Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Informações de Apoio

Temporização

Configurar

Diagrama de Rede

Configurações

Verificar

No roteador asj3640-1

No Roteador asj3640-2

Troubleshoot

Informações Relacionadas

Introduction

Este documento contém uma configuração de exemplo para conectar e testar uma conexão T1 com os dois roteadores Cisco 3640 simultaneamente.

Nesta configuração de exemplo, configuramos o roteador Cisco asj3640-1 com a fonte de tempo definida como interna. Isso significa que o provedor de serviços ou a companhia telefônica (telco) não fornece o relógio, então o T1 precisa derivar o relógio internamente e é o "mestre" nesse caso. Também precisamos configurar todos os outros dispositivos diretamente conectados a este T1 para obter o relógio do mestre (roteador cisco asj3640-1) e agir como "escravos". Em nossa configuração, o escravo é o roteador Cisco asj3640-2.

Prerequisites

Requirements

Não existem requisitos específicos para este documento.

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- Software Cisco IOS® versão 11.3(10)T em asj3640-1. Usamos o módulo de rede NM-1CT1-CSU aqui.

- Software Cisco IOS versão 12.2(1) em asj3640-2. Usamos o módulo de rede NM-2CT1-CSU aqui.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Para obter mais informações sobre convenções de documento, consulte as Convenções de dicas técnicas Cisco.

Informações de Apoio

Temporização

O relógio é uma função importante nas redes T1. O relógio refere-se à temporização e sincronização da portadora T1. A temporização é codificada no sinal de dados transmitido e é usada para garantir a sincronização em toda a rede. Em uma situação típica, um lado da T1 fornece o relógio mestre, e o outro lado é um escravo do relógio mestre.

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Observação: para encontrar informações adicionais sobre os comandos usados neste documento, use a ferramenta Command Lookup Tool (somente clientes registrados).

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Figura 1 – Diagrama da Rede

Configurações

Este documento utiliza as seguintes configurações:

- asj3640-1

- asj3640-2

asj3640-1

asj3640-1#show running-config

Building configuration...

Current configuration:

!

version 11.3

!

hostname asj3640-1

!

!

controller T1 1/0

framing esf

clock source internal

linecode b8zs

channel-group 1 timeslots 1 speed 64

!

!

interface Serial1/0:1

ip address 10.10.10.1 255.255.255.192

encapsulation ppp

!

interface Ethernet2/0

ip address 171.68.186.116 255.255.255.240

!

!

line con 0

transport input none

line aux 0

line vty 0 4

exec-timeout 60 0

login

!

end

asj3640-2

asj3640-2#show running-config

Building configuration...

!

version 12.2

!

hostname asj3640-2

!

!

controller T1 1/0

framing esf

linecode b8zs

channel-group 1 timeslots 1 speed 64

!

controller T1 1/1

shutdown

!

interface Serial1/0:1

ip address 10.10.10.2 255.255.255.192

encapsulation ppp

!

interface Ethernet2/0

ip address 171.68.186.117 255.255.255.240

!

!

line con 0

transport input none

line 1 18

line aux 0

line vty 0 4

login

!

end

Verificar

Esta seção fornece informações que você pode usar para confirmar se sua configuração está funcionando adequadamente.

A Output Interpreter Tool (somente clientes registrados) oferece suporte a determinados comandos show, o que permite exibir uma análise da saída do comando show.

- show interfaces serial —exibe informações sobre uma interface serial.

- show controllers —exibe informações sobre um dispositivo de porta física.

- show diag — exibe estatísticas ambientais e status de diagnósticos iniciais.

Aqui está a saída desses comandos inseridos nos dispositivos mostrados na figura 1. Esta saída mostra que a rede funciona corretamente.

No roteador asj3640-1

asj3640-1#show interfaces serial 1/0:1

Serial1/0:1 is up, line protocol is up

Hardware is DSX1

Internet address is 10.10.10.1/26

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set, keepalive set (10 sec)

LCP Open

Open: IPCP, CDPCP

Last input 00:00:02, output 00:00:02, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/2 (size/max/drops); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

56408 packets input, 3194092 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

52431 packets output, 1988028 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Timeslot(s) Used:1, Transmitter delay is 0 flags

asj3640-1#show controllers t1

T1 1/0 is up.

T1 with CSU interface.

Cable Length is LONG, Rcv gain is 36 db and Tx gain is 0 db.

No alarms detected.

Framing is ESF, Line Code is B8ZS, Clock Source is Internal.

Data in current interval (765 seconds elapsed):

0 Line Code Violations, 0 Path Code Violations

0 Slip Secs, 0 Fr Loss Secs, 0 Line Err Secs, 0 Degraded Mins

0 Errored Secs, 0 Bursty Err Secs, 0 Severely Err Secs, 0 Unavail Secs

Total Data (last 24 hours)

0 Line Code Violations, 0 Path Code Violations,

0 Slip Secs, 0 Fr Loss Secs, 0 Line Err Secs, 0 Degraded Mins,

0 Errored Secs, 0 Bursty Err Secs, 0 Severely Err Secs, 0 Unavail Secs

asj3640-1#show diag

Slot 1:

CT1 (CSU) port adapter, 1 port

Port adapter is analyzed

Port adapter insertion time unknown

Hardware revision 1.1           Board revision A0

Serial number     5706080       Part number    800-01228-03

Test history      0x0           RMA number     00-00-00

EEPROM format version 1

EEPROM contents (hex):

0x20: 01 26 01 01 00 57 11 60 50 04 CC 03 00 00 00 00

0x30: 50 00 00 00 97 10 11 17 FF FF FF FF FF FF FF FF

No Roteador asj3640-2

asj3640-2#show interfaces serial 1/0:1

Serial1/0:1 is up, line protocol is up

Hardware is DSX1

Internet address is 10.10.10.2/26

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

LCP Open

Open: IPCP, CDPCP

Last input 00:00:03, output 04:23:19, output hang never

Last clearing of "show interface" counters 1d20h

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 8

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 48 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

34363 packets input, 1305984 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

37049 packets output, 2090260 bytes, 0 underruns

0 output errors, 0 collisions, 1 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Timeslot(s) Used:1, Transmitter delay is 0 flags

asj3640-2#show controllers t1

T1 1/0 is up.

Applique type is Channelized T1

Cablelength is long gain36 0db

No alarms detected.

alarm-trigger is not set

Framing is ESF, Line Code is B8ZS, Clock Source is Line.

Data in current interval (557 seconds elapsed):

0 Line Code Violations, 0 Path Code Violations

0 Slip Secs, 0 Fr Loss Secs, 0 Line Err Secs, 0 Degraded Mins

0 Errored Secs, 0 Bursty Err Secs, 0 Severely Err Secs, 0 Unavail Secs

Total Data (last 24 hours)

0 Line Code Violations, 0 Path Code Violations,

0 Slip Secs, 1 Fr Loss Secs, 0 Line Err Secs, 0 Degraded Mins,

0 Errored Secs, 0 Bursty Err Secs, 1 Severely Err Secs, 0 Unavail Secs

asj3640-2#show diag

Slot 1:

CT1 (CSU) Port adapter, 2 ports

Port adapter is analyzed

Port adapter insertion time unknown

EEPROM contents at hardware discovery:

Hardware revision 1.1           Board revision B0

Serial number     16809907      Part number    800-01229-04

Test history      0x0           RMA number     00-00-00

EEPROM format version 1

EEPROM contents (hex):

0x20: 01 27 01 01 01 00 7F B3 50 04 CD 04 00 00 00 00

0x30: 58 00 00 00 99 11 02 00 FF FF FF FF FF FF FF FF

Troubleshoot

Atualmente, não existem informações disponíveis específicas sobre Troubleshooting para esta configuração.

Informações Relacionadas

- Páginas de suporte de tecnologia de acesso

- Suporte Técnico - Cisco Systems