Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Produtos Relacionados

Conventions

Configurar

Diagrama de Rede

Configurações

Verificar

Em um host do Windows 2000 Server

Troubleshoot

Comandos para Troubleshooting

Informações Relacionadas

Introduction

Este documento ilustra uma configuração de discagem PPP (Point-to-Point Protocol) usando modems externos.

Prerequisites

Requirements

Você precisa configurar um nome de usuário e uma senha para cada usuário para o qual deseja discar porque essa configuração não tem um sistema de controlador de acesso de terminal (TACACS+) ou um servidor de serviço de usuário de discagem de autenticação remota (RADIUS). Todos os endereços IP são entregues ao cliente de um pool.

Para esta configuração, você precisa do seguinte:

- Os nomes de usuário e as senhas que você deseja que o cliente use (mesmo se for adicionar TACACS+ ou RADIUS posteriormente, adicione alguns nomes ao roteador para testar as linhas).

- O esquema de IP Addressing para criação de pool e para roteamento estático.

Componentes Utilizados

As informações neste documento são baseadas nas versões de software e hardware abaixo.

- Um Cisco 2511 em um ambiente de laboratório com configurações limpas.

- Cisco IOS® versão 12.2(10b) no roteador.

- Quatro números de modems assíncronos externos.

As informações neste documento foram criadas a partir de dispositivos em um ambiente de laboratório específico. All of the devices used in this document started with a cleared (default) configuration. Se você trabalhar em uma rede ativa, certifique-se de que entende o impacto potencial de qualquer comando antes de utilizá-lo.

Produtos Relacionados

Você também pode usar esta configuração com estas versões de hardware e software:

- Roteadores com interfaces assíncronas e interfaces seriais capazes de configurar interfaces assíncronas.

- Podem ser usadas interfaces seriais de porta assíncrona WIC-2A/S, 8 ou 16.

Conventions

For more information on document conventions, refer to the Cisco Technical Tips Conventions.

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Observação: para encontrar informações adicionais sobre os comandos usados neste documento, use a ferramenta Command Lookup Tool (somente clientes registrados).

Diagrama de Rede

Este documento utiliza a configuração de rede mostrada neste diagrama.

Configurações

Este documento utiliza as configurações mostradas abaixo.

Essa configuração foi testada usando o Cisco IOS Software Release 12.2(10b) em um roteador da série 2511. Os mesmos conceitos de configuração se aplicam a uma topologia de roteador semelhante ou a outras versões do Cisco IOS a partir de 11.0(3) ou posterior .

Cisco 2511

Current configuration:

!

version 12.2

service timestamps debug datetime msec

no service password-encryption

no service udp-small-servers

no service tcp-small-servers

!

hostname router1

!

enable secret <deleted>

!

username jason password foo

username laura password letmein

username russ password opensesame

username syed password bar

username tito password knockknock

!--- Usernames and passwords for clients making incoming calls.

modemcap entry default

!--- Modemcap named "default" is applied to the line 2 and line 3 !--- of Serial interfaces. Refer to the Modem-Router Connection Guide !--- and modemcap entry for more information.

!

interface Ethernet0

ip address 192.168.39.1 255.255.255.0

!

interface Serial0

no ip address

!

interface Serial1

no ip address

!

interface Group-Async1

!--- Async configuration for the external modems.

ip unnumbered ethernet0

encapsulation ppp

async mode interactive

peer default ip address pool dialup

!--- Assigns ip address for incoming calls !--- from the "dialup" pool.

no cdp enable

ppp authentication chap

group-range 1 16

!--- Includes lines 1 through 16 in the group-async1 interface.

!

ip local pool dialup 192.168.39.239 192.168.39.254

!--- Defines the range of ip addresses available !--- to the "dialup" pool.

!

line con 0

login

line 1 16

!--- Line configuration for the external modems.

login local

!--- Authenticate incoming calls locally with username and password !--- configured on the router.

autoselect during-login

autoselect ppp

!--- Launch PPP when PPP packets are received from the client.

modem InOut

!--- Allow incoming and outgoing calls.

transport input all

modem autoconfigure type default

!--- Apply the modemcap "default" (configured previously) to initalize !--- the modem. Refer to the link Modem-Router Connection Guide !--- for more information.

stopbits 1 flowcontrol hardware

line aux 0

line vty 0 4

exec-timeout 20 0

password letmein

login

!

end

Para usuários remotos que desejam se conectar ao escritório central em intervalos aleatórios por um tempo menor, esse tipo de conexão discada oferece uma solução mais barata. Na configuração acima, um usuário disca de seu desktop sobre um modem e estabelece uma conectividade PPP para o escritório central através de uma rede PSTN.

Para implementar essa configuração, você deve configurar o seguinte:

- Interface assíncrona.

- Linhas assíncronas.

- Pool de endereços ip no modo de configuração global.

- Parâmetros do modem - entrada de modem e Guia de Conexão Modem-Roteador.

- A rede dial-up deve ser configurada em um host.

Verificar

Esta seção fornece informações que você pode usar para confirmar se sua configuração está funcionando adequadamente.

A Output Interpreter Tool (somente clientes registrados) oferece suporte a determinados comandos show, o que permite exibir uma análise da saída do comando show.

- show users

- show interface

- show line

- show ip route

router1#show users

Line       User       Host(s)              Idle       Location

*  0 con 0                idle                 00:00:00

1 tty 1     jason      Async interface      00:00:34   PPP: 192.168.39.240

3 tty 3                Modem Autoconfigure  00:00:00

4 tty 4                Modem Autoconfigure  00:00:00

5 tty 5                Modem Autoconfigure  00:00:00

6 tty 6                Modem Autoconfigure  00:00:01

7 tty 7                Modem Autoconfigure  00:00:01

8 tty 8                Modem Autoconfigure  00:00:01

9 tty 9                Modem Autoconfigure  00:00:01

10 tty 10               Modem Autoconfigure  00:00:01

11 tty 11               Modem Autoconfigure  00:00:01

12 tty 12               Modem Autoconfigure  00:00:00

13 tty 13               Modem Autoconfigure  00:00:00

14 tty 14               Modem Autoconfigure  00:00:01

15 tty 15               Modem Autoconfigure  00:00:01

16 tty 16               Modem Autoconfigure  00:00:00

Interface  User  Mode  Idle  Peer  Address

router1#show interface asynchronous 1

Async1 is up, line protocol is up

Hardware is Async Serial

Interface is unnumbered. Using address of Ethernet0 (192.168.39.1)

MTU 1500 bytes, BW 115 Kbit, DLY 100000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set  Keepalive not set

DTR is pulsed for 5 seconds on reset

LCP Open

Open: IPCP

Last input 00:00:28, output 00:00:43, output hang never

Last clearing of "show interface" counters 00:29:49

Input queue: 1/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/1/16 (active/max active/max total )

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 86 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

34 packets input, 3147 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

2 input errors, 2 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

16 packets output, 383 bytes, 0 underruns

0 output errors, 0 collisions, 1 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

router1#show line

Tty Typ     Tx/Rx    A Modem  Roty AccO AccI   Uses   Noise  Overruns   Int

*    0 CTY              -    -      -    -    -      0       0     0/0       -

A    1 TTY 115200/115200- inout     -    -    -      1       1     0/0       -

*    2 TTY  38400/38400 - inout     -    -    -      0       0     0/0       -

*    3 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*    4 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*    5 TTY   1200/1200  - inout     -    -    -      0       0     0/0       -

*    6 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*    7 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*    8 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*    9 TTY   1200/1200  - inout     -    -    -      0       0     0/0       -

*   10 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*   11 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*   12 TTY 115200/115200- inout     -    -    -      0       0     0/0       -

*   13 TTY 115200/115200- inout     -    -    -      0       0     0/0       -

*   14 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*   15 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*   16 TTY    300/300   - inout     -    -    -      0       0     0/0       -

17 AUX   9600/9600  -    -      -    -    -      0       0     0/0       -

18 VTY              -    -      -    -    -      0       0     0/0       -

19 VTY              -    -      -    -    -      0       0     0/0       -

20 VTY              -    -      -    -    -      0       0     0/0       -

21 VTY              -    -      -    -    -      0       0     0/0       -

router1#show line 1

Tty Typ     Tx/Rx    A Modem  Roty AccO AccI   Uses   Noise  Overruns   Int

A    1 TTY 115200/115200- inout     -    -    -      1       1     0/0       -

Line 1, Location: "PPP: 192.168.39.240", Type: ""

Length: 24 lines, Width: 80 columns

Baud rate (TX/RX) is 115200/115200, no parity, 1 stopbits, 8 databits

Status: Ready, Active, No Exit Banner, Async Interface Active

Modem Detected, CTS Raised

Capabilities: Hardware Flowcontrol In, Hardware Flowcontrol Out

Modem Callout, Modem RI is CD, Line usable as async interface

Modem Autoconfigure

Modem state: Ready

Group codes: 0

Line is running PPP for address 192.168.39.240.

0 output packets queued, 1 input packets.

Async Escape map is 00000000000000000000000000000000

Modem hardware state: CTS DSR DTR RTS, Modem Configured

Special Chars: Escape Hold Stop Start Disconnect Activation

^^x none - - none

Timeouts: Idle EXEC Idle Session Modem Answer Session Dispatch

00:10:00 never none not set

Idle Session Disconnect Warning

never

router1#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is not set

C 192.168.39.0/24 is directly connected, Ethernet0

Em um host do Windows 2000 Server

Configure a conexão dial-up no host Windows 2000. Configure o nome de usuário, a senha e o número de telefone e disque a conexão.

Depois que a conexão dial-up é estabelecida, um endereço IP é alocado do pool de discagem configurado no roteador. Podemos verificar isso emitindo o comando ipconfig no host. Ele é exibido como um adaptador PPP no host.

C:\Documents and Settings\Administrator>ipconfig

Windows 2000 IP Configuration

Ethernet adapter Local Area Connection:

Media State . . . . . . . . . . . : Cable Disconnected

PPP adapter Dial-up Connection:

Connection-specific DNS Suffix . :

IP Address. . . . . . . . . . . . : 192.168.39.240

Subnet Mask . . . . . . . . . . . : 255.255.255.255

Default Gateway . . . . . . . . . : 192.168.39.240

Para verificar o estabelecimento da conexão do host do servidor Windows 2000 para o roteador Cisco 2511, você pode fazer ping do host para a porta ethernet do roteador e verificar o estabelecimento da conexão. Aqui, 192.168.39.1 é o endereço IP da porta Ethernet do roteador.

C:\Documents and Settings\Administrator>ping 192.168.39.1

Pinging 192.168.39.1 with 32 bytes of data:

Reply from 192.168.39.1: bytes=32 time=170ms TTL=255

Reply from 192.168.39.1: bytes=32 time=111ms TTL=255

Reply from 192.168.39.1: bytes=32 time=110ms TTL=255

Reply from 192.168.39.1: bytes=32 time=100ms TTL=255

Ping statistics for 192.168.39.1:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 100ms, Maximum = 170ms, Average = 122ms

Troubleshoot

Esta seção fornece informações que podem ser usadas para o troubleshooting da sua configuração.

Comandos para Troubleshooting

A Output Interpreter Tool (somente clientes registrados) oferece suporte a determinados comandos show, o que permite exibir uma análise da saída do comando show.

Observação: antes de emitir comandos debug, consulte Informações importantes sobre comandos debug.

- debug ppp negotiation - Para ver se um cliente está passando a negociação PPP. Isto ocorre quando você verifica a negociação de endereço.

- debug ppp authentication - Para ver se um cliente foi aprovado na autenticação.

- debug ppp error – Para exibir erros do protocolo e estatísticas de erros associados à negociação e operação da conexão PPP

- debug modem – Para ver se um roteador está recebendo os sinais corretos do modem.

- show line [# tty line]  Para procurar pelo estado do hardware do modem.

As seguintes saídas foram obtidas do roteador Cisco 2511. Eles mostram o servidor Windows 2000 discando para o link PSTN do Cisco 2511 e estabelecendo uma conexão PPP.

router1#debug ppp negotiation

PPP protocol negotiation debugging is on

router1#debug vtemplate

Virtual Template debugging is on

router1#show debug

PPP:

PPP protocol negotiation debugging is on

Dec 10 18:43:59.079: As1 LCP: I CONFREQ [Closed] id 1 len 50

Dec 10 18:43:59.083: As1 LCP:    ACCM 0x00000000 (0x020600000000)

Dec 10 18:43:59.087: As1 LCP:    MagicNumber 0x59F402A1 (0x050659F402A1)

Dec 10 18:43:59.087: As1 LCP:    PFC (0x0702)

Dec 10 18:43:59.091: As1 LCP:    ACFC (0x0802)

Dec 10 18:43:59.091: As1 LCP:    Callback 6  (0x0D0306)

Dec 10 18:43:59.095: As1 LCP:    MRRU 1614 (0x1104064E)

Dec 10 18:43:59.099: As1 LCP:    EndpointDisc 1 Local

Dec 10 18:43:59.099: As1 LCP:     (0x131701714C44F0EC8F45BABDC596D14B)

Dec 10 18:43:59.103: As1 LCP:     (0x79DB5300000000)

Dec 10 18:43:59.107: As1 LCP: Lower layer not up, Fast Starting

Dec 10 18:43:59.107: As1 PPP: Treating connection as a dedicated line

Dec 10 18:43:59.111: As1 PPP: Phase is ESTABLISHING,

Active Open [0 sess, 0 load]

Dec 10 18:43:59.115: As1 LCP: O CONFREQ [Closed] id 3 len 25

Dec 10 18:43:59.119: As1 LCP:    ACCM 0x000A0000 (0x0206000A0000)

Dec 10 18:43:59.123: As1 LCP:    AuthProto CHAP (0x0305C22305)

Dec 10 18:43:59.127: As1 LCP:    MagicNumber 0x002AF05C (0x0506002AF05C)

Dec 10 18:43:59.127: As1 LCP:    PFC (0x0702)

Dec 10 18:43:59.131: As1 LCP:    ACFC (0x0802)

Dec 10 18:43:59.135: As1 LCP: O CONFREJ [REQsent] id 1 len 11

Dec 10 18:43:59.139: As1 LCP:    Callback 6  (0x0D0306)

Dec 10 18:43:59.139: As1 LCP:    MRRU 1614 (0x1104064E)

Dec 10 18:43:59.155: %LINK-3-UPDOWN: Interface Async1,

changed state to up

Dec 10 18:43:59.263: As1 LCP: I CONFACK [REQsent] id 3 len 25

Dec 10 18:43:59.267: As1 LCP:    ACCM 0x000A0000 (0x0206000A0000)

Dec 10 18:43:59.267: As1 LCP:    AuthProto CHAP (0x0305C22305)

Dec 10 18:43:59.271: As1 LCP:    MagicNumber 0x002AF05C (0x0506002AF05C)

Dec 10 18:43:59.275: As1 LCP:    PFC (0x0702)

Dec 10 18:43:59.275: As1 LCP:    ACFC (0x0802)

Dec 10 18:43:59.279: As1 LCP: I CONFREQ [ACKrcvd] id 2 len 43

Dec 10 18:43:59.283: As1 LCP:    ACCM 0x00000000 (0x020600000000)

Dec 10 18:43:59.287: As1 LCP:    MagicNumber 0x59F402A1 (0x050659F402A1)

Dec 10 18:43:59.287: As1 LCP:    PFC (0x0702)

Dec 10 18:43:59.291: As1 LCP:    ACFC (0x0802)

Dec 10 18:43:59.291: As1 LCP:    EndpointDisc 1 Local

Dec 10 18:43:59.295: As1 LCP:     (0x131701714C44F0EC8F45BABDC596D14B)

Dec 10 18:43:59.299: As1 LCP:     (0x79DB5300000000)

Dec 10 18:43:59.303: As1 LCP: O CONFACK [ACKrcvd] id 2 len 43

Dec 10 18:43:59.307: As1 LCP:    ACCM 0x00000000 (0x020600000000)

Dec 10 18:43:59.311: As1 LCP:    MagicNumber 0x59F402A1 (0x050659F402A1)

Dec 10 18:43:59.311: As1 LCP:    PFC (0x0702)

Dec 10 18:43:59.315: As1 LCP:    ACFC (0x0802)

Dec 10 18:43:59.315: As1 LCP:    EndpointDisc 1 Local

Dec 10 18:43:59.319: As1 LCP:     (0x131701714C44F0EC8F45BABDC596D14B)

Dec 10 18:43:59.323: As1 LCP:     (0x79DB5300000000)

Dec 10 18:43:59.327: As1 LCP: State is Open

Dec 10 18:43:59.327: As1 PPP: Phase is AUTHENTICATING,

by this end [0 sess, 1 load]

Dec 10 18:43:59.331: As1 CHAP: O CHALLENGE id 2 len 25 from "router1"

Dec 10 18:43:59.459: As1 LCP: I IDENTIFY [Open] id 3 len 18 magic

0x59F402A1 MSRASV5.00

Dec 10 18:43:59.463: As1 LCP: I IDENTIFY [Open] id 4 len 28 magic

0x59F402A1

MSRAS-1-LAB-WIN2K-PC

Dec 10 18:43:59.467: As1 CHAP: I RESPONSE id 2 len 26 from "jason"

Dec 10 18:43:59.479: As1 CHAP: O SUCCESS id 2 len 4

Dec 10 18:43:59.483: As1 PPP: Phase is UP [0 sess, 1 load]

Dec 10 18:43:59.487: As1 IPCP: O CONFREQ [Closed] id 1 len 10

Dec 10 18:43:59.491: As1 IPCP:    Address 192.168.39.1

(0x0306C0A82701)

Dec 10 18:43:59.567: As1 CCP: I CONFREQ [Not negotiated] id 5 len 10

Dec 10 18:43:59.571: As1 CCP:    MS-PPC supported bits 0x00000001

(0x120600000001)

Dec 10 18:43:59.575: As1 LCP: O PROTREJ [Open] id 4 len 16 protocol CCP

(0x80FD0105000A120600000001)

Dec 10 18:43:59.599: As1 IPCP: I CONFREQ [REQsent] id 6 len 40

Dec 10 18:43:59.603: As1 IPCP:    CompressType VJ 15 slots CompressSlotID

(0x0206002D0F01)

Dec 10 18:43:59.607: As1 IPCP:    Address 0.0.0.0 (0x030600000000)

Dec 10 18:43:59.611: As1 IPCP:    PrimaryDNS 0.0.0.0 (0x810600000000)

Dec 10 18:43:59.615: As1 IPCP:    PrimaryWINS 0.0.0.0 (0x820600000000)

Dec 10 18:43:59.615: As1 IPCP:    SecondaryDNS 0.0.0.0 (0x830600000000)

Dec 10 18:43:59.619: As1 IPCP:    SecondaryWINS 0.0.0.0 (0x840600000000)

Dec 10 18:43:59.623: As1 IPCP: O CONFREJ [REQsent] id 6 len 34

Dec 10 18:43:59.627: As1 IPCP:    CompressType VJ 15 slots CompressSlotID

(0x0206002D0F01)

Dec 10 18:43:59.631: As1 IPCP:    PrimaryDNS 0.0.0.0 (0x810600000000)

Dec 10 18:43:59.635: As1 IPCP:    PrimaryWINS 0.0.0.0 (0x820600000000)

Dec 10 18:43:59.639: As1 IPCP:    SecondaryDNS 0.0.0.0 (0x830600000000)

Dec 10 18:43:59.643: As1 IPCP:    SecondaryWINS 0.0.0.0 (0x840600000000)

Dec 10 18:43:59.647: As1 IPCP: I CONFACK [REQsent] id 1 len 10

Dec 10 18:43:59.651: As1 IPCP:    Address 192.168.39.1 (0x0306C0A82701)

Dec 10 18:43:59.735: As1 IPCP: I CONFREQ [ACKrcvd] id 7 len 10

Dec 10 18:43:59.739: As1 IPCP:    Address 0.0.0.0 (0x030600000000)

Dec 10 18:43:59.743: As1 IPCP: O CONFNAK [ACKrcvd] id 7 len 10

Dec 10 18:43:59.747: As1 IPCP:    Address 192.168.39.240

(0x0306C0A827F0)

Dec 10 18:43:59.835: As1 IPCP: I CONFREQ [ACKrcvd] id 8 len 10

Dec 10 18:43:59.839: As1 IPCP:    Address 192.168.39.240 (0x0306C0A827F0)

Dec 10 18:43:59.843: As1 IPCP: O CONFACK [ACKrcvd] id 8 len 10

Dec 10 18:43:59.847: As1 IPCP:    Address 192.168.39.240 (0x0306C0A827F0)

Dec 10 18:43:59.851: As1 IPCP: State is Open

Dec 10 18:43:59.863: As1 IPCP: Install route to 192.168.39.240

Dec 10 18:44:00.483: %LINEPROTO-5-UPDOWN:

Line protocol on Interface Async1, changed state to up

Informações Relacionadas

- Página de suporte à tecnologia de acesso discado

- entrada de modemcap

- Manual de conexão do modem-router

- Suporte Técnico - Cisco Systems