Contents

Introduction

Prerequisites

Requirements

Components Used

问题

解决方案

Introduction

本文描述遇到的一个问题，当WinDump进程与Cisco Unified Contact Center Enterprise (UCCE)时Outbound Dialer一起使用。

Prerequisites

Requirements

Cisco 建议您了解以下主题：

- Cisco UCCE

- Cisco UCCE版本8.x会话初始化协议(SIP)或小型客户机控制协议(SCCP)拨号程序

Components Used

本文的信息根据Cisco Unified Contact Center Enterprise (UCCE) Outbound Dialer。

The information in this document was created from the devices in a specific lab environment.All of the devices used in this document started with a cleared (default) configuration.If your network is live, make sure that you understand the potential impact of any command.

问题

当Outbound Dialer进程日志查看时，您注意到WinDump进程失败每15秒：

-------------

13:00:12:615 dialer-baDialer Trace: WinDump process has crashed, restarting...

13:00:12:617 dialer-baDialer Trace: CreateProcess succeeded with szCmdline = windump -I 1

-tt -C 20 -s 0 -W 20 -w DialerCapture udp port 58800

dwProcessId= 262600 hProcess = 256784

13:00:28:843 dialer-baDialer Trace: WinDump process has crashed, restarting...

13:00:28:844 dialer-baDialer Trace: CreateProcess succeeded with szCmdline = windump -I 1

-tt -C 20 -s 0 -W 20 -w DialerCapture udp port 58800

dwProcessId= 262412 hProcess = 256792

13:00:45:069 dialer-baDialer Trace: WinDump process has crashed, restarting...

-------------

当WinDump重复时失败，导致导致Outbound Dialer服务失败的存储器泄漏情况。

解决方案

有也许导致此问题的两三个方案：

- 没有正确地设置捕获选项Outbound Dialer注册密匙。连接对\ HKEY_LOCAL_MACHINE \软件\ Cisco Systems， Inc. \ ICM \ <customer实例> \拨号程序并且切记捕获选项注册密匙设置为- i 1 - tt - C 20 - s 0 - W 20 - w DialerCapture。

在某些状况下，注册密匙设置为- I 1 - tt - C 20 - s 0 - W 20 - w DialerCapture，导致失败。当Outbound Dialer从一个更早版本时，被升级这经常被看到。 欲了解更详细的信息，请参见Cisco Bug ID CSCuh16754 (WinDump进程在拨号程序失败)。

- Wireshark软件也许影响被捕获的动态地连接程序库文件(DLL)。如果Wireshark在服务器上安装为了排除故障和以后被卸载， WinPcap删除由卸载可能导致此问题。Wireshark卸载进程去除获取DLL wpcap.dll和packet.dll， WinDump需要。

为了确认需要的文件存在，并且WinDump适当地运作，请完成这些步骤：

1. 确定wpcap.dll和Packet.dllfiles是存在这些位置：

- C:\Windows\SysWOW64

- C:\Windows\System32

如果没找到DLL文件，请与Cisco技术支持中心(TAC)联系为了得到DLL文件的适当的版本。

2. 为了确认正确地安装WinDump进程并且正确地获取数据，请检查这些命令的输出：
C:\>windump -V

windump version 3.9.5, based on tcpdump version 3.9.5

WinPcap version 4.1.2 (packet.dll version 4.1.0.2001), based on libpcap version 1.0 branch

1_0_rel0b (20091008)

C:\>windump

windump: listening on \Device\NPF_{5A01EA28-AF57-4456-A653-DD785A20853F}

13:06:20.596189 IP PG2B.43005 > PG2A.domain.net.49220: .3075400616:3075400617(1) ack 1040704317 win

13:06:20.596222 IP PG2A.domain.net.49220 > PG2B.43005: .ack 1 win 255 <nop,nop,sack 1 {0:1}>

13:06:20.606477 IP PG2A.domain.net.49208 > PG2B.45005: .1242670277:1242670278(1) ack 357439054 win 2

13:06:20.607219 IP PG2B.45005 > PG2A.domain.net.49208: .0:1(1) ack 1 win 251