------------

port-channel 1   Downstream    Disabled

---------------- ------------- ------------

bison# sh fcdomain vsan 601

The local switch is the Principal Switch.

Local switch run time information:

State: Stable

Local switch WWN: 22:59:00:05:30:00:7a:df

Running fabric name: 22:59:00:05:30:00:7a:df

Running priority: 2

Current domain ID: 0x01(1)

Local switch configuration information:

State: Enabled

FCID persistence: Disabled

Auto-reconfiguration: Disabled

Contiguous-allocation: Disabled

Configured fabric name: 20:01:00:05:30:00:28:df

Configured priority: 128

Configured domain ID: 0x01(1) (preferred)

Principal switch run time information:

Running priority: 2

Interface        Role          RCF-reject

---------------- ------------- ------------

port-channel 1   Downstream    Disabled

---------------- ------------- ------------

MDS 9216（坎特伯里）

canterbury# sh int gig 2/1-2

GigabitEthernet2/1 is up

Hardware is GigabitEthernet, address is 0005.3000.ade6

Internet address is 200.200.200.1/30

MTU 3000 bytes

Port mode is IPS

Speed is 1 Gbps

Beacon is turned off

Auto-Negotiation is turned on

5 minutes input rate 320 bits/sec, 40 bytes/sec, 0 frames/sec

5 minutes output rate 320 bits/sec, 40 bytes/sec, 0 frames/sec

8844 packets input, 993118 bytes

0 multicast frames, 0 compressed

0 input errors, 0 frame, 0 overrun 0 fifo

8855 packets output, 994686 bytes, 0 underruns

0 output errors, 0 collisions, 0 fifo

0 carrier errors

GigabitEthernet2/2 is up

Hardware is GigabitEthernet, address is 0005.3000.ade7

Internet address is 200.200.200.5/30

MTU 3000 bytes

Port mode is IPS

Speed is 1 Gbps

Beacon is turned off

Auto-Negotiation is turned on

5 minutes input rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

5 minutes output rate 8 bits/sec, 1 bytes/sec, 0 frames/sec

634 packets input, 39538 bytes

0 multicast frames, 0 compressed

0 input errors, 0 frame, 0 overrun 0 fifo

610 packets output, 47264 bytes, 0 underruns

0 output errors, 0 collisions, 0 fifo

0 carrier errors

canterbury# sh ips stats tcp int gig 2/1

TCP Statistics for port GigabitEthernet2/1

Connection Stats

18 active openings, 10 accepts

14 failed attempts, 0 reset received, 8 established

Segment stats

8919 received, 8923 sent, 0 retransmitted

0 bad segments received, 0 reset sent

TCP Active Connections

Local Address       Remote Address       State      Send-Q  Recv-Q

200.200.200.1:3225  100.100.100.1:65480  ESTABLISH  0       0

200.200.200.1:3225  100.100.100.1:65482  ESTABLISH  0       0

200.200.200.1:3225  0.0.0.0:0            LISTEN     0       0

canterbury# sh ips stats tcp int gig 2/2

TCP Statistics for port GigabitEthernet2/2

Connection Stats

498 active openings, 2 accepts

498 failed attempts, 0 reset received, 2 established

Segment stats

556 received, 579 sent, 0 retransmitted

0 bad segments received, 0 reset sent

TCP Active Connections

Local Address       Remote Address       State      Send-Q  Recv-Q

200.200.200.5:3225  100.100.100.5:65531  ESTABLISH  0       0

200.200.200.5:3225  100.100.100.5:65533  ESTABLISH  0       0

200.200.200.5:3225  0.0.0.0:0            LISTEN     0       0

canterbury# sh int fcip 1-2

fcip1 is trunking

Hardware is GigabitEthernet

Port WWN is 20:42:00:0c:30:6c:24:40

Peer port WWN is 20:c2:00:05:30:00:7a:de

Admin port mode is auto, trunk mode is auto

Port mode is TE

vsan is 1

Belongs to port-channel 2

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 200 (interface GigabitEthernet2/1)

Peer Information

Peer Internet address is 100.100.100.1 and port is 3225

Special Frame is disabled

Maximum number of TCP connections is 2

Time Stamp is disabled

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 200.200.200.1:3225, Remote 100.100.100.1:65480

Data connection: Local 200.200.200.1:3225, Remote 100.100.100.1:65482

18 Attempts for active connections, 2 close of connections

TCP Parameters

Path MTU 3000 bytes

Current retransmission timeout is 200 ms

Round trip time: Smoothed 5 ms, Variance: 6

Advertized window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 10 KB, Slow start threshold: 112 KB

5 minutes input rate 136 bits/sec, 17 bytes/sec, 0 frames/sec

5 minutes output rate 136 bits/sec, 17 bytes/sec, 0 frames/sec

4189 frames input, 391368 bytes

4183 Class F frames input, 390668 bytes

6 Class 2/3 frames input, 700 bytes

0 Error frames timestamp error 0

4189 frames output, 390140 bytes

4183 Class F frames output, 389404 bytes

6 Class 2/3 frames output, 736 bytes

0 Error frames 0 reass frames

fcip2 is trunking

Hardware is GigabitEthernet

Port WWN is 20:46:00:0c:30:6c:24:40

Peer port WWN is 20:c6:00:05:30:00:7a:de

Admin port mode is auto, trunk mode is auto

Port mode is TE

vsan is 1

Belongs to port-channel 2

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 201 (interface GigabitEthernet2/2)

Peer Information

Peer Internet address is 100.100.100.5 and port is 3225

Special Frame is disabled

Maximum number of TCP connections is 2

Time Stamp is disabled

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 200.200.200.5:3225, Remote 100.100.100.5:65531

Data connection: Local 200.200.200.5:3225, Remote 100.100.100.5:65533

498 Attempts for active connections, 0 close of connections

TCP Parameters

Path MTU 3000 bytes

Current retransmission timeout is 200 ms

Round trip time: Smoothed 10 ms, Variance: 5

Advertized window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 8 KB, Slow start threshold: 112 KB

5 minutes input rate 0 bits/sec, 0 bytes/sec, 0 frames/sec

5 minutes output rate 0 bits/sec, 0 bytes/sec, 0 frames/sec

8 frames input, 1228 bytes

8 Class F frames input, 1228 bytes

0 Class 2/3 frames input, 0 bytes

0 Error frames timestamp error 0

8 frames output, 1232 bytes

8 Class F frames output, 1232 bytes

0 Class 2/3 frames output, 0 bytes

0 Error frames 0 reass frames

canterbury# sh int port 2

port-channel 2 is trunking

Hardware is Fibre Channel

Port WWN is 24:02:00:0c:30:6c:24:40

Admin port mode is auto, trunk mode is auto

Port mode is TE

Port vsan is 1

Speed is 2 Gbps

Trunk vsans (admin allowed and active) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

5 minutes input rate 120 bits/sec, 15 bytes/sec, 0 frames/sec

5 minutes output rate 120 bits/sec, 15 bytes/sec, 0 frames/sec

4213 frames input, 394068 bytes

4207 Class F frames input, 393368 bytes

6 Class 2/3 frames input, 700 bytes

0 Error frames timestamp error 0

4213 frames output, 392844 bytes

4207 Class F frames output, 392108 bytes

6 Class 2/3 frames output, 736 bytes

0 Error frames 0 reass frames

Member[1] : fcip1

Member[2] : fcip2

canterbury# sh ips ip route interface gig 2/1

Codes: C - connected, S - static

No default gateway

S 100.100.100.0/30 via 200.200.200.2, GigabitEthernet2/1

C 200.200.200.0/30 is directly connected, GigabitEthernet2/1

canterbury# sh ips ip route interface gig 2/2

Codes: C - connected, S - static

No default gateway

S 100.100.100.4/30 via 200.200.200.6, GigabitEthernet2/2

C 200.200.200.4/30 is directly connected, GigabitEthernet2/2

canterbury# sh fcns da

VSAN 600:

--------------------------------------------------------------------------

FCID      TYPE  PWWN                     (VENDOR)  FC4-TYPE:FEATURE

--------------------------------------------------------------------------

0x010001  N     10:00:00:00:c9:32:a6:e3  (Emulex)  scsi-fcp:init

0x020001  N     50:05:07:63:00:d0:94:4c  (IBM)     scsi-fcp:target fc..

Total number of entries = 2

VSAN 601:

--------------------------------------------------------------------------

FCID      TYPE  PWWN                     (VENDOR)  FC4-TYPE:FEATURE

--------------------------------------------------------------------------

0x010100  N     10:00:00:00:00:05:00:00

0x020100  N     10:00:00:00:00:01:00:00

!--- Always verify that the fabric has formed with the expected neighbor(s) !--- through FCIP E or TE port when the configuration is completed.

特殊訊框組態(Bison)

!--- Special frames are used to improve security. !--- Before user-data is transmitted across an FCIP tunnel, FSF verifies that !--- the peer is defined on the configured wwn.

interface fcip1

channel-group 1 force

no shutdown

use-profile 1

peer-info ipaddr 200.200.200.1

special-frame peer-wwn 20:00:00:0c:30:6c:24:40 profile-id 200

interface fcip2

channel-group 1 force

no shutdown

use-profile 2

peer-info ipaddr 200.200.200.5

special-frame peer-wwn 20:00:00:0c:30:6c:24:40 profile-id 201

!--- The peer-wwn is derived from the peer MDS by issuing the following command:

canterbury# sh wwn switch

Switch WWN is 20:00:00:0c:30:6c:24:40

!--- This value is significant per peer switch, so it is used for all tunnels !--- towards this switch. This configuration shows the following:

bison# sh int fcip 1-2

fcip1 is trunking

Hardware is GigabitEthernet

Port WWN is 20:c2:00:05:30:00:7a:de

Peer port WWN is 20:42:00:0c:30:6c:24:40

Admin port mode is auto, trunk mode is on

Port mode is TE

vsan is 1

Belongs to port-channel 1

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 1 (interface GigabitEthernet4/1)

Peer Information

Peer Internet address is 200.200.200.1 and port is 3225

Special Frame is enabled

Peer switch WWN is 20:00:00:0c:30:6c:24:40

Peer profile id is 200

Maximum number of TCP connections is 2

Time Stamp is disabled

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 100.100.100.1:65372, Remote 200.200.200.1:3225

Data connection: Local 100.100.100.1:65374, Remote 200.200.200.1:3225

82 Attempts for active connections, 9 close of connections

TCP Parameters

Path MTU 3000 bytes

Current retransmission timeout is 200 ms

Round trip time: Smoothed 2 ms, Variance: 1

Advertized window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 106 KB, Slow start threshold: 118 KB

5 minutes input rate 46128 bits/sec, 5766 bytes/sec, 19 frames/sec

5 minutes output rate 194867736 bits/sec, 24358467 bytes/sec, 20732 frames/sec

5841 frames input, 1729836 bytes

4575 Class F frames input, 429444 bytes

1266 Class 2/3 frames input, 1300392 bytes

0 Error frames timestamp error 0

6339146 frames output, 7447938520 bytes

4576 Class F frames output, 431800 bytes

6334570 Class 2/3 frames output, 7447506720 bytes

0 Error frames 0 reass frames

fcip2 is trunking

Hardware is GigabitEthernet

Port WWN is 20:c6:00:05:30:00:7a:de

Peer port WWN is 20:46:00:0c:30:6c:24:40

Admin port mode is auto, trunk mode is on

Port mode is TE

vsan is 1

Belongs to port-channel 1

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 2 (interface GigabitEthernet4/2)

Peer Information

Peer Internet address is 200.200.200.5 and port is 3225

Special Frame is enabled

Peer switch WWN is 20:00:00:0c:30:6c:24:40

Peer profile id is 201

Maximum number of TCP connections is 2

Time Stamp is disabled

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 100.100.100.5:3225, Remote 200.200.200.5:64535

Data connection: Local 100.100.100.5:3225, Remote 200.200.200.5:64537

58 Attempts for active connections, 1 close of connections

TCP Parameters

Path MTU 3000 bytes

Current retransmission timeout is 200 ms

Round trip time: Smoothed 2 ms, Variance: 1

Advertized window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 106 KB, Slow start threshold: 112 KB

5 minutes input rate 0 bits/sec, 0 bytes/sec, 0 frames/sec

5 minutes output rate 0 bits/sec, 0 bytes/sec, 0 frames/sec

415 frames input, 398160 bytes

16 Class F frames input, 2460 bytes

399 Class 2/3 frames input, 395700 bytes

0 Error frames timestamp error 0

6078322 frames output, 7147327176 bytes

16 Class F frames output, 2460 bytes

6078306 Class 2/3 frames output, 7147324716 bytes

0 Error frames 0 reass frames

特殊幀配置(Canterbury)

interface fcip1

channel-group 2 force

no shutdown

use-profile 200

peer-info ipaddr 100.100.100.1

special-frame peer-wwn 20:00:00:05:30:00:7a:de profile-id 1

interface fcip2

channel-group 2 force

no shutdown

use-profile 201

peer-info ipaddr 100.100.100.5

special-frame peer-wwn 20:00:00:05:30:00:7a:de profile-id 2

canterbury# sh int fcip 1

fcip1 is trunking

Hardware is GigabitEthernet

Port WWN is 20:42:00:0c:30:6c:24:40

Peer port WWN is 20:c2:00:05:30:00:7a:de

Admin port mode is auto, trunk mode is auto

Port mode is TE

vsan is 1

Belongs to port-channel 2

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 200 (interface GigabitEthernet2/1)

Peer Information

Peer Internet address is 100.100.100.1 and port is 3225

Special Frame is enabled

Peer switch WWN is 20:00:00:05:30:00:7a:de

Peer profile id is 1

Maximum number of TCP connections is 2

Time Stamp is disabled

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 200.200.200.1:3225, Remote 100.100.100.1:65372

Data connection: Local 200.200.200.1:3225, Remote 100.100.100.1:65374

2 Attempts for active connections, 0 close of connections

TCP Parameters

Path MTU 3000 bytes

Current retransmission timeout is 200 ms

Round trip time: Smoothed 2 ms, Variance: 1

Advertized window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 10 KB, Slow start threshold: 112 KB

5 minutes input rate 94347400 bits/sec, 11793425 bytes/sec, 10031 frames/sec

5 minutes output rate 144 bits/sec, 18 bytes/sec, 0 frames/sec

3985861 frames input, 4685834196 bytes

219 Class F frames input, 25228 bytes

3985642 Class 2/3 frames input, 4685808968 bytes

0 Error frames timestamp error 0

1043 frames output, 866780 bytes

218 Class F frames output, 23448 bytes

825 Class 2/3 frames output, 843332 bytes

0 Error frames 0 reass frames

canterbury# sh int fcip 2

fcip2 is trunking

Hardware is GigabitEthernet

Port WWN is 20:46:00:0c:30:6c:24:40

Peer port WWN is 20:c6:00:05:30:00:7a:de

Admin port mode is auto, trunk mode is auto

Port mode is TE

vsan is 1

Belongs to port-channel 2

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 201 (interface GigabitEthernet2/2)

Peer Information

Peer Internet address is 100.100.100.5 and port is 3225

Special Frame is enabled

Peer switch WWN is 20:00:00:05:30:00:7a:de

Peer profile id is 2

Maximum number of TCP connections is 2

Time Stamp is disabled

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 200.200.200.5:64535, Remote 100.100.100.5:3225

Data connection: Local 200.200.200.5:64537, Remote 100.100.100.5:3225

500 Attempts for active connections, 0 close of connections

TCP Parameters

Path MTU 3000 bytes

Current retransmission timeout is 300 ms

Round trip time: Smoothed 10 ms, Variance: 5

Advertized window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 8 KB, Slow start threshold: 118 KB

5 minutes input rate 94399712 bits/sec, 11799964 bytes/sec, 10034 frames/sec

5 minutes output rate 0 bits/sec, 0 bytes/sec, 0 frames/sec

9769115 frames input, 11486944196 bytes

16 Class F frames input, 2460 bytes

9769099 Class 2/3 frames input, 11486941736 bytes

0 Error frames timestamp error 0

415 frames output, 398160 bytes

16 Class F frames output, 2460 bytes

399 Class 2/3 frames output, 395700 bytes

0 Error frames 0 reass frames

來自拜森和坎特伯雷的顯示器 — 坎特伯雷被動

interface fcip1

channel-group 2 force

no shutdown

use-profile 200

passive-mode

peer-info ipaddr 100.100.100.1

special-frame peer-wwn 20:00:00:05:30:00:7a:de profile-id 1

interface fcip2

channel-group 2 force

no shutdown

use-profile 201

passive-mode

peer-info ipaddr 100.100.100.5

special-frame peer-wwn 20:00:00:05:30:00:7a:de profile-id 2

canterbury# sh ips stats tcp int gig 2/1

TCP Statistics for port GigabitEthernet2/1

Connection Stats

20 active openings, 14 accepts

14 failed attempts, 0 reset received, 14 established

Segment stats

12042719 received, 3181301 sent, 0 retransmitted

0 bad segments received, 0 reset sent

TCP Active Connections

Local Address       Remote Address       State      Send-Q  Recv-Q

200.200.200.1:3225  100.100.100.1:65368  ESTABLISH  0       0

200.200.200.1:3225  100.100.100.1:65370  ESTABLISH  0       0

200.200.200.1:3225  100.100.100.1:65372  TIME_WAIT  0       0

200.200.200.1:3225  0.0.0.0:0            LISTEN     0       0

!--- Both FCIP interfaces for Canterbury are configured to be passive; this !--- results in the above TCP statistics where Canterbury, despite being !--- configured with the highest IP addresses for both tunnels, did not !--- initiate the TCP connections. Its peer, Bison, initiates.

canterbury# sh ips stats tcp int gig 2/2

TCP Statistics for port GigabitEthernet2/2

Connection Stats

500 active openings, 4 accepts

498 failed attempts, 0 reset received, 6 established

Segment stats

11933351 received, 3144627 sent, 0 retransmitted

0 bad segments received, 0 reset sent

TCP Active Connections

Local Address       Remote Address       State      Send-Q  Recv-Q

200.200.200.5:3225  100.100.100.5:65415  ESTABLISH  0       0

200.200.200.5:3225  100.100.100.5:65417  ESTABLISH  0       0

200.200.200.5:64535 100.100.100.5:3225   TIME_WAIT  0       0

200.200.200.5:3225  0.0.0.0:0            LISTEN     0       0

從Bison和Canterbury顯示 — 時間戳設定

!--- FCIP Time Stamp is enabled to allow the peer to drop FCIP userdata if it !--- exceeds the specified time-difference. The time difference is the maximum !--- value in transit of user data frames between two peer FCIP entities.

bison(config-if)# time-stamp acceptable-diff 1000

Please enable NTP with a common time source on both MDS Switches that are on

either side of the FCIP link

!--- Note that the value specified is in milliseconds and, because a !--- time difference is specified, both ends of the FCIP tunnel must have access !--- to the same clock source through NTP.

interface fcip1

channel-group 1 force

no shutdown

use-profile 1

peer-info ipaddr 200.200.200.1

time-stamp acceptable-diff 1000

special-frame peer-wwn 20:00:00:0c:30:6c:24:40 profile-id 200

interface fcip2

channel-group 1 force

no shutdown

use-profile 2

peer-info ipaddr 200.200.200.5

time-stamp acceptable-diff 1000

special-frame peer-wwn 20:00:00:0c:30:6c:24:40 profile-id 201

bison# sh int fcip 1

fcip1 is trunking

Hardware is GigabitEthernet

Port WWN is 20:c2:00:05:30:00:7a:de

Peer port WWN is 20:42:00:0c:30:6c:24:40

Admin port mode is auto, trunk mode is on

Port mode is TE

vsan is 1

Belongs to port-channel 1

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 1 (interface GigabitEthernet4/1)

Peer Information

Peer Internet address is 200.200.200.1 and port is 3225

Special Frame is enabled

Peer switch WWN is 20:00:00:0c:30:6c:24:40

Peer profile id is 200

Maximum number of TCP connections is 2

Time Stamp is enabled, acceptable time difference 1000 ms

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 100.100.100.1:65368, Remote 200.200.200.1:3225

Data connection: Local 100.100.100.1:65370, Remote 200.200.200.1:3225

84 Attempts for active connections, 10 close of connections

TCP Parameters

Path MTU 3000 bytes

Current retransmission timeout is 200 ms

Round trip time: Smoothed 2 ms, Variance: 3

Advertized window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 10 KB, Slow start threshold: 118 KB

5 minutes input rate 0 bits/sec, 0 bytes/sec, 0 frames/sec

5 minutes output rate 0 bits/sec, 0 bytes/sec, 0 frames/sec

5988 frames input, 1743840 bytes

4719 Class F frames input, 443184 bytes

1269 Class 2/3 frames input, 1300656 bytes

0 Error frames timestamp error 0

15337275 frames output, 18028320932 bytes

4720 Class F frames output, 445544 bytes

15332555 Class 2/3 frames output, 18027875388 bytes

0 Error frames 0 reass frames

canterbury(config-if)# time-stamp acceptable-diff 1000

Please enable NTP with a common time source on both MDS Switches that are on

either side of the FCIP link

interface fcip1

channel-group 2 force

no shutdown

use-profile 200

passive-mode

peer-info ipaddr 100.100.100.1

time-stamp acceptable-diff 1000

special-frame peer-wwn 20:00:00:05:30:00:7a:de profile-id 1

interface fcip2

channel-group 2 force

no shutdown

use-profile 201

passive-mode

peer-info ipaddr 100.100.100.5

time-stamp acceptable-diff 1000

special-frame peer-wwn 20:00:00:05:30:00:7a:de profile-id 2

canterbury# sh int fcip 1

fcip1 is trunking

Hardware is GigabitEthernet

Port WWN is 20:42:00:0c:30:6c:24:40

Peer port WWN is 20:c2:00:05:30:00:7a:de

Admin port mode is auto, trunk mode is auto

Port mode is TE

vsan is 1

Belongs to port-channel 2

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 200 (interface GigabitEthernet2/1)

Peer Information

Peer Internet address is 100.100.100.1 and port is 3225

Passive mode is enabled

Special Frame is enabled

Peer switch WWN is 20:00:00:05:30:00:7a:de

Peer profile id is 1

Maximum number of TCP connections is 2

Time Stamp is enabled, acceptable time difference 1000 ms

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 200.200.200.1:3225, Remote 100.100.100.1:65368

Data connection: Local 200.200.200.1:3225, Remote 100.100.100.1:65370

2 Attempts for active connections, 0 close of connections

TCP Parameters

Path MTU 3000 bytes

Current retransmission timeout is 200 ms

Round trip time: Smoothed 6 ms, Variance: 6

Advertized window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 10 KB, Slow start threshold: 112 KB

5 minutes input rate 0 bits/sec, 0 bytes/sec, 0 frames/sec

5 minutes output rate 0 bits/sec, 0 bytes/sec, 0 frames/sec

9427366 frames input, 11084654892 bytes

295 Class F frames input, 32716 bytes

9427071 Class 2/3 frames input, 11084622176 bytes

145359 Error frames timestamp error 145359

1122 frames output, 874528 bytes

294 Class F frames output, 30932 bytes

828 Class 2/3 frames output, 843596 bytes

0 Error frames 0 reass frames

相關資訊

- T11首頁

- TCP閒置後慢啟動重新啟動中的問題

- RFC 1191 — 路徑MTU探索

- RFC 1323 — 適用於高效能的TCP擴充模組

- RFC 2018 - TCP選擇性確認選項

- RFC 2883 - TCP選擇性確認(SACK)選項的擴展

- RFC 3821 — 透過TCP/IP傳輸的光纖通道(FCIP)

- 技術支援與文件 - Cisco Systems