目录

简介

先决条件

要求

使用的组件

规则

网络图

一般配置任务

配置 VLAN 间路由

常见问题：VLAN接口显示down/down

检查配置

Appendix

Supervisor引擎模块配置

RSM配置

相关信息

简介

本文档提供有关如何使用内部路由器（第3层[L3]卡/模块）在Catalyst交换机（运行Catalyst OS [CatOS]系统软件）上配置VLAN间路由的基本信息。 术语内部路由器是指Catalyst 5500/5000和6500/6000交换机上的以下L3卡/模块：

- Catalyst 6500/6000系列交换机上的多层交换功能卡(MSFC)

- Catalyst 6500/6000系列交换机上的MSFC2

- Catalyst 5500/5000系列交换机上的路由交换功能卡(RSFC)

- Catalyst 5500/5000系列交换机上的路由交换模块(RSM)

本文档中可能已使用任何运行CatOS且带有支持的L3卡的Catalyst 5500/5000或Catalyst 6500/6000系列交换机，以获得相同的结果。

先决条件

要求

本文档的读者应掌握以下这些主题的相关知识：

注意：本文档不讨论如何使用L3服务模块(WS-X4232-L3)在Catalyst 4500/4000交换机上配置VLAN间路由。 有关这些详细信息，请参阅以下文档：

- 为Catalyst 4000第3层服务模块的安装和配置说明中的“配置VLAN间路由模块”部分

- Catalyst 4000 系列 (WS-X4232-L3) 上路由器模块的配置与概述

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 带RSM的Catalyst 5500交换机

- 运行CatOS 6.1(1)软件的Supervisor引擎模块(WS-X5530)

- 运行Cisco IOS®软件版本12.0(5)W5(12)的RSM(WS-X5302)

用clear config all和write erase命令清除所有设备的配置，以保证它们有一个默认配置。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文件规则的更多信息请参见“ Cisco技术提示规则”。

网络图

注意：除非在本文档中要求您连接工作站1和工作站2，否则请勿连接工作站1和工作站2。本文指出客户在路由器模块上配置VLAN间路由或多个VLAN接口时报告的一个常见问题。请参阅常见问题：VLAN接口显示down/down部分以了解详细信息。

一般配置任务

本节提供本文档中执行的主要配置任务的摘要：

- 配置交换机以进行管理

- 在交换机上创建VLAN

- 将端口添加到已配置的VLAN

- 配置内部路由器以进行管理

- 配置 VLAN 间路由

- 检查配置

配置 VLAN 间路由

完成以下步骤以在Catalyst交换机上配置VLAN间路由：

1. 访问Supervisor引擎的控制台端口。

如果访问控制台时遇到困难，请参阅以下文档：

- 对于Catalyst 5500/5000系列交换机 — 将终端连接到Catalyst交换机上的控制台端口。

- 对于Catalyst 6500/6000系列交换机 — 将终端连接到Catalyst交换机上的控制台端口和将调制解调器连接到Catalyst交换机上的控制台端口的“连接终端”部分

2. 配置交换机进行基本管理。

使用以下命令集配置Catalyst交换机以进行管理：

Console> enable) set system name Cat5500

!--- Configure the system name.

System name set.

Cat5500> (enable) set interface sc0 172.16.80.40 255.255.255.0

!--- Configure the IP address.

Interface sc0 IP address and netmask set.

Cat5500> (enable) set ip route 0.0.0.0 172.16.80.1

!--- Configure the default gateway.

注意：如果要管理位于路由器另一端的交换机，则需要在交换机上配置默认网关，因为交换机不参与IP路由，因此不知道网络的第3层拓扑。您也可以使用set ip route default 172.16.80.1命令来配置默认网关，而不是使用set ip route 0.0.0.0 172.16.80.1命令。

3. 在交换机上配置所需的VLAN数量。

根据网络图，您需要在交换机上配置两个新VLAN（VLAN 10和VLAN 20）。

在创建新VLAN之前，交换机必须处于VLAN中继协议(VTP)服务器模式或VTP透明模式。如果交换机为 VTP 服务器，则在添加任何 VLAN 之前必须定义 VTP 域名。无论网络中的交换机数量（一台或多台）如何，也无论您是否使用VTP将VLAN传播到网络中的其它交换机，都必须定义此设置。有关VTP的详细信息，请参阅本文档：

- 了解和配置 VLAN 中继协议 (VTP)

交换机上的默认VTP配置是：

Cat5500> (enable) show vtp domain

Domain Name                      Domain Index VTP Version Local Mode  Password

-------------------------------- ------------ ----------- ----------- ----------

1            2           server      -

Vlan-count Max-vlan-storage Config Revision Notifications

---------- ---------------- --------------- -------------

5          1023             0               disabled

Last Updater    V2 Mode  Pruning  PruneEligible on Vlans

--------------- -------- -------- -------------------------

0.0.0.0         disabled disabled 2-1000

使用set vtp命令设置域名和模式：

Cat5500> (enable) set vtp domain mode transparent

VTP domain  modified

!--- Set the VTP mode.

Cat5500> (enable) set vtp domain cisco

VTP domain cisco modified

!--- Set the VTP domain name.

注意：  在本例中，VTP模式设置为透明。根据您的网络，相应地设置VTP模式。选择透明模式是为了避免受到其他交换机的影响，并避免影响实验中的其他交换机。

4. 发出show vtp domain命令检验VTP配置：

Cat5500> (enable) show vtp domain

Domain Name                      Domain Index VTP Version Local Mode  Password

-------------------------------- ------------ ----------- ----------- ----------

cisco                            1            2           Transparent -

Vlan-count Max-vlan-storage Config Revision Notifications

---------- ---------------- --------------- -------------

5          1023             0               disabled

Last Updater    V2 Mode  Pruning  PruneEligible on Vlans

--------------- -------- -------- -------------------------

0.0.0.0         disabled disabled 2-1000

5. 在交换机上创建VLAN。

默认情况下，交换机上只有一个VLAN，名为VLAN 1。VLAN 1也称为默认VLAN。默认情况下，所有端口都属于此VLAN。此VLAN无法重命名或删除。

要创建VLAN，请使用set vlan 命令：

Cat5500> (enable) set vlan

Usage: set vlan  <mod/port>

(An example of mod/port is 1/1,2/1-12,3/1-2,4/1-12)

set vlan  [name ] [type ] [state ]

[said ] [mtu ] [ring ]

[decring ]

[bridge ] [parent ]

[mode ] [stp ]

[translation ] [backupcrf <off/on>

[aremaxhop ] [stemaxhop ]

(name = 1..32 characters, state = (active, suspend)

type = (ethernet, fddi, fddinet, trcrf, trbrf)

said = 1..4294967294, mtu = 576..18190

hex_ring_number = 0x1..0xfff, decimal_ring_number = 1..4095

bridge_number = 0x1..0xf, parent = 2..1005, mode = (srt, srb)

stp = (ieee, ibm, auto), translation = 1..1005

hopcount = 1..13)

Set vlan commands:

----------------------------------------------------------------------------

set vlan                     Set vlan information

set vlan mapping             Map an 802.1Q vlan to an Ethernet vlan

set vlan                     Vlan number(s)

Cat5500> (enable) set vlan 10

!--- Create VLAN 10.

VTP advertisements transmitting temporarily stopped

and will resume after the command finishes.

Vlan 10 configuration successful

Cat5500> (enable) set vlan 20

!--- Create VLAN 20.

VTP advertisements transmitting temporarily stopped

and will resume after the command finishes.

Vlan 20 configuration successful

Cat5500> (enable) set vlan 10 4/1-12

!--- Add ports to VLAN 10.

VLAN 10 modified.

VLAN 1 modified.

VLAN  Mod/Ports

---- -----------------------

10    4/1-12

Cat5500> (enable) set vlan 20 4/13-20

!--- Add ports to VLAN 20.

VLAN 20 modified.

VLAN 1 modified.

VLAN  Mod/Ports

---- -----------------------

20    4/13-20

Cat5500> (enable) show vlan

VLAN Name                             Status    IfIndex Mod/Ports, Vlans

---- -------------------------------- --------- ------- ------------------------

1    default                          active    443     1/1-2

3/1-3

4/21-24

11/1-48

12/1-2

10   VLAN0010                         active    448     4/1-12

20   VLAN0020                         active    449     4/13-20

1002 fddi-default                     active    444

1003 token-ring-default               active    447

1004 fddinet-default                  active    445

1005 trnet-default                    active    446

VLAN Type  SAID       MTU   Parent RingNo BrdgNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ ------ ---- -------- ------ ------

1    enet  100001     1500  -      -      -      -    -        0      0

10   enet  100010     1500  -      -      -      -    -        0      0

20   enet  100020     1500  -      -      -      -    -        0      0

1002 fddi  101002     1500  -      -      -      -    -        0      0

1003 trcrf 101003     1500  -      -      -      -    -        0      0

1004 fdnet 101004     1500  -      -      -      -    -        0      0

1005 trbrf 101005     1500  -      -      -      ibm  -        0      0

!--- Output suppressed.

6. 在连接到工作站或服务器的端口上配置生成树协议(STP)PortFast。

发出以下命令以启用STP PortFast功能：

Cat5500> (enable) set spantree portfast 4/1-20 enable

Warning: Spantree port fast start should only be enabled on ports connected to a

single host. Connecting

hubs, concentrators, switches, bridges, etc. to a fast start port can cause

temporary spanning tree loops.

Use with caution.

Spantree ports 4/1-20 fast start enabled.

注意：此步骤是可选的，但在连接到常规工作站或服务器的端口上启用STP PortFast是一种好做法。有关为什么启用PortFast的详细信息，请参阅本文档：

- 使用 PortFast 和其他命令解决工作站启动连接延迟问题

7. 在路由器模块上为要路由流量的每个VLAN配置VLAN接口。

通过发出session module#命令访问路由器模块，其中module#是路由器模块所在的插槽。在示例中，RSM位于插槽7中，如下所示：

Cat5500> (enable) show module 7

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

7   7    1     Route Switch              WS-X5302            no  ok

Mod Module-Name         Serial-Num

--- ------------------- --------------------

7                       00006591991

Mod MAC-Address(es)                        Hw     Fw         Sw

--- -------------------------------------- ------ ---------- -----------------

7   00-e0-1e-91-b5-08 to 00-e0-1e-91-b5-09 4.5    20.20      12.0(5)W5(12)

Cat5500> (enable) session 7

Trying Router-7...

Connected to Router-7.

Escape character is '^]'.

Router>

8. 在路由器模块上配置使能口令和Telnet口令。

同样，此步骤是可选的，但如果您尝试通过Telnet直接访问路由器模块，而不是通过Supervisor引擎访问，则需要Telnet密码。使用以下命令集在路由器模块上配置口令：

Router> enable

Router# configure terminal

!--- Enter the global configuration mode.

Enter configuration commands, one per line.  End with CNTL/Z.

Router(config)# enable password cisco

!--- Set enable password.

Router(config)# line vty 0 4

Router(config-line)# login

Router(config-line)# password cisco

!--- Set Telnet password.

Router(config-line)# end

Router#

05:22:40: %SYS-5-CONFIG_I: Configured from console by vty0 (127.0.0.2)

Router#

9. 创建两个VLAN接口，为这些VLAN接口分配IP地址，并在模块上启用路由。

注意：此步骤是配置VLAN间路由的关键。

注意：在路由器模块上，VLAN接口是虚拟接口，但它们被配置为物理接口。

在特权执行模式下发出以下命令集：

Router# configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

!--- Configure interface VLAN 1 and assign it an IP address. !--- An interface VLAN 1 is configured for management purposes only !--- so that you can establish a Telnet session or ping the switch !--- from the workstation.

Router(config)# interface vlan 1

Router(config-if)# no shutdown

Router(config-if)# ip address 172.16.80.79 255.255.255.0

Router(config-if)# exit

!--- Configure interface VLAN 10 and assign it an IP address.

Router(config)# interface vlan 10

Router(config-if)# no shutdown

Router(config-if)# ip address 10.10.10.1 255.255.255.0

Router(config-if)# exit

!--- Configure interface VLAN 20 and assign it an IP address.

Router(config)# interface vlan 20

Router(config-if)# ip address 10.10.11.1 255.255.255.0

Router(config-if)# no shutdown

Router(config)# ip routing

!--- Enable routing protocol on the module. !--- The following two commands are optional; !--- they are only used if you have multiple routers in your network. !--- Depending on your network, you may want to use a different routing protocol.

Router(config)# router rip

Router(config-router)# network 10.0.0.0

Router(config-router)# network 172.16.0.0

Router(config-router)# Ctrl-Z

Router#

07:05:17: %SYS-5-CONFIG_I: Configured from console by vty0 (127.0.0.2)

Router# write memory

!--- Save the configuration.

Building configuration...

Router#

此时，根据网络图,VLAN间配置已完成。

10. 在Router#提示符下发出exit命令，返回Supervisor引擎模块：

Router# exit

Cat5500> (enable

常见问题：VLAN接口显示down/down

本节介绍客户在尝试在Catalyst 5500/5000或Catalyst 6500/6000系列路由器模块(RSM、MSFC、RSFC)上配置VLAN接口时遇到的常见问题。

客户报告他们无法ping通路由器模块上的部分或全部已配置VLAN接口。此外，当它们发出show interface vlan vlan#命令时，它们的状态不会显示为up/up状态。他们已确保在这些接口上配置了no shutdown。唯一显示为up/up的VLAN接口是VLAN 1。

在这种情况下，如果某些或所有VLAN接口未显示/显示，您首先应检查交换机上是否存在针对相关VLAN的活动端口。

重要说明：只有在交换机（路由器接口除外）上至少有一个端口分配给该VLAN，并且该端口已连接时，路由器模块上的VLAN接口才处于up/up状态。配置为中继的端口也满足此VLAN打开/打开要求。如果不满足此条件，则路由器接口不会打开。

在网络图部分，系统警告您不要将工作站连接到Catalyst 5500交换机。此时，如果发出此组命令，您会注意到只有接口VLAN 1显示up/up，而另外两个则显示down:

Router# show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

Vlan1                      172.16.80.79    YES manual up                    up

Vlan10                     10.10.10.1      YES manual down                  down

Vlan20                     10.10.11.1      YES manual down                  down

Router# show interface vlan 1

Vlan1 is up, line protocol is up

Hardware is Cat5k Virtual Ethernet, address is 0010.f6a9.9800 (bia 0010.f6a9.9800)

Internet address is 172.16.80.79/24

MTU 1500 bytes, BW 100000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:00, output 00:00:02, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 1 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

!--- Output suppressed.

Router# show interface vlan 10

Vlan10 is down, line protocol is down

Hardware is Cat5k Virtual Ethernet, address is 0010.f6a9.9800 (bia 0010.f6a9.9800)

Internet address is 10.10.10.1/24

MTU 1500 bytes, BW 100000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:01, output 00:25:48, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

!--- Output suppressed.

Router# show interface vlan 20

Vlan20 is down, line protocol is down

Hardware is Cat5k Virtual Ethernet, address is 0010.f6a9.9800 (bia 0010.f6a9.9800)

Internet address is 10.10.11.1/24

MTU 1500 bytes, BW 100000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:01, output 00:01:04, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 2000 bits/sec, 2 packets/sec

5 minute output rate 1000 bits/sec, 2 packets/sec

!--- Output suppressed.

Router#

接口VLAN 1处于up/up状态，但在交换机上，VLAN 1中没有任何连接和活动端口。VLAN 1中有活动端口/接口，即Supervisor模块上的sc0接口。默认情况下，sc0接口是VLAN 1的成员。在交换机（Supervisor引擎）上发出以下命令以检查sc0接口配置：

Cat5500> (enable) show interface

sl0: flags=51 <UP ,POINTOPOINT ,RUNNING>

slip 0.0.0.0 dest 0.0.0.0

sc0: flags=63 <UP ,BROADCAST ,RUNNING>

vlan 1 inet 172.16.80.40 netmask 255.255.255.0 broadcast 172.16.80.255

Cat5500> (enable)

此时，将端口4/1上的workstation1连接到端口4/13上的workstation2。在交换机上发出show port 4/1和show port 4/13命令，确保这些端口显示连接状态：

Cat5500> (enable) show port 4/1

Port  Name               Status     Vlan       Level  Duplex Speed Type

----- ------------------ ---------- ---------- ------ ------ ----- ------------

4/1                     connected  10         normal a-half  a-10 10/100BaseTX

!--- Output suppressed.

Cat5500> (enable) show port 4/13

Port  Name               Status     Vlan       Level  Duplex Speed Type

----- ------------------ ---------- ---------- ------ ------ ----- ------------

4/13                    connected  20         normal a-full a-100 10/100BaseTX

!--- Output suppressed.

Cat5500> (enable)

现在，登录路由器模块并检查接口VLAN 10和VLAN 20的状态。您应该会看到它们处于up/up状态。发出以下命令集，检查路由器模块上VLAN接口的状态：

Cat5500> (enable) session 7

Trying Router-7...

Connected to Router-7.

Escape character is '^]'.

User Access Verification

Password:

!--- Enter the password; in this case, it is cisco.

Router> enable

Password:

!--- Enter the password; in this case, it is cisco.

Router# show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

Vlan1                      172.16.80.79    YES manual up                    up

Vlan10                     10.10.10.1      YES manual up                    up

Vlan20                     10.10.11.1      YES manual up                    up

Router# show interface vlan 10

Vlan10 is up, line protocol is up

Hardware is Cat5k Virtual Ethernet, address is 0010.f6a9.9800 (bia 0010.f6a9.9800)

Internet address is 10.10.10.1/24

MTU 1500 bytes, BW 100000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:01, output 00:46:14, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

!--- Output suppressed.

Router# show interface vlan 20

Vlan20 is up, line protocol is up

Hardware is Cat5k Virtual Ethernet, address is 0010.f6a9.9800 (bia 0010.f6a9.9800)

Internet address is 10.10.11.1/24

MTU 1500 bytes, BW 100000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:00, output 00:00:56, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 2000 bits/sec, 5 packets/sec

5 minute output rate 2000 bits/sec, 2 packets/sec

!--- Output suppressed.

Router# exit

Cat5500> (enable)

检查配置

可以执行多次ping测试以验证本文档中介绍的配置。在本节中，您使用workstation2对workstation1、交换机的sc0接口和路由器模块的VLAN接口执行ping操作。

注意：确保已将工作站上的默认网关设置为路由器模块上的VLAN接口。根据网络图，工作站1的默认网关设置为10.10.10.1,工作站2的默认网关设置为10.10.11.1。

测试 1：从工作站2 ping工作站1

C:\> ipconfig

!--- This command is used to check the IP configuration on the !--- Windows 2000 workstation. Use the appropriate commands on the workstations !--- that you use.

Windows 2000 IP Configuration

Ethernet adapter Local Area Connection:

Connection-specific DNS Suffix  . :

IP Address. . . . . . . . . . . . : 10.10.11.254

Subnet Mask . . . . . . . . . . . : 255.255.255.0

Default Gateway . . . . . . . . . : 10.10.11.1

C:\> ping 10.10.10.254

Pinging 10.10.10.254 with 32 bytes of data:

Reply from 10.10.10.254: bytes=32 time=10ms TTL=31

Reply from 10.10.10.254: bytes=32 time<10ms TTL=31

Reply from 10.10.10.254: bytes=32 time<10ms TTL=31

Reply from 10.10.10.254: bytes=32 time<10ms TTL=31

Ping statistics for 10.10.10.254:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum =  10ms, Average =  2ms

测试 2：从Workstation2 ping Supervisor引擎上的sc0接口

C:\> ping 172.16.80.40

Pinging 172.16.80.40 with 32 bytes of data:

Reply from 172.16.80.40: bytes=32 time<10ms TTL=59

Reply from 172.16.80.40: bytes=32 time<10ms TTL=59

Reply from 172.16.80.40: bytes=32 time<10ms TTL=59

Reply from 172.16.80.40: bytes=32 time<10ms TTL=59

Ping statistics for 172.16.80.40:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum =  0ms, Average =  0ms

测试 3：从Workstation2 ping路由器模块上的接口VLAN 1

C:\> ping 172.16.80.79

Pinging 172.16.80.79 with 32 bytes of data:

Reply from 172.16.80.79: bytes=32 time<10ms TTL=255

Reply from 172.16.80.79: bytes=32 time<10ms TTL=255

Reply from 172.16.80.79: bytes=32 time<10ms TTL=255

Reply from 172.16.80.79: bytes=32 time<10ms TTL=255

Ping statistics for 172.16.80.79:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum =  0ms, Average =  0ms

测试 4：从Workstation2 ping路由器模块上的接口VLAN 10

C:\> ping 10.10.10.1

Pinging 10.10.10.1 with 32 bytes of data:

Reply from 10.10.10.1: bytes=32 time<10ms TTL=255

Reply from 10.10.10.1: bytes=32 time<10ms TTL=255

Reply from 10.10.10.1: bytes=32 time<10ms TTL=255

Reply from 10.10.10.1: bytes=32 time<10ms TTL=255

Ping statistics for 10.10.10.1:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum =  0ms, Average =  0ms

测试 5：从Workstation2 ping路由器模块上的接口VLAN 20

C:\> ping 10.10.11.1

Pinging 10.10.11.1 with 32 bytes of data:

Reply from 10.10.11.1: bytes=32 time<10ms TTL=255

Reply from 10.10.11.1: bytes=32 time<10ms TTL=255

Reply from 10.10.11.1: bytes=32 time<10ms TTL=255

Reply from 10.10.11.1: bytes=32 time<10ms TTL=255

Ping statistics for 10.10.11.1:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum =  0ms, Average =  0ms

Appendix

Supervisor引擎模块配置

Cat5500> (enable) show config

This command shows non-default configurations only.

Use show config all to show both default and non-default configurations.

...

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Tue Apr 10 2001, 09:09:54

!

#version 6.1(1)

!

set option fddi-user-pri enabled

set password $2$lx7B$WipkVnLnbYIfrBSqD2SN9.

set enablepass $2$6/eK$I3lDb2nnP7Fc9JKF3XwRW/

set prompt Cat5500>

!

#errordetection

set errordetection portcounter enable

!

#system

set system name  Cat5500

!

#frame distribution method

set port channel all distribution mac both

!

#vtp

set vtp domain cisco

set vtp mode transparent

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state active stp ieee

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state active stp ibm

set vlan 10,20

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state active

mode srb aremaxhop 7 stemaxhop 7 backupcrf off

!

#ip

set interface sc0 1 172.16.80.40/255.255.255.0 172.16.80.255

set ip route 0.0.0.0/0.0.0.0         172.16.80.79

!

#set boot command

set boot config-register 0x2102

clear boot system all

!

# default port status is enable

!

!

#module 1 : 2-port 1000BaseSX Supervisor

!

#module 2 : 4-port 10/100BaseTX Supervisor

!

#module 3 : 3-port 1000BaseX Ethernet

!

#module 4 : 24-port 10/100BaseTX Ethernet

set vlan 10   4/1-12

set vlan 20   4/13-20

set spantree portfast    4/1-20 enable

!

#module 5 : 2-port MM OC-3 Dual-Phy ATM

!

#module 6 empty

!

#module 7 : 1-port Route Switch

!

#module 8 empty

!

#module 9 empty

!

#module 10 empty

!

#module 11 : 48-port 10BaseT Ethernet

!

#module 12 : 2-port MM MIC FDDI

!

#module 13 empty

end

Cat5500> (enable)

RSM配置

Router# show running-config

Building configuration...

Current configuration:

!

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Router

!

enable password cisco

!

ip subnet-zero

ip cef

!

!

process-max-time 200

!

interface Vlan1

ip address 172.16.80.79 255.255.255.0

no ip directed-broadcast

!

interface Vlan10

ip address 10.10.10.1 255.255.255.0

no ip directed-broadcast

!

interface Vlan20

ip address 10.10.11.1 255.255.255.0

no ip directed-broadcast

!

ip classless

!

!

line con 0

transport input none

line aux 0

line vty 0 4

password cisco

login

!

end

Router#

相关信息

- Catalyst 4000 系列 (WS-X4232-L3) 上路由器模块的配置与概述

- 使用 PortFast 和其他命令解决工作站启动连接延迟问题

- LAN 产品支持页

- LAN 交换技术支持页

- 技术支持 - Cisco Systems