目錄

簡介

必要條件

需求

採用元件

相關產品

慣例

設定

網路圖表

組態

驗證

疑難排解

疑難排解指令

相關資訊

簡介

本檔案將說明在廣播媒體（例如乙太網路和權杖環）上進行開放最短路徑優先(OSPF)的組態範例。命令show ip ospf interface檢驗OSPF是否預設以廣播網路型別在所有廣播媒體上運行。

必要條件

需求

本文檔的讀者應瞭解以下主題：

- 乙太網路技術

- 配置OSPF

- OSPF鄰居狀態

採用元件

本檔案中的資訊適用於這些軟體和硬體版本。

- 兩台Cisco 2501路由器

- Cisco IOS®軟體版本12.2(27)

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

相關產品

您還可以將此配置用於至少具有一個乙太網、令牌環或FDDI介面的任何兩台路由器。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

設定

本節提供可用於設定本檔案中所述功能的資訊。

注意：要查詢有關本文檔使用的命令的其他資訊，請參閱OSPF命令或使用命令查詢工具(僅限註冊客戶)。

網路圖表

本檔案會使用此網路設定。

組態

本檔案會使用這些設定。

- Router1

- Router2

Router1

interface Loopback0

ip address 192.168.45.1 255.255.255.0

!

interface Ethernet0

ip address 10.10.10.1 255.255.255.0

!

router ospf 1

network 10.10.10.0 0.0.0.255 area 0

!--- OSPF is configured to run on the !--- Ethernet interface with an Area ID of 1.

!

Router2

interface Loopback0

ip address 172.16.10.1 255.255.255.0

!

interface Ethernet0

ip address 10.10.10.2 255.255.255.0

!

router ospf 1

network 10.10.10.0 0.0.0.255 area 0

!--- OSPF is configured to run on the !--- Ethernet interface with an Area ID of 1.

!

驗證

本節提供的資訊可用於確認您的組態是否正常運作。

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

- show ip ospf neighbor — 按介面顯示OSPF鄰居資訊。Router1的輸出如下所示：

Router1#show ip ospf neighbor

Neighbor ID   Pri    State          Dead Time      Address       Interface

172.16.10.1    1     FULL/BDR       00:00:38     10.10.10.2      Ethernet0

根據此輸出，對於Router2的鄰居ID為172.16.10.1的，Router1的鄰居狀態為「Full」。Router2是此廣播網路中的備份指定路由器(BDR)。要瞭解有關show ip ospf neighbor命令顯示的詳細資訊，請參閱show ip ospf neighbor命令顯示什麼內容？

- show ip ospf interface — 顯示與OSPF相關的介面資訊。乙太網介面上發出的Router1的輸出如下所示：

Router1#show ip ospf interface ethernet 0

Ethernet0 is up, line protocol is up

Internet Address 10.10.10.1/24, Area 0

Process ID 1, Router ID 192.168.45.1, Network Type BROADCAST, Cost: 10

Transmit Delay is 1 sec, State DR, Priority 1

Designated Router (ID) 192.168.45.1, Interface address 10.10.10.1

Backup Designated router (ID) 172.16.10.1, Interface address 10.10.10.2

Timer intervals configured, Hello 10, Dead 40, Wait 40, Retransmit 5

Hello due in 00:00:00

Index 2/2, flood queue length 0

Next 0x0(0)/0x0(0)

Last flood scan length is 2, maximum is 2

Last flood scan time is 0 msec, maximum is 0 msec

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 172.16.10.1 (Backup Designated Router)

Suppress hello for 0 neighbor(s)

從該輸出中，您知道Ethernet 0介面的網路型別是廣播的。要瞭解有關show ip ospf interface命令顯示內容的詳細資訊，請參閱show ip ospf interface命令顯示什麼？

同樣地，這裡顯示了Router2上show命令的輸出結果。

Router2#show ip ospf neighbor

Neighbor ID    Pri    State       Dead Time       Address        Interface

192.168.45.1    1     FULL/DR       00:00:31      10.10.10.1       Ethernet0

從show ip ospf neighbor命令輸出中，您知道Router1是此廣播網路中的指定路由器(DR)。

Router2#show ip ospf interface ethernet 0

Ethernet0 is up, line protocol is up

Internet Address 10.10.10.2/24, Area 0

Process ID 1, Router ID 172.16.10.1, Network Type BROADCAST, Cost: 10

Transmit Delay is 1 sec, State BDR, Priority 1

Designated Router (ID) 192.168.45.1, Interface address 10.10.10.1

Backup Designated router (ID) 172.16.10.1, Interface address 10.10.10.2

Timer intervals configured, Hello 10, Dead 40, Wait 40, Retransmit 5

Hello due in 00:00:00

Index 1/1, flood queue length 0

Next 0x0(0)/0x0(0)

Last flood scan length is 1, maximum is 1

Last flood scan time is 0 msec, maximum is 0 msec

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 192.168.45.1 (Designated Router)

Suppress hello for 0 neighbor(s)

Router2的show ip ospf interface ethernet 0命令輸出還顯示Ethernet 0介面的網路型別為廣播。

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

疑難排解指令

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

注意：發出debug指令之前，請參閱有關Debug指令的重要資訊。

兩個路由器之間形成鄰接關係時存在多種狀態。您可以使用debug ip ospf adj 命令檢視各種狀態，以及廣播OSPF網路中發生的DR和BDR選舉。在早期的Cisco IOS軟體版本中，您可以使用命令debug ip ospf adjacency。建立鄰居關係之前，需要發出此debug命令。

從Router1的角度來看此輸出。輸出中粗體字的部分是鄰接過程經歷的各種狀態。

Router1#debug ip ospf adj

OSPF adjacency events debugging is on

*Mar  1 01:41:23.319: OSPF: Rcv DBD from 172.16.10.1 on Ethernet0 seq 0x1F6C opt

0x42 flag 0x7 len 32  mtu 1500 state INIT

*Mar  1 01:41:23.323: OSPF: 2 Way Communication to 172.16.10.1

on Ethernet0, state 2WAY

*Mar  1 01:41:23.327: OSPF: Neighbor change Event on interface Ethernet0

*Mar  1 01:41:23.327: OSPF: DR/BDR election on Ethernet0

*Mar  1 01:41:23.331: OSPF: Elect BDR 172.16.10.1

*Mar  1 01:41:23.331: OSPF: Elect DR 192.168.45.1

*Mar  1 01:41:23.335:        DR: 192.168.45.1 (Id)   BDR: 172.16.10.1 (Id)

*Mar  1 01:41:23.339: OSPF: Send DBD to 172.16.10.1 on Ethernet0 seq 0x2552 opt

0x42 flag 0x7 len 32

*Mar  1 01:41:23.343: OSPF: First DBD and we are not SLAVE

*Mar  1 01:41:23.359: OSPF: Rcv DBD from 172.16.10.1 on Ethernet0 seq 0x2552 opt

0x42 flag 0x2 len 52  mtu 1500 state EXSTART

*Mar  1 01:41:23.363: OSPF: NBR Negotiation Done. We are the MASTER

*Mar  1 01:41:23.367: OSPF: Send DBD to 172.16.10.1 on Ethernet0 seq 0x2553 opt

0x42 flag 0x3 len 72

*Mar  1 01:41:23.387: OSPF: Rcv DBD from 172.16.10.1 on Ethernet0 seq 0x2553 opt

0x42 flag 0x0 len 32  mtu 1500 state EXCHANGE

*Mar  1 01:41:23.391: OSPF: Send DBD to 172.16.10.1 on Ethernet0 seq 0x2554 opt

0x42 flag 0x1 len 32

*Mar  1 01:41:23.411: OSPF: Rcv DBD from 172.16.10.1 on Ethernet0 seq 0x2554 opt

0x42 flag 0x0 len 32  mtu 1500 state EXCHANGE

*Mar  1 01:41:23.415: OSPF: Exchange Done with 172.16.10.1 on Ethernet0

*Mar  1 01:41:23.419: OSPF: Synchronized with 172.16.10.1 on Ethernet0, state FULL

01:41:23: %OSPF-5-ADJCHG: Process 1, Nbr 172.16.10.1 on Ethernet0

from LOADING to FULL, Loading Done

*Mar  1 01:41:23.879: OSPF: Build router LSA for area 0, router ID 192.168.45.1,

seq 0x80000004

*Mar  1 01:41:23.923: OSPF: Build network LSA for Ethernet0, router ID 192.168.45.1

*Mar  1 01:41:25.503: OSPF: Neighbor change Event on interface Ethernet0

*Mar  1 01:41:25.507: OSPF: DR/BDR election on Ethernet0

*Mar  1 01:41:25.507: OSPF: Elect BDR 172.16.10.1

*Mar  1 01:41:25.511: OSPF: Elect DR 192.168.45.1

*Mar  1 01:41:25.511:        DR: 192.168.45.1 (Id)   BDR: 172.16.10.1 (Id)

發出debug ip ospf events 命令以驗證hello計時器值，如以下示例輸出所示。

Router1#debug ip ospf events

OSPF events debugging is on

Router1#

*Mar  1 04:04:11.926: OSPF: Rcv hello from 172.16.10.1 area 0 from

Ethernet0 10.10.10.2

*Mar  1 04:04:11.930: OSPF: End of hello processing

*Mar  1 04:04:21.926: OSPF: Rcv hello from 172.16.10.1

area 0 from Ethernet0 10.10.10.2

*Mar  1 04:04:21.930: OSPF: End of hello processing

*Mar  1 04:04:31.926: OSPF: Rcv hello from 172.16.10.1 area 0 from

Ethernet0 10.10.10.2

*Mar  1 04:04:31.930: OSPF: End of hello processing

*Mar  1 04:04:41.926: OSPF: Rcv hello from 172.16.10.1 area 0 from

Ethernet0 10.10.10.2

*Mar  1 04:04:41.930: OSPF: End of hello processing

*Mar  1 04:04:51.926: OSPF: Rcv hello from 172.16.10.1 area 0 from

Ethernet0 10.10.10.2

*Mar  1 04:04:51.930: OSPF: End of hello processing

*Mar  1 04:05:01.926: OSPF: Rcv hello from 172.16.10.1 area 0 from

Ethernet0 10.10.10.2

*Mar  1 04:05:01.930: OSPF: End of hello processing

*Mar  1 04:05:11.926: OSPF: Rcv hello from 172.16.10.1 area 0 from

Ethernet0 10.10.10.2

*Mar  1 04:05:11.930: OSPF: End of hello processing

*Mar  1 04:05:21.926: OSPF: Rcv hello from 172.16.10.1 area 0 from

Ethernet0 10.10.10.2

*Mar  1 04:05:21.930: OSPF: End of hello processing

此輸出顯示hello資料包每10秒交換一次。

相關資訊

- 通過多路訪問網路連線的OSPF路由器

- 非廣播鏈路上的OSPF初始配置

- 排除OSPF故障

- OSPF支援頁

- IP路由技術支援頁面

- 技術支援與文件 - Cisco Systems