目录

简介

先决条件

使用的组件

失败原因：

ETF服务已禁用或没有有效的服务功能密钥

无法建立新连接：[Errno110]连接超时

失败原因：“400”

HTTP错误：状态代码401身份验证失败

Taxii错误： HTTP错误：状态代码404请求的资源不可用

失败原因：“405”

HTTP错误：状态代码503服务不可用

NOT_FOUND：找不到请求的集合

[SSL: CERTIFICATE_VERIFY_FAILED]证书验证失败(_ssl.c:590)

XML解析错误：未找到元素（第0行）

无法建立新连接：[Errno11]连接被拒绝

相关信息

简介

本文档介绍外部威胁源实施过程中发生故障的几种原因、错误分析和解决操作。

先决条件

没有特定要求，因此Cisco建议您了解以下主题：

- 思科安全邮件网关(ESA)

- 外部威胁源(ETF)

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 运行软件12.x或更高版本的思科安全邮件网关(ESA)

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

失败原因：

ETF服务已禁用或没有有效的服务功能密钥

(Machine esa03.taclab.krk) (SERVICE)> tail threatfeeds

Press Ctrl-C to stop.

Wed Sep 8 16:15:26 2021 Info: THREAT_FEEDS: A delta poll is scheduled for the source: Test_Poll_Path

Machine: ‘esa03.taclab.krk'. A failure was encountered for the source 'Test_Poll_Path'.

Reason for failure: The ETF service is either disabled or there is no valid feature key for the service.

解决方案

请确保：

1. ETF功能密钥已正确安装。

2. EULA已接受，功能密钥已全局启用。

3. 已在计算机级别应用许可证。

注：如果存在集群级别，则需要将设置复制到计算机级别。

无法建立新连接：[错误110]连接超时

(Machine esa03.taclab.krk) (SERVICE)> tail threatfeeds

Press Ctrl-C to stop.

Reason for failure: Taxii Error: HTTPSConnectionPool(host= otx.alienvault.comport, port=443): Max retries exceeded with url:  /taxii/poll/ (Caused by NewConnectionError('<requests.packages....

Failed to establish a new connection: [Errno 110] Connection timed out',))

注意：连接超时通常表示与网络相关的问题，这会阻止ESA获得响应。建议进行防火墙/代理检查并捕获数据包，以便进行更深入的分析。

解决方案

1. 确认防火墙和代理不阻止流量。

可以在GUI > Security Services > Service Updates下检查代理。

2. 通过数据包捕获确认连接。导航到GUI > Help and Support > Packet Capture。

提示：当出现网络相关问题的迹象时，谨慎的做法是运行数据包捕获，以确认连接已正确建立。

失败原因：“400”

(Machine esa03.taclab.krk) (SERVICE)> grep "Sep 6 13:38" threatfeeds

Mon Sep 6 13:38:16 2021 Debug: THREAT_FEEDS: Failed to fetch observables from the source: Test_Poll_Path. Reason for failure: '400'

Mon Sep 6 13:38:55 2021 Info: THREAT_FEEDS: The source 'Test_Poll_Path' is currently in a polling state and therefore a poll for this source cannot be initiated at this time.

注意:RFC7231 Error 400（错误请求），表示服务器无法或不处理该请求，因为某些事件被视为客户端错误。 大多数情况下，出现该错误的原因在于请求语法格式不正确或请求消息帧无效。

解决方案

错误“400”表示存在此轮询路径，但它指向TAXII服务器提供的其他服务。

1. 确认使用轮询请求而不是发现请求配置了轮询路径配置。

2. 在GUI > Mail Policies > External Threat Feeds Manager > Use HTTPS下启用确认HTTPS。

注意：通常，当轮询路径配置有发现请求时（例如：/api/v1/taxii/taxii-discovery-service/）会发生此问题

轮询路径可以配置为对源使用轮询请求，例如：/api/v1/taxii/poll

注意：轮询和发现请求之间的差异：

-轮询URL实际上就是您使用源的位置。

-发现服务URL用于查找Taxii服务提供的服务。

HTTP错误：状态代码401身份验证失败

(Machine esa03.taclab.krk) (SERVICE)> grep "Sep 8 16:35" threatfeeds

Wed Sep 8 16:35:39 2021 Debug: THREAT_FEEDS: Updating the timestamp: 2021-09-08 16:31:36.071684 for the last attempted poll for the source: ETF_Source_Name

Wed Sep 8 16:35:39 2021 Info: THREAT_FEEDS: Job failed with exception : Source: ETF_Source_Name. Reason for failure: Taxii Error: HTTP Error: status code 401 authentication failureurce not available

解决方案

此错误代码表明它缺少目标资源的有效身份验证凭据。

确认凭证配置正确。

还有一个选项不为用户配置凭证。

Taxii错误： HTTP错误：状态代码404请求的资源不可用

(Machine esa03.taclab.krk) (SERVICE)> grep "Aug 27 08:51" threatfeeds

Fri Aug 27 08:51:16 2021 Warning: THREAT_FEEDS: Unable to fetch the observables from the source: Test after 3 failed attempts. Reason for failure: Taxii Error: HTTP Error: status code 404 requested resource not available

Fri Aug 27 08:51:16 2021 Info: THREAT_FEEDS: Job failed with exception : Source: Test. Reason for failure: Taxii Error: HTTP Error: status code 404 requested resource not available

注:404（未找到）状态代码表示源服务器没有找到目标资源的当前表示形式，或者不愿意透露该表示形式存在。这表明，可能存在无效的URL，在大多数情况下，找不到由于资源路径而发生的情况。

解决方案

在ESA GUI > Mail Policies > External Threat Feeds Manager > Choose the proper Source Name下，确认源上的轮询路径/收集名称。

失败原因：“405”

(Machine esa03.taclab.krk) (SERVICE)> grep "Sep 13 00:2" threatfeeds

Mon Sep 13 00:20:21 2021 Debug: THREAT_FEEDS: Failed to fetch observables from the source: Anomali. Reason for failure: '405’

注：根据RFC7231，错误405(Method Not Allowed)表示在请求行中接收的方法是源服务器已知的，但目标资源不支持该方法。

解决方案

由于轮询路径末尾缺少跟踪线“/”斜线，这是一个语法错误。

在路径/taxii/poll/的末尾添加轨迹斜线。

HTTP错误：状态代码503服务不可用

(Machine esa03.taclab.krk) (SERVICE)> grep "Nov 10 13:45" threatfeeds

Sun Nov 10 13:45:21 2020 Info: THREAT_FEEDS: Job failed with exception : Source: ETF_Source_Name. Reason for failure: Taxii Error: HTTP Error: status code 503 service unavailable

Sun Nov 10 13:45:22 2020 Info: THREAT_FEEDS: A delta poll is scheduled for the source: ETF_Source_Name

注：根据RFC7231，错误503“Service Unavailable”是HTTP响应状态代码，表示服务器暂时无法处理请求。

解决方案

错误代码表明目标TAXII服务器出现问题，需要进一步调查。

当服务器过载时可能会发生这种情况。请联系供应商以了解更多信息。

NOT_FOUND：找不到请求的集合

(Machine esa03.taclab.krk) (SERVICE)> grep "Sep 7 12:53" threatfeeds

Tue Sep 7 12:53:16 2021 Warning: THREAT_FEEDS: Unable to fetch the observables from the source: Test_Poll_Path after 3 failed attempts. Reason for failure: Taxii Error: NOT_FOUND: The requested collection could not be found

Tue Sep 7 12:53:16 2021 Debug: THREAT_FEEDS: Updating the timestamp: 2021-09-07 12:49:12.648625 for the last attempted poll for the source: Test_Poll_Path

解决方案

此错误表示集合名称拼写正确，但TAXII服务器在集合下存在问题，拒绝该请求。

可能的原因是收集名称上的过期计时器。

请与供应商联系以检查此类不一致情况。

[SSL: CERTIFICATE_VERIFY_FAILED]证书验证失败(_ssl.c:590)

(Machine esa03.taclab.krk) (SERVICE)> grep "Sep 8 16:35" threatfeeds

Wed Sep 8 16:35:26 2021 Info: THREAT_FEEDS: A delta poll is scheduled for the source: ETF_Source_Name

Wed Sep 8 16:35:33 2019 Warning: THREAT_FEEDS: Unable to fetch the observables from the source: ETF_Source_Name after 3 failed attempts. Reason for failure: Taxii Error: [SSL: CERTIFICATE_VERIFY_FAILED] certificate verify failed (_ssl.c:590)

解决方案

此错误表示证书失败。

要解决此问题，请导入证书颁发机构(CA)列表中的证书。

导航到GUI > Network > Certificates > Edit Settings > Custom List >

选择Enable模式并上传证书。

XML解析错误：未找到元素（第0行）

(Machine esa03.taclab.krk) (SERVICE)> grep "Aug 21 02:39" threatfeeds

Fri Aug 21 02:39:37 2021 Warning: THREAT_FEEDS: Unable to fetch the observables from the source: ETF_Source_Name after 3 failed attempts. Reason for failure: Taxii Error: XML Parising Error: no element found (line 0)

Fri Aug 21 02:39:37 2021 Info: THREAT_FEEDS: Job failed with exception : Source: ETF_Source_Name. Reason for failure: Taxii Error: XML Parising Error: no element found (line 0)

解决方案

将ESA配置的轮询段时间跨度值减少到3-4天。

注意：对于某些特定源，这与Anomali服务器不一致，在这些源中不会发送数据结束标记来停止源。

在这种情况下，配置了Anomali的ETF源的ESA无法轮询超过5天时间跨度的数据。

有效的解决方法是减少ESA配置中的轮询段的时间跨度(Time Span)。

无法建立新连接：[错误11]连接被拒绝

(Machine esa03.taclab.krk) (SERVICE)> tail threatfeeds

Press Ctrl-C to stop.

Reason for failure: Taxii Error: HTTPSConnectionPool(host=otx.alienvault.comport=443): Max retries exceeded with url: /taxii/poll/ (Caused by NewConnectionError('<requests.packages..

Failed to establish a new connection: [Errno 111] Connection refused',))

注意：“连接被拒绝”表示客户端无法连接到正在运行的服务器上的端口。通常，当服务器在错误的端口上侦听或端口不可用时会出现这种情况。

解决方案

1. 通过CLI使用telnet或netstat命令验证适当的端口是否处于侦听状态。

2. 验证防火墙是否未阻止端口。

3. 确保运行的服务没有端口配置错误/端口陈旧。

相关信息

- 思科邮件安全设备最终用户指南

- 什么是STIX和TAXII

- RFC2741 — 错误代码

- TAC研讨会外部威胁源