目录

简介

开始使用前

规则

先决条件

使用的组件

配置

网关到网守配置的一般要求

网络图

配置

验证

故障排除

故障排除命令

相关信息

简介

本文档介绍包含一个双区域拓扑的 VoIP 网络，该拓扑由两个 Cisco 网守管理，并且每个区域中包含一个 Cisco 网关。本文的目的是提供能够让用户避免一些已知问题的基本配置，并为基于网守的网络创建可靠基础。本文档包括所配置功能的相关技术背景信息、设计指南和基本验证与故障排除策略。

特别注意在下面的配置中，四台路由器位于同一个LAN。然而，在您的实际结构中，所有设备可以在您网络的不同部分中使用。

开始使用前

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

先决条件

本文档没有任何特定的前提条件。

使用的组件

已对该设备进行了以下配置测试：

- 四台Cisco 2600，带Cisco IOS®软件版本12.2.8.5 ENTERPRISE PLUS/H323 MCM

本文档中的信息都是基于特定实验室环境中的设备创建的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您在使用任何命令前已经了解其潜在影响。

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网关到网守配置的一般要求

在网关从关守获得正确的地址解析之前，必须满足几个条件。

要验证如下两个重要方面：

- 所有网关都应注册到相应的网守。

- 所有网守都应有正确的拨号计划。

注册

成功注册是第一个必需步骤。还应考虑以下附加因素：

- 如果网关具有局外交换站 (FXS) 接口，则在普通旧式电话服务 (POTS) 拨号对等体上，添加 no register e164 命令。这可避免 Cisco Bug ID CSCdw60626（仅限注册用户）中说明的网关注册问题。 不是使用 e164 编号进行直接 FXS 的端口注册，可以为网关添加区域前缀并基于区域前缀做出路由决定。

- 通常，首选为网关定义技术前缀。虽然技术前缀的出现主要影响呼叫路由，但是它也适于可靠的注册。

有关网关到网守注册问题的详细信息，请参阅排除网守注册问题。

呼叫路由

- 为了实现可靠呼叫路由，应使用某种技术前缀注册所有网关。技术前缀的目的是区分不同类型的呼叫和网关的对应类型。因此，虽然可以使用技术前缀来做出路由决策，但更好的做法是使用技术前缀来根据区域前缀区分呼叫和路由类型。使用此方法，所有VoIP网关都可以配置相同的技术前缀（例如1#*，如本文档中的示例所示）。

- 首选显式为区域前缀配置主网关。

- 将 H.323 信令绑定到 Cisco IOS 网关或路由器上的特定 IP 地址。当Cisco IOS网关有多个被激活的IP接口时，某些H.323消息可能源自某个IP地址，而其他H.323消息则可能参考不同的源地址。如果回环接口可用于识别网关，或者网络中有一个防火墙和记帐服务器，h323-gateway voip bind srcaddr命令则是必要的。此命令已引入 Cisco IOS 软件版本 12.1.2T，为虚拟接口配置 H.323 支持中进行了相应介绍。

有关网守呼叫路由的详细信息，请参阅了解 Cisco IOS H.323 网守呼叫路由。

网络图

本文档使用下图所示的网络设置。

配置

本文档使用以下配置。

网守和网关的配置的验证对于排除网关到网守的问题故障非常重要。为了简化对配置的了解，已删除所有无关配置命令。

- GW_1 - ECV-2600-17

- GW_2 - ECV-2600-16

- GK_1 ECV-2600-15

- GK_2 ECV-2600-14

GW_1 - ECV-2600-17

IOS (tm) C2600 Software (C2600-JSX-M), Version 12.2(7a),

RELEASE SOFTWARE (fc1)

!

hostname ECV-2610-17

!

!

interface Ethernet0/0

ip address 10.52.218.49 255.255.255.0

h323-gateway voip interface

!---- This command enables VoIP GW functions on the interface.

h323-gateway voip id gk-zone1.test.com ipaddr 10.52.218.47

1718

!---- This command defines the GK this GW works with.

h323-gateway voip h323-id gw_1

!---- This command defines the GW alias for the GK.

h323-gateway voip tech-prefix 1#

!---- It is desirable to have tech prefix on the GW for !---- reliable registration and call routing.

h323-gateway voip bind srcaddr 10.52.218.49

!---- This command is not necessary in this simple topology, !---- but for complex networks, it is recommended to use it.

??

!

voice-port 1/1/0

!

voice-port 1/1/1

!

!

dial-peer voice 1 voip

destination-pattern 16..

session target ras

!---- All IP addresses for the destination pattern 16.. should !---- be resolved through the requests to the GK.

!

dial-peer voice 2 pots

destination-pattern 1711

port 1/1/1

no register e164

!---- This command prevents registration of this number with !---- the GK. The GW is registered with the GK with this alias only.

!

gateway

!

end

GW_2 - ECV-2600-16

!

hostname ECV-2610-16

!

!

interface Ethernet0/0

ip address 10.52.218.48 255.255.255.0

h323-gateway voip interface

h323-gateway voip id gk-zone2.test.com ipaddr 10.52.218.46 1718

h323-gateway voip h323-id gw_2

h323-gateway voip tech-prefix 1#

h323-gateway voip bind srcaddr 10.52.218.48

!

!

voice-port 1/1/0

!

voice-port 1/1/1

!

dial-peer voice 1 voip

destination-pattern 17..

session target ras

!

dial-peer voice 2 pots

destination-pattern 1611

port 1/1/1

no register e164

!

gateway

!

!

end

GK_1 ECV-2600-15

!

hostname ECV-2610-15

!

interface Ethernet0/0

ip address 10.52.218.47 255.255.255.0

!

gatekeeper

zone local gk-zone1.test.com test.com 10.52.218.47

!---- This command defines the local zone. The GK name and !---- zone name have the same meaning.

zone remote gk-zone2.test.com test.com 10.52.218.46 1719

!---- This command defines the name of the remote GK (zone).

zone prefix gk-zone2.test.com 16..

!---- This command explicitly defines the number length with !---- the number of dots.

zone prefix gk-zone1.test.com 17.. gw-priority 10 gw_1

!---- This command explicitly defines which GW handles !---- calls for 17.. numbers that could be done for the !---- local zones only.

gw-type-prefix 1#* default-technology

!---- This command defines the default technology prefix !---- that is necessary for routing decisions.

no shutdown

!--- This command turns the service up.

!

end

GK_2 ECV-2600-14

!

hostname ECV-2610-14

!

interface Ethernet0/0

ip address 10.52.218.46 255.255.255.0

!

gatekeeper zone local gk-zone2.test.com test.com 10.52.218.46

zone remote gk-zone1.test.com test.com 10.52.218.47 1719

zone prefix gk-zone2.test.com 16.. gw-priority 10 gw_2

zone prefix gk-zone1.test.com 17..

gw-type-prefix 1#* default-technology

no shutdown

!

end

验证

本部分提供的信息可帮助您确认您的配置是否可正常运行。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

注意：在尝试任何debug命令之前，请参阅有关debug命令的重要信息。有关下面的命令的详细信息，请参阅本文档的故障排除命令部分。

- show gateway - 显示网关注册状态。

- show gatekeeper endpoints - 显示注册到网守的所有网关。

- show gatekeeper zone prefix - 显示网守上配置的所有区域前缀。

- show gatekeeper call - 显示网守处理的所有活动呼叫。

- debug h225 asn1 — 显示H225（注册、准入和状态[RAS]和Q931呼叫设置）消息。

- debug cch323 h225 — 显示H225呼叫设置消息。

- VoIP 呼叫故障排除和调试基础

- VoIP Debug 命令

- Cisco IOS语音、视频和传真命令参考，版本12.2

故障排除

本部分提供的信息可用于对配置进行故障排除。

故障排除命令

要排除故障，请检查以下几个重要方面：

- 所有网关都已注册到相应网守。

- 网关应具有正确的拨号计划（配置了拨号对等体）。

- 网守应具有正确的拨号计划（配置了区域前缀）。

故障排除和调试 VoIP 呼叫基础中描述的操作步骤，补充了网关与网守交互作用相关的调试和显示命令的输出，应当被用作解决与其他Cisco IOS子系统相关的语音问题。show命令的示例输出突出显示了以上步骤，而debug输出则显示了您的所有4台路由器上的RAS和H225消息的顺序。

注意：debug h225 asn1命令会生成非常大的输出，因此应该谨慎使用。某些不必要的输出已从下面的 debug 命令中删除。

注意：在发出debug命令之前，请参阅有关debug命令的重要信息。

!--- Check the GW registration on the GW.

ECV-2610-17#show gateway

Gateway gw_1 is registered to Gatekeeper gk-zone1.test.com

??

Alias list (CLI configured)

H323-ID gw_1

Alias list (last RCF)

H323-ID gw_1

??

H323 resource thresholding is DisabledECV-2610-17#

------------------------------------------------------------

!--- And on the corresponding GK.

??

ECV-2610-15#show gatek en

GATEKEEPER ENDPOINT REGISTRATION

================================

CallSignalAddr Port RASSignalAddrPort Zone Name Type F

--------------- ----- -------------- ----- --------- ---- --

10.52.218.49 1720 10.52.218.4951194 gk-zone1.test.com VOIP-GW

H323-ID: gw_1

Total number of active registrations = 1

ECV-2610-15#

------------------------------------------------------------

??

!--- The same for the second GW.

ECV-2610-16#show gateway

Gateway gw_2 is registered to Gatekeeper gk-zone2.test.com ??

Alias list (CLI configured)

H323-ID gw_2

Alias list (last RCF)

H323-ID gw_2

?? H323 resource thresholding is Disabled

ECV-2610-16#

------------------------------------------------------------??

!--- And the second corresponding GK.

ECV-2610-14#show gatek en

GATEKEEPER ENDPOINT REGISTRATION

================================

CallSignalAddr Port RASSignalAddr Port Zone Name Type F

--------------- ----- --------------- ----- --------- ---- --

10.52.218.48 1720 10.52.218.48 52080 gk-zone2.test.com VOIP-GW

H323-ID:

gw_2

Total number of active registrations = 1 ??

ECV-2610-14#

------------------------------------------------------------

!--- To check the dial plan on the GKs:

??

ECV-2610-15#show gatek zone pr

ZONE PREFIX TABLE

=================

GK-NAME  E164-PREFIX

-------  -----------

gk-zone2.test.com 16..

gk-zone1.test.com 17..??

ECV-2610-15#

ECV-2610-15#

!--- All configured prefixes should be seen in the zone list.

------------------------------------------------------------??

!--- To check the dial plan on the GKs:

ECV-2610-14#

ECV-2610-14#show gatek zone pr

ZONE PREFIX TABLE

=================

GK-NAME E164-PREFIX

------- -----------

gk-zone2.test.com 16..

gk-zone1.test.com 17..??

ECV-2610-14#

------------------------------------------------------------??

ECV-2610-15#show gatekeeper call

Total number of active calls = 1.

GATEKEEPER CALL INFO

====================

LocalCallIDAge(secs) BW

5-0 1 64(Kbps)

Endpt(s): Alias E.164Addr CallSignalAddr Port RASSignalAddr Port

src EP: gw_2 1611 10.52.218.48 1720 10.52.218.48 59067

dst EP: gw_1 1711 10.52.218.49 1720 10.52.218.49 58841??

ECV-2610-15#

-----------------------------------------------------------------??

!--- The conversation between the GW and the GK consists of !--- exchange RAS messages. Here are two messages that show !--- successful registration of the GW to the GK.

ECV-2610-17#

ECV-2610-17#debug h225 asn1

H.225 ASN1 Messages debugging is on

ECV-2610-17#

*Mar 2 07:45:53: RAS OUTGOING PDU ::=

!--- The GW sends a RAS registration request message to the GK.

value RasMessage ::= registrationRequest :

{

requestSeqNum 93

protocolIdentifier { 0 0 8 2250 0 2 }

discoveryComplete FALSE

callSignalAddress

{

}

rasAddress

{

ipAddress :

{

ip '0A34DA31'H

port 57733

}

}

terminalType

{

mc FALSE

undefinedNode FALSE

}

gatekeeperIdentifier {"gk-zone1.test.com"}

endpointVendor

{

vendor

{

t35CountryCode 181

t35Extension 0

manufacturerCode 18

}

}

timeToLive 60

keepAlive TRUE

endpointIdentifier {"8215266C0000000F"}

willSupplyUUIEs FALSE

}

*Mar 2 07:45:53:

*Mar 2 07:45:53: RAS INCOMING PDU ::=

!--- The GK accepts the registration request and replies with !--- a confirmation.

value RasMessage ::= registrationConfirm :

{

requestSeqNum 93

protocolIdentifier { 0 0 8 2250 0 2 }

callSignalAddress

{

}

gatekeeperIdentifier {"gk-zone1.test.com"}

endpointIdentifier {"8215266C0000000F"}

timeToLive 60

willRespondToIRR FALSE

}??

----------------------------------------------------------------??

!--- The incoming H225 call setup message from the remote GW. !--- The example is the debug cch323 h225 command.

ECV-2610-17# debug cch323 h225

*Mar 2 07:46:03: cch323_h225_receiver: received msg of type

SETUPIND_CHOSEN

*Mar  2 07:46:03: cch323_h225_setup_ind: callingNumber[]

calledNumber[1711]

*Mar 2 07:46:03: cch323_h225_setup_ind--calling IE NOT present

*Mar 2 07:46:03:======= PI in cch323_h225_setup_ind = 0??

*Mar 2 07:46:03: Receive: infoXCap 0??

*Mar 2 07:46:03: Receive infoXCap ccb 0??

*Mar 2 07:46:03: src address = 10.52.218.49 of SETUPIND_CHOSEN

*Mar 2 07:46:03: dest address = 10.52.218.47 of SETUPIND_CHOSEN??

*Mar 2 07:46:03: cch323_run_h225_sm: received event

H225_EVENT_FAST_SETUP_IND while

at state H225_IDLE??

*Mar 2 07:46:03: cch323_run_h225_sm: Setup ccb 0x821FCE98 callID

0xFFFFFFFF

*Mar 2 07:46:03: cch323_h225_act_fastStartSetupInd: codec match = 1

*Mar 2 07:46:03: cch323_rtp_set_non_rtp_call: Non-RTP call end

*Mar 2 07:46:03: H.225 SM: changing from H225_IDLE state to

H225_REQ_WAIT_FOR_ARQ

state for callID FFFFFFFF??

-------------------------------------------------------------------

!--- Now the example of the debug h225 asn1 !--- command from all four routers. !--- The messages are sent from the originating GW.

ECV-2610-16#debug h225 asn1

H.225 ASN1 Messages debugging is on

ECV-2610-16#

!--- The GW_2 initiates a call to 1711 phone located on GW_1. !--- Here is the messages that show the process on GW_2:??

*Mar 2 14:28:08.824: RAS OUTGOING PDU ::=

!--- The GW_2 asks gk-zone2 to resolve the e164 number 1711 to IP !--- address.

value RasMessage ::= admissionRequest  :

{

requestSeqNum 3091

callType pointToPoint : NULL

callModel direct : NULL

endpointIdentifier {"8217FB5000000001"}

destinationInfo

{

e164 : "1711"

}

srcInfo

{

e164 : "1611",

h323-ID : {"gw_2"}

}

bandWidth 640

callReferenceValue 8

nonStandardData

{

nonStandardIdentifier h221NonStandard :

{

t35CountryCode 181

t35Extension 0

manufacturerCode 18

}

data '80000008200A1046585320312F312F31'H

}

conferenceID 'F748749F163011CC801CC5F8EEB46E69'H

activeMC FALSE

answerCall FALSE

canMapAlias TRUE

callIdentifier

{

guid 'F748749F163011CC801DC5F8EEB46E69'H

}

willSupplyUUIEs FALSE

}

??

*Mar 2 14:28:08.960: RAS INCOMING PDU ::=

!--- The gk-zone2 notifies GW_2 that the request is in progress as it !--- is forwarded to the other gk-zone1 and is not processed locally.

??

value RasMessage ::= requestInProgress :

{

!--- Note the sequence numbers in the request equal the number in !--- the reply.

requestSeqNum 3091

delay 9000

}

??

*Mar 2 14:28:09.169: RAS INCOMING PDU ::=

!--- The gk-zone2 grants permission to start call and resolves the !--- e164 number 1711 to IP address of GW_1.

value RasMessage ::= admissionConfirm :

{

!--- The sequence numbers in the request equal the number in the reply.

requestSeqNum 3091

bandWidth 640

callModel direct : NULL

destCallSignalAddress ipAddress :

{

ip '0A34DA31'H

!--- The IP address 10.52.218.49 of GW_1.

port 1720

}

irrFrequency 240

destinationInfo

{

e164 : "1711"

}

willRespondToIRR FALSE

uuiesRequested

{

setup FALSE

callProceeding FALSE

connect FALSE

alerting FALSE

information FALSE

releaseComplete FALSE

facility FALSE

progress FALSE

empty FALSE

}

}

*Mar 2 14:28:09.193: H225 NONSTD OUTGOING PDU ::=

value H323_UU_NonStdInfo ::=

{

version 0

progIndParam progIndIEinfo :

{

progIndIE '00000003'H

}

}

*Mar 2 14:28:09.197: H225.0 OUTGOING PDU ::=

!--- The GW_2 now can place H323 (q931) call setup message directly !--- to GW_1.

value H323_UserInformation ::=

{

h323-uu-pdu

{

h323-message-body setup :

{

protocolIdentifier { 0 0 8 2250 0 2 }

sourceAddress

{

h323-ID : {"gw_2"}

}

sourceInfo

{

gateway

{

protocol

{

voice :

{

supportedPrefixes

{??

{

prefix e164 : "1#"

}

}

}

}

}

mc FALSE

undefinedNode FALSE

}

destinationAddress

{

e164 : "1711"

}

activeMC FALSE

conferenceID 'F748749F163011CC801CC5F8EEB46E69'H

conferenceGoal create : NULL

callType pointToPoint : NULL

sourceCallSignalAddress ipAddress :

{

ip '0A34DA30'H

port 11001

}

callIdentifier

{

guid 'F748749F163011CC801DC5F8EEB46E69'H

}

fastStart

{

'0000000D4001800A040001000A34DA3043F3'H,

'400000060401004D40018011140001000A34DA30...'H

}

mediaWaitForConnect FALSE

canOverlapSend FALSE

}

h245Tunneling FALSE

nonStandardControl

{??

{

nonStandardIdentifier h221NonStandard :

{

t35CountryCode 181

t35Extension 0

manufacturerCode 18

}

data 'C00100028006000400000003'H

}

}

}

}

*Mar 2 14:28:09.573: H225.0 INCOMING PDU ::=

!--- The GW_1 replies with an H323 (q931) callProceeding message.

value H323_UserInformation ::=

{

h323-uu-pdu

{

h323-message-body callProceeding :

{

protocolIdentifier { 0 0 8 2250 0 2 }

destinationInfo

{

mc FALSE

undefinedNode FALSE

}

callIdentifier

{

guid 'F748749F163011CC801DC5F8EEB46E69'H

}

fastStart

{

'0000000D40018011140001000A34DA314942000A...'H,

'400000060401004D40018011140001000A34DA30...'H

}

}

h245Tunneling FALSE

}

}

*Mar 2 14:28:09.766: H225.0 INCOMING PDU ::=

!--- The GW_1 sends an H323 (q931) call Progress message.

value H323_UserInformation ::=

{

h323-uu-pdu

{

h323-message-body progress :

{

protocolIdentifier { 0 0 8 2250 0 2 }

destinationInfo

{

mc FALSE

undefinedNode FALSE

}

callIdentifier

{

guid 'F748749F163011CC801DC5F8EEB46E69'H

}

}

h245Tunneling FALSE

nonStandardControl

{

??{

nonStandardIdentifier h221NonStandard :

{

t35CountryCode 181

t35Extension 0

manufacturerCode 18

}

data '60011000011E041E028188'H

}

}

}

}

????

*Mar 2 14:28:11.801: H225.0 INCOMING PDU ::=

!--- The GW_1 sends an H323 (q931) call CONNECT message. The call is !--- now active.

value H323_UserInformation ::=

{

h323-uu-pdu

{

h323-message-body connect :

{

protocolIdentifier { 0 0 8 2250 0 2 }

destinationInfo

{

gateway

{

protocol

{

voice :

{

supportedPrefixes

{

??{

prefix e164 : "1#"

}

}

}

}

}

mc FALSE

undefinedNode FALSE

}

conferenceID 'F748749F163011CC801CC5F8EEB46E69'H

callIdentifier

{

guid 'F748749F163011CC801DC5F8EEB46E69'H

}

}

h245Tunneling FALSE

nonStandardControl

{??

{

nonStandardIdentifier h221NonStandard :

{

t35CountryCode 181

t35Extension 0

manufacturerCode 18

}

data 'C00100028006000400000002'H

}

}

}

}

*Mar 2 14:28:11.909: show call active voice

Total call-legs: 2

??GENERIC:

SetupTime=13848499 ms

Index=1

PeerAddress=1611

PeerSubAddress=

PeerId=2

PeerIfIndex=11

LogicalIfIndex=8

ConnectTime=13849192

CallDuration=00:00:19

CallState=4

!--- This means the call is active.

CallOrigin=2

ChargedUnits=0

InfoType=2

TransmitPackets=442

TransmitBytes=8840

ReceivePackets=1104

ReceiveBytes=22080

!--- This shows that there is two-way voice for this call leg. !--- 0 values a problem.

TELE:

!--- The call is outgoing and started from the PSTN. That is why !--- TELE: is first in the output.

ConnectionId=[0xF748749F 0x163011CC 0x801CC5F8 0xEEB46E69]

IncomingConnectionId=[0xF748749F 0x163011CC 0x801CC5F8

0xEEB46E69]

TxDuration=22100 ms

VoiceTxDuration=2209 ms

FaxTxDuration=0 ms

CoderTypeRate=g729r8

NoiseLevel=-48

ACOMLevel=2

OutSignalLevel=-57

InSignalLevel=-53

InfoActivity=2

ERLLevel=16

SessionTarget=

ImgPages=0

GENERIC:

SetupTime=13848887 ms

Index=1

PeerAddress=1711

PeerSubAddress=

PeerId=1PeerIf

Index=13

LogicalIfIndex=0

ConnectTime=13849185

CallDuration=00:00:20

CallState=4

CallOrigin=1

ChargedUnits=0

InfoType=2

TransmitPackets=1038

TransmitBytes=20760

ReceivePackets=488

ReceiveBytes=9760

VOIP:

ConnectionId[0xF748749F 0x163011CC 0x801CC5F8 0xEEB46E69]

IncomingConnectionId[0xF748749F 0x163011CC 0x801CC5F8

0xEEB46E69]

RemoteIPAddress=10.52.218.49RemoteUDPPort=18754

!--- The signaling and RTP stream IP addresses.

RemoteSignallingIPAddress=10.52.218.49

RemoteSignallingPort=1720

RemoteMediaIPAddress=10.52.218.49

RemoteMediaPort=18754

RoundTripDelay=5 ms

SelectedQoS=best-effort

tx_DtmfRelay=inband-voice

FastConnect=TRUE

Separate H245 Connection=FALSE

H245 Tunneling=FALSE

SessionProtocol=cisco

SessionTarget=ras

OnTimeRvPlayout=6630

GapFillWithSilence=0 ms

GapFillWithPrediction=0 ms

GapFillWithInterpolation=0 ms

GapFillWithRedundancy=0 ms

HiWaterPlayoutDelay=70 ms

LoWaterPlayoutDelay=50 ms

ReceiveDelay=50 ms

LostPackets=0

EarlyPackets=0

LatePackets=0

!--- The DSP statistics.

VAD = enabled

CoderTypeRate=g729r8

CodecBytes=20Total call-legs: 2

ECV-2610-16#

ECV-2610-16#

u all

All possible debugging has been turned off

!--- The following messages shows the call disconnect !--- process at the GW_2.

ECV-2610-16#deb h225 asn1

H.225 ASN1 Messages debugging is on:

*Mar 2 14:29:52.017: H225.0 INCOMING PDU ::=

!--- The GW_1 sends H323 (q931) Release complete message.

value H323_UserInformation ::=

{

h323-uu-pdu

{

h323-message-body releaseComplete :

{

protocolIdentifier { 0 0 8 2250 0 2 }

callIdentifier

{

guid 'F748749F163011CC801DC5F8EEB46E69'H

}

}

h245Tunneling FALSE

}

}

*Mar 2 14:29:52.025: H225.0 OUTGOING PDU ::=

!--- The GW_2 replies with the H323 (q931) releaseComplete !--- message.

value H323_UserInformation ::=

{

h323-uu-pdu

{

h323-message-body releaseComplete :

{

protocolIdentifier { 0 0 8 2250 0 2 }

callIdentifier

{

guid 'F748749F163011CC801DC5F8EEB46E69'H

}

}

h245Tunneling FALSE

}

}

*Mar 2 14:29:52.041: RAS OUTGOING PDU ::=

!--- The GW_2 notifies GK-2 that the call is complete.

value RasMessage ::= disengageRequest :

{

requestSeqNum 3095

endpointIdentifier {"8217FB5000000001"}

conferenceID 'F748749F163011CC801CC5F8EEB46E69'H

callReferenceValue 8

disengageReason normalDrop : NULL

callIdentifier

{

guid 'F748749F163011CC801DC5F8EEB46E69'H

}

answeredCall FALSE

}

*Mar 2 14:29:52.090: RAS INCOMING PDU ::=

!--- The GK-2 confirms the message.

value RasMessage ::= disengageConfirm :

{

requestSeqNum 3095

}

u all

All possible debugging has been turned off

------------------------------------------------------------

!--- The debug output from the GK-2.

ECV-2610-14#debug h225 asn1

H.225 ASN1 Messages debugging is on

ECV-2610-14#

Mar 2 14:28:20.952:

Mar  2 14:28:20.952: RAS INCOMING PDU ::=

!--- The GW_2 asks permission to place the call. !--- Now it is incoming RAS PDU as it is on the GK-2, but the !--- same sequence number.

value RasMessage ::= admissionRequest :

{

requestSeqNum 3091

callType pointToPoint : NULL

callModel direct : NULL

endpointIdentifier {"8217FB5000000001"}

destinationInfo

{

e164 : "1711"

}

srcInfo

{

e164 : "1611",

h323-ID: {"gw_2"}

}

bandWidth 640

callReferenceValue 8

nonStandardData

{

nonStandardIdentifier h221NonStandard :

{

t35CountryCode 181

t35Extension 0

manufacturerCode 18

}

data '80000008200A1046585320312F312F31'H

}

conferenceID 'F748749F163011CC801CC5F8EEB46E69'H

activeMC FALSE

answerCall FALSE

canMapAlias TRUE

callIdentifier

{

guid 'F748749F163011CC801DC5F8EEB46E69'H

}

willSupplyUUIEs FALSE

}??

Mar 2 14:28:20.992: RAS OUTGOING PDU ::=

!--- The GK-2 asks GK-1 to resolve the Number for the remote !--- zone.

value RasMessage ::= locationRequest :

{

requestSeqNum 1026

destinationInfo

{

e164 : "1711"

}

nonStandardData

{

nonStandardIdentifier h221NonStandard :

{

t35CountryCode 181

t35Extension 0

manufacturerCode 18

}

data '8284901100F748749F163011CC801DC5F8EEB46E...'H

}

replyAddress ipAddress :

{

ip '0A34DA2E'H

port 1719

}

sourceInfo

{

h323-ID : {"gk-zone2.test.com"}

}

canMapAlias TRUE

}

Mar 2 14:28:21.024: RAS OUTGOING PDU ::=

!--- The GK-2 notifies GW_2 that the call is processing.

value RasMessage ::= requestInProgress :

{

requestSeqNum 3091

delay 9000

}

Mar 2 14:28:21.157:

Mar 2 14:28:21.157: RAS INCOMING PDU ::=

!--- The GK-1 replies to GK-2 with the permission.

value RasMessage ::= locationConfirm :

{

requestSeqNum 1026

callSignalAddress ipAddress :

{

ip'0A34DA31'H

port 1720

}

rasAddress ipAddress :

{

ip '0A34DA31'H

port 55679

}

nonStandardData

{

nonStandardIdentifier h221NonStandard :

{

t35CountryCode 181

t35Extension 0

manufacturerCode 18

}

data '0001400300670077005F0031200067006B002D00...'H

}

destinationInfo

{

e164 : "1711"

}

destinationType

{

gateway

{

protocol

{

voice :

{

supportedPrefixes

{

}

}

}

}

mc FALSE

undefinedNode FALSE

}

}

Mar 2 14:28:21.209: RAS OUTGOING PDU::=

!--- The GK-2 replies to GW_2 with the permission to place !--- the call.

value RasMessage ::= admissionConfirm :

{

requestSeqNum 3091

bandWidth 640

callModel direct : NULL

destCallSignalAddress ipAddress :

{

ip '0A34DA31'H

port 1720

}

irrFrequency 240

destinationInfo

{

e164 : "1711"

}

willRespondToIRR FALSE

uuiesRequested

{

setup FALSE

callProceeding FALSE

connect FALSE

alerting FALSE

information FALSE

releaseComplete FALSE

facility FALSE

progress FALSE

empty FALSE

}

}

ECV-2610-14#u all

All possible debugging has been turned off

ECV-2610-14#debug h225 asn1

H.225 ASN1 Messages debugging is on

Mar 2 14:30:04.145: RAS INCOMING PDU ::=

!--- The GK-2 gets notification from GW_2 that the call !--- has ended.

value RasMessage ::= disengageRequest :

{

requestSeqNum 3095

endpointIdentifier {"8217FB5000000001"}

conferenceID 'F748749F163011CC801CC5F8EEB46E69'H

callReferenceValue 8

disengageReason normalDrop : NULL

callIdentifier

{

guid 'F748749F163011CC801DC5F8EEB46E69'H

}

answeredCall FALSE

}

Mar 2 14:30:04.157: RAS OUTGOING PDU ::=

value RasMessage ::= disengageConfirm :

{

requestSeqNum 3095

}

ECV-2610-14#u all

All possible debugging has been turned off

ECV-2610-14#

---------------------------------------------------------

!--- The debug output from the GK-2.

ECV-2610-15#ECV-2610-15#debug h225 asn1

H.225 ASN1 Messages debugging is on

*Mar 2 14:28:14.690:

*Mar 2 14:28:14.694:

RAS INCOMING PDU ::=

!--- The request from the GK-2.

value RasMessage ::= locationRequest :

{

requestSeqNum 1026

destinationInfo

{

e164 : "1711"

}

nonStandardData

{

nonStandardIdentifier h221NonStandard:

{

t35CountryCode 181

t35Extension 0

manufacturerCode 18

}

data '8284901100F748749F163011CC801DC5F8EEB46E...'H

}

replyAddress ipAddress :

{

ip '0A34DA2E'H

port 1719

}

sourceInfo

{

h323-ID : {"gk-zone2.test.com"}

}

canMapAlias TRUE

}

*Mar 2 14:28:14.754: RAS OUTGOING PDU ::=

!--- The reply from the GK-1 to GK-2.

value RasMessage::= locationConfirm :

{

requestSeqNum 1026

callSignalAddress ipAddress :

{

ip '0A34DA31'H

port 1720

}

rasAddress ipAddress :

{

ip '0A34DA31'H

port 55679

}

nonStandardData

{

nonStandardIdentifier h221NonStandard :

{

t35CountryCode 181

t35Extension 0

manufacturerCode 18

}

data '0001400300670077005F0031200067006B002D00...'H

}

destinationInfo

{

e164 : "1711"

}

destinationType

{

gateway

{

protocol

{

voice :

{

supportedPrefixes

{

}

}

}

}

mc FALSE

undefinedNode FALSE

}

}

*Mar 2 14:28:15.159: RAS INCOMING PDU ::=

!--- The GW_1 asks GK-1 for permission to accept the call.

value RasMessage ::= admissionRequest :

{

requestSeqNum 101

callType pointToPoint : NULL

callModel direct : NULL

endpointIdentifier {"8261828000000003"}

destinationInfo

{

e164 : "1711"

}

srcInfo

{

e164 : "1611",

h323-ID: {"gw_2"}

}

srcCallSignalAddress ipAddress:

{

ip '0A34DA30'H

port 1100

}

bandWidth 640

callReferenceValue 7

nonStandardData

{

nonStandardIdentifier h221NonStandard :

{

t35CountryCode 181

t35Extension 0

manufacturerCode 18

}

data '80000008200A1046585320312F312F31'H

}

conferenceID 'F748749F163011CC801CC5F8EEB46E69'H

activeMC FALSE

answerCall TRUE

canMapAlias TRUE

callIdentifier

{

guid 'F748749F163011CC801DC5F8EEB46E69'H

}

willSupplyUUIEs FALSE

}

*Mar 2 14:28:15.191: RAS OUTGOING PDU ::=

!--- The permission is granted.

value RasMessage ::= admissionConfirm :

{

requestSeqNum 101

bandWidth 640

callModel direct : NULL

destCallSignalAddress ipAddress :

{

ip '0A34DA31'H

port 1720

}

irrFrequency 240

willRespondToIRR FALSE

uuiesRequested

{

setup FALSE

callProceeding FALSE

connect FALSE

alerting FALSE

information FALSE

releaseComplete FALSE

facility FALSE

progress FALSE

empty FALSE

}

}

ECV-2610-15#

ECV-2610-15#show gatek call

Total number of active calls = 1.

GATEKEEPER CALL INFO

====================

LocalCallID Age(secs) BW

7-63391                            33 64(Kbps)

Endpt(s): Alias E.164Addr CallSignalAddr  Port RASSignalAddr Port

src EP: gw_2 1611  10.52.218.48 1720 10.52.218.48 59067

dst EP: gw_1         1711 10.52.218.49 1720 10.52.218.49 58841

ECV-2610-15#ECV-2610-15#u all

All possible debugging has been turned off

ECV-2610-15#debug h225 asn1

H.225 ASN1 Messages debugging is on

*Mar 2 14:29:57.767: RAS INCOMING PDU ::=

!--- The GK-1 gets notification from GW_1 that the call has ended.

value RasMessage ::= disengageRequest :

{

requestSeqNum 105

endpointIdentifier {"8261828000000003"}

conferenceID 'F748749F163011CC801CC5F8EEB46E69'H

callReferenceValue 7

disengageReason normalDrop : NULL

callIdentifier

{

guid 'F748749F163011CC801DC5F8EEB46E69'H

}

answeredCall TRUE

}

*Mar 2 14:29:57.779: RAS OUTGOING PDU ::=

!--- The GK-1 confirms the message.

value RasMessage ::= disengageConfirm :

{

requestSeqNum 105

}

ECV-2610-15#u all

All possible debugging has been turned off

!--- The debugs must always be turned off when the collection !--- is completed.

-------------------------------------------------------------

!--- The debugs at the terminating gateway GW_1.

ECV-2610-17#

ECV-2610-17#debug h225 asn1

H.225 ASN1 Messages debugging is on

*Mar 1 11:02:27:

*Mar 1 11:02:27: H225.0 INCOMING PDU ::=

!--- The first message is the H225 call setup from GW_2.

value H323_UserInformation ::=

{

h323-uu-pdu

{

h323-message-body setup :

{

protocolIdentifier { 0 0 8 2250 0 2 }

sourceAddress

{

h323-ID : {"gw_2"}

}

sourceInfo

{

gateway

{

protocol

{

voice :

{

supportedPrefixes

{??

{

prefix e164 : "1#"

}

}

}

}

}

mc FALSE

undefinedNode FALSE

}

destinationAddress

{

e164 : "1711"

}

activeMC FALSE

conferenceID 'F748749F163011CC801CC5F8EEB46E69'H

conferenceGoal create : NULL

callType pointToPoint : NULL

sourceCallSignalAddress ipAddress :

{

ip '0A34DA30'H

port 11001

}

callIdentifier

{

guid 'F748749F163011CC801DC5F8EEB46E69'H

}

fastStart

{

'0000000D4001800A040001000A34DA3043F3'H,

'400000060401004D40018011140001000A34DA30...'H

}

mediaWaitForConnect FALSE

canOverlapSend FALSE

}

h245Tunneling FALSE

nonStandardControl

{

??

{

nonStandardIdentifier h221NonStandard :

{

t35CountryCode 181

t35Extension 0

manufacturerCode 18

}

data 'C00100028006000400000003'H

}

}

}

}

*Mar 1 11:02:27: RAS OUTGOING PDU ::=

!--- The GW_1 asks GK-1 for permission to accept the call.

value RasMessage::= admissionRequest :

{

requestSeqNum 101

callType pointToPoint : NULL

callModel direct : NULL

endpointIdentifier {"8261828000000003"}

destinationInfo

{

e164: "1711"

}

srcInfo

{

e164 : "1611",

h323-ID : {"gw_2"}

}

srcCallSignalAddress ipAddress:

{

ip '0A34DA30'H

port 11001

}

bandWidth 640

callReferenceValue 7

nonStandardData

{

nonStandardIdentifier h221NonStandard :

{

t35CountryCode 181

t35Extension 0

manufacturerCode 18

}

data '80000008200A1046585320312F312F31'H

}

conferenceID 'F748749F163011CC801CC5F8EEB46E69'H

activeMC FALSE

answerCall TRUE

canMapAlias TRUE

callIdentifier

{

guid 'F748749F163011CC801DC5F8EEB46E69'H

}

willSupplyUUIEs FALSE

}

*Mar 1 11:02:27: *Mar 1 11:02:27: RAS INCOMING PDU ::=

!--- The permission is granted.

value RasMessage ::= admissionConfirm:

{

requestSeqNum 101

bandWidth 640

callModel direct: NULL

destCallSignalAddress ipAddress :

{

ip '0A34DA31'H

port 1720

}

irrFrequency 240

willRespondToIRR FALSE

uuiesRequested

{

setup FALSE

callProceeding FALSE

connect FALSE

alerting FALSE

information FALSE

releaseComplete FALSE

facility FALSE

progress FALSE

empty FALSE

}

}

*Mar 1 11:02:27: H225.0 OUTGOING PDU ::=

!--- The GW_1 replies to the GW-2 with the callProceeding message.

value H323_UserInformation::=

{

h323-uu-pdu

{

h323-message-body callProceeding:

{

protocolIdentifier { 0 0 8 2250 0 2 }

destinationInfo

{

mc FALSE

undefinedNode FALSE

}

callIdentifier

{

guid 'F748749F163011CC801DC5F8EEB46E69'H

}

fastStart

{

'0000000D40018011140001000A34DA314942000A...'H,

'400000060401004D40018011140001000A34DA30...'H

}

}

h245Tunneling FALSE

}

}

*Mar 1 11:02:27: H225.0 OUTGOING PDU ::=

!--- The call Progress follows.

value H323_UserInformation::=

{

h323-uu-pdu

{

h323-message-body progress:

{

protocolIdentifier { 0 0 8 2250 0 2 }

destinationInfo

{

mc FALSE

undefinedNode FALSE

}

callIdentifier

{

guid 'F748749F163011CC801DC5F8EEB46E69'H

}

}

h245Tunneling FALSE

nonStandardControl

{

??

{

nonStandardIdentifier h221NonStandard :

{

t35CountryCode 181

t35Extension 0

manufacturerCode 18

}

data '60011000011E041E028188'H

}

}

}

}

??

*Mar 1 11:02:29: H225.0 OUTGOING PDU ::=

!--- The GW_1 accepts the call.

value H323_UserInformation ::=

{

h323-uu-pdu

{

h323-message-body connect :

{

protocolIdentifier { 0 0 8 2250 0 2 }

destinationInfo

{

gateway

{

protocol

{

voice :

{

supportedPrefixes

{??

{

prefix e164 : "1#"

}

}

}

}

}

mc FALSE

undefinedNode FALSE

}

conferenceID 'F748749F163011CC801CC5F8EEB46E69'H

callIdentifier

{

guid 'F748749F163011CC801DC5F8EEB46E69'H

}

}

h245Tunneling FALSE

nonStandardControl

{

??{

nonStandardIdentifier h221NonStandard :

{

t35CountryCode 181

t35Extension 0

manufacturerCode 18

}

data 'C00100028006000400000002'H

}

}

}

}

ECV-2610-17#u all

All possible debugging has been turned off

ECV-2610-17#

ECV-2610-17#debug h225 asn1

H.225 ASN1 Messages debugging is on

ECV-2610-17#

*Mar 1 11:04:10: H225.0 OUTGOING PDU ::=

!--- The GW_1 drops the call.

value H323_UserInformation ::=

{

h323-uu-pdu

{

h323-message-body releaseComplete :

{

protocolIdentifier { 0 0 8 2250 0 2 }

callIdentifier

{

guid 'F748749F163011CC801DC5F8EEB46E69'H

}

}

h245Tunneling FALSE

}

}

??*Mar 1 11:04:10: RAS OUTGOING PDU ::=

!--- The GW_1 notifies GK-1 that the call has ended.

value RasMessage ::= disengageRequest :

{

requestSeqNum 105

endpointIdentifier {"8261828000000003"}

conferenceID 'F748749F163011CC801CC5F8EEB46E69'H

callReferenceValue 7

disengageReason normalDrop : NULL

callIdentifier

{

guid 'F748749F163011CC801DC5F8EEB46E69'H

}

answeredCall TRUE

}

*Mar 1 11:04:10: H225.0 INCOMING PDU ::=

!--- The GW_2 drops the call from its side.

value H323_UserInformation ::=

{

h323-uu-pdu

{

h323-message-body releaseComplete :

{

protocolIdentifier { 0 0 8 2250 0 2 }

callIdentifier

{

guid 'F748749F163011CC801DC5F8EEB46E69'H

}

}

h245Tunneling FALSE

}

}

*Mar 1 11:04:10: RAS INCOMING PDU ::=

!--- The GK-1 confirms the message.

value RasMessage ::= disengageConfirm :

{

requestSeqNum 105

}

u all

All possible debugging has been turned off

!--- The debugs must always be turned off when the collection !--- is completed.

相关信息

- 了解 H.323 网守

- 网守注册问题的故障排除

- 了解 Cisco IOS H.323 网守呼叫路由

- Cisco高性能网守

- 配置 H.323 网关

- 配置 H.323 网守

- 了解 Cisco 网守带宽管理与故障排除

- 为虚拟接口配置H.323支持

- 语音技术支持

- 语音和统一通信产品支持

- Cisco IP 电话故障排除

- 技术支持和文档 - Cisco Systems