Contents

Introduction

如何从控制台恢复IC3000

解决方案

Introduction

本文描述如何恢复IC3000与使用控制台。

如何从控制台恢复IC3000

在某些情况下， IC3000在rommon>变得不可启动和被滞留，不能引导它是镜像。

当这是实际情形时，序列/usb控制台能显示此输出：

autoboot: Restarting the system.

Rom image verified correctly

Cisco Systems ROMMON, Version 1.0.0(IC3000), RELEASE SOFTWARE

Copyright (c) 1994-2018  by Cisco Systems, Inc.

Compiled Thu 09/06/2018 11:38:52.09 by builders

Current image running: Boot ROM1

Last reset cause: LocalSoft

DIMM Slot 0 : Present

Platform IC3000-2C2F-K9 with 8192 Mbytes of main memory

MAC Address: 00:00:00:00:00:00

Use BREAK or ESC to interrupt boot.

Use SPACE to begin boot immediately.

Warning: filesystem is not clean

Directory .boot_string not found

Unable to locate .boot_string directory

Unable to load .boot_string

Attempt autoboot: "boot disk0:"

Warning: filesystem is not clean

Warning: filesystem is not clean

File size is 0x01360000

Located IC3000-K9-1.0.1.SPA

Image size 20316160 inode num 12, bks cnt 4960 blk size 8*512

#######################################################################################################################################################################################################

Signature verification failed for key# 1

Failed to validate digital signature

Signature verification failed for key# 1

Signature verification failed for key# 2

Failed to validate digital signature

LFBFF signature verification failed!!

No kernel found to launch.

boot: cannot determine first file name on device "disk0:/"

autoboot: All boot attempts have failed.

autoboot: Restarting the system.

当您中断启动流程并且设法引导镜像时，请提交在disk0 ：您也许发现输出和一样上述和设备基本上在bootloop。

解决方案

为了恢复IC3000，您需要这些前提：

- 对管理端口的IP连通性

- TFTP-server，可及的通过在管理端口的网络

- IC3000镜像，可以下载从： https://software.cisco.com/download/home/286321941/type/286322235

- 与序列的控制台连接或在IC3000的USB连接

这些步骤在可用状态允许您让IC3000回到：

1. 从提供的URL下载IC3000镜像以上并且使可用在TFTP-server

2. 连接到IC3000控制台并且通过按ESC中断启动进程，当您看到此消息时：

Use BREAK or ESC to interrupt boot.

Use SPACE to begin boot immediately.

3. 在您中断正常启动顺序后，您最终获得rommon>提示：

rommon 1 >

4. 配置IP地址和网关IC3000的在管理端口。即使没有需要网关，必须设置值：

rommon 1 > address 192.168.100.2

rommon 2 > netmask 255.255.255.0

rommon 3 > gateway 192.168.100.1

5. 测试连接对TFTP-server ：

rommon 4 >  ping 192.168.100.1

Sending 10, 32-byte ICMP Echoes to 192.168.100.1 timeout is 4 seconds

?!!!!!!!!!

Success rate is 90 percent (9/10)

6. 设置TFTP服务器地址和文件名下载：

rommon 5 > server 192.168.100.1

rommon 6 > file IC3000-K9-1.0.1.SPA

7. 开始下载并且引导镜像从TFTP-server ：

rommon 7 > tftpdnld

ADDRESS: 192.168.100.2

NETMASK: 255.255.255.0

GATEWAY: 192.168.100.1

SERVER: 192.168.100.1

IMAGE: IC3000-K9-1.0.1.SPA

MACADDR: 00:00:00:00:00:00

VERBOSITY: Progress

RETRY: 40

PKTTIMEOUT: 7200

BLKSIZE: 1460

CHECKSUM: Yes

PORT: GbE/0

PHYMODE: Auto Detect

Receiving IC3000-K9-1.0.1.SPA from 192.168.100.1!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

File reception completed.

一旦顺利地转换了镜像， IC3000从镜像将立即引导：

File reception completed.

Boot buffer bigbuf=348bd018

Boot image size = 102729968 (0x61f88f0) bytes

[image size]      102729968

[MD5 signaure]    294a052497277c330d6b2159cf37f1ab

LFBFF signature verified.

[    4.446627] sd 2:0:0:0: [sdb] No Caching mode page found

[    4.510305] sd 2:0:0:0: [sdb] Assuming drive cache: write through

INIT: version 2.88 booting

Starting udev

Populating dev cache

INIT: Entering runlevel: 5postinsts/000-monit...

Configuring network interfaces... Setting bridge MAC address to: 00:b8:b3:80:02:c0

done.

Starting system message bus: dbus.

Checking and Mounting BOOT filesystem...

fsck (busybox 1.24.1, 2018-09-13 06:16:00 UTC)

BOOT was not cleanly unmounted, check forced.

BOOT: Inode 12, i_size is 20316160, should be 20447232.  FIXED.

BOOT: Inode 12, i_blocks is 39728, should be 39984.  FIXED.

BOOT: 12/244320 files (0.0% non-contiguous), 22254/976892 blocks

Checking and Mounting BOOT filesystem...Done

Checking GOLDEN filesystem...

fsck (busybox 1.24.1, 2018-09-13 06:16:00 UTC)

GOLDEN was not cleanly unmounted, check forced.

GOLDEN: 12/122160 files (8.3% non-contiguous), 33504/488448 blocks

Checking GOLDEN filesystem...Done

Checking and Mounting SYSTEM filesystem...

fsck (busybox 1.24.1, 2018-09-13 06:16:00 UTC)

SYSTEM: clean, 11/535392 files, 71084/2139136 [   21.111486] fpga_i2c_init_module: FPGA base address = ffffc90001078000

blocks

Checking and Mounting SYSTEM filesystem...Done

Checking and Mounting IOX filesystem...

fsck (busybox 1.24.1, 2018-09-13 06:16:00 UTC)

IOX: clean, 11/5865472 files, 415148/23442851 blocks

Checking and Mounting IOX filesystem...Done

Checking and Mounting LOG filesystem...

fsck (busybox 1.24.1, 2018-09-13 06:16:00 UTC)

LOG: clean, 11/244800 files, 33670/977949 blocks

Checking and Mounting LOG filesystem...Done

0x0000

Authenticating ACT2...ACT2 success

System initializing...

System Type Fiber.

Mounting cgroups...Done

Checking if cgroup is provided by kernel...Yes.

Checking if cgroup is mounted...Yes.

Checking if lssubsys is available...Yes.

Checking if platform defines cgroup parameters...Yes.

Tweaking base cgroup parameters...Done.

Checking if subsystems needed by IOx exist...

Setting up cpu cgroup parameters...

Setting cpu.shares for apphosting.partition to 921...OK

Setting cpu.shares for host to 100...OK

Setting cpu.shares for host/caf to 100...OK

Setting cpuset values for apphosting.partition...OK

Setting up memory cgroup parameters...

Setting memory.limit_in_bytes for apphosting.partition to 6589061529...OK

Setting memory.limit_in_bytes for host to 1647265382...OK

Setting memory.limit_in_bytes for host/caf to 1317812305...OK

OpenBSD Secure Shell server not in use (/etc/ssh/sshd_not_to_be_run)

Starting atd: OK

starting DNS forwarder and DHCP server: dnsmasq... done.

Starting ntpd: done

Starting system log daemon...0

Starting kernel log daemon...0

Network mgmt starting with factory default configuration

User mgmt starting with factory default configuration

Starting konfd: OK

* Starting virtualization library daemon: libvirtd

no /usr/bin/dnsmasq found; none killed                                   [ ok ]

* Starting libvirt log management daemon: virtlogd                      [ ok ]

Starting crond: OK

Starting Monit 5.14 daemon with http interface at /var/run/monit.sock

ic3k>