目錄

簡介

必要條件

需求

採用元件

慣例

DTP

802.1Q本徵VLAN注意事項

PAgP

配置1:執行Cisco IOS軟體的Catalyst 3500 XL和Catalyst 6500之間的ISL主幹和EtherChannel

網路圖表

配置2:運行Cisco IOS軟體的Catalyst 2950和Catalyst 6500之間使用DTP和PAgP的802.1Q中繼和EtherChannel

網路圖表

驗證:ISL中繼

Catalyst 3500 XL

Catalyst 6500（Cisco IOS軟體）

驗證:802.1Q中繼

Catalyst 2950

Catalyst 6500 Cisco IOS軟體

疑難排解

流量未通過802.1Q中繼

相關資訊

簡介

本檔案將提供在Cisco Catalyst 2900 XL/3500 XL或Catalyst 2950系列交換器與執行Cisco IOS®軟體的Catalyst 6500/6000交換器之間的IEEE 802.1Q/交換器間連結(ISL)主幹和第2層(L2)EtherChannel上的組態範例。在本範例中，您還可以使用執行Cisco IOS軟體而不是Catalyst 6500/6000的Catalyst 4500/4000交換器。本文討論在交換機之間配置中繼和通道時要考慮的最重要因素。本文檔還包括配置示例。

在本文中，每台交換器的四個快速乙太網路連線埠都已建立中繼並捆綁到快速EtherChannel(FEC)中。 3500 XL ISL使用中繼協定，2950示例使用802.1Q。

註：Catalyst 2950不支援ISL中繼。改用802.1Q中繼。

必要條件

需求

本文件沒有特定需求。

採用元件

若要建立本檔案中的範例，以下交換器已在實驗環境中使用，且組態已清除：

- 執行Cisco IOS軟體版本12.0(5)WC2的Catalyst 3548 XL交換器

- 執行Cisco IOS軟體版本12.1(6)EA2c的Catalyst 2950-24交換器

- 搭載Supervisor Engine II的Catalyst 6509交換器(執行Cisco IOS軟體版本12.1(11b)E)

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

DTP

裝置之間的中繼可以靜態配置，也可以使用動態中繼協定(DTP)配置。DTP允許連線的兩台裝置在實際建立中繼連線之前協商中繼設定。可配置的Cisco IOS軟體交換機埠（中繼）模式包括：動態（埠協商接入或中繼模式）、中繼（無條件將埠設定為中繼）和接入（非中繼接入埠）。 靜態（非DTP協商）中繼的兩端最常用的模式組合設定是trunk-trunk。對於動態（DTP協商）中繼，通常的設定是動態 — 動態。其他組合可能產生有效的結果，但不在本文檔的討論範圍之內。支援埠聚合協定(PAgP)的交換機和非PagP裝置之間的中繼連線需要開啟中繼模式。

注意：大多數Cisco路由器和某些Catalyst交換機不支援DTP並且需要靜態中繼配置。例如，Catalyst XL系列、Catalyst 2948G-L3、Catalyst 4908G-L3、Catalyst 8500系列、2/3/4/7xxx系列Cisco路由器等不支援DTP且需要靜態中繼配置。

802.1Q本徵VLAN注意事項

802.1Q中繼會將4位元組的802.1Q標籤欄位插入到通過中繼傳送的幀中，該幀包含VLAN資訊。802.1Q標籤會插入到通過中繼傳輸的每個幀中，但本地VLAN上傳輸的幀除外，這些幀會以未標籤的方式傳送。大多數情況下，本徵VLAN必須在主幹的兩端都匹配，除非有特定的異常配置要求（不在本檔案的範圍之內）。如果本徵VLAN不匹配，交換機將記錄思科發現協定(CDP)消息，說明不匹配。雖然不是災難性的，但此設定實際上會導致兩個不同的本徵VLAN合併到一個更大的第2層廣播域(VLAN)中。 這兩個VLAN試圖為此類橋接的本徵VLAN計算一個通用生成樹協定(STP)拓撲，這有可能最終超過支援的最大STP直徑。

注意：當鄰居或第三方裝置要求標籤所有VLAN時，會出現特殊情況。如果發生這種情況，您可以實施一種變通方法建立虛擬VLAN並將其設定為本地VLAN。這將標籤所有其他必要的VLAN，並且它們會將流量通過中繼傳輸到鄰居或第三方裝置。在Cisco IOS軟體版本12.1.11bEX、12.1.13E及更高版本中，運行Cisco IOS軟體的Catalyst 6500支援標籤所有VLAN流量（包括本徵VLAN）的802.1Q中繼選項。在全域性配置模式下發出vlan dot1q tag native命令。在執行Cisco IOS軟體的Catalyst 4500/4000上，vlan dot1q tag native命令首先在Cisco IOS軟體版本12.2(18)EW中匯入。

PAgP

交換機之間的Gigabit EtherChannel(GEC)和FEC也可使用PAgP進行靜態或動態配置。PAgP允許連線的兩台裝置在實際形成通道之前協商設定。PAgP通道模式包括：desirable（連線埠主動發起通道交涉）、auto（預設情況下，連線埠不會發起交涉，但會回應另一端啟動的交涉嘗試）和on（無條件地將連線埠設定為通道且不會交換PAgP訊框）。在支援PAgP的交換機與非PAgP裝置之間的連線需要on模式才能形成通道。

靜態（非PAgP協商）通道的兩端最常用的模式組合是開啟模式。對於動態(PAgP-negotiated)通道，通常的設定是desirable-desirable或desirable-auto。已配置為理想模式的連線埠在通道開始之前執行通道協商和驗證，並在通道運行期間繼續驗證通道。由於PAgP提供了額外的保護，如果連線的兩台交換機都支援PAgP，則通常建議採用這種設定。

注意：PAgP存在一些有意為之的配置限制。協商通道的埠必須具有相同的速度、雙工、中繼封裝和VLAN設定。此外，鏈路間的通道負載均衡演算法可以在某些平台上配置。

注意：一旦EtherChannel啟動，它就會被視為一個唯一的STP埠。因此，要在設定非協商通道時避免STP不一致，請按照以下步驟操作：

1. 關閉通道的所有埠以在兩端進行配置。

2. 在兩端執行配置。

3. 重新啟用所有埠。

在連線埠開啟時嘗試設定此類通道可能會導致臨時STP不一致和/或回圈。這些步驟僅在未使用PAgP時適用。

Catalyst 2900 XL/3500 XL

Catalyst 2900 XL/3500 XL系列交換器不支援DTP和PAgP，因此需要靜態主幹和通道設定。有關更多資訊，請參閱上述說明。Catalyst 2900 XL/3500 XL系列交換器目前支援ISL和802.1Q中繼封裝。如需詳細資訊，請參閱以下檔案：

- 使用外部路由器在Catalyst 2900XL/3500XL/2950交換器上設定InterVLAN路由和ISL/802.1Q中繼

Cisco IOS軟體版本11.2(8)SA4和更新版本支援ISL，而Cisco IOS軟體版本11.2(8)SA5和更新版本支援802.1Q。

使用執行Cisco IOS軟體版本11.2(8)SA1或11.2(8)SA2的Catalyst 2900 XL，每台交換器允許四個EtherChannel（連線埠群組），且每個群組的連線埠數不受限制。通道中鏈路間的負載均衡始終基於目標地址。不支援交換式連線埠分析器(SPAN)和連線埠安全功能。

在執行Cisco IOS軟體版本11.2(8)SA3或更新版本的Catalyst 2900 XL、執行Cisco IOS軟體版本11.2(8)SA6或更新版本的Catalyst 3500 XL和Catalyst 2950上，通道中連結間的負載平衡可以設定為基於來源或目的地MAC位址。Source是預設值。基於源的轉發允許一個FEC（埠組）中最多八個埠。 基於目標的轉發允許每個埠組有無限的埠。每台交換機最多可以配置12個埠組，並且可以混合使用基於源/目標的組。不支援SPAN和埠安全。

Catalyst 2950

Catalyst 2950交換機僅支援802.1Q中繼，不支援ISL中繼。Catalyst 2950交換器支援DTP和PAgP動態中繼和通道交涉（使用Cisco IOS軟體版本12.1版本），以及靜態模式（僅使用Cisco IOS軟體版本12.0版本）。EtherChannel負載平衡可以使用源MAC或目標MAC地址轉發。您可以通過發出port-channel load-balance 全域性配置命令來配置負載平衡方法。這些交換機最多支援每個通道八個交換機埠。

執行Cisco IOS軟體的Catalyst 6500

執行Cisco IOS軟體的Catalyst 6500交換器支援L2（交換器連線埠）和第3層(L3)（路由連線埠）EtherChannel組態。Catalyst 6500/6000系列交換器最多支援64個EtherChannel(使用Cisco IOS軟體版本12.1(2)E和更新版本時為256個)。 您可以形成EtherChannel，在Catalyst 6000系列交換器中的任何模組上最多具有八個相容設定的LAN連線埠，但配備數位功能卡(DFC)的模組（例如WS-X6816等）除外，目前這些模組僅允許使用同一DFC模組上的連線埠來建立L2通道。但是，可以在不同的配備DFC的模組之間配置L3通道。Catalyst 6500/6000 Cisco IOS軟體版本12.1(11b)EX和更新版本已移除此限制。本文檔配置二層EtherChannel。

執行Cisco IOS軟體的Catalyst 6500/6000允許您發出port-channel load-balance 全域組態命令，設定EtherChannel負載平衡，以使用任何來源、目的地和來源 — 目的地組合中的MAC位址、IP位址或第4層(L4)連線埠資訊。預設設定為在源IP地址和目標IP地址之間使用雜湊函式。

Catalyst 6500/6000交換機支援ISL和802.1Q中繼封裝以及DTP。有關埠功能的詳細資訊，請發出show interface interface_id capabilities命令。

執行Cisco IOS軟體的Catalyst 4000

執行Cisco IOS軟體（搭載Supervisor Engine III和IV）的Catalyst 4000交換器支援L2（交換器連線埠）和L3（路由連線埠）EtherChannel組態。Catalyst 4000系列交換器最多支援64個EtherChannel。您可以形成EtherChannel，在任何模組上，以及在Catalyst 4000系列交換機中的模組上，配置最多八個相容的乙太網介面。每個EtherChannel中的所有介面都必須為相同的速度，並且必須全部配置為L2或L3介面。

執行Cisco IOS軟體的Catalyst 4000允許您設定EtherChannel負載平衡，透過發出port-channel load-balance 全域組態命令，在任何來源、目的地和來源 — 目的地組合中使用MAC位址、IP位址或L4連線埠資訊。預設設定為在源IP地址和目標IP地址之間使用雜湊函式。

運行Cisco IOS軟體的Catalyst 4000支援ISL和802.1Q中繼封裝和DTP。ISL在某些模組上不可用。如需此類模組的完整清單，請參閱設定第2層乙太網路介面的瞭解VLAN中繼一節。在未來的軟體版本中，通過發出show interface capabilities命令可獲得有關埠功能的詳細資訊。目前此命令不可用。

配置1:執行Cisco IOS軟體的Catalyst 3500 XL和Catalyst 6500之間的ISL主幹和EtherChannel

本節提供用於設定本文件中所述功能的資訊。

注意：要查詢有關本文檔中使用的命令的其他資訊，請使用命令查詢工具 (僅限註冊客戶)。

網路圖表

此配置使用以下網路設定：

Catalyst 3524 XL

!--- Catalyst 3500 XL does not support DTP/PAgP. !--- First, shut down the secondary ports involved in the channel !--- and then enable them back when the configuration is complete on both switches.

Cat3500XL#show run

Building configuration...

Current configuration:

!

version 12.0

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Cat3500XL

ip subnet-zero

!

interface FastEthernet0/1

!

!--- Output suppressed.

!

interface FastEthernet0/17

port group 1

!--- Assigned port to port channel 1.

switchport trunk encapsulation isl

!--- Configured the port to use the trunking encapsulation ISL.

switchport mode trunk

!--- Configured the port to be in trunking mode.

!

interface FastEthernet0/18

!--- Repeated the trunk and channel configuration.

port group 1

switchport trunk encapsulation isl

switchport mode trunk

!

interface FastEthernet0/19

!--- Repeated the trunk and channel configuration.

Port group 1

switchport trunk encapsulation isl

switchport mode trunk

!

interface FastEthernet0/20

!--- Repeated the trunk and channel configuration.

Port group 1

switchport trunk encapsulation isl

switchport mode trunk

!

interface FastEthernet0/21

!

!--- Output suppressed.

!

interface FastEthernet0/48

!

interface GigabitEthernet0/1

!

interface GigabitEthernet0/2

!

interface VLAN1

ip address 10.10.10.1 255.255.255.0

no ip directed-broadcast

no ip route-cache

!

line con 0

transport input none

stopbits 1

line vty 0 4

login

Catalyst 6500（Cisco IOS軟體）

!--- Catalyst 3500 XL does not support DTP/PAgP. !--- First, shut down the secondary ports involved in the channel, !--- and then enable them back when the configuration is complete on both switches.

Cat6500#show run

Building configuration...

Current configuration : 3999 bytes

!

version 12.1

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Cat6500

!

boot bootldr bootflash:c6msfc2-boot-mz.121-8b.E9

!

redundancy

main-cpu

auto-sync standard

ip subnet-zero

!

!

no mls ip multicast aggregate

no mls ip multicast non-rpf cef

mls qos statistics-export interval 300

mls qos statistics-export delimiter |

!

interface Port-channel1

!--- This interface will be created and configured automatically. !--- You do not need to input this part of the configuration.

switchport

switchport trunk encapsulation isl

switchport mode trunk

no ip address

!

interface GigabitEthernet1/1

no ip address

shutdown

!

!--- Output suppressed.

!

interface FastEthernet4/2

switchport

!--- Setting the interface as an L2 port, as by default the port is a routed port.

!--- Note: Catalyst 4500/4000 that runs Cisco IOS Software defaults to the L2 port.

switchport trunk encapsulation dot1q

!--- Setting the trunk encapsulation to dot1q.

switchport mode trunk

!--- Configured port to be in trunking mode.

no ip address

channel-group 1 mode on

!--- Configured the port to participate in port channel 1 with channel mode on.

!

Interface FastEthernet4/3

!--- Repeated the trunk and channel configuration.

switchport

switchport trunk encapsulation isl

switchport mode trunk

no ip address

channel-group 1 mode on

!

interface FastEthernet4/4

!--- Repeated the trunk and channel configuration.

switchport

switchport trunk encapsulation isl

switchport mode trunk

no ip address

channel-group 1 mode on

!

interface FastEthernet4/5

!--- Repeated the trunk and channel configuration.

switchport

switchport trunk encapsulation isl

switchport mode trunk

no ip address

channel-group 1 mode on

!

interface FastEthernet4/6

no ip address

shutdown

!

!

interface VLAN 1

ip address 10.10.10.2  255.255.255.0

!

ip classless

no ip http server

!

line con 0

line vty 0 4

!

end

Cat6500#

配置2:運行Cisco IOS軟體的Catalyst 2950和Catalyst 6500之間使用DTP和PAgP的802.1Q中繼和EtherChannel

本節提供用於設定本文件中所述功能的資訊。

注意：要查詢有關本文檔中使用的命令的其他資訊，請使用命令查詢工具 (僅限註冊客戶)。

網路圖表

此配置使用以下網路設定：

Catalyst 2950

!--- Catalyst 2950 with Cisco IOS Software Release 12.1 supports PAgP. !--- There is no need to shut down the ports as both Catalyst 2950 and 6500 can negotiate !--- channeling in desirable mode.

Cat2950#show run

Building configuration...

Current configuration : 1380 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Cat2950

!

ip subnet-zero

no ip finger

!

interface Port-channel1

switchport mode trunk

!

interface FastEthernet0/1

!

interface FastEthernet0/2

switchport mode trunk

!--- Configured port to be in trunking mode.

channel-group 1 mode desirable

!--- Configured port to participate in PAgP-negotiated port channel 1.

!

interface FastEthernet0/3

!--- Repeated trunk and channel configuration.

switchport mode trunk

channel-group 1 mode desirable

!

interface FastEthernet0/4

!--- Repeated trunk and channel configuration.

switchport mode trunk

channel-group 1 mode desirable

!

interface FastEthernet0/5

!--- Repeated trunk and channel configuration.

switchport mode trunk

channel-group 1 mode desirable

!

interface FastEthernet0/6

!

!--- Output suppressed.

!

interface FastEthernet0/25

!

interface FastEthernet0/26

!

interface VLAN1

ip address 10.10.10.1 255.255.255.0

no ip route-cache

!

ip http server

!

line con 0

transport input none

line vty 5 15

!

end

Cat2950#

Catalyst 6500（Cisco IOS軟體）

!--- Catalyst 2950 with Cisco IOS Software Release 12.1 supports PAgP. !--- There is no need to shut down the ports as both Catalyst 2950 and 6500 can negotiate !--- channeling in desirable mode.

Cat6500#show run

Building configuration...

Current configuration : 3999 bytes

!

version 12.1

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Cat6500

!

boot bootldr bootflash:c6msfc2-boot-mz.121-8b.E9

!

redundancy

main-CPU

auto-sync standard

ip subnet-zero

!

!

no mls ip multicast aggregate

no mls ip multicast non-rpf cef

mls qos statistics-export interval 300

mls qos statistics-export delimiter |

!

interface Port-channel1

!--- This interface will be created and configured automatically. !--- You do not need to input this part of the configuration.

switchport

switchport trunk encapsulation dot1q

switchport mode trunk

no ip address

!

interface GigabitEthernet1/1

no ip address

shutdown

!

!--- Output suppressed.

!

interface FastEthernet4/2

switchport

!--- Setting the interface as an L2 port, as by default the port is a routed port.

!--- Note: Catalyst 4500/4000 that runs Cisco IOS Software defaults to the L2 port.

switchport trunk encapsulation dot1q

!--- Setting the trunk encapsulation to dot1q.

switchport mode trunk

!--- Configured port to be in trunking mode.

No ip address

channel-group 1 mode desirable

!--- Configured port to participate in port channel 1 with channel mode desirable.

!

Interface FastEthernet4/3

!--- Repeated trunk and channel configuration.

switchport

switchport trunk encapsulation dot1q

switchport mode trunk

no ip address

channel-group 1 mode desirable

!

interface FastEthernet4/4

!--- Repeated trunk and channel configuration.

switchport

switchport trunk encapsulation dot1q

switchport mode trunk

no ip address

channel-group 1 mode desirable

!

interface FastEthernet4/5

!--- Repeated trunk and channel configuration.

switchport

switchport trunk encapsulation dot1q

switchport mode trunk

no ip address

channel-group 1 mode desirable

!

interface FastEthernet4/6

no ip address

shutdown

!

!

interface VLAN 1

ip address 10.10.10.2  255.255.255.0

!

ip classless

no ip http server

!

!

line con 0

line vty 0 4

!

end

Cat6500#

驗證:ISL中繼

使用本節內容，確認您的組態是否正常運作。

輸出直譯器工具 (僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

Catalyst 3500 XL

Cat3500XL#show cdp neighbor

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater

Device ID        Local Intrfce     Holdtme    Capability  Platform  Port ID

Cat3500XL        Fas 0/20           136        R S I      Catalyst 6Fas 4/5

Cat3500XL        Fas 0/19           136        R S I      Catalyst 6Fas 4/4

Cat3500XL        Fas 0/18           136        R S I      Catalyst 6Fas 4/3

Cat3500XL        Fas 0/17           136        R S I      Catalyst 6Fas 4/2

Cat3500XL#

Cat3500XL#show port group

Group  Interface              Transmit Distribution

-----  ---------------------  ---------------------

1  FastEthernet0/18       source address

1  FastEthernet0/17       source address

1  FastEthernet0/20       source address

1  FastEthernet0/19       source address

Cat3500XL#

Cat3500XL#show etherchannel summary

Flags:  d - default     D - down

I - in use

Group Ports

----- -----

1     Fa0/18(I) Fa0/17(Id) Fa0/20(I) Fa0/19(I)

Cat3500XL#

註：如果您有八埠EtherChannel，則如果執行低於Cisco IOS軟體版本12.0(5)WC5的Cisco IOS軟體版本，發出show etherchannel summary命令可能會使交換器崩潰。

Cat3500XL#show interfaces fastethernet0/17 switchport

Name: Fa0/17

Switchport: Enabled

Administrative mode: trunk

Operational Mode: trunk

Administrative Trunking Encapsulation: isl

Operational Trunking Encapsulation: isl

Negotiation of Trunking: Disabled

Access Mode VLAN: 0 ((Inactive))

Trunking Native Mode VLAN: 1 (default)

Trunking VLANs Enabled: ALL

Trunking VLANs Active: 1,2

Pruning VLANs Enabled: 2-1001

Priority for untagged frames: 0

Override vlan tag priority: FALSE

Voice VLAN: none

Appliance trust: none

Cat3500XL#

Catalyst 6500（Cisco IOS軟體）

Cat6500#show interfaces fastethernet 4/2 capabilities

FastEthernet4/2

Model:                 WS-X6248-RJ-45

Type:                  10/100BaseTX

Speed:                 10,100,auto

Duplex:                half,full

Trunk encap. type:     802.1Q,ISL

Trunk mode:            on,off,desirable,nonegotiate

Channel:               yes

Broadcast suppression: percentage(0-100)

Flowcontrol:           rx-(off,on),tx-(none)

Fast Start:            yes

QOS scheduling:        rx-(1q4t), TX(2q2t)

CoS rewrite:           yes

ToS rewrite:           yes

Inline power:          no

SPAN:                  source/destination

Cat6500#

Cat6500#show cdp neighbors

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater

Device ID        Local Intrfce     Holdtme    Capability  Platform  Port ID

Cat6500          Fas 4/5            135         T S       WS-C3548-XFas 0/20

Cat6500          Fas 4/4            135         T S       WS-C3548-XFas 0/19

Cat6500          Fas 4/3            134         T S       WS-C3548-XFas 0/18

Cat6500          Fas 4/2            134         T S       WS-C3548-XFas 0/17

Cat6500#

Cat6500#show interfaces port-channel 1 etherchannel

Age of the Port-channel   = 01d:07h:30m:43s

Logical slot/port   = 14/1           Number of ports = 4

GC                  = 0x00010001      HotStandBy port = null

Port state          = Port-channel Ag-Inuse

Ports in the Port-channel:

Index   Load   Port    EC state

------+------+------+------------

0     11     Fa4/2    on

1     22     Fa4/3    on

2     44     Fa4/4    on

3     88     Fa4/5    on

Time since last port bundled:    01d:06h:51m:22s    Fa4/5

Time since last port Un-bundled: 01d:06h:52m:30s    Fa4/5

Cat6500#

Cat6500#show etherchannel ?

<1-269>       Channel group number

brief         Brief information

detail        Detail information

load-balance  Load-balance/frame-distribution scheme among ports in

port-channel

port          Port information

port-channel  Port-channel information

summary       One-line summary per channel-group

Cat6500#show etherchannel summary

Flags:  D - down        P - in port-channel

I - stand-alone s - suspended

R - Layer3      S - Layer2

U - port-channel in use

Group Port-channel  Ports

-----+------------+-----------------------------------------------------------

1     Po1(SU)     Fa4/2(P)   Fa4/3(P)   Fa4/4(P)   Fa4/5(P)

Cat6500#

Cat6500#show etherchannel port-channel

Channel-group listing:

-----------------------

Group: 1

----------

Port-channels in the group:

----------------------

Port-channel: Po1

------------

Age of the Port-channel   = 01d:07h:35m:28s

Logical slot/port   = 14/1           Number of ports = 4

GC                  = 0x00010001      HotStandBy port = null

Port state          = Port-channel Ag-Inuse

Ports in the Port-channel:

Index   Load   Port    EC state

------+------+------+------------

0     11     Fa4/2    on

1     22     Fa4/3    on

2     44     Fa4/4    on

3     88     Fa4/5    on

Time since last port bundled:    01d:06h:56m:08s    Fa4/5

Time since last port UN-bundled: 01d:06h:57m:15s    Fa4/5

Cat6500#show interfaces port-channel 1 switchport

Name: Po1

Switchport: Enabled

Administrative Mode: trunk

Operational Mode: trunk

Administrative Trunking Encapsulation: isl

Operational Trunking Encapsulation: isl

Negotiation of Trunking: On

Access Mode VLAN: 1 (default)

Trunking Native Mode VLAN: 1 (default)

Administrative private-vlan host-association: none

Administrative private-vlan mapping: none

Operational private-vlan: none

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Cat6500#

驗證:802.1Q中繼

使用本節內容，確認您的組態是否正常運作。

輸出直譯器工具 (僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

Catalyst 2950

Cat2950#show cdp neighbors

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater

Device ID        Local Intrfce     Holdtme    Capability  Platform  Port ID

Cat2950          Fas 0/4            120        R S I      Catalyst 6Fas 4/4

Cat2950          Fas 0/5            120        R S I      Catalyst 6Fas 4/5

Cat2950          Fas 0/3            120        R S I      Catalyst 6Fas 4/3

Cat2950          Fas 0/2            120        R S I      Catalyst 6Fas 4/2

Cat2950#

Cat2950#show etherchannel port-channel

Channel-group listing:

-----------------------

Group: 1

----------

Port-channels in the group:

----------------------

Port-channel: Po1

------------

Age of the Port-channel   = 01d:08h:27m:08s

Logical slot/port   = 1/0           Number of ports = 4

GC                  = 0x00010001      HotStandBy port = null

Port state          = Port-channel Ag-Inuse

Ports in the Port-channel:

Index   Load   Port    EC state

------+------+------+------------

0     00     Fa0/2    desirable-SL

0     00     Fa0/3    desirable-SL

0     00     Fa0/4    desirable-SL

0     00     Fa0/5    desirable-SL

Time since last port bundled:    00d:00h:07m:17s    Fa0/5

Time since last port UN-bundled: 01d:08h:10m:06s    Fa0/5

Cat2950#

Cat2950#show etherchannel load-balance

Source MAC address

Cat2950#

Cat2950#show interfaces port-channel 1 switchport

Name: Po1

Switchport: Enabled

Administrative Mode: trunk

Operational Mode: trunk

Administrative Trunking Encapsulation: dot1q

Operational Trunking Encapsulation: dot1q

Negotiation of Trunking: On

Access Mode VLAN: 1 (default)

Trunking Native Mode VLAN: 1 (default)

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Protected: false

Voice VLAN: none (Inactive)

Appliance trust: none

Cat2950#

Catalyst 6500 Cisco IOS軟體

Cat6500#show etherchannel port-channel

Channel-group listing:

-----------------------

Group: 1

----------

Port-channels in the group:

----------------------

Port-channel: Po1

------------

Age of the Port-channel   = 01d:08h:25m:07s

Logical slot/port   = 14/1           Number of ports = 4

GC                  = 0x00010001      HotStandBy port = null

Port state          = Port-channel Ag-Inuse

Ports in the Port-channel:

Index   Load   Port    EC state

------+------+------+------------

1     11     Fa4/2    desirable-SL

3     22     Fa4/3    desirable-SL

0     44     Fa4/4    desirable-SL

2     88     Fa4/5    desirable-SL

Time since last port bundled:    00d:00h:09m:53s    Fa4/3

Time since last port UN-bundled: 00d:00h:09m:56s    Fa4/5

Cat6500#

疑難排解

使用本節內容，對組態進行疑難排解。

流量未通過802.1Q中繼

可能導致問題的原因之一是：

- 兩台交換器之間所連線的連線埠上存在本徵VLAN組態不相符的情況。

檢驗兩台交換機上的本徵VLAN配置。在CatOS交換器上發出show trunk命令，以便檢視本地VLAN設定。在XL交換器上發出show interface interface_id switchport 命令，以便檢視本地VLAN設定。如果兩台交換器之間的本徵VLAN不匹配，請使用相同的本徵VLAN配置交換器。發出switchport trunk native vlan 介面組態指令，變更XL交換器上的原生VLAN。發出set vlan 指令，變更CatOS交換器上的原生VLAN。

- XL交換機不支援DTP幀。

CatOS交換機通過中繼鏈路傳送DTP幀，但XL交換機不支援DTP幀。XL交換器不支援DTP。為了避免此問題，請將CatOS交換機埠狀態設定為no negotiate。發出set trunk mod/port nonegotiate dot1q 命令，將dot1q中繼模式的中繼模式設定為nonegotiate。

- XL交換器上存在封裝不相符。

在XL交換機上，檢驗中繼封裝是否設定為dot1q。發出show interface interface_id switchport 命令以檢視目前設定。發出switchport trunk encapsulation dot1q 介面組態命令，將封裝變更為dot1q。

- 早期版本的CatOS不支援dot1q中繼。

交換機中使用的CatOS早期版本不支援dot1q中繼。將交換機的CatOS升級到同時支援dot1q中繼和ISL中繼的更高版本。

相關資訊

- 建立EtherChannel埠組 配置交換機埠

- VLAN中繼的工作方式 配置VLAN

- 配置EtherChannel

- 配置EtherChannel

- 為第2層交換配置LAN埠

- 瞭解和設定EtherChannel

- 配置第2層乙太網介面

- LAN 產品支援頁面

- LAN 交換支援頁面

- 技術支援與文件 - Cisco Systems