目录

简介

先决条件

要求

使用的组件

支持的平台

规则

配置

网络图

配置

显示命令

已知问题

相关信息

简介

LAN仿真(LANE)服务质量(QoS)功能通过创建具有所需QoS参数的数据直接虚拟通道连接(VCC)来区分多个流量类别。当LAN仿真客户端(LEC)收到按优先顺序排列的流量时，会在VCC上转发此流量，并且QoS参数匹配。

目前，LANE QoS支持创建未指定比特率加(UBR+)VCC。UBR+ VCC是交换机保证最小信元速率(MCR)的UBR VCC。 如果交换机无法保证您为UBR+ VCC指定的速率，则LEC将恢复为UBR，而无MCR保证。

通过使用lane client命令中的qos选项，可以按LEC启用或禁用LANE QoS功能。同一模拟LAN(ELAN)可以同时包含支持QoS和不支持QoS的LEC。

在路由器平台上，服务类别(CoS)值在将路由的数据包交给LANE之前对其进行分类。LEC根据数据包的CoS确定VCC。用户配置确定CoS到VCC的映射。非IP流量和桥接流量流始终通过UBR+ VCC发送。

在Catalyst 5000系列ATM模块中，LEC会创建UBR+ VCC或UBR VCC，但不会同时创建UBR+ VCC和UBR VCC。要创建UBR+ VCC，LEC指定远程LEC的ATM地址的QoS参数。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

此功能在Cisco IOS®软件版本12.1(2)E中引入。

请参阅LAN仿真服务质量的限制部分，查看此技术限制的详细信息。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

支持的平台

以下平台支持LANE上的QoS:

- Cisco 4500 系列路由器

- Cisco 7200 系列路由器

- Cisco 7500 系列路由器

- Catalyst 5000系列双PHY光载波12(OC-12)ATM LANE和基于ATM的多协议(MPOA)模块

- Catalyst 6000系列ATM线卡

注意：这些模块需要Cisco IOS软件版本12.1(4)E来支持此功能。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本文档使用以下网络设置：

路由器1和2是运行Cisco IOS软件版本12.1(5)E的Cisco 7200路由器。路由器2充当LAN仿真配置服务器(LECS)、LAN仿真服务器(LES)以及广播和未知服务器(BUS)。 每台路由器都配置了LEC。

Procida是运行Cisco IOS软件版本12.0(10)W5(18c)的Catalyst 8540多服务交换机路由器(MSR)。

要查看LANE配置示例，请参阅配置ATM LAN仿真。要查看LANE设计建议，请参阅LANE设计建议。

配置

本文档使用以下配置：

- 路由器 1

- 路由器 2

路由器 1

lane qos database test

atm-address 47.009181000000009021561401.0050A219F070.02 ubr+ pcr 140000 mcr 100000

ubr+ cos 0-7

!

interface ATM2/0

no ip address

no atm ilmi-keepalive

pvc 0/5 qsaal

!

pvc 0/16 ilmi

!

!

interface ATM2/0.2 multipoint

ip address 20.0.0.2 255.255.255.0

lane client qos test

lane client ethernet lane-qos

路由器 2

lane database lane-qos

name lane-qos server-atm-address 47.009181000000009021561401.0050A219F071.01

!

lane qos database test

atm-address 47.009181000000009021561401.0030199AB838.02 ubr+ pcr 140000 mcr 100000

ubr+ cos 0-7

!

interface ATM4/0

no ip address

no atm ilmi-keepalive

pvc 0/16 ilmi

!

pvc 0/5 qsaal

!

lane config auto-config-atm-address

lane config database lane-qos

!

interface ATM4/0.1 multipoint

lane server-bus ethernet lane-qos

!

interface ATM4/0.2 multipoint

ip address 20.0.0.1 255.255.255.0

lane client qos test

lane client ethernet lane-qos

要配置LANE上的QoS，您需要定义QoS数据库(通过发出lane qos database name命令)，并通过发出lane client qos name命令将其应用于客户端上。有关如何配置LANE的说明，请参阅配置ATM LAN仿真。

显示命令

此部分提供您能使用的，用以确认您的配置正常工作的信息。

使用以下命令测试网络是否正常运行：

- show lane client

- ping设备

- show atm vc

- show atm interface resource atm

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

在LANE QoS数据库中配置的网络服务接入点(NSAP)地址与作为UBR+数据直接目的地的LEC相同。在路由器1上，您可以通过发出show lane client命令，找到在路由器2 LANE QoS数据库中配置的NSAP地址。

Router1# show lane client

LE Client ATM2/0.2  ELAN name: lane-qos  Admin: up  State: operational

Client ID: 2   LEC up for 44 seconds

ELAN ID: 0

Join Attempt: 48

Known LE Servers: 1

Last Fail Reason: Fail to set up config VC

QoS database: test

HW Address: 0030.199a.b838  Type: ethernet  Max Frame Size: 1516

ATM Address: 47.009181000000009021561401.0030199AB838.02

在LANE QoS数据库中，您需要定义（使用CoS字段）哪种类型的流量将使用UBR+ VC，然后配置UBR+参数。这确定使用哪个峰值细胞率(PCR)和最小细胞率(MCR)。

在本例中，所有类型的流量和CoS都使用UBR+。与路由器1和路由器2上的LEC关联的所有流量都使用UBR+ VC。这些VC的参数是MCR 100 Mbps和PCR 140 Mbps。

Router1# ping 20.0.0.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 20.0.0.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/2/4 ms

Router1# show lane client

LE Client ATM2/0.2  ELAN name: lane-qos  Admin: up  State: operational

Client ID: 2                 LEC up for 44 seconds

ELAN ID: 0

Join Attempt: 48

Known LE Servers: 1

Last Fail Reason: Fail to set up config VC

QoS database: test

HW Address: 0030.199a.b838   Type: ethernet             Max Frame Size: 1516

ATM Address: 47.009181000000009021561401.0030199AB838.02

VCD  rxFrames  txFrames  Type       ATM Address

0         0         0  configure  47.009181000000009021561401.0050A219F073.00

212         1         6  direct     47.009181000000009021561401.0050A219F071.01

213         8         0  distribute 47.009181000000009021561401.0050A219F071.01

214         0        11  send       47.009181000000009021561401.0050A219F072.01

215        20         0  forward    47.009181000000009021561401.0050A219F072.01

218+        0         1  data       47.009181000000009021561401.0050A219F070.02

Router1# show atm vc 218

ATM2/0.2: VCD: 218, VPI: 0, VCI: 43

UBR+, PeakRate: 140000, Minimum Guaranteed Rate: 0

LANE-DATA, etype:0x6, Flags: 0x48, VCmode: 0x0

OAM frequency: 0 second(s)

InARP DISABLED

Transmit priority 4

InPkts: 0, OutPkts: 1, InBytes: 0, OutBytes: 62

InPRoc: 0, OutPRoc: 1, Broadcasts: 0

InFast: 0, OutFast: 0, InAS: 0, OutAS: 0

InPktDrops: 0, OutPktDrops: 0

CrcErrors: 0, SarTimeOuts: 0, OverSizedSDUs: 0

OAM cells received: 0

OAM cells sent: 0

Status: UP

TTL: 4

interface =  ATM2/0.2, call locally initiated, call reference = 154

vcnum = 218, vpi = 0, vci = 43, state = Active(U10)

, point-to-point call

Retry count: Current = 0

timer currently inactive, timer value = 00:00:00

Remote Atm Nsap address: 47.009181000000009021561401.0050A219F070.02

, VC owner: ATM_OWNER_LANE

如果查看交换机(Procida)，您会看到资源已为该特定VC保留。

Procida# show atm interface resource atm 1/1/0

Resource Management configuration:

Service Classes:

Service Category map: c2 cbr, c2 vbr-rt, c3 vbr-nrt, c4 abr,

Scheduling: RS c1 WRR c2, WRR c3, WRR c4, WRR c5

WRR Weight: 15 c2, 2 c3, 2 c4, 2 c5

CAC Configuration to account for Framing Overhead : Disabled

Pacing: disabled   0 Kbps rate configured, 0 Kbps rate installed

overbooking :  disabled

Service Categories supported: cbr,vbr-rt,vbr-nrt,abr,ubr

Link Distance: 0 kilometers

Controlled Link sharing:

Max aggregate guaranteed services: none RX,  none TX

Max bandwidth: none cbr RX, none cbr TX, none vbr RX, none vbr TX,

none abr RX, none abr TX, none ubr RX, none ubr TX

Min bandwidth: none cbr RX, none cbr TX, none vbr RX, none vbr TX,

none abr RX, none abr TX, none ubr RX, none ubr TX

Best effort connection limit: disabled  0 max connections

Max traffic parameters by service (rate in Kbps, tolerance in cell-times):

Peak-cell-rate RX: none cbr, none vbr, none abr, none ubr

Peak-cell-rate TX: none cbr, none vbr, none abr, none ubr

Sustained-cell-rate: none vbr RX, none vbr TX

Minimum-cell-rate RX: none abr, none ubr

Minimum-cell-rate TX: none abr, none ubr

CDVT RX: none cbr, none vbr, none abr, none ubr

CDVT TX: none cbr, none vbr, none abr, none ubr

MBS: none vbr RX, none vbr TX

Resource Management state:

Available bit rates (in Kbps):

47743 cbr RX, 47743 cbr TX, 47743 vbr RX, 47743 vbr TX,

47743 abr RX, 47743 abr TX, 47743 ubr RX, 47743 ubr TX

Allocated bit rates:

0 cbr RX, 0 cbr TX, 0 vbr RX, 0 vbr TX,

0 abr RX, 0 abr TX, 100000 ubr RX, 100000 ubr TX

Best effort connections: 7 pvcs,  5 svcs

您可以看到，已为该VC分配的MCR。

已知问题

如果查看上一节的输出，您可以看到ATM交换机上的已分配资源和路由器1上的VC输出与已配置的参数不对应。这是一个已知问题：在Cisco IOS软件版本12.1(5)E之前，保留的带宽和显示的带宽是数据包速率，而不是信元速率。自Cisco IOS软件版本12.1(5)E起，这些值以信元速率表示。

例如，如果将当前示例应用于Cisco IOS软件版本12.1(3a)E，则以下是这些show命令生成的输出：

Router1# show atm vc 218

ATM2/0.2: VCD: 218, VPI: 0, VCI: 43

UBR+, PeakRate: 154584, Minimum Guaranteed Rate: 0

LANE-DATA, etype:0x6, Flags: 0x48, VCmode: 0x0

OAM frequency: 0 second(s)

InARP DISABLED

Transmit priority 4

InPkts: 0, OutPkts: 1, InBytes: 0, OutBytes: 62

InPRoc: 0, OutPRoc: 1, Broadcasts: 0

InFast: 0, OutFast: 0, InAS: 0, OutAS: 0

InPktDrops: 0, OutPktDrops: 0

CrcErrors: 0, SarTimeOuts: 0, OverSizedSDUs: 0

OAM cells received: 0

OAM cells sent: 0

Status: UP

TTL: 4

interface =  ATM2/0.2, call locally initiated, call reference = 154

vcnum = 218, vpi = 0, vci = 43, state = Active(U10)

, point-to-point call

Retry count: Current = 0

timer currently inactive, timer value = 00:00:00

Remote Atm Nsap address: 47.009181000000009021561401.0050A219F070.02

, VC owner: ATM_OWNER_LANE

Procida# show atm interface resource atm 1/1/0

Resource Management configuration:

Service Classes:

Service Category map: c2 cbr, c2 vbr-rt, c3 vbr-nrt, c4 abr,

Scheduling: RS c1 WRR c2, WRR c3, WRR c4, WRR c5

WRR Weight: 15 c2, 2 c3, 2 c4, 2 c5

CAC Configuration to account for Framing Overhead : Disabled

Pacing: disabled   0 Kbps rate configured, 0 Kbps rate installed

overbooking :  disabled

Service Categories supported: cbr,vbr-rt,vbr-nrt,abr,ubr

Link Distance: 0 kilometers

Controlled Link sharing:

Max aggregate guaranteed services: none RX,  none TX

Max bandwidth: none cbr RX, none cbr TX, none vbr RX, none vbr TX,

none abr RX, none abr TX, none ubr RX, none ubr TX

Min bandwidth: none cbr RX, none cbr TX, none vbr RX, none vbr TX,

none abr RX, none abr TX, none ubr RX, none ubr TX

Best effort connection limit: disabled  0 max connections

Max traffic parameters by service (rate in Kbps, tolerance in cell-times):

Peak-cell-rate RX: none cbr, none vbr, none abr, none ubr

Peak-cell-rate TX: none cbr, none vbr, none abr, none ubr

Sustained-cell-rate: none vbr RX, none vbr TX

Minimum-cell-rate RX: none abr, none ubr

Minimum-cell-rate TX: none abr, none ubr

CDVT RX: none cbr, none vbr, none abr, none ubr

CDVT TX: none cbr, none vbr, none abr, none ubr

MBS: none vbr RX, none vbr TX

Resource Management state:

Available bit rates (in Kbps):

37326 cbr RX, 37326 cbr TX, 37326 vbr RX, 37326 vbr TX,

37326 abr RX, 37326 abr TX, 37326 ubr RX, 37326 ubr TX

Allocated bit rates:

0 cbr RX, 0 cbr TX, 0 vbr RX, 0 vbr TX,

0 abr RX, 0 abr TX, 110416 ubr RX, 110416 ubr TX

Best effort connections: 7 pvcs,  5 svcs

您可以看到：

- 路由器1上显示的PCR是154584而不是140000。

- 根据配置，ATM交换机上分配的MCR是110416而不是100000。

这些差异是因为，在Cisco IOS软件版本12.1(5)E之前，在QoS数据库下配置的VC参数不是信元速率，而是数据包速率。因此，所显示的分配速率实际上是配置速率乘以53或48。

相关信息

- LAN 仿真示例配置

- LANE 设计推荐

- 排除LAN仿真交换环境故障

- LANE（LAN仿真）支持页

- ATM （异步传输模式）支持页面

- 技术支持和文档 - Cisco Systems