目錄

簡介

必要條件

需求

採用元件

慣例

背景理論

設定

網路圖表

組態

驗證

show命令

show命令輸出示例

Catalyst 5500交換器

Catalyst 6500交換器

在通道模式下使用無條件的特殊注意事項

相關資訊

簡介

本文討論執行Catalyst OS(CatOS)的Cisco Catalyst 5500交換器和Catalyst 6500交換器之間的EtherChannel設定。 在此案例中，可能會使用任何執行CatOS的Catalyst 4500/4000、5500/5000或6500/6000系列交換器來取得相同的結果。EtherChannel可以稱為快速EtherChannel(FEC)或Gigabit EtherChannel(GEC)，具體取決於用來形成EtherChannel的介面或連線埠的速度。

在本例中，每台交換機的兩個快速乙太網(FE)埠已捆綁到FEC中。在本文檔中，術語「快速EtherChannel」、「Gigabit EtherChannel」、「埠通道」、「通道」和「埠組」均指的是EtherChannel。

本檔案僅包含交換器的組態檔以及相關範例show命令的輸出。有關如何在Catalyst交換器之間設定EtherChannel的進一步詳細資訊，請參閱以下檔案：

- 在執行CatOS的Catalyst 4000、5000和6000交換器之間設定EtherChannel

本文檔不提供使用鏈路聚合控制協定(LACP)的配置。有關配置LACP的詳細資訊，請參閱以下文檔：

- 在Catalyst 6000和Catalyst 4000之間配置LACP(802.3ad)

必要條件

需求

本文件沒有特定需求。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 執行CatOS 6.3(7)軟體的Catalyst 5500交換器

- 執行CatOS 7.2(2)軟體的Catalyst 6500交換器

注意：在CatOS交換機之間配置通道之前，請參閱以下文檔：

- 在Catalyst交換機上實施EtherChannel的系統要求

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

背景理論

可以無條件配置EtherChannel（使用開啟通道模式），也可以通過讓交換機使用埠聚合協定(PAgP)（使用通道模式desirable）與遠端協商通道來配置EtherChannel。

注意：運行CatOS的Catalyst交換機支援PAgP，因此建議在這些裝置之間設定EtherChannel時使用desirable模式。PAgP可防止兩台裝置之間的任何配置錯誤。當遠端裝置不支援PAgP且您需要無條件設定通道時，開啟的通道模式可能會很有用。silent或non-silent關鍵字可用於自動和理想的通道模式。Catalyst 4500/4000或6500/6000的所有連線埠和Catalyst 5500/5000系列交換器的銅纜連線埠預設啟用silent關鍵字。Catalyst 5500/5000系列交換器的所有光纖連線埠（FE和Gigabit乙太網路[GE]）預設啟用non-silent關鍵字。建議在Cisco交換機之間連線時使用預設的silent或non-silent關鍵字。

如需PAgP和EtherChannel的詳細資訊，請參閱思科交換器產品頁面上有關您的CatOS軟體版本的技術檔案。請參閱配置快速EtherChannel和Gigabit EtherChannel或配置EtherChannel部分。您可能希望使用瀏覽器的「查詢」功能來查詢這些部分。

另一個很好的參考是以下文檔的EtherChannel/埠聚合協定部分：

- Catalyst 4000、5000和6000系列交換機配置和管理的最佳實踐

設定

本節提供用於設定本文件中所述功能的資訊。

注意：要查詢有關本文檔中使用的命令的其他資訊，請使用命令查詢工具 (僅限註冊客戶)。

網路圖表

本檔案會使用以下網路設定：

組態

本檔案會使用以下設定：

- Catalyst 5500交換器

- Catalyst 6500交換器

注意：本文檔中列出的配置是通過在建議的desirable模式下使用PAgP協商配置EtherChannel來實現的。

Catalyst 5500交換器

#version 6.3(7)

!

set option fddi-user-pri enabled

!

#system

set system name  cat5500

!

#frame distribution method

set port channel all distribution mac both

!

#ip

!--- This is the IP address used for management.

set interface sc0 1 10.10.10.2/255.255.255.0 10.10.10.255

!

#set boot command

set boot config-register 0x2102

set boot system flash bootflash:cat5000-sup3.6-3-7.bin

!

#port channel

!--- Ports are assigned to admin group 50. This admin group is assigned !--- automatically when the port channel is configured, or it can be assigned manually. !--- If the admin group does not need to be assigned manually, this command should not be !--- manually set either. Let the switch create it automatically. !--- Also note that ports 4/1 through 4/4 are set for port channel even though only !--- 4/1-2 are configured. This is normal behavior. The ports 4/3 and 4/4 can !--- be used for any other purpose.

set port channel 4/1-4 50

!

# default port status is enable

!

!

#module 1 : 2-port 1000BaseSX Supervisor

!

#module 2 empty

!

#module 3 empty

!

#module 4 : 24-port 10/100BaseTX Ethernet

!--- Port channeling is enabled.

set port channel 4/1-2 mode desirable silent

!

#module 5 : 12-port 10/100BaseTX Ethernet

!

#module 6 empty

!

#module 7 : 2-port MM OC-3 Dual-Phy ATM

!

#module 8 empty

!

#module 9 empty

!

#module 10 empty

!

#module 11 empty

!

#module 12 empty

!

#module 13 empty

end

Catalyst 6500交換器

#version 7.2(2)

!

!

#system

set system name  cat6500

!

#!

#ip

!--- This is the IP address used for management.

set interface sc0 1 10.10.10.1/255.255.255.0 10.10.10.255

!

#set boot command

set boot config-register 0x2102

set boot system flash bootflash:cat6000-supk8.7-2-2.bin

!

#igmp

set igmp leave-query-type mac-gen-query

!

#port channel

!--- The ports are assigned to admin group 63. This admin group is assigned !--- automatically when the port channel is configured or it can be assigned manually. !--- If admin group does not need to be assigned manually, this command should not be !--- manually set. Let the switch create it automatically. !--- Also note that ports 4/1 through 4/4 are set for the port channel even though !--- only 4/1-2 are configured. This is normal behavior. The ports 4/3 and 4/4 !--- can be used for any other purpose.

set port channel 4/1-4 63

!

# default port status is enable

!

!

#module 1 : 2-port 1000BaseX Supervisor

!

#module 2 : 2-port 1000BaseX Supervisor

!

#module 3 empty

!

#module 4 : 48-port 10/100BaseTX Ethernet

!--- Port channeling is enabled.

set port channel 4/1-2 mode desirable silent

!

#module 5 empty

!

#module 6 empty

!

#module 15 : 1-port Multilayer Switch Feature Card

!

#module 16 : 1-port Multilayer Switch Feature Card

end

驗證

本節提供的資訊可用於確認您的組態是否正常運作。

show命令

Output Interpreter Tool (僅供註冊客戶使用)支援某些show命令，這允許您檢視show命令輸出的分析。

要檢查CatOS交換機中的埠通道，請發出以下命令：

- show port capabilities module

- show port channel

- show port channel module/port

- show port channel info

要檢查CatOS交換機中的生成樹協定(STP)狀態，請發出以下命令：

- show spantree

- show spantree vlan

- show spantree module/port

show命令輸出示例

Catalyst 5500交換器

show port capabilities module

此命令用於檢查模組是否能夠進行通道化。還顯示了允許哪些其他埠使用此埠形成通道。

cat5500> (enable) show port capabilities 4

Model                    WS-X5225R

Port                     4/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  4/1-2,4/1-4

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off,on)

Security                 yes

Dot1x                    yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(none),tx-(none)

CoS rewrite              yes

ToS rewrite              IP-Precedence

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            1..1000,untagged,dot1p,none

SPAN                     source,destination

--------------------------------------------------------------

Model                    WS-X5225R

Port                     4/2

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  4/1-2,4/1-4

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off,on)

Security                 yes

Dot1x                    yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(none),tx-(none)

CoS rewrite              yes

ToS rewrite              IP-Precedence

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            1..1000,untagged,dot1p,none

SPAN                     source,destination

--------------------------------------------------------------

!--- Output suppressed.

show port channel

此命令以及show port channel info命令用於檢查連線埠通道的狀態。

cat5500> (enable) show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

4/1  connected  desirable silent        50   865

4/2  connected  desirable silent        50   865

----- ---------- -------------------- ----- -----

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

4/1  TBA04380080(cat6500)            4/1                       WS-C6506

4/2  TBA04380080(cat6500)            4/2                       WS-C6506

----- ------------------------------- ------------------------- ----------------

註：如果埠4/3和4/4處於未連線狀態，則會在上述輸出中顯示。

如果您的Cisco裝置具有show port channel命令的輸出，可以使用Output Interpreter Tool (僅限註冊客戶)來顯示潛在問題和修正程式。

show spantree module/port

cat5500> (enable) show spantree 4/1

Port                     Vlan Port-State    Cost      Prio Portfast Channel_id

------------------------ ---- ------------- --------- ---- -------- ----------

4/1-2                    1    forwarding           12   32 disabled 865

cat5500> (enable) show spantree 4/2

Port                     Vlan Port-State    Cost      Prio Portfast Channel_id

------------------------ ---- ------------- --------- ---- -------- ----------

4/1-2                    1    forwarding           12   32 disabled 865

注意：連線埠4/1和4/2的show spantree module/port 命令的輸出相同，因為這些連線埠都以通道ID為865的一個通道進行分組。

Catalyst 6500交換器

show port capabilities module

此命令用於檢查模組是否能夠進行通道化。還顯示了允許哪些其他埠使用此埠形成通道。

cat6500> (enable) show port capabilities 4/1

Model                    WS-X6248-RJ-45

Port                     4/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  yes

Broadcast suppression    no

Flow control             receive-(off,on),send-(off)

Security                 yes

Dot1x                    yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(1q4t),tx-(2q2t)

CoS rewrite              yes

ToS rewrite              DSCP

UDLD                     yes

Inline power             no

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

COPS port group          4/1-48

Link debounce timer      yes

show port channel

此命令以及show port channel info命令用於檢查連線埠通道的狀態。

cat6500> (enable) show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

4/1  connected  desirable silent        63   865

4/2  connected  desirable silent        63   865

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

4/1  069001645(cat5500)              4/1                       WS-C5500

4/2  069001645(cat5500)              4/2                       WS-C5500

註：如果埠4/3和4/4處於未連線狀態，則會在上述輸出中顯示。

如果您的Cisco裝置具有show port channel命令的輸出，可以使用Output Interpreter Tool (僅限註冊客戶)來顯示潛在問題和修正程式。

show port channel info

cat6500> (enable) show port channel info

Switch Frame Distribution Method: ip both

Port  Status     Channel              Admin Channel Speed Duplex Vlan

mode                 group id

----- ---------- -------------------- ----- ------- ----- ------ ----

4/1  connected  desirable silent        63     865 a-100 a-full    1

4/2  connected  desirable silent        63     865 a-100 a-full    1

Port  Channel Oper-group Neighbor   Oper-Distribution PortSecurity/

ifIndex            Oper-group Method            Dynamic port

----- ------- ---------- ---------- ----------------- -------------

4/1  215            241 1          ip both

4/2  215            241 1          ip both

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

4/1  069001645(cat5500)              4/1                       WS-C5500

4/2  069001645(cat5500)              4/2                       WS-C5500

!--- Output suppressed.

show spantree vlan

show spantree命令用於驗證通道中的所有埠是否都分組在一起並處於轉發狀態。

cat6500> (enable) show spantree 1

VLAN 1

Spanning tree mode          PVST+

Spanning tree type          ieee

Spanning tree enabled

Designated Root             00-04-6d-82-88-00

Designated Root Priority    0

Designated Root Cost        38

Designated Root Port        4/25

Root Max Age   20 sec   Hello Time 2  sec   Forward Delay 15 sec

Bridge ID MAC ADDR          00-03-a0-e9-0c-00

Bridge ID Priority          32768

Bridge Max Age 20 sec   Hello Time 2  sec   Forward Delay 15 sec

Port                     Vlan Port-State    Cost      Prio Portfast Channel_id

------------------------ ---- ------------- --------- ---- -------- ----------

1/1                     1    not-connected         4   32 disabled 0

1/2                     1    not-connected         4   32 disabled 0

2/1                     1    not-connected         4   32 disabled 0

2/2                     1    not-connected         4   32 disabled 0

4/1-2                    1    forwarding           12   32 disabled 865

4/3                     1    forwarding           19   32 disabled 0

4/4                     1    forwarding           19   32 disabled 0

4/5                     1    not-connected       100   32 disabled 0

4/6                     1    not-connected       100   32 disabled 0

4/7                     1    not-connected       100   32 disabled 0

4/8                     1    not-connected       100   32 disabled 0

4/9                     1    not-connected       100   32 disabled 0

4/10                    1    not-connected       100   32 disabled 0

4/11                    1    not-connected       100   32 disabled 0

4/12                    1    not-connected       100   32 disabled 0

4/13                    1    not-connected       100   32 disabled 0

4/14                    1    not-connected       100   32 disable

!--- Output suppressed.

如果您的Cisco裝置具有show spantree指令的輸出，可以使用Output Interpreter Tool (僅限註冊客戶)來顯示潛在問題和修正程式。

show spantree module/port

cat6500> (enable) show spantree 4/1

Port                     Vlan Port-State    Cost      Prio Portfast Channel_id

------------------------ ---- ------------- --------- ---- -------- ----------

4/1-2                    1    forwarding           12   32 disabled 865

cat6500> (enable) show spantree 4/2

Port                     Vlan Port-State    Cost      Prio Portfast Channel_id

------------------------ ---- ------------- --------- ---- -------- ----------

4/1-2                    1    forwarding           12   32 disabled 865

注意：連線埠3/1和3/2的show spantree module/port 命令的輸出相同，因為這些連線埠以通道ID為865的同一個通道組合在一起。

在通道模式下使用無條件的特殊注意事項

思科建議使用PAgP進行埠通道配置，如上述背景理論中所述。如果由於任何原因而無條件配置EtherChannel（使用開啟通道模式），建議您按照以下步驟建立埠通道。這樣可避免在配置過程中出現STP可能的問題。如果一端配置為通道，另一端配置為通道，則STP環路檢測可能會禁用埠。

1. 發出set port disable module/port 命令，將連線埠通道中要使用的連線埠設定為第一台交換器上的停用模式。

2. 在第一個交換機上建立埠通道（埠組），並將通道模式設定為on。

3. 在第二個交換機上建立埠通道，並將通道模式設定為on。

4. 發出set port enable module/port命令，重新啟用之前在第一個交換器上停用的連線埠。

相關資訊

- 在執行CatOS的Catalyst 4000、5000和6000交換器之間設定EtherChannel

- 在Catalyst交換機上實施EtherChannel的系統要求

- LAN 產品支援頁面

- LAN 交換支援頁面

- 技術支援 - Cisco Systems