Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Produtos Relacionados

Conventions

Informações de Apoio

Configurar

Diagrama de Rede

Configurações

Verificar

Comandos show em Venus após discagem para Saturn

Comandos show em discagens Saturn After Venus

Troubleshoot

Troubleshooting de Recursos

Comandos para Troubleshooting

Comandos de depuração em Vênus quando o tráfego interessante chega

Informações Relacionadas

Introduction

Este documento fornece uma configuração de exemplo para o uso do bridging intermediário PPP para conectar redes roteadas e interconectadas.

Prerequisites

Requirements

Não existem requisitos específicos para este documento.

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- Software Cisco IOS® versão 12.2(7b).

- Dois roteadores da série Cisco 2500. Cada uma tem pelo menos uma interface ISDN BRI.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Produtos Relacionados

Esta configuração também pode ser utilizada com estas versões de hardware e software:

- Qualquer interface serial, como serial, BRI (Basic Rate Interface Interface de Taxa Básica), PRI (Primary Rate Interface Interface de Taxa Primária) e assim por diante.

- Software Cisco IOS versão 11.2.

- Qualquer roteador executando o software Cisco IOS conforme mencionado acima e pelo menos uma porta ISDN-BRI. No entanto, o recurso de meia ponte pode ser usado em um roteador com uma interface serial.

Conventions

Para obter mais informações sobre convenções de documento, consulte as Convenções de dicas técnicas Cisco.

Informações de Apoio

A ponte envia pacotes de ponte para a meia-ponte PPP que os converte em pacotes roteados e os encaminha para outros processos do roteador. Da mesma forma, a meia-bridge PPP converte pacotes roteados em pacotes de bridge Ethernet e os envia à bridge na mesma sub-rede Ethernet.

Observação: essa configuração não cobre uma bridge completa em ambos os lados. Para tal configuração, consulte o documento Bridging Across ISDN.

Esteja ciente de que o Bridging em uma conexão ISDN tende a manter a conexão ativa por períodos muito longos, se não permanentemente. Se a Telco cobrar por ISDN com base no tempo de conexão, isso pode resultar em uma conta muito grande. Consequentemente, esse cenário é recomendado para aqueles que têm linhas ISDN de uso ilimitado.

Observação: uma interface não pode funcionar como uma meia ponte e uma bridge. O software Cisco IOS não suporta mais de uma meia ponte PPP por sub-rede Ethernet.

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Observação: para encontrar informações adicionais sobre os comandos usados neste documento, use a ferramenta Command Lookup Tool (somente clientes registrados).

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Configurações

Este documento utiliza as seguintes configurações:

- Vênus

Esse roteador está configurado como uma bridge completa com o roteamento IP desabilitado. O dispositivo disca quando qualquer tráfego de ponte chega.

- Saturno

Este roteador foi configurado como uma meia ponte. Observe que os comandos dialer string, dialer group e dialer list não estão configurados nesse lado. Assim, esse roteador nunca discará, mas aceitará chamadas recebidas. Isso impede que o roteador disque para o roteador remoto. Ativamos o roteamento IP aqui. O software Full Bridging não está configurado neste roteador. A meia ponte PPP está sendo executada na interface BRI, portanto comandos como show bridge e show spanning-tree não produzem nenhuma saída neste roteador.

Vênus

Venus#show running-config

!

version 12.2

!

hostname Venus

!

username Saturn password 0 same

!--- Required for PPP CHAP authentication during dialup

ip subnet-zero

no ip routing

!--- Turn off routing

no ip domain-lookup

!

isdn switch-type basic-5ess

!--- The ISDN switchtype for this circuit. Obtain this information from the !--- Telco. This ISDN switch type is USA specific and could be changed !--- depending on the country and TELCO requirements

!

interface Ethernet0

ip address 10.1.1.2 255.0.0.0

!--- This is for management purpose only

no ip route-cache

no ip mroute-cache

bridge-group 1

!--- Assign this interface to Bridge Group 1 !--- Frames are bridged only among interfaces in the same group !--- Note: the dialer1 interface is also in this bridge-group 1

interface BRI0

no ip address

no ip route-cache

no ip mroute-cache

dialer pool-member 1

!--- Dialer profiles configured with same dialer pool # !--- (in this case, dialer1) will bind to this interface

isdn switch-type basic-5ess

!--- Check with your Telco for the correct values

!

interface Dialer1

!--- Configure the Dialer profile

description ISDN to Saturn

ip address 10.1.1.2 255.0.0.0

encapsulation ppp

dialer pool 1

!--- Use physical interfaces configured with same pool # !--- (in this case, bri0) during dialup

dialer remote-name Saturn

!--- Specifies remote CHAP name

dialer string 5552000

!--- Specifies the number to dial when interesting traffic arrives

dialer-group 1

!--- Defines the interesting traffic as configured in the dialer-list

ppp authentication chap

!--- Use CHAP as the authentication method

bridge-group 1

!--- Assign this interface to Bridge Group 1. !--- Frames are bridged only among interfaces in the same group. !--- Note: the Ethernet interface 0 is also in this bridge-group 1

ip default-gateway 10.1.1.3

!--- All default traffic from Venus should go through Saturn

dialer-list 1 protocol bridge permit

!--- Defines the interesting traffic. In this case, all bridged traffic

bridge 1 protocol ieee

!--- Define the type of Spanning-Tree Protocol used for the interface in !--- bridge-group 1. Here we use the IEEE spanning tree protocol. The IEEE 802.1D !--- Spanning-Tree Protocol is the preferred way of running the bridge.

!

Saturno

Saturn#show running-config

!

version 12.2

!

hostname Saturn

!

username Venus password 0 same

!--- Required for PPP CHAP authentication during dialup

ip subnet-zero

no ip domain-lookup

!

isdn switch-type basic-5ess

!--- The ISDN switchtype for this circuit. Obtain this information from the !--- Telco. This ISDN switch type is USA specific and could be changed !--- depending on the country and Telco requirements

!

interface Ethernet0

ip address 192.168.1.1 255.255.0.0

!

interface BRI0

no ip address

no ip mroute-cache

dialer pool-member 1

!--- Dialer profiles configured with same dialer pool # !--- (in this case, dialer1) will bind to this interface

isdn switch-type basic-5ess

!

interface Dialer1

!--- Configure the Dialer profile

description ISDN to Venus

ip address 10.1.1.3 255.0.0.0

!--- IP address is required to route the bridged traffic from Venus !--- This ip address MUST be in the same subnet as the remote bridge network

encapsulation ppp

dialer pool 1

!--- Use physical interfaces configured with same pool # !--- (in this case, bri0) during dialup

dialer remote-name Venus

pulse-time 0

ppp bridge ip

!--- Configures half bridge

ppp authentication chap

!--- Use CHAP as the authentication method

!

Verificar

Esta seção fornece informações que você pode usar para confirmar se sua configuração está funcionando adequadamente.

A Output Interpreter Tool (somente clientes registrados) oferece suporte a determinados comandos show, o que permite exibir uma análise da saída do comando show.

- show isdn status —exibe o status L1, L2 e L3 das interfaces ISDN.

- show dialer — exibe o status do discador e o status individual dos canais ISDN.

- show bridge — exibe classes de entradas no banco de dados de encaminhamento de bridge, no modo EXEC privilegiado.

- show interface —exibe o status de várias interfaces, incluindo as interfaces serial e BRI.

- show arp —verifica o mapeamento ARP. O ARP é um protocolo usado para mapear o endereço da Camada 2 (endereço MAC) para um endereço da Camada 3 (endereço IP).

- show spanning-tree —exibe a topologia spanning-tree conhecida pelo roteador.

Comandos show em Venus após discagem para Saturn

Venus#show isdn status

Global ISDN Switchtype = basic-5ess

ISDN BRI0 interface

dsl 0, interface ISDN Switchtype = basic-5ess

Layer 1 Status:

ACTIVE

Layer 2 Status:

TEI = 107, Ces = 1, SAPI = 0, State = MULTIPLE_FRAME_ESTABLISHED

Layer 3 Status:

1 Active Layer 3 Call(s)

CCB:callid=800E, sapi=0, ces=1, B-chan=2, calltype=DATA

Active dsl 0 CCBs = 1

The Free Channel Mask:

0x80000001

Number of L2 Discards = 0, L2 Session ID = 17

Total Allocated ISDN CCBs = 1

Venus#show dialer

BRI0 - dialer type = ISDN

Dial String Successes Failures Last DNIS Last status

0 incoming call(s) have been screened.

0 incoming call(s) rejected for callback.

BRI0:1 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is idle

BRI0:2 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up

Dial reason: bridge (0x0800)

Interface bound to profile Di1

Time until disconnect 90 secs

Current call connected 00:00:31

Di1 - dialer type = DIALER PROFILE

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up

Number of active calls = 1

Dial String Successes Failures Last DNIS  Last status

5552000   5   1   00:00:34  Successful Default

Venus#show interface bri0:2

BRI0:2 is up, line protocol is up

Hardware is BRI

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

Time to interface disconnect: idle 00:01:18

Interface is bound to Di1 (Encapsulation PPP)

LCP Open

Closed: IPCP

Open: BRIDGECP, CDPCP

!--- Bridge Control Protocol is open

Last input 00:00:42, output 00:00:00, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

161 packets input, 9796 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

328 packets output, 16659 bytes, 0 underruns

0 output errors, 0 collisions, 7 interface resets

0 output buffer failures, 0 output buffers swapped out

16 carrier transitions

Venus#show bridge

Total of 300 station blocks, 298 free

Codes: P - permanent, S - self

Bridge Group 1:

Address Action Interface Age RX count TX count

00d0.58ad.ae13 forward Ethernet0 0 74 58

0060.5cf4.a955 forward Dialer1 0 58 72

Venus#show arp

Protocol Address Age (min) Hardware Addr Type Interface

Internet 10.1.1.2 - 0060.5cf4.a9a8 ARPA Ethernet0

Internet 10.1.1.3 0 0060.5cf4.a955 ARPA Dialer1

Venus#show spanning-tree

Bridge group 1 is executing the ieee compatible Spanning Tree protocol

Bridge Identifier has priority 32768, address 0060.5cf4.a9a8

Configured hello time 2, max age 20, forward delay 15

Current root has priority 32768, address 0009.7c2e.ba00

Root port is 2 (Ethernet0), cost of root path is 100

Topology change flag not set, detected flag not set

Number of topology changes 1 last change occurred 22:09:28 ago

from Ethernet0

Times: hold 1, topology change 35, notification 2

hello 2, max age 20, forward delay 15

Timers: hello 0, topology change 0, notification 0, aging 300

Port 2 (Ethernet0) of Bridge group 1 is forwarding

Port path cost 100, Port priority 128, Port Identifier 128.2.

Designated root has priority 32768, address 0009.7c2e.ba00

Designated bridge has priority 32768, address 0009.7c2e.ba00

Designated port id is 128.13, designated path cost 0

Timers: message age 2, forward delay 0, hold 0

Number of transitions to forwarding state: 1

BPDU: sent 1, received 39911

Port 8 (Dialer1) of Bridge group 1 is forwarding

Port path cost 17857, Port priority 128, Port Identifier 128.8.

Designated root has priority 32768, address 0009.7c2e.ba00

Designated bridge has priority 32768, address 0060.5cf4.a9a8

Designated port id is 128.8, designated path cost 100

Timers: message age 0, forward delay 0, hold 0

Number of transitions to forwarding state: 1

BPDU: sent 39879, received 0

Comandos show em discagens Saturn After Venus

Saturn#show dialer

BRI0 - dialer type = ISDN

Dial String Successes Failures Last DNIS Last status

0 incoming call(s) have been screened.

0 incoming call(s) rejected for callback.

BRI0:1 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is idle

BRI0:2 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up

Interface bound to profile Di1

Time until disconnect 45 secs

Connected to

(Venus)

Di1 - dialer type = DIALER PROFILE

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up   Number of active calls = 1

Dial String Successes Failures Last DNIS Last status

Saturn#show isdn status

Global ISDN Switchtype = basic-5ess

ISDN BRI0 interface

dsl 0, interface ISDN Switchtype = basic-5ess

Layer 1 Status:

ACTIVE

Layer 2 Status:

TEI = 105, Ces = 1, SAPI = 0, State = MULTIPLE_FRAME_ESTABLISHED

I_Queue_Len 0, UI_Queue_Len 0

Layer 3 Status:

1 Active Layer 3 Call(s)

CCB:callid=2B, sapi=0, ces=1, B-chan=2, calltype=DATA

Active dsl 0 CCBs = 1

The Free Channel Mask: 0x80000001

Number of L2 Discards = 0, L2 Session ID = 37

Total Allocated ISDN CCBs = 1

Saturn#show arp

Protocol Address Age (min) Hardware Addr Type Interface

Internet 10.1.1.2 27 0060.5cf4.a9a8 ARPA Dialer1

Internet 10.1.1.1 63 00d0.58ad.ae13 ARPA Dialer1

Internet 192.168.1.1 - 0060.5cf4.a955 ARPA Ethernet0

Internet 192.168.1.2 53 0000.0c76.2882 ARPA Ethernet0

Saturn#show spanning-tree

No spanning tree instances exist.

!--- This router does not run full bridge, !--- so spanning tree does not run on this router

Saturn#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is not set

C 10.0.0.0/8 is directly connected, Dialer1

C 192.168.0.0/16 is directly connected, Ethernet0

Troubleshoot

Esta seção fornece informações que podem ser usadas para o troubleshooting da sua configuração.

Troubleshooting de Recursos

Os procedimentos de Troubleshooting para chamadas ISDN de entrada e saída são explicados na Documento Tecnologia de Discagem:Técnicas de Troubleshooting. Informações adicionais sobre como solucionar problemas das camadas 1, 2 e 3 da ISDN são fornecidas em Using the show isdn status Command for BRI Troubleshooting and Troubleshooting ISDN BRI Layer 3 usando o Comando debug isdn q931.

Comandos para Troubleshooting

A Output Interpreter Tool (somente clientes registrados) oferece suporte a determinados comandos show, o que permite exibir uma análise da saída do comando show.

Observação: antes de inserir o comando debug, consulte Informações importantes sobre os comandos debug.

- debug dialer —indica quando o tráfego interessante foi detectado e quando a discagem foi iniciada.

- debug isdn event — indica que a atividade ISDN está ocorrendo no lado do usuário da interface ISDN e é semelhante à debug isdn q931.

- debug isdn q931 —fornece informações sobre a configuração de chamadas e a desconexão de conexões de rede ISDN (Camada 3), entre o roteador local (lado do usuário) e a rede.

- debug isdn q921 —exibe os procedimentos de acesso da camada de enlace (Camada 2) que estão ocorrendo no roteador no canal D (LAPD) de sua interface ISDN.

- debug ppp negotiation —executa a negociação de opções PPP e parâmetros do Network Control Protocol (NCP).

- debug ppp authentication —permite a troca de pacotes Challenge Authentication Protocol (CHAP) e Password Authentication Protocol (PAP).

Comandos de depuração em Vênus quando o tráfego interessante chega

Venus#

*Mar  1 22:00:14.838: BR0 DDR: rotor dialout [priority]

*Mar  1 22:00:14.838: BR0 DDR: Dialing cause bridge (0x0800)

*Mar  1 22:00:14.842: BR0 DDR: Attempting to dial 5552000

*Mar  1 22:00:14.846: ISDN BR0: Outgoing call id = 0x8006, dsl 0

*Mar  1 22:00:14.846: ISDN BR0: Event: Call to 5552000 at 64 Kb/s

*Mar  1 22:00:14.850: ISDN BR0: process_bri_call(): call id 0x8006,

called_number 5552000, speed 64, call type DATA

*Mar  1 22:00:14.854: CCBRI_Go Fr Host InPkgInfo (Len=22) :

*Mar  1 22:00:14.858: 1 0 1 80 6 0 4 2 88 90 18 1 83 2C 7 35 35 35 32 30 30 30

*Mar  1 22:00:14.866:

*Mar  1 22:00:14.870: CC_CHAN_GetIdleChanbri: dsl 0

*Mar  1 22:00:14.870:     Found idle channel B1

*Mar  1 22:00:14.886: ISDN BR0: TX -> INFOc sapi=0 tei=106 ns=0 nr=0

i=0x08010605040288901801832C0735353532303030

*Mar  1 22:00:14.906:     SETUP pd = 8  callref = 0x06

*Mar  1 22:00:14.914:         Bearer Capability i = 0x8890

*Mar  1 22:00:14.918:         Channel ID i = 0x83

*Mar  1 22:00:14.92Venus#6:         Keypad Facility i = '5552000'

*Mar  1 22:00:15.190: ISDN BR0: RX <- INFOc sapi=0 tei=106 ns=0 nr=1

i=0x0801860218018A

*Mar  1 22:00:15.198:     CALL_PROC pd = 8  callref = 0x86

*Mar  1 22:00:15.206:         Channel ID i = 0x8A

*Mar  1 22:00:15.222: ISDN BR0: TX -> RRr sapi=0 tei=106 nr=1

*Mar  1 22:00:15.230: CCBRI_Go Fr L3 pkt (Len=7) :

*Mar  1 22:00:15.230: 2 1 6 98 18 1 8A

*Mar  1 22:00:15.234:

*Mar  1 22:00:15.238: ISDN BR0: LIF_EVENT: ces/callid 1/0x8006

HOST_PROCEEDING

*Mar  1 22:00:15.238: ISDN BR0: HOST_PROCEEDING

*Mar  1 22:00:15.242: ISDN BR0: HOST_MORE_INFO

*Mar  1 22:00:15.658: ISDN BR0: RX <- INFOc sapi=0 tei=106 ns=1

nr=1 i=0x08018607

*Mar  1 22:00:15.666:     CONNECT pd = 8  callref = 0x86

*Mar  1 22:00:15.678: ISDN BR0: TX -> RRr sapi=0 tei=106 nr=2

*Mar  1 22:00:15.686: CCBRI_Go Fr L3 pkt (Len=4) :

*Mar  1 22:00:15.690: 7 1 6 91

*Mar  1 22:00:15.690:

*Mar  1 22:00:15.694: ISDN BR0: LIF_EVENT: ces/callid 1/0x8006 HOST_CONNECT

22:00:15: %LINK-3-UPDOWN: Interface BRI0:2, changed state to up

*Mar  1 22:00:15.702: BR0:2 PPP: Phase is DOWN, Setup [0 sess, 0 load]

*Mar  1 22:00:15.706: BR0:2 PPP: No remote authentication for call-out

*Mar  1 22:00:15.710: BR0:2 PPP: Phase is ESTABLISHING [0 sess, 0 load]

*Mar  1 22:00:15.710: BR0:2 PPP: Treating connection as a callout

*Mar  1 22:00:15.714: BR0:2 PPP: No remote authentication for call-out

*Mar  1 22:00:15.718: BR0:2 LCP: O CONFREQ [Closed] id 1 len 10

*Mar  1 22:00:15.722: BR0:2 LCP:    MagicNumber 0x6515B12A (0x05066515B12A)

*Mar  1 22:00:15.722: BR0:2: interface must be fifo queue, force fifo

22:00:15: %DIALER-6-BIND: Interface BR0:2 bound to profile Di1

*Mar  1 22:00:15.742: ISDN: get_isdn_service_state(): idb 0x1A2DBC bchan 3

is_isdn 1 Not a Pri

*Mar  1 22:00:15.746: BR0:2 PPP: Treating connection as a callout

*Mar  1 22:00:15.746: ISDN BR0: Event: Connected to 5552000 on B2 at 64 Kb/s

*Mar  1 22:00:15.762: ISDN BR0: TX -> INFOc sapi=0 tei=106 ns=1 nr=2 i=0x0801060F

*Mar  1 22:00:15.766:     CONNECT_ACK pd = 8  callref = 0x06

*Mar  1 22:00:15.774: BR0:2 LCP: I CONFREQ [REQsent] id 1 len 15

*Mar  1 22:00:15.778: BR0:2 LCP:    AuthProto CHAP (0x0305C22305)

*Mar  1 22:00:15.782: BR0:2 LCP:    MagicNumber 0x788C6F8F (0x0506788C6F8F)

*Mar  1 22:00:15.786: BR0:2 LCP: O CONFACK [REQsent] id 1 len 15

*Mar  1 22:00:15.790: BR0:2 LCP:    AuthProto CHAP (0x0305C22305)

*Mar  1 22:00:15.790: BR0:2 LCP:    MagicNumber 0x788C6F8F (0x0506788C6F8F)

*Mar  1 22:00:15.798: BR0:2 LCP: I CONFACK [ACKsent] id 1 len 10

*Mar  1 22:00:15.798: BR0:2 LCP:    MagicNumber 0x6515B12A (0x05066515B12A)

*Mar  1 22:00:15.802: BR0:2 LCP: State is Open

*Mar  1 22:00:15.806: BR0:2 PPP: Phase is AUTHENTICATING, by the peer

[0 sess, 1 load]

*Mar  1 22:00:15.870: ISDN BR0: RX <- RRr sapi=0 tei=106 nr=2

*Mar  1 22:00:15.882: BR0:2 CHAP: I CHALLENGE id 31 len 27 from "Saturn"

*Mar  1 22:00:15.890: BR0:2 CHAP: O RESPONSE id 31 len 26 from "Venus"

*Mar  1 22:00:15.914: BR0:2 CHAP: I SUCCESS id 31 len 4

*Mar  1 22:00:15.918: BR0:2 PPP: Phase is UP [0 sess, 1 load]

*Mar  1 22:00:15.922: BR0:2 BNCP: O CONFREQ [Closed] id 1 len 4

*Mar  1 22:00:15.926: BR0:2 IPCP: O CONFREQ [Closed] id 1 len 10

*Mar  1 22:00:15.930: BR0:2 IPCP:    Address 10.1.1.2 (0x03060A010102)

*Mar  1 22:00:15.934: BR0:2 CDPCP: O CONFREQ [Closed] id 1 len 4

*Mar  1 22:00:15.942: BR0:2 BNCP: I CONFREQ [REQsent] id 1 len 4

*Mar  1 22:00:15.946: BR0:2 BNCP: O CONFACK [REQsent] id 1 len 4

*Mar  1 22:00:15.950: BR0:2 CDPCP: I CONFREQ [REQsent] id 1 len 4

*Mar  1 22:00:15.954: BR0:2 CDPCP: O CONFACK [REQsent] id 1 len 4

*Mar  1 22:00:15.958: BR0:2 BNCP: I CONFACK [ACKsent] id 1 len 4

*Mar  1 22:00:15.958: BR0:2 BNCP: State is Open

*Mar  1 22:00:15.966: BR0:2 LCP: I PROTREJ [Open] id 2 len 16 protocol IPCP

(0x80210101000A03060A010102)

*Mar  1 22:00:15.970: BR0:2 IPCP: State is Closed

*Mar  1 22:00:15.974: BR0:2 CDPCP: I CONFACK [ACKsent] id 1 len 4

*Mar  1 22:00:15.978: BR0:2 CDPCP: State is Open

*Mar  1 22:00:15.978: BR0:2 DDR: dialer protocol up

22:00:16: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0:2,

changed state to up

22:00:21: %ISDN-6-CONNECT: Interface BRI0:2 is now connected to 5552000

Venus#

Saturn#

4d16h: ISDN BR0: RX <- UI c/r=1 sapi=0 tei=127

i=0x080141050402889018018A7008C135353532303030

4d16h:     SETUP pd = 8  callref = 0x41

4d16h:         Bearer Capability i = 0x8890

4d16h:         Channel ID i = 0x8A

4d16h:         Called Party Number i = 0xC1, '5552000', Plan:ISDN,

Type:Subscriber(local)

4d16h: CCBRI_Go Fr L3 pkt (Len=21) :

4d16h: 5 1 C1 90 4 2 88 90 18 1 8A 70 8 C1 35 35 35 32 30 30 30

4d16h:

4d16h: ISDN BR0: Incoming call id = 0x002B, dsl 0

4d16h: ISDN BR0: LIF_EVENT: ces/callid 1/0x2B HOST_INCOMING_CALL

4d16h: ISDN BR0: HOST_INCOMING_CALL: (non-POTS) DATA

4d16h: ISDN BR0: HOST_INCOMING_CALL: (1) call_type = DATA

4d16h: ISDN BR0: HOST_INCOMING_CALL: voice_answer_data = FALSE call type is DATA

4d16h: ISDN BR0: Event: Received a DATA call from

on B2 at 64 Kb/s

4d16h: ISDN BR0: Event: Accepting the call id 0x2B

4d16h: BR0:2 PPP: Phase is DOWN, Setup [0 sess, 1 load]

4d16h: BR0:2 PPP: Phase is ESTABLISHING [0 sess, 1 load]

4d16h: BR0:2: inteSarface must be fifo queue, force fifo

4d16h: %DIALER-6-BIND: Interface BR0:2 bound to profile Di1

4d16h: ISDN BR0: RM returned call_type 0 resource type 0 response 1

4d16h: CCBRI_Go Fr Host InPkgInfo (Len=9) :

4d16h: 7 0 1 0 2B 3 18 1 8A

4d16h:

4d16h: ISDN BR0: isdn_send_connect(): msg 4, call id 0x2B, ces 1 bchan 1, c

all type DATA

4d16h: %LINK-3-UPDOWN: Interface BRI0:2, changed state to up

4d16h: ISDN: get_isdn_service_state(): idb 0x1A2EAC bchan 3 is_isdn 1 Not a Pri

4d16h: BR0:2 PPP: Treating connection as a callin

4d16h: BR0:2 LCP: State is Listen

4d16h: CCBRI_Go Fr Host InPkgInfo (Len=6) :

4d16h: 4 0 1 0 2B 0

4d16h:

4d16h: ISDN BR0: TX -> INFOc sapi=0 tei=105 ns=7 nr=5 i=0x0801C10218018A

4d16h:     CALL_PROC pd = 8  callref = 0xC1

4d16h:         Channel ID i = 0x8A

4d16h: ISDN BR0: RX <- RRr sapi=0 tei=105 nr=8

4d16h: ISDN BR0: TX -> INFOc sapi=0 tei=105 ns=8 nr=5 i=0x0801C107

4d16h:     CONNECT pd = 8  callref = 0xC1

4d16h: ISDN BR0: RX <- INFOc sapi=0 tei=105 ns=5 nr=9 i=0x0801410F

4d16h:     CONNECT_ACK pd = 8  callref = 0x41

4d16h: ISDN BR0: TX -> RRr sapi=0 tei=105 nr=6

4d16h: CCBRI_Go Fr L3 pkt (Len=4) :

4d16h: F 1 C1 92

4d16h:

4d16h: ISDN BR0: LIF_EVENT: ces/callid 1/0x2B HOST_CONNECT

4d16h: ISDN BR0: Event: Connected to <unknown> on B2 at 64 Kb/s

4d16h: BR0:2 LCP: I CONFREQ [Listen] id 1 len 10

4d16h: BR0:2 LCP:    MagicNumber 0x6515B12A (0x05066515B12A)

4d16h: BR0:2 LCP: O CONFREQ [Listen] id 1 len 15

4d16h: BR0:2 LCP:    AuthProto CHAP (0x0305C22305)

4d16h: BR0:2 LCP:    MagicNumber 0x788C6F8F (0x0506788C6F8F)

4d16h: BR0:2 LCP: O CONFACK [Listen] id 1 len 10

4d16h: BR0:2 LCP:    MagicNumber 0x6515B12A (0x05066515B12A)

4d16h: BR0:2 LCP: I CONFACK [ACKsent] id 1 len 15

4d16h: BR0:2 LCP:    AuthProto CHAP (0x0305C22305)

4d16h: BR0:2 LCP:    MagicNumber 0x788C6F8F (0x0506788C6F8F)

4d16h: BR0:2 LCP: State is Open

4d16h: BR0:2 PPP: Phase is AUTHENTICATING, by this end [0 sess, 0 load]

4d16h: BR0:2 CHAP: O CHALLENGE id 31 len 27 from "Saturn"

4d16h: BR0:2 CHAP: I RESPONSE id 31 len 26 from "Venus"

4d16h: BR0:2 CHAP: O SUCCESS id 31 len 4

4d16h: BR0:2 PPP: Phase is UP [0 sess, 0 load]

4d16h: BR0:2 BNCP: O CONFREQ [Closed] id 1 len 4

4d16h: BR0:2 CDPCP: O CONFREQ [Closed] id 1 len 4

4d16h: BR0:2 BNCP: I CONFREQ [REQsent] id 1 len 4

4d16h: BR0:2 BNCP: O CONFACK [REQsent] id 1 len 4: BR0:2 IPCP: I CONFREQ

[Not negotiated] id 1 len 10

4d16h: BR0:2 IPCP:    Address 10.1.1.2 (0x03060A010102)

4d16h: BR0:2 LCP: O PROTREJ [Open] id 2 len 16 protocol IPCP

(0x80210101000A03060A010102)

4d16h: BR0:2 CDPCP: I

4d16h CONFREQ [REQsent] id 1 len 4

4d16h: BR0:2 CDPCP: O CONFACK [REQsent] id 1 len 4

4d16h: BR0:2 BNCP: I CONFACK [ACKsent] id 1 len 4

4d16h: BR0:2 BNCP: State is Open

4d16h: BR0:2 CDPCP: I CONFACK [ACKsent] id 1 len 4

4d16h: BR0:2 CDPCP: State is Open

4d16h: BR0:2 DDR: dialer protocol up

4d16h: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0:2, changed state to up

4d16h: %ISDN-6-CONNECT: Interface BRI0:2 is now connected to

<unknown phone number> Venus

!--- Unknown phone number because of no dialer string on Saturn

Saturn#

Informações Relacionadas

- Mais informações sobre os comandos de backup de discagem

- Suporte tecnológico Cisco - Discagem

- Suporte Técnico - Cisco Systems