Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Fluxograma

Informações Relacionadas

Introduction

Este documento mostra o fluxograma para troubleshooting de T1 PRI.

Prerequisites

Requirements

Não existem requisitos específicos para este documento.

Componentes Utilizados

Este documento não se restringe a versões de software e hardware específicas.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

For more information on document conventions, refer to the Cisco Technical Tips Conventions.

Fluxograma

Para ver mais informações, clique nas caixas de comando. Clique nas informações em vermelho para passar ao próximo fluxograma.

Informações Relacionadas

- Troubleshooting de T1

- Troubleshooting de T1 Layer 1

- Troubleshooting do T1 Alarm

- Troubleshooting de Evento de Erro T1

- Teste forçado de circuito fechado de plugue

- Suporte Técnico - Cisco Systems