目录

简介

先决条件

要求

使用的组件

规则

主要 接口

多点子接口

点对点子接口

相关信息

简介

本文档说明了在本地ATM接口上配置虚拟路径标识符(VPI)和虚拟通道标识符(VCI)以便成功ping通的需要。

将IP地址应用到ATM接口只需将接口配置为路由IP接口。为使ping工作，还要配置永久虚电路(PVC)，以便路由器知道通过哪个虚电路(VC)发送ATM信元。如果没有VC，路由器会报告启用debug命令时的封装故障。通过封装，路由器指的是包绕ping数据包的第2层(L2)报头。

当您对本地接口执行ping操作时，ATM信元实际上会通过物理线路发送出去。如果端到端电路处于活动状态，则ping信元会传到远程路由器端，然后回环。或者，在路径中的某处配置硬件或软件环回，包括在本地接口本身。使用loopback diagnostic命令配置软件环回。

由于ATM VC是点对点的，请考虑以下有关要在其上配置VC的接口类型的点：

- 主接口 — 支持多条虚电路。每条虚电路需要静态或动态映射，将本地PVC值与远程IP地址匹配。如果没有映射，路由器将报告启用调试后的封装失败错误消息。

- 多点子接口 — 支持多条虚电路。每条虚电路需要静态或动态映射，将本地PVC值与远程IP地址匹配。如果没有映射，路由器将报告启用调试后的封装失败错误消息。

- 点对点子接口 — 支持单个VC。由于路由器根据定义假设虚电路另一端有一台设备，因此不需要显式映射。相反，路由器根据路由决策将数据包从VC转发出去。换句话说，路由表告诉路由器IP数据包的下一跳是VC的远程端。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档不限于特定的软件和硬件版本。

规则

有关文件规则的更多信息请参见“ Cisco技术提示规则”。

主要 接口

下表说明了ping本地接口所需的配置命令，具体取决于该接口是点对点接口还是多点接口。

在主ATM接口上配置仅IP地址和无VPI/VCI

!

interface ATM4/0

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

no atm ilmi-keepalive

!

cs-7204-15a#show atm vc

VCD /                                     Peak Avg/Min Burst

Interface      Name         VPI   VCI  Type   Encaps     Kbps   Kbps  Cells Sts

cs-7204-15a#show atm map

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

4w2d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending

4w2d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, encapsulation failed

!--- Router reports encapsulation failure messages because there is no VPI/VCI !--- on which to send the packet.

在主ATM接口上配置PVC

interface ATM4/0

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

no atm ilmi-keepalive

pvc 1/32

encapsulation aal5snap

cs-7204-15a#show atm vc

VCD /                                     Peak Avg/Min Burst

Interface      Name         VPI   VCI  Type   Encaps     Kbps   Kbps  Cells Sts

4/0            4              1    32   PVC    SNAP     149760                UP

cs-7204-15a#show atm map

cs-7204-15a#

debug ip packet

IP packet debugging is on

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

4w2d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending

4w2d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, encapsulation failed

!--- Although this configures a PVC, either a dynamic or !--- static mapping is still needed between the L2 and Layer 3 (L3) addresses.

在PVC上配置静态映射语句

interface ATM4/0

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

no atm ilmi-keepalive

pvc 1/32

protocol ip 10.1.1.1

!--- This configures a static map back to the local interface. !--- Normally, the map statement points to the remote IP address.

encapsulation aal5snap

cs-7204-15a#show atm map

Map list ATM4/0pvc4 : PERMANENT

ip 10.1.1.1 maps to VC 4, VPI 1, VCI 32, ATM4/0

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending.

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending.

!--- The router now sends the packets. However, since there is not a !--- remote end in the lab setup, the pings fail.

在主接口上配置环回诊断

interface ATM4/0

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

loopback diagnostic

!--- This configures a software loopback with the loopback diag command.

no atm ilmi-keepalive

pvc 1/32

protocol ip 10.1.1.1

encapsulation aal5snap

cs-7204-15a#show atm map

Map list ATM4/0pvc4 : PERMANENT

ip 10.1.1.1 maps to VC 4, VPI 1, VCI 32, ATM4/0

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/2/4 ms

cs-7204-15a#

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending

5w1d: IP: s=10.1.1.1 (ATM4/0), d=10.1.1.1 (ATM4/0), len 100, rcvd 3

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending

5w1d: IP: s=10.1.1.1 (ATM4/0), d=10.1.1.1 (ATM4/0), len 100, rcvd 3

!--- The pings are successful. Note that the local interface both !--- receives its own Internet Control Message Protocol (ICMP) echo and echo-reply.

多点子接口

配置ATM多点接口

interface ATM4/0

no ip address

no ip directed-broadcast

loopback diagnostic

no atm ilmi-keepalive

!

interface ATM4/0.1 multipoint

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

pvc 1/32

protocol ip 10.1.1.1

!--- This configures a static map or use inverse Address Resolution Protocol (ARP) on a multipoint subinterface.

encapsulation aal5snap

cs-7204-15a#show atm map

Map list ATM4/0.1pvc5 : PERMANENT

ip 10.1.1.1 maps to VC 5, VPI 1, VCI 32, ATM4/0.1

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/2/4 ms

cs-7204-15a#

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0.1), len 100, sending

5w1d: IP: s=10.1.1.1 (ATM4/0.1), d=10.1.1.1 (ATM4/0.1), len 100, rcvd 3

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0.1), len 100, sending

5w1d: IP: s=10.1.1.1 (ATM4/0.1), d=10.1.1.1 (ATM4/0.1), len 100, rcvd 3

点对点子接口

点对点子接口

interface ATM4/0

no ip address

no ip directed-broadcast

loopback diagnostic

!--- Use the loopback diagnostic command if !--- the PVC is not configured end to end.

no atm ilmi-keepalive

!

interface ATM4/0.2 point-to-point

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

pvc 1/32

encapsulation aal5snap

!--- Point-to-point interfaces do not need a static mapping or inverse ARP.

cs-7204-15a#show atm map

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/2/4 ms

cs-7204-15a#

00:11:03: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0.2), len 100, sending

00:11:03: IP: s=10.1.1.1 (ATM4/0.2), d=10.1.1.1 (ATM4/0.2), len 100, rcvd 3

00:11:03: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0.2), len 100, sending

00:11:03: IP: s=10.1.1.1 (ATM4/0.2), d=10.1.1.1 (ATM4/0.2), len 100, rcvd 3

相关信息

- 使用 LLC 封装的 ATM PVC中的多个 路由协议

- ATM PVC上的使用 VC 复用的多个路由协议

- 使用桥接 RFC 1483 的基本 PVC 配置

- 路由器与 Catalyst 交换机之间的桥接 PVC 连接

- ATM（异步传输模式）技术支持

- 更多ATM的信息

- 技术支持 - Cisco Systems