目錄

簡介

必要條件

需求

採用元件

複製檔案

將檔案從FTD複製到FMC

將檔案從FMC複製到本地電腦

使用SCP複製

從GUI下載

簡介

本檔案介紹如何將記錄檔從Cisco Firepower管理中心(FMC)和Firepower威脅防禦(FTD)下載到本機電腦。

必要條件

需求

思科建議您瞭解以下主題：

- Cisco Firepower裝置

- 虛擬裝置型號

採用元件

本文件所述內容不限於特定軟體和硬體版本。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

複製檔案

將檔案從FTD複製到FMC

FMC上有一個安全複製協定(SCP)伺服器，因此檔案可以從FTD移到FMC。

root@FMC:~$ scp admin@<FTD ip>:<path to file> <path to local directory where to store>

一個常見的示例是將核心檔案從FTD移動到FMC。

在FTD上：

root@ciscoasa:/ngfw/var/common# ls -l

total 1557960

-rw-r--r-- 1 root root 23231 Sep 6 03:43 core_1482327396_Firepower-module1_snort_6

-rw------- 1 root root 560128000 Apr 26 01:47 core_1556242979_ciscoasa_snort_6.8777

-rw------- 1 root root 383381504 Aug 25 23:05 core_1566774281_ciscoasa_snort_11.31618

-rw------- 1 root root 69562368 Aug 25 23:05 core_1566774281_ciscoasa_snort_11.31620

-rw------- 1 root root 465424384 Aug 28 02:21 core_1566958444_ciscoasa_snort_6.18352

-rw------- 1 root root 116887552 Aug 28 02:18 core_1566958688_ciscoasa_snort_6.18340

-rw------- 1 root root 52338688 Aug 28 02:18 core_1566958689_ciscoasa_snort_6.18341

-rw------- 1 root root 465514496 Sep 2 02:20 core_1567390346_ciscoasa_snort_6.27631

-rw------- 1 root root 151572480 Sep 2 02:17 core_1567390618_ciscoasa_snort_6.27435

現在，將檔案傳輸到FMC:

root@FMC:/Volume/home/admin# scp admin@10.10.10.10:/ngfw/var/common/core_1567390618_ciscoasa_snort_6.27435 /var/common/

注意：在scp命令上新增 — v以進行詳細日誌記錄，以進一步進行故障排除。

將檔案從FMC複製到本地電腦

使用SCP複製

FMC上有一個安全複製協定(SCP)伺服器，它使用可以從FMC移動到其他裝置的檔案。

root@FMC:~$ scp  <path to local directory where to store>  admin@<FMC ip>:<path to file>

一種常見方法是將核心檔案從FMC移動到本地案頭：

root@localMachine:/Volume/home/admin# scp admin@10.10.10.20:/var/common/core_1567390618_ciscoasa_snort_6.27435 /var/tmp/

WInSCP是一種常用的工具，通常在Windows上使用。此工具提供基於GUI的介面。

In FMC 6.4 and above, SCP to the FMC is not possible directly. For that, the following is needed(the below is intended for user: admin):

root@FMC:/Volume/home/admin# usermod --shell /bin/bash admin

After this SCP to the FMC will work. Once done, please remeber to rollback:

root@FMC:/Volume/home/admin# usermod --shell /usr/bin/clish admin

從GUI下載

存在/var/common的檔案可從GUI下載。

If there are any file(s) and/or tcpdump generated on the FMC, please move to /var/common, so that it can be downloaded from the GUI.

步驟 1.導覽至System > Health > Monitor，然後按一下需要下載檔案的感應器，如下圖所示：

步驟 2.導覽至System > Health > Monitor，然後按一下Advanced Troubleshooting，如下圖所示：

步驟 3.輸入檔案名稱，按一下「download」，如下圖所示：