Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Produtos Relacionados

Conventions

Configurar

Diagrama de Rede

Configurações

Verificar

Exemplo de saída de show

Troubleshoot

Troubleshooting de Recursos

Comandos para Troubleshooting

Exemplo de saída de depuração

Informações Relacionadas

Introduction

A conexão PPP multilink (MLP, Multilink PPP) equilibra a carga sobre as interfaces do discador, como interfaces ISDN, síncronas e assíncronas. A conexão MLP divide pacotes e envia os fragmentos por circuitos paralelos. Dessa forma, melhora a produtividade e reduz a latência entre sistemas. A conexão MLP fornece um método para dividir, recombinar e sequenciar datagramas entre vários links de dados lógicos. O MLP permite que os pacotes se fragmentem, e que os fragmentos sejam enviados simultaneamente por vários links ponto a ponto ao mesmo endereço remoto.

Este documento ilustra uma conexão Multilink entre interfaces seriais através da configuração de modelo virtual.

Prerequisites

Requirements

Não existem requisitos específicos para este documento.

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- Software Cisco IOS® versão 11.2 ou posterior.

- Dois roteadores Cisco 2503, cada um com duas interfaces WAN seriais. Esses roteadores executam o software Cisco IOS Release 12.2(7b).

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Produtos Relacionados

Essa configuração também pode ser usada com essas versões de hardware e software.

- Qualquer par de roteadores que tenham duas interfaces WAN seriais. É possível usar WIC-1T, WIC-2T e interfaces WAN seriais fixas.

Conventions

Consulte as Convenções de Dicas Técnicas da Cisco para obter mais informações sobre convenções de documentos.

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Nota:Use a Command Lookup Tool (somente clientes registrados) para obter mais informações sobre os comandos usados neste documento.

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Os Roteadores Montecito e Goleta estão conectados back-to-back por meio das interfaces Serial0 e Serial1. Essa configuração usa um Modelo Virtual de cada lado, o Point-to-Point Protocol (PPP) Multilink e interliga e roteia o IP e o IPX entre os roteadores.

Configurações

Este documento utiliza as seguintes configurações:

- Montecito

- Goleta

Montecito

Montecito#write terminal

Building configuration...

Current configuration : 945 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Montecito

!

boot system flash c2500-d-l.122-7b.bin

no logging buffered

!

ip subnet-zero

no ip domain-lookup

!

!

multilink virtual-template 1

!--- Applies the virtual interface template to the multilink bundle. !--- All multilink calls have virtual-access interfaces cloned !--- from virtual-template 1.

!

ipx routing 0000.0c31.aac2

!

interface Loopback0

ip address 10.1.1.1 255.0.0.0

ipx network BEEF

!

interface Ethernet0

no ip address

shutdown

!

!

!--- Virtual-template is a logical interface that creates virtual access !--- interfaces dynamically, and applies them to physical serial interfaces.

interface Virtual-Template1

!--- Assumes the IP & IPX address of Loopback0.

ip unnumbered Loopback0

ipx ppp-client Loopback0

ppp multilink

!--- Enables Multilink PPP on the interface.

bridge-group 1

!

interface Serial0

no ip address

encapsulation ppp

no ip route-cache

no ip mroute-cache

no fair-queue

!--- Enables Multilink PPP on the interface.

ppp multilink

!

interface Serial1

no ip address

encapsulation ppp

no ip route-cache

no ip mroute-cache

no fair-queue

!--- Enables Multilink PPP on the interface.

ppp multilink

!

interface BRI0

no ip address

shutdown

!

no ip classless

!

bridge 1 protocol ieee

!

line con 0

line aux 0

line vty 0 4

login

!

end

Goleta

Goleta#write terminal

Building configuration...

Current configuration : 960 bytes

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Goleta

!

!

ip subnet-zero

no ip domain-lookup

!

!

!--- Applies the virtual interface template to the multilink bundle. !--- Skip this step for ISDN or dialer interfaces.

multilink virtual-template 1

ipx routing 0000.0c47.4e9a

!

!

!

interface Loopback0

ip address 192.168.10.2 255.255.255.0

ipx network BEEF

!

interface Ethernet0

no ip address

shutdown

!

!--- Virtual-template is a logical interface that Creates virtual access !--- interfaces dynamically and applies them to physical serial interfaces.

interface Virtual-Template1

!--- Assumes the IP & IPX address of Loopback0.

ip unnumbered Loopback0

ipx ppp-client Loopback0

!

!--- Enables Multilink PPP on the interface.

ppp multilink

bridge-group 1

!

interface Serial0

no ip address

encapsulation ppp

no fair-queue

clockrate 1000000

!

!--- Enables Multilink PPP on the interface.

ppp multilink

!

interface Serial1

no ip address

encapsulation ppp

no fair-queue

clockrate 1000000

!

!--- Enables Multilink PPP on the interface.

ppp multilink

!

interface BRI0

no ip address

shutdown

!

ip classless

!

bridge 1 protocol ieee

!

line con 0

line aux 0

line vty 0 4

!

end

Verificar

Use esta seção para confirmar se a sua configuração funciona corretamente.

A Output Interpreter Tool ( somente clientes registrados) (OIT) oferece suporte a determinados comandos show. Use a OIT para exibir uma análise da saída do comando show.

- show ppp multilink — mostra informações sobre grupos multilink ativos. Use esse comando para verificar a conexão multilink.

- show interface virtual-access — mostra o status, dados do tráfego e informações de configuração sobre uma interface específica de acesso virtual.

- show interface serial — permite que você resolva qualquer problema com a interface serial

Exemplo de saída de show

Comandos show no Montecito após a Conexão ser Feita

Montecito#show interface virtual-access 1

Virtual-Access1 is up, line protocol is up

Hardware is Virtual Access interface

Interface is unnumbered. Using address of Loopback0 (10.1.1.1)

MTU 1500 bytes, BW 3088 Kbit, DLY 100000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

DTR is pulsed for 5 seconds on reset

LCP Open, multilink Open

Open: BRIDGECP, IPCP, IPXCP

Last input 00:00:00, output never, output hang never

Last clearing of "show interface" counters 00:02:09

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

22 packets input, 743 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

8 packets output, 124 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Montecito#show interface serial 0

Serial0 is up, line protocol is up

Hardware is HD64570

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

LCP Open, multilink Open

Last input 00:00:00, output 00:00:06, output hang never

Last clearing of "show interface" counters 02:04:30

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

3320 packets input, 107170 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

1483 packets output, 24622 bytes, 0 underruns

0 output errors, 0 collisions, 6 interface resets

0 output buffer failures, 0 output buffers swapped out

8 carrier transitions

DCD=up DSR=up DTR=up RTS=up CTS=up

Montecito#show interface serial 1

Serial1 is up, line protocol is up

Hardware is HD64570

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

LCP Open, multilink Open

Last input 00:00:00, output 00:00:00, output hang never

Last clearing of "show interface" counters 02:04:32

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

3320 packets input, 107161 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

1482 packets output, 24646 bytes, 0 underruns

0 output errors, 0 collisions, 6 interface resets

0 output buffer failures, 0 output buffers swapped out

8 carrier transitions

DCD=up DSR=up DTR=up RTS=up CTS=up

Montecito#show ppp multilink

Virtual-Access1, bundle name is Goleta

Bundle up for 00:01:39

0 lost fragments, 0 reordered, 0 unassigned

0 discarded, 0 lost received, 1/255 load

0x3D received sequence, 0xB sent sequence

Member links: 2 (max not set, min not set)

Serial1, since 00:01:40, last rcvd seq 00003C

Serial0, since 00:01:39, last rcvd seq 00003B

Montecito#show bridge group

Bridge Group 1 is running the IEEE compatible Spanning Tree protocol

Port 10 (Virtual-Access1) of bridge group 1 is forwarding

Port 9 (Virtual-Template1) of bridge group 1 is down

Montecito#

Comandos show no Goleta após a Conexão ser Feita

Goleta#show interface virtual-access 1

Virtual-Access1 is up, line protocol is up

Hardware is Virtual Access interface

Interface is unnumbered. Using address of Loopback0 (192.168.10.2)

MTU 1500 bytes, BW 3088 Kbit, DLY 100000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

DTR is pulsed for 5 seconds on reset

LCP Open, multilink Open

Open: BRIDGECP, IPCP, IPXCP

Last input 00:00:10, output never, output hang never

Last clearing of "show interface" counters 00:02:18

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

4 packets input, 52 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

28 packets output, 892 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Goleta#show interface serial 0

Serial0 is up, line protocol is up

Hardware is HD64570

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

LCP Open, multilink Open

Last input 01:52:28, output 00:00:00, output hang never

Last clearing of "show interface" counters 02:55:09

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

2364 packets input, 41972 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

4465 packets output, 134689 bytes, 0 underruns

0 output errors, 0 collisions, 148 interface resets

0 output buffer failures, 0 output buffers swapped out

294 carrier transitions

DCD=up DSR=up DTR=up RTS=up CTS=up

Goleta#show interface serial 1

Serial1 is up, line protocol is up

Hardware is HD64570

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

LCP Open, multilink Open

Last input 01:52:38, output 00:00:00, output hang never

Last clearing of "show interface" counters 02:55:18

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

2366 packets input, 42030 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

4472 packets output, 134930 bytes, 0 underruns

0 output errors, 0 collisions, 147 interface resets

0 output buffer failures, 0 output buffers swapped out

289 carrier transitions

DCD=up DSR=up DTR=up RTS=up CTS=up

Goleta#sh ppp multilink

Virtual-Access1, bundle name is Montecito

Bundle up for 00:01:35

0 lost fragments, 0 reordered, 0 unassigned

0 discarded, 0 lost received, 1/255 load

0xB received sequence, 0x3B sent sequence

Member links: 2 (max not set, min not set)

Serial0, since 00:01:36, last rcvd seq 00000A

Serial1, since 00:01:35, last rcvd seq 000009

Goleta#show bridge group

Bridge Group 1 is running the IEEE compatible Spanning Tree protocol

Port 10 (Virtual-Access1) of bridge group 1 is forwarding

Port 9 (Virtual-Template1) of bridge group 1 is down

Troubleshoot

Use esta seção para resolver problemas de configuração.

Troubleshooting de Recursos

Use estes recursos para troubleshooting quando necessário:

- Troubleshooting Problemas de Linha Serial

- Conexões back-to-back HDLC

- Resolução de problemas de linhas alugadas

Comandos para Troubleshooting

A Output Interpreter Tool ( somente clientes registrados) (OIT) oferece suporte a determinados comandos show. Use a OIT para exibir uma análise da saída do comando show.

Nota:Consulte Informações Importantes sobre Comandos de Depuração antes de usar comandos debug.

- debug ppp negotiation — indica se um cliente passa a negociação PPP. Também verifica a negociação de endereços.

- debug ppp authentication — indica se um cliente passa a autenticação. Use esse comando se você usa o software Cisco IOS Release 11.2 ou versões mais recentes.

- debug ppp chap — indica se um cliente passa a autenticação. Use esse comando se você usa uma release do software Cisco IOS anterior à 11.2.

- debug ppp error — mostra erros de protocolo e estatísticas de erros associados à negociação e à operação da conexão PPP.

- debug vtemplate — permite que você veja as configurações do modelo virtual que estão sendo usadas.

- debug vprofile — permite que você veja as opções de configuração aplicadas à interface de acesso virtual.

Exemplo de saída de depuração

Aqui estão algumas saídas de debugação para chamadas bem-sucedidas. Preste atenção às seções com fonte em negrito. Compare a saída que você obtém com o resultado mostrado aqui:

depurações de PPP em Montecito

Montecito#debug ppp negotiation

PPP protocol negotiation debugging is on

Montecito#

00:07:30: %LINK-3-UPDOWN: Interface Serial1, changed state to up

00:07:30: Se1 PPP: Treating connection as a dedicated line

00:07:30: Se1 PPP: Phase is ESTABLISHING, Active Open [0 sess, 2 load]

00:07:30: Se1 LCP: O CONFREQ [Closed] id 4 len 26

00:07:30: Se1 LCP:    MagicNumber 0x6063D57E (0x05066063D57E)

00:07:30: Se1 LCP:    MRRU 1524 (0x110405F4)

00:07:30: Se1 LCP:    EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

00:07:30: Se1 LCP: I CONFREQ [REQsent] id 101 len 23

00:07:30: Se1 LCP:    MagicNumber 0x60944B81 (0x050660944B81)

00:07:30: Se1 LCP:    MRRU 1524 (0x110405F4)

00:07:30: Se1 LCP:    EndpointDisc 1 Goleta (0x130901476F6C657461)

00:07:30: Se1 LCP: O CONFACK [REQsent] id 101 len 23

00:07:30: Se1 LCP:    MagicNumber 0x60944B81 (0x050660944B81)

00:07:30: Se1 LCP:    MRRU 1524 (0x110405F4)

00:07:30: Se1 LCP:    EndpointDisc 1 Goleta (0x130901476F6C657461)

00:07:30: Se1 LCP: I CONFACK [ACKsent] id 4 len 26

00:07:30: Se1 LCP:    MagicNumber 0x6063D57E (0x05066063D57E)

00:07:30: Se1 LCP:    MRRU 1524 (0x110405F4)

00:07:30: Se1 LCP:    EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

00:07:30: Se1 LCP: State is Open

00:07:30: Se1 PPP: Phase is VIRTUALIZED [0 sess, 1 load]

00:07:31: Vi1 PPP: Phase is DOWN, Setup [0 sess, 0 load]

00:07:31: Vi1 PPP: Phase is ESTABLISHING [0 sess, 0 load]

00:07:31: %LINK-3-UPDOWN: Interface Serial0, changed state to up

00:07:31: Se0 PPP: Treating connection as a dedicated line

00:07:31: Se0 PPP: Phase is ESTABLISHING, Active Open [0 sess, 0 load]

00:07:31: Se0 LCP: O CONFREQ [Closed] id 4 len 26

00:07:31: Se0 LCP:    MagicNumber 0x6063D8DC (0x05066063D8DC)

00:07:31: Se0 LCP:    MRRU 1524 (0x110405F4)

00:07:31: Se0 LCP:    EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

00:07:31: %LINK-3-UPDOWN: Interface Virtual-Access1, changed state to up

00:07:31: Vi1 PPP: Treating connection as a dedicated line

00:07:31: Vi1 LCP: O CONFREQ [Closed] id 1 len 26

00:07:31: Vi1 LCP:    MagicNumber 0x6063D8F9 (0x05066063D8F9)

00:07:31: Vi1 LCP:    MRRU 1524 (0x110405F4)

00:07:31: Vi1 LCP:    EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

00:07:31: Vi1 PPP: Phase is UP [0 sess, 0 load]

00:07:31: Vi1 BNCP: O CONFREQ [Closed] id 1 len 4

00:07:31: Vi1 IPCP: O CONFREQ [Closed] id 1 len 10

00:07:31: Vi1 IPCP:    Address 10.1.1.1 (0x03060A010101)

00:07:31: Vi1 IPXCP: O CONFREQ [Closed] id 1 len 18

00:07:31: Vi1 IPXCP:    Network 0x0000BEEF (0x01060000BEEF)

00:07:31: Vi1 IPXCP:    Node 0000.0c31.aac2 (0x020800000C31AAC2)

00:07:31: Vi1 MLP: Added first link Se1 to bundle Goleta

00:07:31: Se0 LCP: I CONFREQ [REQsent] id 101 len 23

00:07:31: Se0 LCP:    MagicNumber 0x60944EF7 (0x050660944EF7)

00:07:31: Se0 LCP:    MRRU 1524 (0x110405F4)

00:07:31: Se0 LCP:    EndpointDisc 1 Goleta (0x130901476F6C657461)

00:07:31: Se0 LCP: O CONFACK [REQsent] id 101 len 23

00:07:31: Se0 LCP:    MagicNumber 0x60944EF7 (0x050660944EF7)

00:07:31: Se0 LCP:    MRRU 1524 (0x110405F4)

00:07:31: Se0 LCP:    EndpointDisc 1 Goleta (0x130901476F6C657461)

00:07:31: Se1 BNCP: MLP bundle interface is built, process packets now

00:07:31: Se1 BNCP: Redirect packet to Vi1

00:07:31: Vi1 BNCP: I CONFREQ [REQsent] id 1 len 4

00:07:31: Vi1 BNCP: O CONFACK [REQsent] id 1 len 4

00:07:31: Vi1 IPCP: I CONFREQ [REQsent] id 1 len 10

00:07:31: Vi1 IPCP:    Address 192.168.10.2 (0x0306C0A80A02)

00:07:31: Vi1 IPCP: O CONFACK [REQsent] id 1 len 10

00:07:31: Vi1 IPCP:    Address 192.168.10.2 (0x0306C0A80A02)

00:07:31: Vi1 IPXCP: I CONFREQ [REQsent] id 1 len 18

00:07:31: Vi1 IPXCP:    Network 0x0000BEEF (0x01060000BEEF)

00:07:31: Vi1 IPXCP:    Node 0000.0c47.4e9a (0x020800000C474E9A)

00:07:31: Vi1 IPXCP: O CONFACK [REQsent] id 1 len 18

00:07:31: Vi1 IPXCP:    Network 0x0000BEEF (0x01060000BEEF)

00:07:31: Vi1 IPXCP:    Node 0000.0c47.4e9a (0x020800000C474E9A)

00:07:31: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial1,

changed state to up

00:07:31: Se0 LCP: I CONFACK [ACKsent] id 4 len 26

00:07:31: Se0 LCP:    MagicNumber 0x6063D8DC (0x05066063D8DC)

00:07:31: Se0 LCP:    MRRU 1524 (0x110405F4)

00:07:31: Se0 LCP:    EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

00:07:31: Se0 LCP: State is Open

00:07:31: Se0 PPP: Phase is VIRTUALIZED [0 sess, 2 load]

00:07:31: Vi1 MLP: Added link Se0 to bundle Goleta

00:07:31: Vi1 BNCP: I CONFACK [ACKsent] id 1 len 4

00:07:31: Vi1 BNCP: State is Open

00:07:31: Vi1 IPCP: I CONFACK [ACKsent] id 1 len 10

00:07:31: Vi1 IPCP:    Address 10.1.1.1 (0x03060A010101)

00:07:31: Vi1 IPCP: State is Open

00:07:31: Vi1 IPXCP: I CONFACK [ACKsent] id 1 len 18

00:07:31: Vi1 IPXCP:    Network 0x0000BEEF (0x01060000BEEF)

00:07:31: Vi1 IPXCP:    Node 0000.0c31.aac2 (0x020800000C31AAC2)

00:07:31: Vi1 IPXCP: State is Open

00:07:31: Vi1 IPCP: Install route to 192.168.10.2

00:07:32: %LINEPROTO-5-UPDOWN: Line protocol on Interface Virtual-Access1,

changed state to up

00:07:32: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial0,

changed state to up

Montecito#

Montecito#ping  192.168.10.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.10.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 8/9/12 ms

Montecito#ping ipx

Target IPX address: BEEF.0000.0c47.4e9a

Repeat count [5]:

Datagram size [100]:

Timeout in seconds [2]:

Verbose [n]:

Type escape sequence to abort.

Sending 5, 100-byte IPX Novell Echoes to BEEF.0000.0c47.4e9a,

timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 8/10/12 ms

Montecito#

Debugação de PPP no Goleta

Goleta#debug ppp negotiation

PPP protocol negotiation debugging is on

Goleta#

01:00:26: Se0 PPP: Treating connection as a dedicated line

01:00:26: Se0 PPP: Phase is ESTABLISHING, Active Open [0 sess, 0 load]

01:00:26: Se0 LCP: O CONFREQ [Closed] id 101 len 23

01:00:26: Se0 LCP: MagicNumber 0x60944B81 (0x050660944B81)

01:00:26: Se0 LCP: MRRU 1524 (0x110405F4)

01:00:26: Se0 LCP: EndpointDisc 1 Goleta (0x130901476F6C657461)

01:00:26: Se0 LCP: I CONFREQ [REQsent] id 4 len 26

01:00:26: Se0 LCP: MagicNumber 0x6063D57E (0x05066063D57E)

01:00:26: Se0 LCP: MRRU 1524 (0x110405F4)

01:00:26: Se0 LCP: EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

01:00:26: Se0 LCP: O CONFACK [REQsent] id 4 len 26

01:00:26: Se0 LCP: MagicNumber 0x6063D57E (0x05066063D57E)

01:00:26: Se0 LCP: MRRU 1524 (0x110405F4)

01:00:26: Se0 LCP: EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

01:00:26: Se0 LCP: I CONFACK [ACKsent] id 101 len 23

01:00:26: Se0 LCP: MagicNumber 0x60944B81 (0x050660944B81)

01:00:26: Se0 LCP: MRRU 1524 (0x110405F4)

01:00:26: Se0 LCP: EndpointDisc 1 Goleta (0x130901476F6C657461)

01:00:26: Se0 LCP: State is Open

01:00:26: Se0 PPP: Phase is VIRTUALIZED [0 sess, 0 load]

01:00:26: Vi1 PPP: Phase is DOWN, Setup [0 sess, 0 load]

01:00:26: Vi1 PPP: Phase is ESTABLISHING [0 sess, 0 load]

01:00:27: %LINK-3-UPDOWN: Interface Serial1, changed state to up

01:00:27: Se1 PPP: Treating connection as a dedicated line

01:00:27: Se1 PPP: Phase is ESTABLISHING, Active Open [0 sess, 0 load]

01:00:27: Se1 LCP: O CONFREQ [Closed] id 101 len 23

01:00:27: Se1 LCP: MagicNumber 0x60944EF7 (0x050660944EF7)

01:00:27: Se1 LCP: MRRU 1524 (0x110405F4)

01:00:27: Se1 LCP: EndpointDisc 1 Goleta (0x130901476F6C657461)

01:00:27: %LINK-3-UPDOWN: Interface Virtual-Access1, changed state to up

01:00:27: Vi1 PPP: Treating connection as a dedicated line

01:00:27: Vi1 LCP: O CONFREQ [Closed] id 1 len 23

01:00:27: Vi1 LCP: MagicNumber 0x60944F10 (0x050660944F10)

01:00:27: Vi1 LCP: MRRU 1524 (0x110405F4)

01:00:27: Vi1 LCP: EndpointDisc 1 Goleta (0x130901476F6C657461)

01:00:27: Vi1 PPP: Phase is UP [0 sess, 0 load]

01:00:27: Vi1 BNCP: O CONFREQ [Closed] id 1 len 4

01:00:27: Vi1 IPCP: O CONFREQ [Closed] id 1 len 10

01:00:27: Vi1 IPCP: Address 192.168.10.2 (0x0306C0A80A02)

01:00:27: Vi1 IPXCP: O CONFREQ [Closed] id 1 len 18

01:00:27: Vi1 IPXCP: Network 0x0000BEEF (0x01060000BEEF)

01:00:27: Vi1 IPXCP: Node 0000.0c47.4e9a (0x020800000C474E9A)

01:00:27: Vi1 MLP: Added first link Se0 to bundle Montecito

01:00:27: Se1 LCP: I CONFREQ [REQsent] id 4 len 26

01:00:27: Se1 LCP: MagicNumber 0x6063D8DC (0x05066063D8DC)

01:00:27: Se1 LCP: MRRU 1524 (0x110405F4)

01:00:27: Se1 LCP: EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

01:00:27: Se1 LCP: O CONFACK [REQsent] id 4 len 26

01:00:27: Se1 LCP: MagicNumber 0x6063D8DC (0x05066063D8DC)

01:00:27: Se1 LCP: MRRU 1524 (0x110405F4)

01:00:27: Se1 LCP: EndpointDisc 1 Montecito (0x130C014D6F6E74656369746F)

01:00:27: Se0 BNCP: MLP bundle interface is built, process packets now

01:00:27: Se0 BNCP: Redirect packet to Vi1

01:00:27: Vi1 BNCP: I CONFREQ [REQsent] id 1 len 4

01:00:27: Vi1 BNCP: O CONFACK [REQsent] id 1 len 4

01:00:27: Se0 IPCP: MLP bundle interface is built, process packets now

01:00:27: Se0 IPCP: Redirect packet to Vi1

01:00:27: Vi1 IPCP: I CONFREQ [REQsent] id 1 len 10

01:00:27: Vi1 IPCP: Address 10.1.1.1 (0x03060A010101)

01:00:27: Vi1 IPCP: O CONFACK [REQsent] id 1 len 10

01:00:27: Vi1 IPCP: Address 10.1.1.1 (0x03060A010101)

01:00:27: Se0 IPXCP: MLP bundle interface is built, process packets now

01:00:27: Se0 IPXCP: Redirect packet to Vi1

01:00:27: Vi1 IPXCP: I CONFREQ [REQsent] id 1 len 18

01:00:27: Vi1 IPXCP: Network 0x0000BEEF (0x01060000BEEF)

01:00:27: Vi1 IPXCP: Node 0000.0c31.aac2 (0x020800000C31AAC2)

01:00:27: Vi1 IPXCP: O CONFACK [REQsent] id 1 len 18

01:00:27: Vi1 IPXCP: Network 0x0000BEEF (0x01060000BEEF)

01:00:27: Vi1 IPXCP: Node 0000.0c31.aac2 (0x020800000C31AAC2)

01:00:27: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial0,

changed state to up

01:00:27: Se1 LCP: I CONFACK [ACKsent] id 101 len 23

01:00:27: Se1 LCP: MagicNumber 0x60944EF7 (0x050660944EF7)

01:00:27: Se1 LCP: MRRU 1524 (0x110405F4)

01:00:27: Se1 LCP: EndpointDisc 1 Goleta (0x130901476F6C657461)

01:00:27: Se1 LCP: State is Open

01:00:27: Se1 PPP: Phase is VIRTUALIZED [0 sess, 4 load]

01:00:27: Vi1 BNCP: I CONFACK [ACKsent] id 1 len 4

01:00:27: Vi1 BNCP: State is Open

01:00:27: Vi1 MLP: Added link Se1 to bundle Montecito

01:00:27: Vi1 IPCP: I CONFACK [ACKsent] id 1 len 10

01:00:27: Vi1 IPCP: Address 192.168.10.2 (0x0306C0A80A02)

01:00:27: Vi1 IPCP: State is Open

01:00:27: Vi1 IPXCP: I CONFACK [ACKsent] id 1 len 18

01:00:27: Vi1 IPXCP: Network 0x0000BEEF (0x01060000BEEF)

01:00:27: Vi1 IPXCP: Node 0000.0c47.4e9a (0x020800000C474E9A)

01:00:27: Vi1 IPXCP: State is Open

01:00:27: Vi1 IPCP: Install route to 10.1.1.1

01:00:28: %LINEPROTO-5-UPDOWN: Line protocol on Interface Virtual-Access1,

changed state to up

01:00:28: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial1,

changed state to up

Goleta#

Goleta#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 8/10/12 ms

Goleta#ping ipx

Target IPX address: BEEF.0000.0c31.aac2

Repeat count [5]:

Datagram size [100]:

Timeout in seconds [2]:

Verbose [n]:

Type escape sequence to abort.

Sending 5, 100-byte IPX Novell Echoes to BEEF.0000.0c31.aac2,

timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 8/10/12 ms

Informações Relacionadas

- Acesse a página de suporte de tecnologia

- Suporte Técnico e Documentação - Cisco Systems