Contents

Introduction

用户名和密码短语的最大字符长度

工具访问-用户名

工具访问-密码短语

垃圾邮件检疫访问-用户名

垃圾邮件检疫访问-密码短语

Related Information

Introduction

本文描述字符的最大长度用户名的Cisco电子邮件安全工具(ESA)工具访问和垃圾邮件检疫访问的技术支持和密码短语。

用户名和密码短语的最大字符长度

工具访问-用户名

AsyncOS版本11.0或以上：

- 用户名限制(本地和LDAP) ：没有限制

AsyncOS版本10.0.1或更老：

- 用户名限制(本地和LDAP) ：16个字符

工具访问-密码短语

默认情况下，密码短语需求是：

A passphrase must contain the following:

at least 8 characters.

at least one upper (A-Z) and lower (a-z) case letter.

at least one number (0-9).

at least one special character.

The following characters are allowed: ~ ? ! @ # $ % ^ & * - _ + = \ | / [ ] ( ) < > { } ` ' " ; : , .

not be a username or one of its variations.

not any of 3 recent passphrase.

Note:可以更改密码短语需求。连接对在本地用户帐户&密码短语设置部分的系统管理> Users。 参考用户指南关于更详细的资料。

- 本地登录密码短语：没有限制

- LDAP密码：128个字符(Microsoft默认限额)

垃圾邮件检疫访问-用户名

- 本地用户名限制：16个字符

- LDAP用户名限制：33个字符

垃圾邮件检疫访问-密码短语

- 本地登录密码短语： 129个字符

- LDAP密码短语：128个字符(Microsoft默认限额)

Related Information

- 电子邮件安全用户指南的AsyncOS

- Technical Support & Documentation - Cisco Systems