目錄

簡介

必要條件

需求

採用元件

慣例

設定

網路圖表

組態

驗證

show ipv6 route

show ipv6 route bgp

show bgp ipv6 unicast summary

相關資訊

簡介

本檔案將提供適用於IPv6的多通訊協定邊界閘道通訊協定(BGP)的範例組態。BGP是一種外部閘道通訊協定(EGP)，主要用於連線包含獨立路由原則（自治系統）的獨立路由網域。BGP通常用於連線到服務提供商以訪問Internet。BGP也可用於自治系統，這種變體稱為內部BGP(iBGP)。 多協定BGP是一種增強型BGP，它承載多個網路層協定地址系列（如IPv6地址系列）和IP組播路由的路由資訊。所有BGP命令和路由策略功能均可與多協定BGP一起使用。

必要條件

需求

嘗試此組態之前，請確保符合以下要求：

- 實施IPv6編址和基本連線

採用元件

本文件所述內容不限於特定軟體和硬體版本。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

設定

本節提供用於設定本文件中所述功能的資訊。

在此拓撲中，路由器R0和R1形成EBGP關係：R0位於自治系統編號1(AS1)中，R1位於AS2中。路由器R0通告兩個IPv6網路：2010:AB8:2::/48和2010:AB8:3::/48。

網路圖表

本檔案會使用以下網路設定：

組態

以下是圖中所示路由器的IPv6多協定BGP的示例配置：

路由器R0

ipv6 unicast-routing

!--- Enables forwarding of IPv6 packets.

ipv6 cef

interface Loopback10

no ip address

ipv6 address 2010:AB8:2::/48

ipv6 enable

!

interface Loopback20

no ip address

ipv6 address 2010:AB8:3::/48

ipv6 enable

!

interface FastEthernet0/0

no ip address

duplex auto

speed auto

ipv6 address 2010:AB8:0:2::/64 eui-64

ipv6 enable

!

router bgp 1

bgp router-id 1.1.1.1

no bgp default ipv4-unicast

!--- Without configuring ""no bgp default ipv4-unicast"" only IPv4 will be !--- advertised

bgp log-neighbor-changes

neighbor 2010:AB8:0:2:C601:10FF:FE58:0 remote-as 2

!

address-family ipv6

neighbor 2010:AB8:0:2:C601:10FF:FE58:0 activate

network 2010:AB8:2::/48

network 2010:AB8:3::/48

exit-address-family

!

路由器R1

ipv6 unicast-routing

ipv6 cef

interface FastEthernet0/0

no ip address

duplex auto

speed auto

ipv6 address 2010:AB8:0:2::/64 eui-64

ipv6 enable

!

router bgp 2

bgp router-id 2.2.2.2

no bgp default ipv4-unicast

bgp log-neighbor-changes

neighbor 2010:AB8:0:2:C600:10FF:FE58:0 remote-as 1

!

address-family ipv6

neighbor 2010:AB8:0:2:C600:10FF:FE58:0 activate

exit-address-family

!

驗證

使用本節內容，確認您的組態是否正常運作。

輸出直譯器工具(僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

show ipv6 route

此命令顯示IPv6路由表。

R1#

show ipv6 route

IPv6 Routing Table - 5 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

C   2010:AB8:0:2::/64 [0/0]

via ::, FastEthernet0/0

L   2010:AB8:0:2:C601:10FF:FE58:0/128 [0/0]

via ::, FastEthernet0/0

B   2010:AB8:2::/48 [20/0]

via FE80::C600:10FF:FE58:0, FastEthernet0/0

B   2010:AB8:3::/48 [20/0]

via FE80::C600:10FF:FE58:0, FastEthernet0/0

L   FF00::/8 [0/0]

via ::, Null0

show ipv6 route bgp

當您指定協定時，只顯示該特定路由協定的路由。以下輸出示例來自使用BGP關鍵字輸入的show ipv6 route命令：

R1#

show ipv6 route bgp

IPv6 Routing Table - 5 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

B   2010:AB8:2::/48 [20/0]

via FE80::C600:10FF:FE58:0, FastEthernet0/0

B   2010:AB8:3::/48 [20/0]

via FE80::C600:10FF:FE58:0, FastEthernet0/0

show bgp ipv6 unicast summary

此命令提供的輸出與show ip bgp summary命令類似，不同之處在於它是IPv6特定的。

R1#

show bgp ipv6 unicast summary

BGP router identifier 2.2.2.2, local AS number 2

BGP table version is 3, main routing table version 3

2 network entries using 304 bytes of memory

2 path entries using 152 bytes of memory

2/1 BGP path/bestpath attribute entries using 248 bytes of memory

1 BGP AS-PATH entries using 24 bytes of memory

0 BGP route-map cache entries using 0 bytes of memory

0 BGP filter-list cache entries using 0 bytes of memory

BGP using 728 total bytes of memory

BGP activity 2/0 prefixes, 2/0 paths, scan interval 60 secs

Neighbor        V    AS MsgRcvd MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

2010:AB8:0:2:C600:10FF:FE58:0

4     1      15      14        3    0    0 00:11:52        2

相關資訊

- IP第6版(IPv6)技術支援

- 為IPv6實施多協定BGP

- 技術支援與文件 - Cisco Systems