目錄

簡介

必要條件

需求

採用元件

慣例

J1位元組

配置J1位元組

其他選項

相關資訊

簡介

本檔案介紹如何在Packet over SONET/SDH(POS)線路卡上設定SDH的J1位元組、高階路徑額外負荷(HO-POH)。本文檔還說明如何清除HO Path Trace Identifier Mismatch(HP-TIM)警報。

必要條件

需求

本文件沒有特定需求。

採用元件

本文件所述內容不限於特定軟體和硬體版本。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

J1位元組

Bellcore GR-253標準定義了同步光纖網路(SONET)。SONET使用路徑開銷(POH)、線路開銷(LOH)和分段開銷(SOH)的分層體系結構。POH列包括J1位元組，也稱為路徑跟蹤緩衝區(PTB)。

ITU-T的G.707標準定義了同步數字層級(SDH)，它在歐洲部署得更為廣泛。G.707將J1位元組定義為虛擬容器中的第一個位元組。關聯的AU-n(n = 3, 4)或TU-3指標指示此位元組的位置。以下是標準如何定義此位元組的使用：

「此位元組用於重複傳輸路徑接入點識別符號，以便路徑接收終端可以檢驗其與預期發射機的持續連線。為傳輸接入點識別符號定義了一個16位元組的幀。此16位元組幀與9.2.2.2中定義的16位元組幀相同（用於描述位元組J0）。在國際邊界或不同經營者的網路之間的邊界，應使用第3/G.831條所定義的格式，除非提供運輸的經營者雙方另行議定。在國家網路或單個運營商的域內，此路徑接入點識別符號可能使用64位元組的幀。」

圖1說明了J1位元組在SDH結構中的位置：

圖1 - J1位元組在SDH結構中的位置

配置J1位元組

您可以為J1位元組配置以下值：

OSIRS20(config-controller)#overhead j1 ?

expected  Expected Message

length    Message length

transmit  Transmit Message

其中：

- 應為行中所需的字串。任何不匹配都會生成HP-TIM警報。

- 長度=字串的長度。這可能是16位元組(SDH)或64位元組(SONET)。

- Transmit =傳輸到線路中的字串值。

以下範例顯示兩個POS卡直接與暗光纖連線。此示例使用SDH配置：

OSIRS20(config-controller)#overhead j1 length 16

OSIRS20(config-controller)#overhead j1 expected expect123456789

OSIRS20(config-controller)#overhead j1 transmit transmit1234567

在本例中，線路預期的傳入字串是expect123456789，您將傳輸字串transmit1234567。

核發此命令，以便檢視來自第行的內容：

OSIRS20#show controller sonet 9/1/0

以下為輸出內容：

OSIRS20#show controller sonet 9/1/0

SONET 9/1/0 is up.

Channelized OC-3/STM-1 SMI PA

H/W Version : 24.257.2.3, ROM Version : 1.2

FREEDM version : 2, F/W Version : 1.18.1

Applique type is Channelized Sonet/SDH

Clock Source is Line, AUG mapping is AU4.

Medium info:

Type: SDH, Line Coding: NRZ, Line Type: Short SM

Regenerator Section Status:

No alarms detected.

Multiplex Section Status:

No alarms detected.

No BER failure/degrade detected

BER_SF threshold power : 3

BER_SD threshold power : 6

Higher Order Path Status:

Path# 1 has defects HP-TIM

Captured Trace for Path# 1 is (CRC - 4) transmit1234567

或者，發出以下命令以擷取最後一行：

OSIRS20#show controller sonet 9/1/0 | i Captured Trace

您可以看到，輸出中存在HP-TIM警報，因為預期的字串與從遠端站接收的字串不匹配。若要清除警報，請發出以下命令：

OSIRS20(config-controller)#overhead j1 length 16

OSIRS20(config-controller)#overhead j1 expected transmit1234567

以下是這些命令的輸出：

OSIRS20#show controller sonet 9/1/0

SONET 9/1/0 is up.

Channelized OC-3/STM-1 SMI PA

H/W Version : 24.257.2.3, ROM Version : 1.2

FREEDM version : 2, F/W Version : 1.18.1

Applique type is Channelized Sonet/SDH

Clock Source is Line, AUG mapping is AU4.

Medium info:

Type: SDH, Line Coding: NRZ, Line Type: Short SM

Regenerator Section Status:

No alarms detected.

Multiplex Section Status:

No alarms detected.

No BER failure/degrade detected

BER_SF threshold power : 3

BER_SD threshold power : 6

Higher Order Path Status:

Path# 1 has no defects

Captured Trace for Path# 1 is (CRC - 4) transmit1234567

其他選項

清除此警報的另一個選項是禁用J1位元組。當您這樣做時，主機板不再從J1位元組讀取資訊。因此，HP-TIM警報永遠不會發生。

OSIRS20#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

OSIRS20(config)#controller sonet 9/1/0

OSIRS20(config-controller)#no over j1

OSIRS20(config-controller)#end

相關資訊

- 技術支援與文件 - Cisco Systems