目录

简介

先决条件

要求

使用的组件

规则

背景信息

配置

网络图

配置

验证

故障排除

相关信息

简介

本文提供一个示例配置，关于MDS基本的TCP/IP光纤信道 (FCIP)多层导向交换机(MDS)。

此配置示例与 SAN-OS 的 1.2 和 1.3 版本有关。SAN-OS 2.0 版本中的一些参数发生了变化。请参考 2.0 SAN-OS 配置指南和版本说明。

FCIP描述了在基于IP的光纤信道(FC)存储区域网络（SAN）岛实现互连的机制，以便在单个FC光组织中组成统一的SAN。FCIP依靠基于IP的网络服务，在通过局域网、城域网或广域网的SAN岛之间提供连连通性。

由 FCIP 连接的光纤通道 SAN

FCIP 在端口 3225 上使用传输控制协议 (TCP) 作为一种网络层传输技术。

先决条件

要求

IP骨干网必须是可运行的，并提供所需的带宽，以支持在FCIP链路上 - 可能是第二层(L2)拓扑或第三层(L3)拓扑 - 运行的应用。如果必须配置L3、中间路由器或多层交换机来正确转发FCIP隧道的IP数据流源IP地址和目的地IP地址。如果在FCIP对等体路径上的任何网络设备中强制执行服务质量（QoS）或流量整形，那么在MDS FCIP配置文件上配置任何TCP的相关参数和功能之前，应参考管理IP结构的网络管理器，以了解必要的详细资料。

使用的组件

本文档中的信息基于下列软件和硬件版本：

- 具备 IP Storage (IPS) 服务模块 (DS-X9308-SMIP) 1.2.(2a) 运行版本的 MDS 9509

- 具备 IPS 服务模块 (DS-X9308-SMIP) 1.2.(2a) 运行版本的 MDS 9509

- 带有Emulex LP9K HBA的Win2003服务器(HPQ Pro-Liant-P4)

- IBM 存储阵列 (ESS-2105-F20)

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文件规则的更多信息请参见“ Cisco技术提示规则”。

背景信息

FCIP 包括以下规格：

ANSI T11

1. FC-SW-2描述FC交换机的操作和交互作用包括E_Port和结构操作。

2. FC-BB-2是适合通过TCP网络主干的FC交换网络扩展的映射，它同时还定义了支持E_端口 和B_端口的参考模型。

IETF IPS 工作组

1. TCP的FC包括在一个IP网络上传输FC帧的TCP/IP要求。

2. FC 帧封装可定义普通的光纤封装格式。

在2个SAN交换机或整个FCIP上的结构互连被称为FCIP链路，它能包含一条或多条TCP连接。FCIP链路的每个结尾与虚拟E端口(VE_端口)或B_端口连接，这取决于实施情况。FC-BB 和 FC-BB-2 可描述两种方法之间的区别。IP业务模块(DS-X9308-SMIP)支持两种模式，但默认为VE_Port，如果所有相关对等体都是DS-X9308-SMIP模块，VE_Port也是推荐运行的模式。MDS平台上的VE_Port功能还支持TE 端口功能，此功能使它能够在一个FCIP实例上支持来自多个VSAN的中继数据流。

配置

在MDS上，您需要用适于两个平台的IPS配置指南进行自我熟悉。手册的最新版本为配置 IP 存储。

网络图

本文档使用下图所示的网络设置。

此图表显示了一个典型的实验室设置，其中没有其它的网络设备在两台MDS交换机的两个千兆以太网(GE)接口之间连接。这是 FCIP安装的MDS的最简单形式，一般用于用户实验室，以验证基本功能。在 VSAN 600 中，Emulex LightPulse 9000 HBA 将 Windows 2003 服务器连接至 MDS 9509 (Bison)，将 IBM 存储阵列连接至 MDS9216 (Canterbury)，在其中可配置 Windows 2003 服务器的 LUN。

Agilent SAN测试设备用作仿真器，用两个装置安装VSAN 601，并且生成大量的FC-2非-FCP后台流量。增加外围设备使配置更可实现，并可在两台参与交换机的被分配名称服务器中拥有大量条目。本文不关注端到端连通性，不包括服务器或存储阵列的截屏画面。外围设备不了解FCIP，并且它的运行就好象两个MDS之间的EISL链路在一条正常FC链路上运行一样。

配置

本文档使用如下所示的配置。

- 具备 IPS-8 模块的 MDS9509 (Bison)

- 具备 IPS-8 模块的 MDS9216 (Canterbury)

具备 IPS-8 模块的 MDS9509 (Bison)

bison# sh ver

Cisco Storage Area Networking Operating System (SAN-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2003 by Cisco Systems, Inc. All rights reserved.

The copyright for certain works contained herein are owned by

Andiamo Systems, Inc. and/or other third parties and are used and

distributed under license.

Software

BIOS: version 1.0.8

loader: version 1.2(2)

kickstart: version 1.2(2a)

system: version 1.2(2a)

BIOS compile time: 08/07/03

kickstart image file is: bootflash:/k122a

kickstart compile time: 9/23/2003 11:00:00

system image file is: bootflash:/s122a

system compile time: 10/8/2003 18:00:00

Hardware

RAM 1024584 kB

bootflash: 500736 blocks (block size 512b)

slot0: 0 blocks (block size 512b)

bison uptime is 1 days 15 hours 45 minute(s) 44 second(s)

Last reset

Reason: Unknown

System version: 1.2(2a)

Service:

bison# sh run

Building Configuration ...

fcip profile 1

ip address 100.100.100.1

!--- FCIP profile 1 is bound to the local relevant IPS interface. In this !--- example, it is the IP address of interface Gig4/1.

vsan database

vsan 600

vsan 601

fcdomain priority 1 vsan 1

fcdomain domain 1 preferred vsan 1

fcdomain domain 1 preferred vsan 600

fcdomain domain 1 preferred vsan 601

interface fcip1

no shutdown

switchport trunk allowed vsan 600-601

use-profile 1

peer-info ipaddr 100.100.100.2

!--- Interface FCIP 1 is configured to act as an EISL port carrying traffic !--- for both VSAN 600 and VSAN 601 across the tunnel. The FCIP interface, !--- in most respects, is configured identical then any normal FC interface !--- acting as ISL or EISL. Bind this interface to FCIP profile 1, and define !--- the peer-ip address 100.100.100.2, which is the address of the MDS9216's !--- Gig 2/1 interface in the example.

vsan database

vsan 600 interface fc3/1

vsan 601 interface fc3/2

vsan 601 interface fc3/8

vsan 600 interface fc3/16

zone name z-fcip2 vsan 600

member pwwn 50:05:07:63:00:d0:94:4c

member pwwn 10:00:00:00:c9:32:a6:e3

zone name Zone_a1 vsan 601

member pwwn 10:00:00:00:00:01:00:00

member pwwn 10:00:00:00:00:05:00:00

zoneset distribute full vsan 600

zoneset name zs-fcip2 vsan 600

member z-fcip2

zoneset name Agilent_1 vsan 601

member Zone_a1

zoneset activate name zs-fcip2 vsan 600

zoneset activate name Agilent_1 vsan 601

interface GigabitEthernet4/1

ip address 100.100.100.1 255.255.255.252

no shutdown

!--- Note that Gig4/1 in the default state is configured with an MTU size of !--- 1500 bytes, if the network topology allows for larger end-to-end frame !--- sizes known as jumbo frames. !--- The default value may be changed to a higher value. A good value is !--- 3000 bytes, because this would avoid the fragmentation of full 2048 FC !--- frames into multiple TCP segments. Not all networking equipment can handle !--- jumbo frames, so the default value of 1500 bytes is a conservative !--- approach to avoid connectivity issues while bringing up the FCIP tunnel.

具备 IPS-8 模块的 MDS9216 (Canterbury)

canterbury# sh ver

Cisco Storage Area Networking Operating System (SAN-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2003 by Cisco Systems, Inc. All rights reserved.

The copyright for certain works contained herein are owned by

Andiamo Systems, Inc. and/or other third parties and are used and

distributed under license.

Software

BIOS: version 1.0.8

loader: version 1.2(2)

kickstart: version 1.2(2a)

system: version 1.2(2a)

BIOS compile time: 08/07/03

kickstart image file is: bootflash:/k122a

kickstart compile time: 9/23/2003 11:00:00

system image file is: bootflash:/s122a

system compile time: 10/8/2003 18:00:00

Hardware

RAM 960072 kB

bootflash: 500736 blocks (block size 512b)

slot0: 0 blocks (block size 512b)

canterbury uptime is 6 days 22 hours 35 minute(s) 37 second(s)

Last reset at 995484 usecs after Wed Nov 5 15:05:04 2003

Reason: Reset by installer

System version: 1.2(1a)

Service:

canterbury# sh run

Building Configuration ...

fcip profile 1

ip address 100.100.100.2

!--- At this side of the tunnel, choose the same profile number that you !--- used on the peer to make management easier. This is not mandatory, !--- and you can choose another value between 1 and 255.

vsan database

vsan 600

vsan 601

fcdomain domain 2 preferred vsan 600

fcdomain domain 2 preferred vsan 601

interface fcip1

no shutdown

switchport trunk allowed vsan 600-601

use-profile 1

peer-info ipaddr 100.100.100.1

!--- FCIP interface 1 is chosen for arbitrary reasons. You can choose another !--- FCIP number and still tunnel to the peer FCIP 1 instance. !--- It is important that you bind the correct profile-id to your FCIP interface !--- of choice. Allow the same VSANs that you allowed on the peer FCIP interface, !--- which is good practice in general for normal EISL trunks. The peer ip-address !--- is the IP address of the MDS9505s interface Gig4/1 !--- in the Network Diagram above.

vsan database

vsan 600 interface fc1/1

vsan 601 interface fc1/8

vsan 600 interface fc1/16

zone name z-fcip2 vsan 600

member pwwn 50:05:07:63:00:d0:94:4c

member pwwn 10:00:00:00:c9:32:a6:e3

zone default-zone permit vsan 777

zoneset distribute full vsan 600

zoneset name zs-fcip2 vsan 600

member z-fcip2

zoneset activate name zs-fcip2 vsan 600

zoneset activate name Agilent_1 vsan 601

interface GigabitEthernet2/1

ip address 100.100.100.2 255.255.255.252

no shutdown

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

- show interface gig x/y - 显示绑定到 FCIP 配置文件的相关千兆接口的状态。

- show ips stats tcp int gig x/y---显示相关千兆接口的TCP统计数据和活动连接。

- show ips arp int gig x/y - 显示相关千兆接口的所有地址解析协议 (ARP) 条目；对端的下一跳应该是存在于此列表中。

- show ips ip route int gig x/y - 显示通过相关千兆接口的特定路由。

- show interface fcip x——显示FCIP接口状态和与此FCIP隧道相关的全部详情。

- show profile fcip x ——显示文件夹所捆绑的IP地址，以及所有配置的TCP参数。

- show int fcip x counters——用于检查是否有任何帧通过FCIP隧道。

- show fcdomain vsan x - 列出所有与域相关的详细信息；过去常常验证结构在FCIP隧道间被形成。

- show fcns da vsan x ---显示与VSAN相关的所有pwwn、FC4-类型和FCID;用于验证所有期望的条目通过FCIP隧道被分配。

故障排除

务必多次发出上述 show 命令以建立计数器历史记录。与时点无有关并且只收集一次的计数器通常没有用。

请使用下方所示的配置进行更多故障排除。

- MDS9509 (Bison)

- MDS9216 (Canterbury)

MDS9509 (Bison)

GigabitEthernet4/1 is up

Hardware is GigabitEthernet, address is 0005.3000.a85a

Internet address is 100.100.100.1/30

MTU 1500  bytes   !...default value

Port mode is IPS

Speed is 1 Gbps

Beacon is turned off

Auto-Negotiation is turned on

5 minutes input rate 320 bits/sec, 40 bytes/sec, 0 frames/sec

5 minutes output rate 312 bits/sec, 39 bytes/sec, 0 frames/sec

933169199 packets input, 998306879592 bytes

12 multicast frames, 0 compressed

0 input errors, 0 frame, 0 overrun 0 fifo

337209366 packets output, 214303313560 bytes, 0 underruns

0 output errors, 0 collisions, 0 fifo

0 carrier errors

bison# sh ips stats tcp int gig 4/1

TCP Statistics for port GigabitEthernet4/1

Connection Stats

272 active openings, 107 accepts

206 failed attempts, 0 reset received, 163 established

Segment stats

932985717 received, 337201993 sent, 7 retransmitted

0 bad segments received, 103 reset sent

TCP Active Connections

Local Address Remote Address State Send-Q Recv-Q

100.100.100.1:3225 100.100.100.2:65128 ESTABLISH 0 0

100.100.100.1:3225 100.100.100.2:65130 ESTABLISH 0 0

100.100.100.1:3225 0.0.0.0:0 LISTEN 0 0

!--- By default, MDS establishes two TCP connections per FCIP tunnel instance.

bison# sh ips stats tcp int gig 4/1 de

TCP Statistics for port GigabitEthernet4/1

TCP send stats

337202017 segments, 222637392068 bytes

130562402 data, 205533417 ack only packets

503 control (SYN/FIN/RST), 0 probes, 1105737 window updates

7 segments retransmitted, 2208 bytes

4 retransmitted while on ethernet send queue, 40061909 packets split

250922624 delayed acks sent

TCP receive stats

932985742 segments, 921498012 data packets in sequence,

936715052100 bytes in sequence

770241 predicted ack, 856752348 predicted data

0 bad checksum, 0 multi/broadcast, 0 bad offset

0 no memory drops, 0 short segments

0 duplicate bytes, 16 duplicate packets

0 partial duplicate bytes, 0 partial duplicate packets

53128 out-of-order bytes, 165 out-of-order packets

0 packet after window, 0 bytes after window

5 packets after close

76225562 acks, 192030009160 ack bytes, 0 ack toomuch, 5851 duplicate acks

0 ack packets left of snd_una, 0 non-4 byte aligned packets

9124012 window updates, 0 window probe

1381 pcb hash miss, 984 no port, 103 bad SYN, 0 paws drops

TCP Connection Stats

272 attempts, 107 accepts, 163 established

511 closed, 3 drops, 206 conn drops

3 drop in retransmit timeout, 20 drop in keepalive timeout

0 drop in persist drops, 0 connections drained

TCP Miscellaneous Stats

61792500 segments timed, 76225541 rtt updated

124 retransmit timeout, 0 persist timeout

5760 keepalive timeout, 5740 keepalive probes

TCP SACK Stats

0 recovery episodes, 0 data packets, 0 data bytes

0 data packets retransmitted, 0 data bytes retransmitted

0 connections closed, 0 retransmit timeouts

TCP SYN Cache Stats

107 entries, 107 connections completed, 0 entries timed out

0 dropped due to overflow, 0 dropped due to RST

0 dropped due to ICMP unreach, 0 dropped due to bucket overflow

0 abort due to no memory, 0 duplicate SYN, 0 no-route SYN drop

0 hash collisions, 0 retransmitted

TCP Active Connections

Local Address Remote Address State Send-Q Recv-Q

100.100.100.1:3225 100.100.100.2:65128 ESTABLISH 0 0

100.100.100.1:3225 100.100.100.2:65130 ESTABLISH 0 0

100.100.100.1:3225 0.0.0.0:0 LISTEN 0 0

bison#

bison# sh ips stats tcp int gig 4/1 de

TCP Statistics for port GigabitEthernet4/1

TCP send stats

337202017 segments, 222637392068 bytes

130562402 data, 205533417 ack only packets

503 control (SYN/FIN/RST), 0 probes, 1105737 window updates

7 segments retransmitted, 2208 bytes

4 retransmitted while on ethernet send queue, 40061909 packets split

250922624 delayed acks sent

TCP receive stats

932985742 segments, 921498012 data packets in sequence,

936715052100 bytes in sequence

770241 predicted ack, 856752348 predicted data

0 bad checksum, 0 multi/broadcast, 0 bad offset

0 no memory drops, 0 short segments

0 duplicate bytes, 16 duplicate packets

0 partial duplicate bytes, 0 partial duplicate packets

53128 out-of-order bytes, 165 out-of-order packets

0 packet after window, 0 bytes after window

5 packets after close

76225562 acks, 192030009160 ack bytes, 0 ack toomuch, 5851 duplicate acks

0 ack packets left of snd_una, 0 non-4 byte aligned packets

9124012 window updates, 0 window probe

1381 pcb hash miss, 984 no port, 103 bad SYN, 0 paws drops

TCP Connection Stats

272 attempts, 107 accepts, 163 established

511 closed, 3 drops, 206 conn drops

3 drop in retransmit timeout, 20 drop in keepalive timeout

0 drop in persist drops, 0 connections drained

TCP Miscellaneous Stats

61792500 segments timed, 76225541 rtt updated

124 retransmit timeout, 0 persist timeout

5760 keepalive timeout, 5740 keepalive probes

TCP SACK Stats

0 recovery episodes, 0 data packets, 0 data bytes

0 data packets retransmitted, 0 data bytes retransmitted

0 connections closed, 0 retransmit timeouts

TCP SYN Cache Stats

107 entries, 107 connections completed, 0 entries timed out

0 dropped due to overflow, 0 dropped due to RST

0 dropped due to ICMP unreach, 0 dropped due to bucket overflow

0 abort due to no memory, 0 duplicate SYN, 0 no-route SYN drop

0 hash collisions, 0 retransmitted

TCP Active Connections

Local Address Remote Address State Send-Q Recv-Q

100.100.100.1:3225 100.100.100.2:65128 ESTABLISH 0 0

100.100.100.1:3225 100.100.100.2:65130 ESTABLISH 0 0

100.100.100.1:3225 0.0.0.0:0 LISTEN 0 0

bison#

!--- Most of the TCP details displayed above can be used to determine the !--- health of your FCIP tunnel, provided that there is a one-to-one relationship !--- between the FCIP tunnel and the physical interface. Note that for this !--- particular FCIP instance, both TCP connections were initiated from this peer, !--- which you can derive from the local address x.x.x.x:3225 statement.

bison# sh ips arp interface gig 4/1

Protocol Address Age (min) Hardware Addr Type Interface

Internet 100.100.100.2 9 0005.3000.ade6 ARPA GigabitEthernet4/1

bison#

bison# sh ips ip route int gig 4/1

Codes: C - connected, S - static

No default gateway

C 100.100.100.0/30 is directly connected, GigabitEthernet4/1

bison#

!--- The FCIP tunnel is connected in a back-to-back fashion. Issue the !--- sh ips ip route command to get the directly connected IP subnet. !--- In a more realistic situation, where you would need to configure a !--- next-hop to reach the FCIP peer ip-address, this command would show !--- the configured routes through the relevant interfaces.

bison# sh fcip profile 1

FCIP Profile 1

Internet Address is 100.100.100.1 (interface GigabitEthernet4/1)

Listen Port is 3225

TCP parameters

SACK is enabled

PMTU discovery is enabled, reset timeout is 3600 sec

Keep alive is 60 sec

Minimum retransmission timeout is 200 ms

Maximum number of re-transmissions is 4

Send buffer size is 0 KB

Maximum allowed bandwidth is 1000000 kbps

Minimum available bandwidth is 15000 kbps

Estimated round trip time is 1000 usec

Congestion window monitoring is enabled, burst size is 10 KB

!--- The profile parameters are an easy way to directly verify your !--- configured TCP parameters per FCIP instance.

bison# sh int fcip 1

fcip1 is trunking

Hardware is GigabitEthernet

Port WWN is 20:c2:00:05:30:00:7a:de

Peer port WWN is 20:42:00:0c:30:6c:24:40

Admin port mode is auto, trunk mode is on

Port mode is TE

vsan is 1

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 1 (interface GigabitEthernet4/1)

Peer Information

Peer Internet address is 100.100.100.2 and port is 3225

Special Frame is disabled

Maximum number of TCP connections is 2

Time Stamp is disabled

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 100.100.100.1:3225, Remote 100.100.100.2:65128

Data connection: Local 100.100.100.1:3225, Remote 100.100.100.2:65130

272 Attempts for active connections, 58 close of connections

TCP Parameters

Path MTU 1500 bytes

Current retransmission timeout is 200 ms

Round trip time: Smoothed 2 ms, Variance: 1

Advertised window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 10 KB, Slow start threshold: 112 KB

5 minutes input rate 120 bits/sec, 15 bytes/sec, 0 frames/sec

5 minutes output rate 120 bits/sec, 15 bytes/sec, 0 frames/sec

72182460 frames input, 135382910244 bytes

34626 Class F frames input, 3190588 bytes

72147834 Class 2/3 frames input, 135379719656 bytes

0 Error frames timestamp error 0

47823751 frames output, 97610768920 bytes

34632 Class F frames output, 3194464 bytes

47789119 Class 2/3 frames output, 97607574456 bytes

0 Error frames 373 reass frames

!--- You can see the specific details per FCIP interface, as they are taken !--- into account by a running FCIP instance. You can also derive the TCP !--- parameters of the peer with this output.

bison# sh fcdomain vsan 600

The local switch is the Principal Switch.

Local switch run time information:

State: Stable

Local switch WWN: 22:58:00:05:30:00:7a:df

Running fabric name: 22:58:00:05:30:00:7a:df

Running priority: 2

Current domain ID: 0x01(1)

Local switch configuration information:

State: Enabled

FCID persistence: Disabled

Auto-reconfiguration: Disabled

Contiguous-allocation: Disabled

Configured fabric name: 20:01:00:05:30:00:28:df

Configured priority: 128

Configured domain ID: 0x01(1) (preferred)

Principal switch run time information:

Running priority: 2

Interface Role RCF-reject

---------------- ------------- ------------

fcip1 Downstream Disabled

---------------- ------------- ------------

bison# sh fcdomain vsan 601

The local switch is the Principal Switch.

Local switch run time information:

State: Stable

Local switch WWN: 22:59:00:05:30:00:7a:df

Running fabric name: 22:59:00:05:30:00:7a:df

Running priority: 2

Current domain ID: 0x01(1)

Local switch configuration information:

State: Enabled

FCID persistence: Disabled

Auto-reconfiguration: Disabled

Contiguous-allocation: Disabled

Configured fabric name: 20:01:00:05:30:00:28:df

Configured priority: 128

Configured domain ID: 0x01(1) (preferred)

Principal switch run time information:

---------------- ------------- ------------

fcip1 Downstream Disabled

---------------- ------------- ------------

bison# sh fcdomain vsan 601

The local switch is the Principal Switch.

Local switch run time information:

State: Stable

Local switch WWN: 22:59:00:05:30:00:7a:df

Running fabric name: 22:59:00:05:30:00:7a:df

Running priority: 2

Current domain ID: 0x01(1)

Local switch configuration information:

State: Enabled

FCID persistence: Disabled

Auto-reconfiguration: Disabled

Contiguous-allocation: Disabled

Configured fabric name: 20:01:00:05:30:00:28:df

Configured priority: 128

Configured domain ID: 0x01(1) (preferred)

Principal switch run time information:

Running priority: 2

Interface Role RCF-reject

---------------- ------------- ------------

fcip1 Downstream Disabled

---------------- ------------- ------------

bison#

!--- Similar to normal (E)ISL troubleshooting, verify that !--- your fabric is formed as expected.

bison# sh fcns da vsan 600-601

VSAN 600:

--------------------------------------------------------------------------

FCID TYPE PWWN (VENDOR) FC4-TYPE:FEATURE

--------------------------------------------------------------------------

0x010001 N 10:00:00:00:c9:32:a6:e3 (Emulex) scsi-fcp:init

0x020001 N 50:05:07:63:00:d0:94:4c (IBM) scsi-fcp:target fc..

Total number of entries = 2

VSAN 601:

--------------------------------------------------------------------------

FCID TYPE PWWN (VENDOR) FC4-TYPE:FEATURE

--------------------------------------------------------------------------

0x010001 N 10:00:00:00:c9:32:a6:e2 (Emulex) scsi-fcp:init

0x010100 N 10:00:00:00:00:05:00:00

0x020100 N 10:00:00:00:00:01:00:00

Total number of entries = 3

MDS9216 (Canterbury)

canterbury# sh int gig 2/1

GigabitEthernet2/1 is up

Hardware is GigabitEthernet, address is 0005.3000.ade6

Internet address is 100.100.100.2/30

MTU 1500  bytes

Port mode is IPS

Speed is 1 Gbps

Beacon is turned off

Auto-Negotiation is turned on

5 minutes input rate 312 bits/sec, 39 bytes/sec, 0 frames/sec

5 minutes output rate 312 bits/sec, 39 bytes/sec, 0 frames/sec

337277325 packets input, 214308964948 bytes

12 multicast frames, 0 compressed

0 input errors, 0 frame, 0 overrun 0 fifo

932989688 packets output, 998294817662 bytes, 0 underruns

0 output errors, 0 collisions, 0 fifo

0 carrier errors

canterbury# sh ips arp int gig 2/1

Protocol         Address   Age (min)   Hardware Addr  Type   Interface

Internet   100.100.100.1        7     0005.3000.a85a  ARPA  GigabitEthernet2/1

canterbury#

canterbury# sh ips ip route int gig 2/1

Codes: C - connected, S - static

No default gateway

C 100.100.100.0/30 is directly connected, GigabitEthernet2/1

canterbury#

canterbury# sh ips stats tcp int gig 2/1 de

TCP Statistics for port GigabitEthernet2/1

TCP send stats

932982227 segments, 1022389174048 bytes

921498559 data, 11061499 ack only packets

401 control (SYN/FIN/RST), 0 probes, 421342 window updates

454 segments retransmitted, 972180 bytes

291 retransmitted while on ethernet send queue, 223642028 packets split

76162595 delayed acks sent

TCP receive stats

337204879 segments, 130561386 data packets in sequence,

192030387428 bytes in sequence

156457374 predicted ack, 65996627 predicted data

0 bad checksum, 0 multi/broadcast, 0 bad offset

0 no memory drops, 0 short segments

48 duplicate bytes, 3542 duplicate packets

48 partial duplicate bytes, 1 partial duplicate packets

4336 out-of-order bytes, 131 out-of-order packets

0 packet after window, 0 bytes after window

0 packets after close

268794983 acks, 936715866930 ack bytes, 0 ack toomuch, 4152 duplicate acks

0 ack packets left of snd_una, 0 non-4 byte aligned packets

50179371 window updates, 0 window probe

1251 pcb hash miss, 1061 no port, 0 bad SYN, 0 paws drops

TCP Connection Stats

204 attempts, 73 accepts, 155 established

357 closed, 64 drops, 70 conn drops

4 drop in retransmit timeout, 10 drop in keepalive timeout

0 drop in persist drops, 0 connections drained

TCP Miscellaneous Stats

233047332 segments timed, 268794618 rtt updated

105 retransmit timeout, 0 persist timeout

105 keepalive timeout, 94 keepalive probes

TCP SACK Stats

3 recovery episodes, 25938540 data packets, 71110030772 data bytes

180 data packets retransmitted, 272884 data bytes retransmitted

1 connections closed, 388 retransmit timeouts

TCP SYN Cache Stats

93 entries, 73 connections completed, 0 entries timed out

0 dropped due to overflow, 18 dropped due to RST

0 dropped due to ICMP unreach, 0 dropped due to bucket overflow

0 abort due to no memory, 6 duplicate SYN, 0 no-route SYN drop

0 hash collisions, 8 retransmitted

TCP Active Connections

Local Address Remote Address State Send-Q Recv-Q

100.100.100.2:65128 100.100.100.1:3225 ESTABLISH 0 0

100.100.100.2:65130 100.100.100.1:3225 ESTABLISH 0 0

100.100.100.2:3225 0.0.0.0:0 LISTEN 0 0

0.0.0.0:3260 0.0.0.0:0 LISTEN 0 0

canterbury#

!--- This MDS initiated both TCP connections for FCIP 1. Although no passive !--- statement was configured on the peer MDS, MDS9216 Canterbury has the !--- highest IP address configured on the tunnel. This makes the other side !--- disconnect its TCP connection.

canterbury# sh fcip profile 1

FCIP Profile 1

Internet Address is 100.100.100.2 (interface GigabitEthernet2/1)

Listen Port is 3225

TCP parameters

SACK is enabled

PMTU discovery is enabled, reset timeout is 3600 sec

Keep alive is 60 sec

Minimum retransmission timeout is 200 ms

Maximum number of re-transmissions is 4

Send buffer size is 0 KB

Maximum allowed bandwidth is 1000000 kbps

Minimum available bandwidth is 15000 kbps

Estimated round trip time is 1000 usec

Congestion window monitoring is enabled, burst size is 10 KB

canterbury# sh interface fcip 1

fcip1 is trunking

Hardware is GigabitEthernet

Port WWN is 20:42:00:0c:30:6c:24:40

Peer port WWN is 20:c2:00:05:30:00:7a:de

Admin port mode is auto, trunk mode is auto

Port mode is TE

vsan is 1

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 1 (interface GigabitEthernet2/1)

Peer Information

Peer Internet address is 100.100.100.1 and port is 3225

Special Frame is disabled

Maximum number of TCP connections is 2

Time Stamp is disabled

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 100.100.100.2:65128, Remote 100.100.100.1:3225

Data connection: Local 100.100.100.2:65130, Remote 100.100.100.1:3225

204 Attempts for active connections, 72 close of connections

TCP Parameters

Path MTU 1500 bytes

Current retransmission timeout is 200 ms

Round trip time: Smoothed 2 ms, Variance: 1

Advertized window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 10 KB, Slow start threshold: 112 KB

5 minutes input rate 120 bits/sec, 15 bytes/sec, 0 frames/sec

5 minutes output rate 120 bits/sec, 15 bytes/sec, 0 frames/sec

91063905 frames input, 192030052404 bytes

41991 Class F frames input, 3931568 bytes

91021914 Class 2/3 frames input, 192026120836 bytes

0 Error frames timestamp error 0

753551524 frames output, 936716093696 bytes

42028 Class F frames output, 3909128 bytes

753509496 Class 2/3 frames output, 936712184568 bytes

0 Error frames 40061908 reass frames

canterbury#

相关信息

- RFC 3821 - 基于 TCP/IP 的光纤通道 (FCIP)

- T11 主页

- 技术支持 - Cisco Systems