目錄

簡介

必要條件

需求

採用元件

慣例

設定

網路圖表

組態

顯示輸出示例

show命令

顯示輸出示例

疑難排解

debug指令

調試輸出示例

相關資訊

簡介

本文描述如何在具有BRI介面的兩台路由器之間配置按需撥號路由(DDR)。在此配置中，小型辦公室、家庭辦公室(SOHO)路由器在需要將流量傳送到中央網路時撥打中央站點路由器。如果使用者定義的時間段內沒有流量，則連線會自動關閉。此網路還使用開放最短路徑優先(OSPF)路由協定和ip ospf demand-circuit命令，以防止在DDR鏈路中斷時刪除遠端側網路的任何路由。但是，無需路由協定即可通過該鏈路運行。

必要條件

需求

以下幾點描述了配置DDR鏈路之前應確定的幾個設計因素。

- DDR實施：您可以使用撥號器對應（傳統DDR）或撥號器設定檔。有關這兩種實現之間的差異的詳細資訊，請參閱使用撥號器配置檔案配置ISDN DDR。在此配置中，我們使用撥號器對映。

- 單或雙向撥號：您可以將每台路由器配置為通過撥打另一端來啟動DDR鏈路，或者只能讓一端（通常是SOHO）啟動撥號連線。檢查您的流量模式，並在決定使用哪種撥號方法之前考慮以下資訊：

- 如果兩台路由器都撥號：

- 當有流量發往另一台路由器的網路時，任一站點都可以啟動鏈路。

- 兩台路由器可能同時撥號，從而導致消息繁忙。

- 如果撥號限制在SOHO路由器：

- 如果鏈路未開啟，則從中央站點發往SOHO路由器的流量將失敗。

- 您將避免因「衝突」呼叫而出現忙消息。

注意：在本示例中，只有SOHO路由器啟動DDR鏈路。

- 路由協定：您可以選擇在鏈路上運行路由協定，但必須確保定期更新（如hello）被標籤為無趣，以便鏈路不會無限期保持運行。此外，路由協定應保持路由表不變，並且鏈路關閉後不應丟棄路由。這可以通過ip ospf demand-circuit命令或快照路由來完成。如果不想使用路由協定，則可以在下一跳指向另一路由器的BRI介面的每台路由器上配置靜態路由。

- 有趣的流量：定義DDR相關流量時一定要小心。在任一端未正確定義相關流量可能會阻止鏈路在需要時啟動、過早斷開或甚至根本未斷開。例如，您可能希望將所有路由協定流量標籤為無趣，因此定期更新不會無限期保持鏈路正常運行。

採用元件

此配置是使用以下軟體和硬體版本開發和測試的：

- 一台運行Cisco IOS®軟體版本12.1(5)T的Cisco 1604 SOHO路由器，帶有一個BRI U介面

- 運行Cisco IOS 12.1(2)的Cisco 3640路由器，其上有NM-4B-U（四個BRI U介面）

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

設定

本節提供用於設定本文件中所述功能的資訊。

注意：要查詢有關本文檔中使用的命令的其他資訊，請使用IOS命令查詢工具

網路圖表

本文檔使用下圖所示的網路設定。

組態

本文檔使用如下所示的配置。

注意：本文檔中的資訊來自隔離的實驗室環境。使用前，請確認您已瞭解任何指令可能對網路造成的影響。

maui-soho-01(1600)

maui-soho-01#show running-config

Building configuration...

Current configuration : 1656 bytes

!

version 12.1

no service single-slot-reload-enable

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname maui-soho-01

!

logging rate-limit console 10 except errors

aaa new-model

aaa authentication login default local

aaa authentication login NO_AUTHEN none

aaa authentication ppp default local

!--- basic AAA configuration for PPP calls

enable secret 5 <deleted>

!

username admin password <deleted>

username maui-nas-05 password cisco

!--- username for remote router (maui-nas-05) and shared secret !--- (used for CHAP authentication) !--- Shared secret must be the same on both sides.

ip subnet-zero

!

isdn switch-type basic-ni

!

interface Loopback0

ip address 172.17.1.1 255.255.255.0

!--- The loopback address will be used by OSPF for the router ID.

!

interface Ethernet0

ip address 172.16.1.1 255.255.255.0

!

interface Serial0

no ip address

shutdown

no fair-queue

!

interface BRI0

!--- BRI interface used for DDR dialout

ip address 172.20.10.2 255.255.255.0

!--- IP address !--- The remote address is in the same subnet.

encapsulation ppp

ip ospf demand-circuit

!--- This forces OSPF to keep the routing table intact when the DDR link !--- is down. This should only be configured on one router for a !--- point-to-point circuit.

dialer idle-timeout 900

!--- Idle timeout is set to 900 seconds (15 minutes). !--- The link will be disconnected if there is no interesting traffic !--- for 900 secs.

dialer map ip 172.20.10.1 name maui-nas-05 broadcast 5551111

dialer map ip 172.20.10.1 name maui-nas-05 broadcast 5551112

!--- dialer map statements for the remote router !--- The name must match the one used by the remote router to identify !--- itself. The broadcast keyword is required to send broadcast traffic !--- over the link(for OSPF). The two different phone numbers correspond !--- to the b-channels of the remote side. The multiple statements allow !--- the router to dial the second number if the first number is busy.

dialer load-threshold 80 outbound

!--- This set the load level for traffic at which additional connections !--- will be added to the Multilink PPP bundle. !--- Load level values range from 1 (unloaded) to 255 (fully loaded). !--- The threshold in this case is 80/255 = 32%.

dialer-group 1

!--- apply interesting traffic definition from dialer-list 1

isdn switch-type basic-ni

isdn spid1 51255522220101 5552222

isdn spid2 51255522230101 5552223

ppp authentication chap

!--- Use chap authentication.

ppp multilink

!--- Use multilink to bring up both BRI channels.

!

router ospf 5

log-adjacency-changes

network 172.16.1.0 0.0.0.255 area 0

network 172.17.1.0 0.0.0.255 area 0

network 172.20.10.0 0.0.0.255 area 0

!

ip classless

ip route 172.20.0.0 255.255.0.0 172.20.10.0

no ip http server

!

access-list 101 remark Define Interesting Traffic

access-list 101 deny   ospf any any

!--- mark OSPF as uninteresting !--- This will prevent OSPF hellos from keeping the link up.

access-list 101 permit ip any any

dialer-list 1 protocol ip list 101

!--- Interesting traffic is defined by access-list 101. !--- This is applied to BRI0 using dialer-group 1.

!

line con 0

exec-timeout 0 0

login authentication NO_AUTHEN

transport input none

line vty 0 4

!

end

maui-nas-05(3640)

maui-nas-05#show running-config

Building configuration...

Current configuration:

!

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname maui-nas-05

!

aaa new-model

aaa authentication login default local

aaa authentication login NO_AUTHEN none

aaa authentication ppp default local

!--- basic AAA configuration for PPP calls

enable secret 5 <deleted>

!

username admin password 7 <deleted>

username maui-soho-01 password 7 cisco

!--- username for remote router (maui-soho-01) and shared secret !--- (used for CHAP authentication) !--- Shared secret must be the same on both sides.

ip subnet-zero

!

isdn switch-type basic-ni

!

interface Loopback0

ip address 172.22.1.1 255.255.255.0

!--- The loopback address is used by OSPF for the router ID.

!

interface Ethernet0/0

ip address 172.22.53.105 255.255.255.0

!

interface Ethernet0/1

no ip address

shutdown

!

interface BRI1/0

!--- BRI interface used to accept dialin

ip address 172.20.10.1 255.255.255.0

!--- IP address !--- The remote address is in the same subnet.

encapsulation ppp

dialer idle-timeout 900

!--- Idle timeout is set to 900 seconds (15 minutes). !--- Set this value to be equal to or higher than the idle-timeout on the !--- client side. A higher idle-timeout permits the client side to !--- determine when to bring down the link.

!

dialer map ip 172.20.10.2 name maui-soho-01 broadcast

!--- dialer map statement for the BRI interface of the remote router !--- The name must be the one used by the remote router to identify !--- itself. The broadcast keyword is required to send broadcast traffic !--- over the link(for OSPF). Note: There is no phone number, as we are !--- not configuring this side to dial. If you want this router to dial, !--- add the remote side phone number to the dialer map statement

dialer-group 1

!--- apply interesting traffic definition from dialer-list 1

isdn switch-type basic-ni

isdn spid1 51255511110101 5551111

isdn spid2 51255511120101 5551112

ppp authentication chap

ppp multilink

!--- allow multilink connections

!

! <<--unused interface configurations have been removed.

!

router ospf 5

network 172.20.10.0 0.0.0.255 area 0

network 172.22.1.0 0.0.0.255 area 0

network 172.22.53.0 0.0.0.255 area 0

default-information originate always

!--- transmit OSPF default information !--- This may be required for remote router to use the BRI DDR link.

!

ip classless

ip route 0.0.0.0 0.0.0.0 Ethernet0/0

ip route 172.22.0.0 255.255.0.0 172.22.53.0

no ip http server

!

dialer-list 1 protocol ip permit

!--- All IP traffic is defined interesting. !--- This is applied to BRI0 using dialer-group 1.

!

line con 0

login authentication NO_AUTHEN

transport input none

line 97 102

line aux 0

line vty 0 4

!

end

注意：如果路由器是OSPF點對點拓撲（2台路由器）的一部分，則只需使用ip ospf demand-circuit命令配置需求電路的一端。但是，所有路由器必須在區域內載入此功能，並且必須支援ip ospf demand-circuit命令。如果路由器是OSPF點對多點拓撲（例如中心輻射和分支）的一部分，則只能使用此命令配置多點終端。

顯示輸出示例

show命令

輸出直譯器工具支援某些show命令，該工具允許您檢視show命令輸出的分析。

- show dialer interface [type number ] — 顯示為DDR配置的介面的一般診斷資訊，並顯示計時器的配置和連線超時前的時間。您應該驗證以下消息：

- 「Dialer state is data link layer up」 — 撥號器正常啟動。

- 「Physical layer up」 — 線路協定啟動，但網路控制協定(NCP)未啟動。

- 「撥號原因」該選項顯示發起撥號的資料包的源地址和目的地址。

- show isdn status — 確保路由器與ISDN交換機正確通訊。此命令還顯示活動呼叫數您應驗證以下消息：

- "第1層狀態為ACTIVE",

- "第2層狀態狀態= MULTIPLE_FRAME_ESTABLISHED"

注意：有關詳細資訊，請參閱使用show isdn status命令進行BRI故障排除。

- show caller user username detail — 顯示詳細的LCP協商引數。

顯示輸出示例

show ip route命令在DDR鏈路接通後顯示soho上的路由表。請注意，遠端站點的OSPF路由已安裝。

maui-soho-01#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - ISIS level-1, L2 - ISIS level-2, ia - ISIS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 172.20.10.1 to network 0.0.0.0

172.17.0.0/24 is subnetted, 1 subnets

C       172.17.1.0 is directly connected, Loopback0

172.16.0.0/24 is subnetted, 1 subnets

C       172.16.1.0 is directly connected, Ethernet0

172.20.0.0/16 is variably subnetted, 3 subnets, 3 masks

C       172.20.10.0/24 is directly connected, BRI0

C       172.20.10.1/32 is directly connected, BRI0

S       172.20.0.0/16 [1/0] via 172.20.10.0

172.22.0.0/16 is variably subnetted, 2 subnets, 2 masks

O       172.22.53.0/24 [110/1572] via 172.20.10.1, 00:01:37, BRI0

O       172.22.1.1/32 [110/1563] via 172.20.10.1, 00:01:37, BRI0

O*E2 0.0.0.0/0 [110/1] via 172.20.10.1, 00:01:37, BRI0

注意：來自遠端端的OSPF路由（尤其是預設路由）將新增到路由表中。這允許客戶端(maui-soho-01)在需要通過BRI鏈路傳送流量時撥打BRI鏈路。由於這是OSPF需求電路，因此當鏈路因撥號器空閒超時過期而關閉時，不會刪除（老化）路由表中的OSPF條目。

在show caller user username detail輸出中，注意連線的空閒超時。

maui-soho-01#show caller user maui-nas-05 detail

User: maui-nas-05, line BR0:1, service PPP

Active time 00:02:33, Idle time 00:00:00

Timeouts:            Absolute  Idle

Limits:          -         -

Disconnect in:   -         -

PPP: LCP Open, multilink Open, CHAP (AAA <--> AAA)

LCP: -> peer, AuthProto, MagicNumber, MRRU, EndpointDisc

<- peer, AuthProto, MagicNumber, MRRU, EndpointDisc

NCP: Closed IPCP, CDPCP

Dialer: Connected to 5551111, outbound

Type is ISDN, group BR0

Cause: ip (s=172.20.10.2, d=172.20.10.1)

IP: Local 172.20.10.2/24

Bundle: Member of maui-nas-05, last input 00:00:00

Counts: 945 packets input, 147302 bytes, 0 no buffer

0 input errors, 0 CRC, 0 frame, 0 overrun

972 packets output, 150964 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

User: maui-nas-05, line Vi1, service PPP Bundle

Active time 00:02:32, Idle time 00:02:32

Timeouts:            Absolute  Idle

Limits:          -         00:15:00

Disconnect in:   -         00:12:26

!--- time after which this call will be disconnected unless it receives !--- interesting traffic

PPP: LCP Open, multilink Open, IPCP, CDPCP

LCP: -> peer, MagicNumber, MRRU, EndpointDisc

<- peer

NCP: Open IPCP, CDPCP

IPCP: <- peer, Address

-> peer, Address

Dialer: Connected to 5551111, outbound

Idle timer 900 secs, idle 153 secs

Type is IN-BAND SYNC, group BR0

IP: Local 172.20.10.2/24, remote 172.20.10.1

Bundle: First link of maui-nas-05, 1 link, last input 00:02:33

Counts: 20 packets input, 2916 bytes, 0 no buffer

0 input errors, 0 CRC, 0 frame, 0 overrun

23 packets output, 2683 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

疑難排解

debug指令

注意：發出debug指令之前，請先參閱有關Debug指令的重要資訊。

- debug isdn q931 — 顯示ISDN網路連線（第3層）的呼叫建立和斷開。

- debug isdn q921 — 顯示路由器和ISDN交換機之間D通道上的資料鏈路層消息（第2層）。如果show isdn status命令不顯示第1層和第2層為up，請使用此調試。

- debug dialer [events | packets] -顯示有關撥號器介面上接收的資料包的DDR調試資訊。

- debug ppp negotiation — 在協商PPP元件(包括鏈路控制協定(LCP)、身份驗證和NCP時，顯示有關PPP流量和交換的資訊。成功的PPP協商將首先開啟LCP狀態，然後進行身份驗證，最後協商NCP（通常是IPCP）。

- debug ppp authentication — 顯示PPP身份驗證協定消息，包括質詢身份驗證協定(CHAP)資料包交換和口令身份驗證協定(PAP)交換。

- debug ppp error — 顯示與PPP連線協商和操作相關的協定錯誤和錯誤統計資訊。

請參閱撥號技術：故障排除技術，瞭解有關此DDR連線故障排除的詳細資訊。

調試輸出示例

debug輸出顯示對遠端路由器BRI介面的ICMP ping觸發的DDR呼叫。調試顯示soho路由器撥號、連線到中心站點、協商ppp以及執行CHAP身份驗證。

maui-soho-01#debug dialer

Dial on demand events debugging is on

maui-soho-01#debug ppp negotiation

PPP protocol negotiation debugging is on

maui-soho-01#debug ppp authentication

PPP authentication debugging is on

maui-soho-01#debug isdn q931

ISDN Q931 packets debugging is on

maui-soho-01#

maui-soho-01#

maui-soho-01#

maui-soho-01#ping 172.20.10.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 172.20.10.1, timeout is 2 seconds:

*Mar  1 21:57:42.625: BR0 DDR: Dialing cause ip (s=172.20.10.2, d=172.20.10.1)

!--- The ping destined for 172.20.10.1 dials the BRI.

*Mar  1 21:57:42.629: BR0 DDR: Attempting to dial 5551111

!--- phone number of the remote router that is dialed

*Mar  1 21:57:42.653: ISDN BR0: TX ->  SETUP pd = 8  callref = 0x09

*Mar  1 21:57:42.661:         Bearer Capability i = 0x8890

*Mar  1 21:57:42.669:         Channel ID i = 0x83

*Mar  1 21:57:42.677:         Keypad Facility i = '5551111'

*Mar  1 21:57:43.002: ISDN BR0: RX <-  CALL_PROC pd = 8  callref = 0x89

*Mar  1 21:57:43.010:         Channel ID i = 0x89

*Mar  1 21:57:43.189: ISDN BR0: RX <-  CONNECT pd = 8  callref = 0x89

*Mar  1 21:57:43.216: %LINK-3-UPDOWN: Interface BRI0:1, changed state to up

*Mar  1 21:57:43.236: BR0:1 PPP: Treating connection as a callout

!--- PPP negotiation begins.

*Mar  1 21:57:43.236: BR0:1 PPP: Phase is ESTABLISHING,

Active Open [0 sess, 1 load]

*Mar  1 21:57:43.248: BR0:1 LCP: O CONFREQ [Closed] id 10 len 34

*Mar  1 21:57:43.252: BR0:1 LCP:    AuthProto CHAP (0x0305C22305)

*Mar  1 21:57:43.256: BR0:1 LCP:    MagicNumber 0x153BEFE7 (0x0506153BEFE7)

*Mar  1 21:57:43.260: BR0:1 LCP:    MRRU 1524 (0x110405F4)

*Mar  1 21:57:43.268: BR0:1 LCP:    EndpointDisc 1 Local

(0x130F016D6175692D736F686F2D3031)

*Mar  1 21:57:43.280: ISDN BR0: TX ->  CONNECT_ACK pd = 8  callref = 0x09

*Mar  1 21:57:43.300: BR0:1 LCP: I CONFREQ [REQsent] id 7 Len 33

*Mar  1 21:57:43.304: BR0:1 LCP:    AuthProto CHAP (0x0305C22305)

*Mar  1 21:57:43.308: BR0:1 LCP:    MagicNumber 0x354AAC53 (0x0506354AAC53)

*Mar  1 21:57:43.312: BR0:1 LCP:    MRRU 1524 (0x110405F4)

*Mar  1 21:57:43.320: BR0:1 LCP:    EndpointDisc 1 Local

(0x130E016D6175692D6E61732D3035)

*Mar  1 21:57:43.327: BR0:1 LCP: O CONFACK [REQsent] id 7 Len 33

*Mar  1 21:57:43.331: BR0:1 LCP:    AuthProto CHAP (0x0305C22305)

*Mar  1 21:57:43.335: BR0:1 LCP:    MagicNumber 0x354AAC53 (0x0506354AAC53)

*Mar  1 21:57:43.339: BR0:1 LCP:    MRRU 1524 (0x110405F4)

*Mar  1 21:57:43.347: BR0:1 LCP:    EndpointDisc 1 Local

(0x130E016D6175692D6E61732D3035)

*Mar  1 21:57:43.359: BR0:1 LCP: I CONFACK [ACKsent] id 10 Len 34

*Mar  1 21:57:43.363: BR0:1 LCP:    AuthProto CHAP (0x0305C22305)

*Mar  1 21:57:43.367: BR0:1 LCP:    MagicNumber 0x153BEFE7 (0x0506153BEFE7)

*Mar  1 21:57:43.371: BR0:1 LCP:    MRRU 1524 (0x110405F4)

*Mar  1 21:57:43.379: BR0:1 LCP:    EndpointDisc 1 Local

(0x130F016D6175692D736F686F2D3031)

*Mar  1 21:57:43.383: BR0:1 LCP: State is Open

*Mar  1 21:57:43.383: BR0:1 PPP: Phase is AUTHENTICATING, by both

[0 sess, 1 load]

!--- PPP Authentication begins.

*Mar  1 21:57:43.391: BR0:1 CHAP: O CHALLENGE id 6 Len 33 from "maui-soho-01"

!--- outgoing challenge for the remote router !--- This username should be configured in the dialer map statement !--- at the remote router.

*Mar  1 21:57:43.399: BR0:1 CHAP: I CHALLENGE id 6 Len 32 from "maui-nas-05"

!--- incoming challenge from remote router

!--- This username should be configured in the dialer map statement.

*Mar  1 21:57:43.415: BR0:1 CHAP: O RESPONSE id 6 Len 33 from "maui-soho-01"

*Mar  1 21:57:43.443: BR0:1 CHAP: I SUCCESS id 6 Len 4

!--- Incoming CHAP Authentication is successful.

*Mar  1 21:57:43.450: BR0:1 CHAP: I RESPONSE id 6 Len 32 from "maui-nas-05"

*Mar  1 21:57:43.466: BR0:1 CHAP: O SUCCESS id 6 Len 4

!--- Outgoing CHAP Authentication is successful.

*Mar  1 21:57:43.474: BR0:1 PPP: Phase is VIRTUALIZED [0 sess, 1 load]

*Mar  1 21:57:43.581: Vi1 PPP: Phase is DOWN, Setup [0 sess, 1 load]

*Mar  1 21:57:43.601: BR0:1 IPCP: Packet buffered while building

MLP bundle interface

*Mar  1 21:57:43.605: BR0:1 CDPCP: Packet buffered while building

MLP bundle interface

*Mar  1 21:57:43.609: %LINK-3-UPDOWN: Interface Virtual-Access1,

changed state to up

!--- Virtual access interface is automatically created (needed for multilink).

*Mar  1 21:57:43.613: Vi1 DDR: Dialer statechange to up

*Mar  1 21:57:43.617: Vi1 DDR: Dialer call has been placed

*Mar  1 21:57:43.625: Vi1 PPP: Treating connection as a callout

*Mar  1 21:57:43.625: Vi1 PPP: Phase is ESTABLISHING, Active Open

[0 sess, 1 load]

*Mar  1 21:57:43.637: Vi1 LCP: O CONFREQ [Closed] id 1 Len 34

*Mar  1 21:57:43.641: Vi1 LCP:    AuthProto CHAP (0x0305C22305)

*Mar  1 21:57:43.645: Vi1 LCP:    MagicNumber 0x153BF171 (0x0506153BF171)

*Mar  1 21:57:43.649: Vi1 LCP:    MRRU 1524 (0x110405F4)

*Mar  1 21:57:43.653: Vi1 LCP:    EndpointDisc 1 Local

(0x130F016D6175692D736F686F2D3031)

*Mar  1 21:57:43.665: Vi1 PPP: Phase is UP [0 sess, 1 load]

*Mar  1 21:57:43.677: Vi1 IPCP: O CONFREQ [Closed] id 1 Len 10

*Mar  1 21:57:43.681: Vi1 IPCP:    Address 172.20.10.2 (0x0306AC140A02)

*Mar  1 21:57:43.693: Vi1 CDPCP: O CONFREQ [Closed] id 1 Len 4

*Mar  1 21:57:43.697: BR0:1 MLP: maui-nas-05, multilink up, first link

*Mar  1 21:57:43.700: Vi1 PPP: Pending ncpQ size is 2

*Mar  1 21:57:43.700: BR0:1 IPCP: Redirect packet to Vi1

*Mar  1 21:57:43.708: Vi1 IPCP: I CONFREQ [REQsent] id 1 Len 10

*Mar  1 21:57:43.712: Vi1 IPCP:    Address 172.20.10.1 (0x0306AC140A01)

*Mar  1 21:57:43.716: Vi1 IPCP: O CONFACK [REQsent] id 1 Len 10

*Mar  1 21:57:43.724: Vi1 IPCP:    Address 172.20.10.1 (0x0306AC140A01)

*Mar  1 21:57:43.728: BR0:1 CDPCP: Redirect packet to Vi1

*Mar  1 21:57:43.732: Vi1 CDPCP: I CONFREQ [REQsent] id 1 Len 4

*Mar  1 21:57:43.736: Vi1 CDPCP: O CONFACK [REQsent] id 1 Len 4

*Mar  1 21:57:43.744: Vi1 IPCP: I CONFACK [ACKsent] id 1 Len 10

*Mar  1 21:57:43.752: Vi1 IPCP:    Address 172.20.10.2 (0x0306AC140A02)

*Mar  1 21:57:43.756: Vi1 IPCP: State is Open

!--- IPCP state is open.

*Mar  1 21:57:43.764: Vi1 CDPCP: I CONFACK [ACKsent] id 1 Len 4

*Mar  1 21:57:43.768: Vi1 CDPCP: State is Open

*Mar  1 21:57:43.772: Vi1 DDR: dialer protocol up

*Mar  1 21:57:43.784: BR0 IPCP: Install route to 172.20.10.1

!--- Install route to remote side.

*Mar  1 21:57:44.462: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0:1,

changed state to up

*Mar  1 21:57:44.657: %LINEPROTO-5-UPDOWN: Line protocol on Interface

Virtual-Access1, changed state to up

*Mar  1 21:57:49.180: %ISDN-6-CONNECT: Interface BRI0:1 is now connected to

5551111 maui-nas-05

!--- BRI Dial on Demand Routing (DDR) Link is operational.

maui-soho-01#

相關資訊

- 使用show isdn status命令進行BRI故障排除

- 設定基本ISDN服務

- 技術支援 - Cisco Systems