目录

简介

先决条件

要求

使用的组件

规则

配置

网络图

配置

验证

故障排除

相关信息

简介

在使用认证代理执行浏览器身份验证之前，此示例配置最初会阻塞从外部主机到内部网络上的所有设备的流量。从服务器传递的访问列表(permit tcp|ip|icmp any any )将授权后的动态条目添加到访问列表115，该列表暂时允许从外部PC访问内部网络。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- Cisco IOS®软件版本12.0.7.T

- Cisco 3640 路由器

注意：在Cisco IOS软件版本12.0.5.T中引入了ip auth-proxy命令。此配置测试了Cisco IOS软件版本12.0.7.T。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文档约定的更多信息，请参考 Cisco 技术提示约定。

配置

本部分提供有关如何配置本文档所述功能的信息。

注意：使用命令查找工具(仅限注册客户)可获取有关本节中使用的命令的详细信息。

网络图

本文档使用以下网络设置：

配置

本文档使用以下配置：

3640路由器

Current configuration:

!

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname security-3640

!

aaa new-model

aaa group server tacacs+ RTP

server 171.68.118.115

!

aaa authentication login default group RTP none

aaa authorization exec default group RTP none

aaa authorization auth-proxy default group RTP

enable secret 5 $1$H9zZ$z9bu5HMy4NTtjsvIhltGT0

enable password ww

!

ip subnet-zero

!

ip inspect name myfw cuseeme timeout 3600

ip inspect name myfw ftp timeout 3600

ip inspect name myfw http timeout 3600

ip inspect name myfw rcmd timeout 3600

ip inspect name myfw realaudio timeout 3600

ip inspect name myfw smtp timeout 3600

ip inspect name myfw sqlnet timeout 3600

ip inspect name myfw streamworks timeout 3600

ip inspect name myfw tftp timeout 30

ip inspect name myfw udp timeout 15

ip inspect name myfw tcp timeout 3600

ip auth-proxy auth-proxy-banner

ip auth-proxy auth-cache-time 10

ip auth-proxy name list_a http

ip audit notify log

ip audit po max-events 100

cns event-service server

!

process-max-time 200

!

interface FastEthernet0/0

ip address 40.31.1.150 255.255.255.0

ip access-group 101 in

no ip directed-broadcast

ip inspect myfw in

no mop enabled

!

interface FastEthernet1/0

ip address 11.11.11.11 255.255.255.0

ip access-group 115 in

no ip directed-broadcast

ip auth-proxy list_a

!

ip classless

ip route 0.0.0.0 0.0.0.0 11.11.11.1

ip route 171.68.118.0 255.255.255.0 40.31.1.1

ip http server

ip http authentication aaa

!

access-list 101 permit icmp 40.31.1.0 0.0.0.255 any

access-list 101 permit tcp 40.31.1.0 0.0.0.255 any

access-list 101 permit udp 40.31.1.0 0.0.0.255 any

access-list 101 permit icmp 171.68.118.0 0.0.0.255 any

access-list 101 permit tcp 171.68.118.0 0.0.0.255 any

access-list 101 permit udp 171.68.118.0 0.0.0.255 any

access-list 115 permit tcp host 11.11.11.12 host 11.11.11.11 eq www

access-list 115 deny   tcp any any

access-list 115 deny   udp any any

access-list 115 permit icmp any 40.31.1.0 0.0.0.255 echo

access-list 115 permit icmp any 40.31.1.0 0.0.0.255 echo-reply

access-list 115 permit icmp any 40.31.1.0 0.0.0.255 packet-too-big

access-list 115 permit icmp any 40.31.1.0 0.0.0.255 time-exceeded

access-list 115 permit icmp any 40.31.1.0 0.0.0.255 traceroute

access-list 115 permit icmp any 40.31.1.0 0.0.0.255 unreachable

access-list 115 permit icmp any 40.31.1.0 0.0.0.255 administratively-prohibited

dialer-list 1 protocol ip permit

dialer-list 1 protocol ipx permit

!

tacacs-server host 171.68.118.115

tacacs-server key cisco

radius-server host 171.68.118.115

radius-server key cisco

!

line con 0

transport input none

line aux 0

line vty 0 4

password ww

!

!

end

验证

当前没有可用于此配置的验证过程。

故障排除

本部分提供的信息可用于对配置进行故障排除。

对于这些指令和其他故障排除信息，请参见排错认证代理。

注意：在发出debug命令之前，请参阅有关Debug命令的重要信息。

相关信息

- IOS防火墙支持页面

- TACACS/TACACS+支持页面

- IOS 文档中的 TACACS+

- RADIUS 支持页

- 请求注解 (RFC)

- 技术支持和文档 - Cisco Systems