目录

简介

先决条件

要求

使用的组件

规则

背景信息

配置

配置

验证

故障排除

相关信息

简介

本文描述在Nexus 5000系列交换机中配置巨型最大传输单元(MTU)数据包时引起的问题。

先决条件

验证

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于以下系列的 Nexus 交换机:

- Nexus 5020

- NX-OS 版本 4.1(3)N2(1a)

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

规则

有关文档约定的更多信息，请参考 Cisco 技术提示约定。

背景信息

本文档介绍需要在Nexus 5000系列交换机中使用巨型数据包时出现的问题。当您尝试在Nexus 5000和/或Nexus 7000交换机之间传输巨型数据包时，可能会出现上述场景。

配置

数据包丢失可能发生在两个Nexus 5000交换机之间或Nexus 5000交换机和Nexus 7000交换机之间。

使用 9216 字节的数据包对主机进行 ping 操作时，您可以看到数据包丢失率为 50%。

Nexus-5000#ping 172.16.0.1 packet-size 9216 count 20

PING 172.16.0.1 (172.16.0.1): 9216 data bytes

9224 bytes from 172.16.0.1: icmp_seq=0 ttl=254 time=6.094 ms

Request 1 timed out

9224 bytes from 172.16.0.1: icmp_seq=2 ttl=254 time=5.507 ms

Request 3 timed out

9224 bytes from 172.16.0.1: icmp_seq=4 ttl=254 time=5.529 ms

Request 5 timed out

9224 bytes from 172.16.0.1: icmp_seq=6 ttl=254 time=10.09 ms

Request 7 timed out

9224 bytes from 172.16.0.1: icmp_seq=8 ttl=254 time=5.597 ms

Request 9 timed out

9224 bytes from 172.16.0.1: icmp_seq=10 ttl=254 time=5.497 ms

Request 11 timed out

9224 bytes from 172.16.0.1: icmp_seq=12 ttl=254 time=5.491 ms

Request 13 timed out

9224 bytes from 172.16.0.1: icmp_seq=14 ttl=254 time=5.555 ms

Request 15 timed out

9224 bytes from 172.16.0.1: icmp_seq=16 ttl=254 time=6.021 ms

Request 17 timed out

9224 bytes from 172.16.0.1: icmp_seq=18 ttl=254 time=5.51 ms

--- 172.16.0.1 ping statistics ---

20 packets transmitted, 10 packets received, 50.00% packet loss

round-trip min/avg/max = 5.491/6.089/10.09 ms

配置

如果巨型数据包必须经过Nexus 5020和Nexus 7010，则需要在Nexus 5020中配置Policy-map并设置  system jumbomtu size 在Nexus 7010系列交换机中。

要在Nexus 5020中配置策略映射，请完成以下步骤：

Nexus -5020

!--- You can enable the Jumbo MTU for the whole switch by setting the MTU to its maximum size (9216 bytes)

!--- in the policy map for the default Ethernet system class (class-default).

switch(config)#policy-map type network-qos jumbo

switch(config-pmap-nq)#class type network-qos class-default

switch(config-pmap-c-nq)#mtu 9216

switch(config-pmap-c-nq)#exit

switch(config-pmap-nq)#exit

switch(config)#system qos

switch(config-sys-qos)#service-policy type network-qos jumbo

有关详细信息，请参阅Cisco Nexus 5000系列NX-OS第2层交换配置指南，版本4.2(1)N1(1)。

在 Nexus 7010 交换机中完成以下步骤以设置超巨型帧：

Nexus -7010

!--- Set the MTU to its maximum size (9216 bytes) in order to enable the Jumbo MTU for the whole switch.

switch(config)#system jumbomtu 9216

!--- Set the MTU specification for an interface.

switch(config)#interface ethernet x/x

!--- By default, Cisco NX-OS configures Layer 3 parameters. In order to configure Layer 2 parameters, use this command.

switch(config-if)#switchport

switch(config-if)#mtu 9216

switch(config-if)#exit

验证

为了进行验证，您可以使用大于1500字节的数据包大小执行ping: Ping -l 9000 x.x.x.x。

也可以发出  show interface ethernet port/slot  命令，以验证是否已设置巨帧。

在Nexus 5000上，输入  show queuing interface ethernet 1/1  指令：

Nexus5000#show queuing interface ethernet 1/1

Ethernet1/1 queuing information:

TX Queuing

qos-group  sched-type  oper-bandwidth

0       WRR             50

1       WRR             50

RX Queuing

qos-group 0

q-size: 243200, HW MTU: 9280 (9216 configured)

在Nexus 7000上，输入  show interface ethernet 1/9  指令：

Nexus-7010#show interface ethernet 1/9

Ethernet1/9 is up

Hardware: 10000 Ethernet, address: 0000.0000.0000 (bia 0000.0000.0000)

MTU 9216 bytes, BW 10000000 Kbit, DLY 10 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA

Port mode is access

full-duplex, 10 Gb/s, media type is 10g

Beacon is turned off

Auto-Negotiation is turned off

Input flow-control is off, output flow-control is off

Rate mode is dedicated

Switchport monitor is off

Last link flapped 00:57:24

Last clearing of "show interface" counters 00:56:14

30 seconds input rate 0 bits/sec, 0 packets/sec

30 seconds output rate 360 bits/sec, 0 packets/sec

Load-Interval #2: 5 minute (300 seconds)

input rate 0 bps, 0 pps; output rate 448 bps, 0 pps

RX

5894254 unicast packets  0 multicast packets  0 broadcast packets

5894254 input packets  29108950332 bytes

0 jumbo packets  0 storm suppression packets

0 runts  0 giants  0 CRC  0 no buffer

0 input error  0 short frame  0 overrun   0 underrun  0 ignored

0 watchdog  0 bad etype drop  0 bad proto drop  0 if down drop

0 input with dribble  0 input discard

0 Rx pause

TX

5894228 unicast packets  2225 multicast packets  0 broadcast packets

5896453 output packets  29109001641 bytes

0 jumbo packets

0 output error  0 collision  0 deferred  0 late collision

0 lost carrier  0 no carrier  0 babble

0 Tx pause

0 interface resets

注：不支持Nexus 7000系列上的超巨型帧计数器，并且Tx和Rx帧显示空值，但是如果您注意到MTU大小，则会显示已配置的超巨型帧。

故障排除

当前没有可用于对此配置进行故障排除的信息。

相关信息

- Cisco Nexus 5000 系列交换机

- Cisco Nexus 7000系列交换机支持页

- 思科技术支持和下载