目錄

簡介

必要條件

需求

採用元件

慣例

簡要理論總結

當ITCM註冊到CMTS時會發生什麼？

要發出語音呼叫時會發生什麼情況？

組態:要遵循的不同步驟

CMTS中的配置檔案

纜線資料機中的設定檔

疑難排解和提示

相關資訊

簡介

本檔案將說明如何在思科uBR7200通用寬頻路由器上設定服務品質(QoS)增強功能並對其進行疑難排解，以支援語音和傳真流量。要實施此功能，您需要Cisco IOS®軟體版本12.0.7XR2，或來自branch 12.1.1T、12.1(1a)T1或更高版本的版本。

必要條件

需求

本文檔的讀者應瞭解以下主題：

- 有線電纜資料服務介面規範 (DOCSIS)

- Cisco IOS軟體

- IP語音(VoIP)

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- Cisco IOS軟體版本12.0.7XR2或分支12.1.1T、12.1(1a)T1或更新版本。

- Cisco uBR7200

- 符合DOCSIS的整合式電話纜線資料機(ITCM)

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

簡要理論總結

DOCSIS 1.0+實施是具有QoS擴展的DOCSIS 1.0，用於支援LAN上的即時語音、傳真和影片。

DOCSIS 1.0+不是電纜實驗室採用的新規範或中間規範。整個DOCSIS 1.0+架構是思科和某些電纜數據機(CM)供應商提供的上市時間解決方案，直到DOCSIS 1.1規範和開發廣泛提供。

DOCSIS 1.0+為來自ITCM的即時語音、傳真和資料資料包提供其他QoS功能。以下是在DOCSIS 1.0+中新增到DOCSIS 1.0的專用擴展：

- 兩則新的CM啟動的動態MAC消息：動態服務新增(DSA)和動態服務刪除(DSD)。 這些消息允許在運行時基於每個呼叫建立和刪除動態服務ID(SID)。

- 上游未經請求的授權服務（固定位元率[CBR] — 排程）。此服務為來自ITCM的上游CBR語音和傳真資料包提供高品質QoS通道。

對於任何給定ITCM，提供單獨的下游速率的能力取決於資料包中的IP優先順序值。這有助於分隔發往同一ITCM的語音、信令和資料流量，以實現速率整形目的。

當ITCM註冊到CMTS時會發生什麼？

當纜線資料機終端系統(CMTS)收到註冊要求時，會為ITCM建立本機資料庫專案。靜態SID會立即分配給資料服務的ITCM。對於電話線服務，CMTS會在ITCM的資料庫條目中建立一些延遲服務流（用於後續啟用）。註冊期間沒有為電話線路服務分配SID。

注意：註冊時CMTS為ITCM建立的延遲流的數量取決於為電纜數據機調配的「電話線路數」引數的值。值可以是從0開始的任意數字(例如：0、1、2、3等)。

要發出語音呼叫時會發生什麼情況？

1. ITCM獲取新的語音或傳真呼叫，並使用從較高層語音呼叫信令協定接收的編解碼器型別G.711或G.729確定該呼叫的QoS引數。

2. ITCM向uBR傳送DSA請求(DSA-REQ)，請求新的動態SID。

3. CMTS訪問ITCM的資料庫資訊（使用DSA-REQ消息中的MAC地址）並檢查此ITCM是否有任何非活動或未允許（延遲）的服務流。如果ITCM具有未使用的延遲流，並且上游(US)通道（ITCM連線到該通道）具有足夠的容量來接納在DSA-REQ中請求的新週期CBR插槽，則由CMTS建立新的動態SID。

4. CMTS使用DSA響應(DSA-RSP)響應ITCM請求。

5. ITCM確認DSA-RSP。（每次傳送DSA響應時，CMTS都會從ITCM收到DSA確認[DSA-ACK]。）

6. 當語音或傳真呼叫被清除時，ITCM會向CMTS傳送DSD-REQ MAC消息，指定要刪除的動態SID。

7. CMTS刪除動態SID並向ITCM傳送DSD-RSP。有關DOCSIS 1.0+的詳細說明，請參閱DOCSIS 1.0+的常見問題。

組態:要遵循的不同步驟

本檔案中的範例組態使用以下網路設定：

Cisco IOS軟體版本12.1(1a)T1在纜線資料機和思科uBR7246上運行。

CMTS中的配置檔案

QoS設定檔

在CMTS，兩個特殊（語音和傳真相關）QoS設定檔是動態設定的，並可在任何指定時間用於CMTS QoS代碼。這些QoS簡檔（G711和G729）配置有用於G.711或G.729型別編碼器 — 解碼器（編解碼器）的特殊排程引數。 CMTS可以從請求此特殊排程處理的DSA-REQ消息的內容獲得特定引數，如授權大小和授權間隔。您必須在CMTS上為每個唯一的編解碼器參陣列合配置QoS配置檔案模板。

注意：在電纜數據機的配置檔案中配置電話線路後，會立即動態建立編解碼器G.711和G.729的QoS配置檔案。它們接收的預設授予間隔為20毫秒，授予大小為31.22 kbps(G.729)和87.2 kbps(G.711)。

當在纜線資料機的組態檔中設定了至少一根電話線路時，show cable qos profile指令的輸出如下：

# show cable qos profile

ID  Prio Max       Guar      Max        Max      TOS  TOS   Created Privacy IP prec.

upstream  upstream  downstream transmit mask value by      B       rate

bandwidth bandwidth bandwidth  burst                       enabled enabled

3   7    31200     31200     0          0        0x0  0x0   cmts    yes     no

4   7    87200     87200     0          0        0x0  0x0   cmts    yes     no

如果ITCM供應商使用的G.711或G.729編解碼器版本與本示例中使用的不同，則必須在CMTS上為每個唯一的編解碼器參陣列合（未經請求的授權大小和授權間隔）靜態配置QoS配置檔案模板。

此表顯示如何計算未經請求的授權大小和授權間隔（對於編解碼器G.711和G.729）：

適用於G.711編解碼器的QoS設定檔

以下是G.711 QoS配置檔案的相應數字：

未經請求的授權大小

229 位元組

未經請求的授權間隔

20毫秒

保留/峰值速率

87.2 kbps

適用於G.729編解碼器的QoS設定檔

以下是計算DOCSIS纜線MAC訊框總大小的方式：

每時間間隔的G.729編解碼器輸出

20 位元組

路由表通訊協定(RTP)標頭

12 位元組

使用者資料包通訊協定(UDP)標頭

8 位元組

IP報頭

20 位元組

乙太網路訊框標頭與循環冗餘檢查(CRC)

18 位元組

DOCSIS電纜MAC報頭

11位元組（假設5位元組隱私擴充標頭為強制要求）

DOCSIS電纜MAC幀總大小

89 位元組

20毫秒的授權間隔緊隨G.729編解碼器的成幀或分組延遲之後。僅考慮每個G.729編解碼器輸出的乙太網級頻寬使用量，即可獲得上游預留速率。這相當於每20毫秒78位元組的乙太網幀，相當於31.2 kbps。

在疑難排解和提示一節中，提供了一個示例，來顯示如果沒有為所使用的編解碼器正確指定grant-size或grant-interval，則在debug輸出中會出現的情況。

您可以使用show cable qos profile x verbose命令檢查您的調制配置檔案。

調制配置檔案

您可以更改調制配置檔案，以最大化每個上行通道可以獲得的語音呼叫數。以下是您可以使用的調制配置檔案：

cable modulation-profile 5

!--- This configuration line is entered on one line:

cable modulation-profile 5 short 2 52 35 8

qpsk scrambler 152 diff 72 shortened uw8

interface Cable3/0

cable upstream 5 minislot-size 4

cable upstream 5 modulation-profile 5

CMTS配置

cable modulation-profile 5 request 0 16 1 8 qpsk scrambler 152 no-diff 64 fixed uw16

cable modulation-profile 5 initial 5 34 0 48 qpsk scrambler 152 no-diff 128 fixed uw16

cable modulation-profile 5 station 5 34 0 48 qpsk scrambler 152 no-diff 128 fixed uw16

cable modulation-profile 5 short 6 75 6 8 16qam scrambler 152 no-diff 144 fixed uw8

cable modulation-profile 5 long 8 220 0 8 16qam scrambler 152 no-diff 160 fixed uw8

cable qos profile 5 ip-precedence 5 max-downstream 128

no cable qos permission update

!--- This command was created automatically during CM registration; !--- no cable qos permission creates 2 phone lines with IP precedence 5 and !--- with 128K for max downstream, as specified in CM configuration file.

cable qos permission modems

cable time-server

!

interface Ethernet2/0

ip address 10.200.68.3 255.255.255.0

!

interface Cable3/0

ip address 10.200.70.17 255.255.255.240

secondary ip address 10.200.69.1 255.255.255.240

no keepalive

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable upstream 0 shutdown

cable upstream 1 shutdown

cable upstream 2 shutdown

cable upstream 3 shutdown

cable upstream 4 shutdown

cable upstream 5 frequency 30000000

cable upstream 5 power-level 0

cable upstream 5 minislot-size 4

cable upstream 5 modulation-profile 5

no cable upstream 5 shutdown

cable dhcp-giaddr policy

cable helper-address 10.200.68.11

!

ip classless

纜線資料機中的設定檔

DOCSIS纜線資料機組態檔

使用DOCSIS客戶端裝置(CPE)配置器準備電纜數據機的配置檔案。指定所需的電話線路數量。對於Cisco uBR924電纜數據機，此值可以是0、1或2，其中0表示無語音埠的資料專用值，1和2表示電話數量。指定用於將語音和信令與資料分離的IP優先順序設定和速率限制。

在本例中，語音傳輸優先順序值(4)設定為下游速率限制128 kbps:

Value = 4; Rate Limit (kps) = 128000

如果使用靜態配置，則在電纜數據機中配置撥號對等體

配置撥號對等體並指定要用於語音和傳真流量的IP優先順序。

纜線資料機1的組態

voice-port 0

input gain -2

cptone xx

!

voice-port 1

input gain -2

cptone xx

!

!

dial-peer voice 1 pots

destination-pattern 444

port 0

!

dial-peer voice 2 voip

destination-pattern 555

session-target ipv4:10.200.69.3

!--- IP address of CM2’s cable interface.

ip precedence 5

纜線資料機2的組態

voice-port 0

input gain -2

cptone xx

!

voice-port 1

input gain -2

cptone xx

!

!

dial-peer voice 1 pots

destination-pattern 555

port 0

!

dial-peer voice 2 voip

destination-pattern 444

session target ipv4:10.200.69.10

!--- IP address of CM1’s cable interface.

ip precedence 5

疑難排解和提示

本節提供有用的debug和show命令，用於疑難排解您的組態。

注意：發出debug命令之前，請參閱有關Debug命令的重要資訊。

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

以下是一些很有用的debug指令：

- debug cable dynsrv — 在CMTS上調試所有動態MAC消息（如DSA-REQ、DSA-RSP、DSA-ACK、DSD-REQ、DSD-RSP）。

- debug cable scheduler unsolicited-grants — 對接收的未請求授權進行平均延遲和最大延遲抖動調試。

- debug cable scheduler admission-control — 檢視MAC排程程式嘗試允許和取消允許CBR插槽。

注意：只能針對每個介面或每個SID啟用新的debug命令。這使得調試更易於管理。不要忘記使用所需的每個調試啟用debug cable interface cable x/y 或debug cable interface cable x/y SID。

以下是一些有用的show命令：

- show interfaces cable x/y SID

- show interfaces cable x/y upstream n

- show cable qos profile

- show cable qos profile z verbose

從CM1到CM2進行電話呼叫並分析發生的情況：

big-cmts# debug cable dynsrv

CMTS dynsrv debugging is on

big-cmts# debug cable interface cable 3/0

!--- Each of these timestamped lines of output appear on one line:

*May 5 05:15:36.531: DSA-REQ-RECD: OrgMac->0050.734e.b5b1 OrgId->52

*May 5 05:15:36.531: DSx-STATE-CREATED: OrgMac->0050.734e.b5b1 OrgId->52

*May 5 05:15:36.531: DSA-REQ TLV Information:

*May 5 05:15:36.531: Type Subtype Subtype Length Value

*May 5 05:15:36.531: 24 10

*May 5 05:15:36.531: 19 2 89

*May 5 05:15:36.531: 20 4 20000

*May 5 05:15:36.531: 80 69

*May 5 05:15:36.531: DSA-REQ: Requested QoS Parameter Information:

*May 5 05:15:36.531: Srv Flow Ref: 0 Grant Size: 89 Grant Intvl: 20000

*May 5 05:15:36.531: Requested QoS parameters match QoS Profile:3 (G729)

*May 5 05:15:36.531: DSA-REQ-SID-ASSIGNED: CM 0050.734e.b5b1 SID 11

*May 5 05:15:36.531: DSA-RSP-SEND: OrgMac->0050.734e.b5b1 OrgId->52

*May 5 05:15:36.531: DSA-RSP msg TLVs

*May 5 05:15:36.531: Type:Length:Value

*May 5 05:15:36.531: US QoS Encodings 24:8

*May 5 05:15:36.531: SID 3:2:11

*May 5 05:15:36.531: Service Flow Reference 1:2:0

*May 5 05:15:36.531: DSA-RSP hex dump:

*May 5 05:15:36.531: 0x0000: C2 00 00 26 00 00 00 50 73 4E B5 B1 00 10 0B AF

*May 5 05:15:36.531: 0x0010: BC 54 00 14 00 00 03 01 10 00 00 34 00 18 08 03

*May 5 05:15:36.531: 0x0020: 02 00 0B 01 02 00 00 00

*May 5 05:15:36.535: DSA-RSP-SENT: CM->0050.734e.b5b1 TranscId->52

*May 5 05:15:36.539: DSA-ACK-RECD:

OrgMac->0050.734e.b5b1 OrgId->52 ConfCode->0

*May 5 05:15:36.539: DYN-SRV-STATE-DESTROYED :

OrgMac->0050.734e.b5b1 OrgId->52

*May 5 05:15:42.779: DSA-REQ-RECD: OrgMac->0050.7366.1bdb OrgId->51

*May 5 05:15:42.779: DSx-STATE-CREATED: OrgMac->0050.7366.1bdb OrgId->51

*May 5 05:15:42.779: DSA-REQ TLV Information:

*May 5 05:15:42.779: Type Subtype Subtype Length Value

*May 5 05:15:42.779: 24 10

*May 5 05:15:42.779: 19 2 89

*May 5 05:15:42.779: 20 4 20000

*May 5 05:15:42.779: 80 69

*May 5 05:15:42.779: DSA-REQ: Requested QoS Parameter Information:

*May 5 05:15:42.779: Srv Flow Ref: 0 Grant Size: 89 Grant Intvl: 20000

*May 5 05:15:42.779: Requested QoS parameters match QoS Profile:3 (G729)

!--- If the configured Unsolicited Grant size or Unsolicited Grant interval !--- are not correct.

*May 5 05:15:42.779: DSA-REQ-SID-ASSIGNED: CM 0050.7366.1bdb SID 12

!--- You see “Requested QoS doesn't match any profile” here.

*May 5 05:15:42.779: DSA-RSP-SEND: OrgMac->0050.7366.1bdb OrgId->51

!--- TIP: check the configured QoS Profile with the !--- show qos profile x verbose command.

*May 5 05:15:42.779: DSA-RSP MSG TLVs

*May 5 05:15:42.779: Type:Length:Value

!--- Also, if you forgot to specify the number of phone lines you want !--- in CM config file.

*May 5 05:15:42.779: US QoS Encodings 24:8

!--- You see “QoS profile matched but DSA-REQ is rejected” here.

*May 5 05:15:42.779: SID 3:2:12

*May 5 05:15:42.779: Service Flow Reference 1:2:0

*May 5 05:15:42.779: DSA-RSP hex dump:

*May 5 05:15:42.779: 0x0000: C2 00 00 26 00 00 00 50 73 66 1B DB 00 10 0B AF

*May 5 05:15:42.779: 0x0010: BC 54 00 14 00 00 03 01 10 00 00 33 00 18 08 03

*May 5 05:15:42.779: 0x0020: 02 00 0C 01 02 00 00 00

*May 5 05:15:42.779: DSA-RSP-SENT: CM->0050.7366.1bdb TranscId->51

*May 5 05:15:42.787: DSA-ACK-RECD:

OrgMac->0050.7366.1bdb OrgId->51 ConfCode->0

*May 5 05:15:42.787: DYN-SRV-STATE-DESTROYED :

OrgMac->0050.7366.1bdb OrgId->51

cmts# show interfaces cable 3/0 SID

SID  Prim  Type Online  Admin   QoS  Create    IP Address    MAC Address

SID      State     Status        Time

1          stat online  enable  5    04:26:35  10.200.69.3   0050.734e.b5b1

2          stat online  enable  5    04:26:47  10.200.69.10  0050.7366.1bdb

13   1     dyn          enable  3    05:22:20

14   2     dyn          enable  3    05:22:20

已為語音呼叫建立兩個動態SID。它們使用QoS ID 3，即G729配置檔案。

cmts# show cable qos profile

ID  Prio Max       Guar      Max        Max      TOS  TOS   Created Privacy IP prec.

upstream  upstream  downstream transmit mask value by      B       rate

bandwidth bandwidth bandwidth  burst                       enabled enabled

1   0    0         0         0          0        0x0  0x0   cmts(r) no      no

2   0    64000     0         1000000    0        0x0  0x0   cmts(r) no      no

3*  7    32000     320000    0          0        0x0  0x0   cmts    yes     no

4** 7    87200     87200     0          0        0x0  0x0   cmts    yes     no

5   1    1000000   0         2000000    1600     0x0  0x0   cm      no      yes

!--- * Profile for the G.729 codec. !--- ** Profile for the G.711 codec.

對於下游流量，您仍然使用主SID（資料配置檔案）和相應的QoS配置檔案。(IP優先速率限制提供了一種區分語音和資料的方法。已為下游QoS配置檔案編號5啟用。)

在DOCSIS 1.0+中，IP優先順序設定用於將語音和信令與資料分開。如果呼叫的一個端點位於有線網路之外，則「外部」網路負責確保所有語音資料包在轉發到CMTS之前都經過適當的著色。如果呼叫兩端都位於有線網路上，則由始發流量的端點（客戶）負責在語音資料包傳送到網路之前對其進行著色。

注意：可以使用IP ToS overwrite命令（自uBR7200早期版本以來可用）在屬於CBR配置檔案的SID上接收的上游資料包中設定非預設型別的服務(ToS)值。這樣，操作員可以確保在動態CBR SID上接收的資料包在uBR7200轉發到WAN鏈路之前將具有正確的模式（這樣可以防止ITCM進行錯誤的著色）。

請考慮以下示例：

cmts(config)# cable qos profile 3 tos-overwrite 0xE0 0xA0

value : 0xA0

!--- First 3 bits of ToS field: 101, which is an IP precedence of 5.

mask : 0xE0

!--- Remember that IP precedence uses the first 3 bits of the ToS field !--- from the IPv4 header.

big-cmts# show interfaces cable 3/0 upstream 5

Cable3/0: Upstream 5 is up

Received 254 broadcasts, 0 multicasts, 20229 unicasts

0 discards, 66907 errors, 0 unknown protocol

20483 packets input, 1 uncorrectable

101 noise, 0 microreflections

Total Modems On This Upstream Channel : 2 (2 active)

Default MAC scheduler

Queue[Rng Polls] 0/20, fifo queueing, 0 drops

Queue[Cont Mslots] 0/104, FIFO queueing, 1 drop

Queue[CIR Grants] 0/20, fair queueing, 0 drops

Queue[BE Grants] 0/30, fair queueing, 0 drops

Queue[Grant Shpr] 0/30, calendar queueing, 0 drops

Reserved slot table currently has 2 CBR entries

Req IEs 3645087, Req/Data IEs 0

Init Mtn IEs 56729, Stn Mtn IEs 3196

Long Grant IEs 80084, Short Grant IEs 202

Avg upstream channel utilization : 4%

Avg percent contention slots : 92%

Avg percent initial ranging slots : 4%

Avg percent minislots lost on late MAPs : 0%

Total channel bw reserved 64000 bps

CIR admission control not enforced

Current minislot count : 3101850 Flag: 0

Scheduled minislot count : 3102029 Flag: 0

cmts# debug cable scheduler

CMTS scheduler debugging is on

big-cmts# show debug

*May 5 05:24:41.991: SID:13 max-jitter:2 msecs, avg-jitter:0 msecs

*May 5 05:24:51.995: SID:14 max-jitter:2 msecs, avg-jitter:1 msecs

*May 5 05:25:02.015: SID:13 max-jitter:2 msecs, avg-jitter:0 msecs

*May 5 05:25:12.035: SID:13 max-jitter:2 msecs, avg-jitter:1 msecs

*May 5 05:25:22.055: SID:13 max-jitter:2 msecs, avg-jitter:0 msecs

*May 5 05:25:32.075: SID:13 max-jitter:2 msecs, avg-jitter:0 msecs

*May 5 05:25:42.091: SID:13 max-jitter:2 msecs, avg-jitter:0 msecs

*May 5 05:25:52.095: SID:13 max-jitter:2 msecs, avg-jitter:0 msecs

cmts# show cable qos profile 3 verbose

Profile Index 3

Name G729

Upstream Traffic Priority 7

Upstream Maximum Rate (BPS) 32000

Upstream Guaranteed Rate (BPS) 32000

Unsolicited Grant Size (bytes) 89

Unsolicited Grant Interval (usecs) 20000

Upstream Maximum Transmit Burst (bytes) 0

IP Type of Service Overwrite Mask 0x0

IP Type of Service Overwrite Value 0x0

Downstream Maximum Rate (BPS) 0

Created By cmts

Baseline Privacy Enabled yes

big-cmts# show cable qos profile 4 verbose

Profile Index 4

Name G711

Upstream Traffic Priority 7

Upstream Maximum Rate (BPS) 87200

Upstream Guaranteed Rate (BPS) 87200

Unsolicited Grant Size (bytes) 229

Unsolicited Grant Interval (usecs) 20000

Upstream Maximum Transmit Burst (bytes) 0

IP Type of Service Overwrite Mask 0x0

IP Type of Service Overwrite Value 0x0

Downstream Maximum Rate (BPS) 0

Created By cmts

Baseline Privacy Enabled yes

Line is released:

The phone line is released: a user hangs up.

big-cmts# show debug

CMTS:

CMTS dynsrv debugging is on

CMTS specific:

Debugging is on for Cable3/0

big-cmts# show debug

!--- Each of these timestamped lines of output appear on one line:

*May 5 05:29:45.659: DSD-REQ-RECD: I/F Cable3/0/U5: OrgMac->0050.734e.b5b1

*May 5 05:29:45.659: OrgId->54 sfid 13

*May 5 05:29:45.659: DYN-SID-DELETED:

SID:13 Inpkts:5047 InOctets:393749 Bwreqs:12 Grants:22270

*May 5 05:29:45.659: DSD-RSP Message Hex Dump:

*May 5 05:29:45.659: 0x0000: C2 00 00 20 00 00 00 50 73 4E B5 B1 00 10 0B AF

*May 5 05:29:45.659: 0x0010: BC 54 00 0E 00 00 03 01 16 00 00 36 00 00 00 00

*May 5 05:29:45.659: 0x0020: 00 0D

*May 5 05:29:45.659: DSD-RSP-SENT: To CM->0050.734e.b5b1 TranscId->54

*May 5 05:29:48.023: DSD-REQ-RECD: I/F Cable3/0/U5: OrgMac->0050.7366.1bdb

*May 5 05:29:48.023: OrgId->53 sfid 14

*May 5 05:29:48.023: DYN-SID-DELETED:

SID:14 Inpkts:6512 InOctets:508085 Bwreqs:2 Grants:22378

!--- The dynamic SIDs are deleted.

*May 5 05:29:48.023: DSD-RSP Message Hex Dump:

*May 5 05:29:48.023: 0x0000: C2 00 00 20 00 00 00 50 73 66 1B dB 00 10 0B AF

*May 5 05:29:48.023: 0x0010: BC 54 00 0E 00 00 03 01 16 00 00 35 00 00 00 00

*May 5 05:29:48.023: 0x0020: 00 0E

*May 5 05:29:48.023: DSD-RSP-SENT: To CM->0050.7366.1bdb TranscId->53

下一個輸出顯示當這些引數（您要使用的編解碼器的授權大小或授權間隔）之一配置錯誤時會發生的情況。在本例中，我們將配置檔案G729的授予大小從89更改為80:

cmts(config)# cable qos profile 3 grant-size 80

cmts# show cable qos profile 3 verbose

Profile Index 3

Name G729

Upstream Traffic Priority 7

Upstream Maximum Rate (BPS) 31200

Upstream Guaranteed Rate (BPS) 31200

Unsolicited Grant Size (bytes) 80

Unsolicited Grant Interval (usecs) 20000

Upstream Maximum Transmit Burst (bytes) 0

IP Type of Service Overwrite Mask 0x0

IP Type of Service Overwrite Value 0x0

Downstream Maximum Rate (BPS) 0

Created By cmts

Baseline Privacy Enabled yes

big-cmts# show debug

!--- Each of these timestamped lines of output appear on one line:

*May 10 04:20:57.885: DSA-REQ-RECD: OrgMac->0050.734e.b5b1 OrgId->59

*May 10 04:20:57.885: DSx-STATE-CREATED: OrgMac->0050.734e.b5b1 OrgId->59

*May 10 04:20:57.885: DSA-REQ TLV Information:

*May 10 04:20:57.885: Type Subtype Subtype Length Value

*May 10 04:20:57.885: 24 10

*May 10 04:20:57.885: 19 2 89

*May 10 04:20:57.885: 20 4 20000

*May 10 04:20:57.885: 80 69

*May 10 04:20:57.885: DSA-REQ: Requested QoS Parameter Information:

*May 10 04:20:57.885: Srv Flow Ref: 0 Grant Size: 89 Grant Intvl: 20000

*May 10 04:20:57.885: DSA-REQ-REJECT OrgMac->0050.734e.b5b1 OrgId->59:

*May 10 04:20:57.885: No CMTS QoS profile matching requested parameters

!--- Request is rejected, because there is no QoS profile.

*May 10 04:20:57.885: DSA-RSP-SENT: CM->0050.734e.b5b1 TranscId->59

*May 10 04:20:57.889: DSA-ACK-RECD:

OrgMac->0050.734e.b5b1 OrgId->59 ConfCode->0

*May 10 04:20:57.889: DYN-SRV-STATE-DESTROYED :

OrgMac->0050.734e.b5b1 OrgId->59

!--- The state is destroyed.

*May 10 04:20:57.905: DSA-REQ-RECD: OrgMac->0050.7366.1bdb OrgId->58

*May 10 04:20:57.905: DSx-STATE-CREATED: OrgMac->0050.7366.1bdb OrgId->58

*May 10 04:20:57.905: DSA-REQ TLV Information:

*May 10 04:20:57.905: Type Subtype Subtype Length Value

*May 10 04:20:57.905: 24 10

*May 10 04:20:57.905: 19 2 89

*May 10 04:20:57.905: 20 4 20000

*May 10 04:20:57.905: 80 69

*May 10 04:20:57.905: DSA-REQ: Requested QoS Parameter Information:

*May 10 04:20:57.905: Srv Flow Ref: 0 Grant Size: 89 Grant Intvl: 20000

*May 10 04:20:57.905: DSA-REQ-REJECT OrgMac->0050.7366.1bdb OrgId->58:

*May 10 04:20:57.905: No CMTS QoS profile matching requested parameters

*May 10 04:20:57.909: DSA-RSP-SENT: CM->0050.7366.1bdb TranscId->58

*May 10 04:20:57.913: DSA-ACK-RECD:

OrgMac->0050.7366.1bdb OrgId->58 ConfCode->0

*May 10 04:20:57.913: DYN-SRV-STATE-DESTROYED : OrgMac->0050.7366.1bdb Org

big-cmts# show interfaces cable 3/0 upstream 5

Cable3/0: Upstream 5 is up

!--- Output suppressed.

Reserved slot table currently has 0 CBR entries

!--- Output suppressed.

相關資訊

- DOCSIS 1.0+的常見問題

- 技術支援 - Cisco Systems