目录

简介

先决条件

要求

使用的组件

规则

配置

网络图

配置

验证

故障排除

故障排除命令

故障排除步骤

相关信息

简介

本文档提供Cisco 1800集成多业务路由器(ISR)上无线LAN(WLAN)的配置示例。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 1800 ISR（在Cisco IOS®软件版本12.3或更高版本上），带高级IP服务功能集

注意：您可以将相同的配置应用于任何ISR。配置不特定于1800系列。

- 带有以下无线网卡的PC:

- 802.11a

- 802.11b

- 802.11b/g a/b/g

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

配置

本部分提供有关如何配置本文档所述功能的信息。

注意：使用命令查找工具(仅限注册客户)可查找有关本文档中使用的命令的详细信息。

网络图

本文档使用以下网络设置：

与路由器的无线连接

配置

逐步指导

请完成以下步骤：

1. 设置DHCP范围和排除的地址。

注：排除地址是可选的。

有关Cisco IOS软件中的DHCP服务器的详细说明，请参阅Cisco IOS DHCP服务器。

2. 打开集成路由和桥接，并设置网桥组。

3. 为接口网桥组虚拟接口1(BVI1)分配IP地址。

4. 设置无线。

1. 将接口Dot11Radio0或Dot11Radio1分配给网桥组1。

2. 为无线电接口分配服务集标识符(SSID)，然后定义开放式身份验证。

配置

本文档使用以下配置：

1800系列ISR无线和DHCP配置

1800-ISR#show running-config

Building configuration...

.

.

!

hostname 1800-ISR

!

!--- Output suppressed.

!

ip subnet-zero

!

!

ip dhcp excluded-address 192.168.2.1 192.168.2.100

!--- This sets up DHCP and excluded addresses. Excluded addresses are optional.

!

ip dhcp pool 1800-ISR

network 192.168.2.0 255.255.255.0

!

!

bridge irb

!--- Turn on integrated routing and bridging.

!

!

interface Dot11Radio0

!--- This is the wireless radio interface configuration.

no ip address

!

ssid Cisco

!--- Here, the SSID is given as "Cisco".

authentication open

!--- This defines the authentication as open.

!

speed basic-1.0 basic-2.0 basic-5.5 6.0 9.0 basic-11.0 12.0 18.0 24.0 36.0 48.0 54.0

station-role root

bridge-group 1

bridge-group 1 subscriber-loop-control

bridge-group 1 spanning-disabled

bridge-group 1 block-unknown-source

no bridge-group 1 source-learning

no bridge-group 1 unicast-flooding

!

!

interface BVI1

ip address 192.168.2.1 255.255.255.0

!

ip classless

!

!--- Note: Configure the bridge 1 protocol IEEE and the bridge 1 route IP !--- before you create interface BVI1 or add the radio interface to bridge group 1.

!

bridge 1 protocol ieee

bridge 1 route ip

!

line con 0

line aux 0

line vty 0 4

!

no scheduler allocate

end

验证

使用本部分可确认配置能否正常运行。

命令输出解释程序（仅限注册用户）(OIT) 支持某些 show 命令。使用 OIT 可查看对 show 命令输出的分析。

使用以下命令验证DHCP和无线是否正常运行：

- show dot11 associations

- show ip dhcp binding

在show dot11 associations命令的输出和show ip dhcp binding命令的输出中，MAC地址和IP地址必须匹配。示例如下：

1800-ISR#show dot11 associations

802.11 Client Stations on Dot11Radio0:

SSID [Cisco] :

MAC Address     IP address      Device           Name          Parent         State

0040.96ac.345c  192.168.2.101   CB21AG/PI21AG    WLCLIENT      self           Associated

!

!--- Output suppressed.

!

1800-ISR#show ip dhcp binding

Bindings from all pools not associated with VRF:

IP address          Client-ID/              Lease expiration       Type

Hardware address/

User name

192.168.2.101       0100.4096.ac34.5c       Dec 18 2005 05:07 PM   Automatic

1800-ISR#

故障排除

使用本部分可排除配置故障。

故障排除命令

注意：在使用debug命令之前，请参阅有关Debug命令的重要信息。

发出debug ip dhcp server packet命令以调试IP DHCP服务器。使用未加密的开放式身份验证WLAN时，此命令提供最快、最有效的故障排除方法。

debug ip dhcp server packet命令显示以下数据事务：

debug ip dhcp server packet命令的此输出是成功DHCP请求的示例：

1800-ISR#debug ip dhcp server packet

*Dec 17 15:40:50.379: DHCPD: DHCPREQUEST received from client 0100.4096.ac34.5c.

!

!--- This shows the client DHCP discover packet that is sent to the router.

!

*Dec 17 15:40:50.379: DHCPD: No default domain to append - abort update

*Dec 17 15:40:50.379: DHCPD: Sending DHCPACK to client 0100.4096.ac34.5c (192.168.2.101)

!

!--- This shows the router DHCP acknowledgment (ACK) that is sent back to the client.

!

*Dec 17 15:40:50.379: DHCPD: creating ARP entry (192.168.2.101, 0040.96ac.345c).

*Dec 17 15:40:50.379: DHCPD: unicasting BOOTREPLY to client 0040.96ac.345c (192.168.2.101)

故障排除步骤

如果在debug ip dhcp server packet命令的输出中未看到DHCP提供，请开始排除802.11协议的故障。请完成以下步骤：

1. 验证无线客户端设置、SSID和无安全/加密设置。

注意：SSID在ISR和客户端中必须相同。在本例中，SSID为“Cisco”。 图1和图2显示了Cisco Aironet桌面实用程序(ADU)和Aironet客户端实用程序(ACU)中的SSID设置。 您看到的窗口取决于无线客户端卡和所使用的固件版本。

图1 - Cisco ADU SSID设置

图2 - Cisco ACU SSID设置

图3 - Windows无线零设置

2. 检验Wi-Fi兼容性。

请参阅Wi-Fi联盟 页，以验证所使用的无线网络接口卡(NIC)的Wi-Fi兼容性。

3. 请联系思科技术支持以获得进一步的技术帮助。

相关信息

- Cisco IOS DHCP 服务器

- 思科接入路由器无线配置指南

- 技术支持和文档 - Cisco Systems