目录

简介

先决条件

要求

使用的组件

规则

背景理论

配置

网络图

配置

验证

显示命令

show 命令输出示例

Catalyst 5500 交换机

Catalyst 6500 交换机

在信道模式下使用无条件方式的特别注意事项

相关信息

简介

本文讨论在都运行 Catalyst OS (CatOS) 的 Cisco Catalyst 5500 交换机和 Catalyst 6500 交换机之间设置 EtherChannel。 运行 CatOS 的所有 Catalyst 4500/4000、5500/5000 或 6500/6000 系列交换机都可在这种情况下用于获得同样结果。EtherChannel 可以根据用于形成 EtherChannel 的接口或端口的速度称为快速以太通 (FEC) 或千兆以太网通道 (GEC)。

在本例中，每个交换机的快速以太网 (FE) 端口已被捆绑到 FEC。在本文中，术语“快速以太通道”、“千兆以太网通道”、“端口通道”、“通道”和“端口组”都指 EtherChannel。

本文档仅包括交换机的配置文件和相关 show 命令示例的输出。有关如何在 Catalyst 交换机之间配置 EtherChannel 的进一步详细信息，请参阅以下文档：

- 在运行 CatOS 的 Catalyst 4000、5000 与 6000 交换机之间配置以太网信道

本文档不提供使用链路聚合控制协议(LACP)的配置。有关配置LACP的详细信息，请参阅以下文档：

- 在 Catalyst 6000 与 Catalyst 4000 之间配置 LACP (802.3ad)

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 运行 CatOS 6.3(7) 软件的 Catalyst 5500 交换机

- 运行 CatOS 7.2(2) 软件的 Catalyst 6500 交换机

注意：在配置CatOS交换机之间的通道之前，请参阅以下文档：

- 在 Catalyst 交换机上实施 EtherChannel 的系统要求

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

背景理论

EtherChannel 可无条件配置（打开信道模式），也可以让此交换机使用端口聚合协议 (PAgP)（使用期望信道模式）与远端协商此信道来进行配置。

注意：运行CatOS的Catalyst交换机支持PAgP，因此建议使用期望模式在这些设备之间设置EtherChannel。PAgP 可保护两个设备之间不出现任何误配置。打开信道模式在远端设备不支持 PAgP 时且您需要无条件设置信道时很有用。静音或非静音关键字可用于自动信道模式和期望信道模式。默认情况下，静音关键字在 Catalyst 4500/4000 或 6500/6000 的所有端口和 Catalyst 5500/5000系列交换机的铜线端口上启用。默认情况下，非静音关键字在 Catalyst 5500/5000 系列交换机的所有光纤端口（FE 和千兆以太网 [GE]）上启用。当在 Cisco 交换机之间连接时，推荐使用默认静音或非静音关键字。

有关 PAgP 和 EtherChannel 的详细信息，请转到 Cisco 交换机产品网页寻找您的 CatOS 软件版本的技术文档。请参阅配置快速以太通道和千兆以太网通道或配置 EtherChannel 部分。您可能会希望使用您的浏览器“查找”功能找到这些部分。

另一个好的参考是以下文档的 EtherChannel/端口聚合协议部分：

- Catalyst 4000、5000和6000系列交换机配置和管理最佳实践经验

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具 (仅注册客户)。

网络图

本文档使用以下网络设置：

配置

本文档使用以下配置：

- Catalyst 5500 交换机

- Catalyst 6500 交换机

注意：本文档中列出的配置是通过建议的期望模式使用PAgP协商配置EtherChannel来实现的。

Catalyst 5500 交换机

#version 6.3(7)

!

set option fddi-user-pri enabled

!

#system

set system name  cat5500

!

#frame distribution method

set port channel all distribution mac both

!

#ip

!--- This is the IP address used for management.

set interface sc0 1 10.10.10.2/255.255.255.0 10.10.10.255

!

#set boot command

set boot config-register 0x2102

set boot system flash bootflash:cat5000-sup3.6-3-7.bin

!

#port channel

!--- Ports are assigned to admin group 50. This admin group is assigned !--- automatically when the port channel is configured, or it can be assigned manually. !--- If the admin group does not need to be assigned manually, this command should not be !--- manually set either. Let the switch create it automatically. !--- Also note that ports 4/1 through 4/4 are set for port channel even though only !--- 4/1-2 are configured. This is normal behavior. The ports 4/3 and 4/4 can !--- be used for any other purpose.

set port channel 4/1-4 50

!

# default port status is enable

!

!

#module 1 : 2-port 1000BaseSX Supervisor

!

#module 2 empty

!

#module 3 empty

!

#module 4 : 24-port 10/100BaseTX Ethernet

!--- Port channeling is enabled.

set port channel 4/1-2 mode desirable silent

!

#module 5 : 12-port 10/100BaseTX Ethernet

!

#module 6 empty

!

#module 7 : 2-port MM OC-3 Dual-Phy ATM

!

#module 8 empty

!

#module 9 empty

!

#module 10 empty

!

#module 11 empty

!

#module 12 empty

!

#module 13 empty

end

Catalyst 6500 交换机

#version 7.2(2)

!

!

#system

set system name  cat6500

!

#!

#ip

!--- This is the IP address used for management.

set interface sc0 1 10.10.10.1/255.255.255.0 10.10.10.255

!

#set boot command

set boot config-register 0x2102

set boot system flash bootflash:cat6000-supk8.7-2-2.bin

!

#igmp

set igmp leave-query-type mac-gen-query

!

#port channel

!--- The ports are assigned to admin group 63. This admin group is assigned !--- automatically when the port channel is configured or it can be assigned manually. !--- If admin group does not need to be assigned manually, this command should not be !--- manually set. Let the switch create it automatically. !--- Also note that ports 4/1 through 4/4 are set for the port channel even though !--- only 4/1-2 are configured. This is normal behavior. The ports 4/3 and 4/4 !--- can be used for any other purpose.

set port channel 4/1-4 63

!

# default port status is enable

!

!

#module 1 : 2-port 1000BaseX Supervisor

!

#module 2 : 2-port 1000BaseX Supervisor

!

#module 3 empty

!

#module 4 : 48-port 10/100BaseTX Ethernet

!--- Port channeling is enabled.

set port channel 4/1-2 mode desirable silent

!

#module 5 empty

!

#module 6 empty

!

#module 15 : 1-port Multilayer Switch Feature Card

!

#module 16 : 1-port Multilayer Switch Feature Card

end

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

显示命令

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

要检查 CatOS 交换机上的端口信道，请发出以下命令：

- show port capabilities module

- show port channel

- show port channel module/port

- show port channel info

要检查 CatOS 交换机的生成树协议 (STP) 状态，请发出以下命令：

- show spantree

- show spantree vlan

- show spantree module/port

show 命令输出示例

Catalyst 5500 交换机

show port capabilities module

此命令用于检查此模块是否能够开通信道。它还显示哪些其他端口可以使用此端口形成信道。

cat5500> (enable) show port capabilities 4

Model                    WS-X5225R

Port                     4/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  4/1-2,4/1-4

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off,on)

Security                 yes

Dot1x                    yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(none),tx-(none)

CoS rewrite              yes

ToS rewrite              IP-Precedence

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            1..1000,untagged,dot1p,none

SPAN                     source,destination

--------------------------------------------------------------

Model                    WS-X5225R

Port                     4/2

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  4/1-2,4/1-4

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off,on)

Security                 yes

Dot1x                    yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(none),tx-(none)

CoS rewrite              yes

ToS rewrite              IP-Precedence

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            1..1000,untagged,dot1p,none

SPAN                     source,destination

--------------------------------------------------------------

!--- Output suppressed.

show port channel

此命令与 show port channel info 命令一起用于检查端口通道的状态。

cat5500> (enable) show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

4/1  connected  desirable silent        50   865

4/2  connected  desirable silent        50   865

----- ---------- -------------------- ----- -----

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

4/1  TBA04380080(cat6500)            4/1                       WS-C6506

4/2  TBA04380080(cat6500)            4/2                       WS-C6506

----- ------------------------------- ------------------------- ----------------

注意：如果端口4/3和4/4处于未连接状态，则上述输出中会显示它们。

如果从Cisco设备获得show port channel命令的输出，则可以使用输出解释器工具 (仅注册客户)来显示潜在问题和修复。

show spantree module/port

cat5500> (enable) show spantree 4/1

Port                     Vlan Port-State    Cost      Prio Portfast Channel_id

------------------------ ---- ------------- --------- ---- -------- ----------

4/1-2                    1    forwarding           12   32 disabled 865

cat5500> (enable) show spantree 4/2

Port                     Vlan Port-State    Cost      Prio Portfast Channel_id

------------------------ ---- ------------- --------- ---- -------- ----------

4/1-2                    1    forwarding           12   32 disabled 865

注意：端口4/1和4/2的show spantree module/port命令的输出相同，因为这些端口在一个通道中分组，通道ID为865。

Catalyst 6500 交换机

show port capabilities module

此命令用于检查此模块是否能够开通信道。它还显示哪些其他端口可以使用此端口形成信道。

cat6500> (enable) show port capabilities 4/1

Model                    WS-X6248-RJ-45

Port                     4/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  yes

Broadcast suppression    no

Flow control             receive-(off,on),send-(off)

Security                 yes

Dot1x                    yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(1q4t),tx-(2q2t)

CoS rewrite              yes

ToS rewrite              DSCP

UDLD                     yes

Inline power             no

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

COPS port group          4/1-48

Link debounce timer      yes

show port channel

此命令与 show port channel info 命令一起用于检查端口通道的状态。

cat6500> (enable) show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

4/1  connected  desirable silent        63   865

4/2  connected  desirable silent        63   865

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

4/1  069001645(cat5500)              4/1                       WS-C5500

4/2  069001645(cat5500)              4/2                       WS-C5500

注意：如果端口4/3和4/4处于未连接状态，则上述输出中会显示它们。

如果从Cisco设备获得show port channel命令的输出，则可以使用Output Interpreter Tool (仅限注册的客户)来显示潜在问题和修复。

show port channel info

cat6500> (enable) show port channel info

Switch Frame Distribution Method: ip both

Port  Status     Channel              Admin Channel Speed Duplex Vlan

mode                 group id

----- ---------- -------------------- ----- ------- ----- ------ ----

4/1  connected  desirable silent        63     865 a-100 a-full    1

4/2  connected  desirable silent        63     865 a-100 a-full    1

Port  Channel Oper-group Neighbor   Oper-Distribution PortSecurity/

ifIndex            Oper-group Method            Dynamic port

----- ------- ---------- ---------- ----------------- -------------

4/1  215            241 1          ip both

4/2  215            241 1          ip both

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

4/1  069001645(cat5500)              4/1                       WS-C5500

4/2  069001645(cat5500)              4/2                       WS-C5500

!--- Output suppressed.

show spantree vlan

show spantree 命令用于验证一个信道内的所有端口是否分为一组且处于转发状态。

cat6500> (enable) show spantree 1

VLAN 1

Spanning tree mode          PVST+

Spanning tree type          ieee

Spanning tree enabled

Designated Root             00-04-6d-82-88-00

Designated Root Priority    0

Designated Root Cost        38

Designated Root Port        4/25

Root Max Age   20 sec   Hello Time 2  sec   Forward Delay 15 sec

Bridge ID MAC ADDR          00-03-a0-e9-0c-00

Bridge ID Priority          32768

Bridge Max Age 20 sec   Hello Time 2  sec   Forward Delay 15 sec

Port                     Vlan Port-State    Cost      Prio Portfast Channel_id

------------------------ ---- ------------- --------- ---- -------- ----------

1/1                     1    not-connected         4   32 disabled 0

1/2                     1    not-connected         4   32 disabled 0

2/1                     1    not-connected         4   32 disabled 0

2/2                     1    not-connected         4   32 disabled 0

4/1-2                    1    forwarding           12   32 disabled 865

4/3                     1    forwarding           19   32 disabled 0

4/4                     1    forwarding           19   32 disabled 0

4/5                     1    not-connected       100   32 disabled 0

4/6                     1    not-connected       100   32 disabled 0

4/7                     1    not-connected       100   32 disabled 0

4/8                     1    not-connected       100   32 disabled 0

4/9                     1    not-connected       100   32 disabled 0

4/10                    1    not-connected       100   32 disabled 0

4/11                    1    not-connected       100   32 disabled 0

4/12                    1    not-connected       100   32 disabled 0

4/13                    1    not-connected       100   32 disabled 0

4/14                    1    not-connected       100   32 disable

!--- Output suppressed.

如果您有来自Cisco设备的show spantree命令的输出，则可以使用输出解释程序工具 (仅注册客户)来显示潜在问题和修复。

show spantree module/port

cat6500> (enable) show spantree 4/1

Port                     Vlan Port-State    Cost      Prio Portfast Channel_id

------------------------ ---- ------------- --------- ---- -------- ----------

4/1-2                    1    forwarding           12   32 disabled 865

cat6500> (enable) show spantree 4/2

Port                     Vlan Port-State    Cost      Prio Portfast Channel_id

------------------------ ---- ------------- --------- ---- -------- ----------

4/1-2                    1    forwarding           12   32 disabled 865

注意：端口3/1和3/2的show spantree module/port命令的输出相同，因为这些端口在一个通道中分组，通道ID为865。

在信道模式下使用无条件方式的特别注意事项

思科建议端口信道配置使用 PAgP，如上背景理论中所述。如果出于任何原因无条件配置 EtherChannel（打开信道模式），建议您按照以下步骤创建端口信道。这样可在配置过程中避免 STP 方面的可能问题。如果一端在另一端可配置为信道之前被配置为信道，STP 环路检测可能会禁用端口。

1. 发出 set port disable module/port 命令，在第一个交换机上，将要用于形成端口信道的端口设为禁用模式。

2. 在第一个交换机上创建端口通道（端口组），将信道模式设为开。

3. 在第二个交换机上创建端口通道，将信道模式设为开。

4. 发出 set port enable module/port 命令，在第一个交换机上重新启用之前被禁用的端口。

相关信息

- 在运行 CatOS 的 Catalyst 4000、5000 与 6000 交换机之间配置以太网信道

- 在 Catalyst 交换机上实施 EtherChannel 的系统要求

- LAN 产品支持页

- LAN 交换技术支持页

- 技术支持 - Cisco Systems