Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Modo de instalação versus modo de pacote

Modo de instalação

Modo de pacote

Verifique o modo

Atualização

Limpeza da memória flash

Antes da limpeza da memória flash

Após a limpeza da memória flash

Recurso de atualização automática dos switches Catalyst 3850 Series

Configurar

Ativar o recurso de atualização automática

Verificar

Recuperar de uma falha de inicialização do switch 3850 Series

Métodos de recuperação padrão

Recuperação por USB

Recuperação de arquivos corrompidos

Recuperação de emergência

Introduction

Este documento descreve o processo de atualização para os switches Cisco Catalyst 3850 Series e oferece técnicas de recuperação de desastres no caso de uma falha de software ou inicialização.

Prerequisites

Requirements

A Cisco recomenda que você tenha conhecimento destes tópicos:

- TFTP

- FTP

- Experiência com atualizações do software Cisco IOS® XE

Componentes Utilizados

As informações neste documento são baseadas no Cisco Catalyst 3850 Series Switch que executa o Cisco IOS® XE versões 03.03.00 e posteriores. Os exemplos neste documento usam uma solução em pilha; no entanto, os mesmos comandos podem ser executados em um switch independente.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Note: Para fazer o download de imagens do Cisco IOS® XE do site da Cisco, você deve ter uma conta válida do Cisco Connection Online (CCO) com credenciais qualificadas. A Cisco não oferece uma solução TFTP/FTP gratuita. Instale e configure o TFTP/FTP antes de começar.

Modo de instalação versus modo de pacote

O switch Cisco Catalyst 3850 Series tem dois modos de operação: INSTALAÇÃO e PACOTE.

Existem pequenas diferenças entre os dois modos. Consulte o guia de configuração para obter mais detalhes.

A Cisco recomenda que o modo de INSTALAÇÃO seja usado durante a operação, pois proporciona um conjunto mais completo de recursos e exige menos recursos na inicialização. Este documento fornece um breve resumo de cada modo para referência futura.

Modo de instalação

Este é o modo padrão do switch. O modo de INSTALAÇÃO usa um arquivo de provisionamento de pacotes denominado packages.conf para inicializar o switch. Além disso, há vários arquivos .pkg na flash.

A Cisco recomenda que você não altere esses arquivos a menos que seja orientado por um engenheiro do Cisco Technical Assistance Center (TAC).

Modo de pacote

Se você estiver familiarizado com o uso de imagens IOS® monolíticas tradicionais para inicializar o switch, o modo BUNDLE é provavelmente familiar.

O modo de PACOTE consome mais memória do que o de INSTALAÇÃO porque os pacotes são extraídos do pacote maior e copiados para a RAM.

Verifique o modo

Para verificar o modo atual, digite o comando show version:

3850-stack#show version

Cisco IOS Software, IOS-XE Software, Catalyst L3 Switch Software

(CAT3K_CAA-UNIVERSALK9-M), Version 03.03.00SE RELEASE SOFTWARE (fc1)

Switch Ports Model           SW Version     SW Image              Mode

------------------           ----------     ----------            ----

1 32    WS-C3850-24P    03.03.00SE     cat3k_caa-universalk9 INSTALL

*    2 56    WS-C3850-48T    03.03.00SE     cat3k_caa-universalk9 INSTALL

Atualização

Para iniciar o processo de atualização, baixe o arquivo IOS® XE.bin do site da Cisco e coloque-o na memória flash do seu switch ativo. O processo usado para copiar o arquivo para o switch não é coberto neste documento.

Ao copiar o arquivo .bin para um único switch, o processo de instalação replica o arquivo para os outros switches na pilha. Assim que o arquivo estiver presente, digite este comando:

3850-stack#

software install file flash:cat3k_caa-universalk9.SPA.03.03.01.SE.150-1.EZ1.bin

switch 1-2

Note: Há muitas opções disponíveis depois de cada comando; no entanto, uma atualização básica é executada neste exemplo.

Quando o processo de atualização começa, o switch envia o arquivo .bin para os peers membros da pilha.

Preparing install operation ...

[2]: Copying software from active switch 1 to switch 2

Após todos os membros receberem o arquivo .bin, ele é automaticamente expandido na memória flash.

[1 2]: Starting install operation

[1 2]: Expanding bundle flash:

cat3k_caa-universalk9.SPA.03.03.01.SE.150-1.EZ1.bin

[1 2]: Copying package files

[1 2]: Package files copied

[1 2]: Finished expanding bundle flash:

cat3k_caa-universalk9.SPA.03.03.01.SE.150-1.EZ1.bin

[1 2]: Verifying and copying expanded package files to flash:

[1 2]: Verified and copied expanded package files to flash:

[1 2]: Starting compatibility checks

[1 2]: Finished compatibility checks

[1 2]: Starting application pre-installation processing

[1 2]: Finished application pre-installation processing

Em seguida, o switch lista um resumo dos arquivos que estão marcados para remoção e para adição ao arquivo de ponteiros packages.conf.

[1]: Old files list:

Removed cat3k_caa-base.SPA.03.03.00SE.pkg

Removed cat3k_caa-drivers.SPA.03.03.00SE.pkg

Removed cat3k_caa-infra.SPA.03.03.00SE.pkg

Removed cat3k_caa-iosd-universalk9.SPA.150-1.EZ.pkg

Removed cat3k_caa-platform.SPA.03.03.00SE.pkg

Removed cat3k_caa-wcm.SPA.10.1.100.0.pkg

[2]: Old files list:

Removed cat3k_caa-base.SPA.03.03.00SE.pkg

Removed cat3k_caa-drivers.SPA.03.03.00SE.pkg

Removed cat3k_caa-infra.SPA.03.03.00SE.pkg

Removed cat3k_caa-iosd-universalk9.SPA.150-1.EZ.pkg

Removed cat3k_caa-platform.SPA.03.03.00SE.pkg

Removed cat3k_caa-wcm.SPA.10.1.100.0.pkg

[1]: New files list:

Added cat3k_caa-base.SPA.03.03.01SE.pkg

Added cat3k_caa-drivers.SPA.03.03.01SE.pkg

Added cat3k_caa-infra.SPA.03.03.01SE.pkg

Added cat3k_caa-iosd-universalk9.SPA.150-1.EZ1.pkg

Added cat3k_caa-platform.SPA.03.03.01SE.pkg

Added cat3k_caa-wcm.SPA.10.1.110.0.pkg

[2]: New files list:

Added cat3k_caa-base.SPA.03.03.01SE.pkg

Added cat3k_caa-drivers.SPA.03.03.01SE.pkg

Added cat3k_caa-infra.SPA.03.03.01SE.pkg

Added cat3k_caa-iosd-universalk9.SPA.150-1.EZ1.pkg

Added cat3k_caa-platform.SPA.03.03.01SE.pkg

Added cat3k_caa-wcm.SPA.10.1.110.0.pkg

Por último, o arquivo packages.conf é atualizado e alocado.

[1 2]: Creating pending provisioning file

[1 2]: Finished installing software.  New software will load on reboot.

[1 2]: Committing provisioning file

[1 2]: Do you want to proceed with reload? [yes/no]: yes

Verifique se o processo de atualização foi concluído corretamente após a recarga.

3850-stack#show ver | i INSTALL

1 32    WS-C3850-24P     03.03.01SE      cat3k_caa-universalk9 INSTALL

*    2 56    WS-C3850-48T     03.03.01SE      cat3k_caa-universalk9 INSTALL

Limpeza da memória flash

Arquivos residuais de versões anteriores permanecem na memória flash. Para limpar os arquivos residuais, insira o comando software clean em vez de uma exclusão manual dos arquivos. Isso limpa os arquivos que o switch não precisa mais.

Note: Este comando também remove o arquivo .bin usado para instalar o novo software IOS. É importante lembrar que, uma vez extraído, você não precisa mais dele.

As duas próximas seções fornecem exemplos do estado da memória flash antes e depois do comando software clean ser usado.

Antes da limpeza da memória flash

3850-stack#show flash

-#- --length-- ---------date/time----------- -----------------------path-----------------------

2    2097152 Feb 16 2014 11:38:46.0 +00:00 nvram_config

4  257016048 Jan 28 2014 17:22:12.0 +00:00 cat3k_caa-universalk9.SPA.03.03.00.SE.150-1.EZ.bin

5       4096 Jan 28 2014 17:25:50.0 +00:00 mnt

6       4096 Jan 28 2014 17:25:50.0 +00:00 mnt/images

7       4096 Jan 28 2014 17:25:52.0 +00:00 mnt/images/ap.bak

8         40 Oct 03 2013 05:02:21.0 +00:00 mnt/images/ap.bak/ap1g2.md5

9   11591680 Oct 03 2013 05:02:21.0 +00:00 mnt/images/ap.bak/ap1g2

10         40 Oct 03 2013 05:02:21.0 +00:00 mnt/images/ap.bak/ap3g1.md5

11   10444800 Oct 03 2013 05:02:21.0 +00:00 mnt/images/ap.bak/ap3g1

12         40 Oct 03 2013 05:02:21.0 +00:00 mnt/images/ap.bak/ap3g2.md5

13   13568000 Oct 03 2013 05:02:21.0 +00:00 mnt/images/ap.bak/ap3g2

14         40 Oct 03 2013 05:02:21.0 +00:00 mnt/images/ap.bak/c1140.md5

15   10291200 Oct 03 2013 05:02:21.0 +00:00 mnt/images/ap.bak/c1140

16         11 Oct 03 2013 05:02:21.0 +00:00 mnt/images/ap.bak/version.info

17       1214 Jan 28 2014 17:25:10.0 +00:00 packages.conf.00-

18   79112096 Jan 28 2014 17:25:06.0 +00:00 cat3k_caa-base.SPA.03.03.00SE.pkg

19    6474428 Jan 28 2014 17:25:06.0 +00:00 cat3k_caa-drivers.SPA.03.03.00SE.pkg

20   34501468 Jan 28 2014 17:25:06.0 +00:00 cat3k_caa-infra.SPA.03.03.00SE.pkg

21       1248 Feb 16 2014 11:27:51.0 +00:00 packages.conf

22   34763952 Jan 28 2014 17:25:06.0 +00:00 cat3k_caa-iosd-universalk9.SPA.150-1.EZ.pkg

23        796 Feb 19 2014 11:43:13.0 +00:00 vlan.dat

24   24992476 Jan 28 2014 17:25:06.0 +00:00 cat3k_caa-platform.SPA.03.03.00SE.pkg

25   77167308 Jan 28 2014 17:25:06.0 +00:00 cat3k_caa-wcm.SPA.10.1.100.0.pkg

26       1224 Jan 28 2014 16:39:58.0 +00:00 packages.conf.01-

27       6571 Dec 20 2013 08:56:32.0 +00:00 BLANK_CONFIG.cfg

28  257193048 Feb 16 2014 11:19:44.0 +00:00 cat3k_caa-universalk9.SPA.03.03.01.SE.150-1.EZ1.bin

30   79113792 Feb 16 2014 11:27:46.0 +00:00 cat3k_caa-base.SPA.03.03.01SE.pkg

31   74409080 Jan 28 2014 16:39:54.0 +00:00 cat3k_caa-base.SPA.03.02.01.SE.pkg

32    2775728 Jan 28 2014 16:39:54.0 +00:00 cat3k_caa-drivers.SPA.03.02.01.SE.pkg

33    6476476 Feb 16 2014 11:27:46.0 +00:00 cat3k_caa-drivers.SPA.03.03.01SE.pkg

34   32478052 Jan 28 2014 16:39:54.0 +00:00 cat3k_caa-infra.SPA.03.02.01.SE.pkg

35   30389028 Jan 28 2014 16:39:54.0 +00:00 cat3k_caa-iosd-universalk9.SPA.150-1.EX1.pkg

36   18313952 Jan 28 2014 16:39:54.0 +00:00 cat3k_caa-platform.SPA.03.02.01.SE.pkg

37   63402700 Jan 28 2014 16:39:54.0 +00:00 cat3k_caa-wcm.SPA.10.0.101.0.pkg

38   34503664 Feb 16 2014 11:27:46.0 +00:00 cat3k_caa-infra.SPA.03.03.01SE.pkg

39   34788684 Feb 16 2014 11:27:46.0 +00:00 cat3k_caa-iosd-universalk9.SPA.150-1.EZ1.pkg

40   25009040 Feb 16 2014 11:27:46.0 +00:00 cat3k_caa-platform.SPA.03.03.01SE.pkg

41   77296448 Feb 16 2014 11:27:46.0 +00:00 cat3k_caa-wcm.SPA.10.1.110.0.pkg

237428736 bytes available (1302147072 bytes used)

Após a limpeza da memória flash

3850-stack#software clean

Preparing clean operation ...

[1 2]: Cleaning up unnecessary package files

[1 2]: No path specified, will use booted path flash:packages.conf

[1 2]: Cleaning flash:

[1]: Preparing packages list to delete ...

In use files, will not delete:

cat3k_caa-base.SPA.03.03.01SE.pkg

cat3k_caa-drivers.SPA.03.03.01SE.pkg

cat3k_caa-infra.SPA.03.03.01SE.pkg

cat3k_caa-iosd-universalk9.SPA.150-1.EZ1.pkg

cat3k_caa-platform.SPA.03.03.01SE.pkg

cat3k_caa-wcm.SPA.10.1.110.0.pkg

packages.conf

[2]: Preparing packages list to delete ...

In use files, will not delete:

cat3k_caa-base.SPA.03.03.01SE.pkg

cat3k_caa-drivers.SPA.03.03.01SE.pkg

cat3k_caa-infra.SPA.03.03.01SE.pkg

cat3k_caa-iosd-universalk9.SPA.150-1.EZ1.pkg

cat3k_caa-platform.SPA.03.03.01SE.pkg

cat3k_caa-wcm.SPA.10.1.110.0.pkg

packages.conf

[1]: Files that will be deleted:

cat3k_caa-base.SPA.03.02.01.SE.pkg

cat3k_caa-base.SPA.03.03.00SE.pkg

cat3k_caa-drivers.SPA.03.02.01.SE.pkg

cat3k_caa-drivers.SPA.03.03.00SE.pkg

cat3k_caa-infra.SPA.03.02.01.SE.pkg

cat3k_caa-infra.SPA.03.03.00SE.pkg

cat3k_caa-iosd-universalk9.SPA.150-1.EX1.pkg

cat3k_caa-iosd-universalk9.SPA.150-1.EZ.pkg

cat3k_caa-platform.SPA.03.02.01.SE.pkg

cat3k_caa-platform.SPA.03.03.00SE.pkg

cat3k_caa-universalk9.SPA.03.03.00.SE.150-1.EZ.bin

cat3k_caa-universalk9.SPA.03.03.01.SE.150-1.EZ1.bin

cat3k_caa-wcm.SPA.10.0.101.0.pkg

cat3k_caa-wcm.SPA.10.1.100.0.pkg

packages.conf.00-

packages.conf.01-

[2]: Files that will be deleted:

cat3k_caa-base.SPA.03.02.01.SE.pkg

cat3k_caa-base.SPA.03.03.00SE.pkg

cat3k_caa-drivers.SPA.03.02.01.SE.pkg

cat3k_caa-drivers.SPA.03.03.00SE.pkg

cat3k_caa-infra.SPA.03.02.01.SE.pkg

cat3k_caa-infra.SPA.03.03.00SE.pkg

cat3k_caa-iosd-universalk9.SPA.150-1.EX1.pkg

cat3k_caa-iosd-universalk9.SPA.150-1.EZ.pkg

cat3k_caa-platform.SPA.03.02.01.SE.pkg

cat3k_caa-platform.SPA.03.03.00SE.pkg

cat3k_caa-universalk9.SPA.03.03.00.SE.150-1.EZ.bin

cat3k_caa-universalk9.SPA.03.03.01.SE.150-1.EZ1.bin

cat3k_caa-wcm.SPA.10.0.101.0.pkg

cat3k_caa-wcm.SPA.10.1.100.0.pkg

packages.conf.00-

packages.conf.01-

[1 2]: Do you want to proceed with the deletion? [yes/no]: yes

[1 2]: Clean up completed

Esta é a saída do comando show flash após a limpeza da memória flash:

3850-stack#show flash

-#- --length-- ---------date/time----------- -------------------path--------------------

2    2097152 Feb 16 2014 11:38:46.0 +00:00 nvram_config

4       4096 Jan 28 2014 17:25:50.0 +00:00 mnt

5       4096 Jan 28 2014 17:25:50.0 +00:00 mnt/images

6       4096 Jan 28 2014 17:25:52.0 +00:00 mnt/images/ap.bak

7         40 Oct 03 2013 05:02:21.0 +00:00 mnt/images/ap.bak/ap1g2.md5

8   11591680 Oct 03 2013 05:02:21.0 +00:00 mnt/images/ap.bak/ap1g2

9         40 Oct 03 2013 05:02:21.0 +00:00 mnt/images/ap.bak/ap3g1.md5

10   10444800 Oct 03 2013 05:02:21.0 +00:00 mnt/images/ap.bak/ap3g1

11         40 Oct 03 2013 05:02:21.0 +00:00 mnt/images/ap.bak/ap3g2.md5

12   13568000 Oct 03 2013 05:02:21.0 +00:00 mnt/images/ap.bak/ap3g2

13         40 Oct 03 2013 05:02:21.0 +00:00 mnt/images/ap.bak/c1140.md5

14   10291200 Oct 03 2013 05:02:21.0 +00:00 mnt/images/ap.bak/c1140

15         11 Oct 03 2013 05:02:21.0 +00:00 mnt/images/ap.bak/version.info

16       1248 Feb 16 2014 11:27:51.0 +00:00 packages.conf

17        796 Feb 19 2014 11:43:13.0 +00:00 vlan.dat

18       6571 Dec 20 2013 08:56:32.0 +00:00 BLANK_CONFIG.cfg

20   79113792 Feb 16 2014 11:27:46.0 +00:00 cat3k_caa-base.SPA.03.03.01SE.pkg

21    6476476 Feb 16 2014 11:27:46.0 +00:00 cat3k_caa-drivers.SPA.03.03.01SE.pkg

22   34503664 Feb 16 2014 11:27:46.0 +00:00 cat3k_caa-infra.SPA.03.03.01SE.pkg

23   34788684 Feb 16 2014 11:27:46.0 +00:00 cat3k_caa-iosd-universalk9.SPA.150-1.EZ1.pkg

24   25009040 Feb 16 2014 11:27:46.0 +00:00 cat3k_caa-platform.SPA.03.03.01SE.pkg

25   77296448 Feb 16 2014 11:27:46.0 +00:00 cat3k_caa-wcm.SPA.10.1.110.0.pkg

1231515648 bytes available (308060160 bytes used)

Recurso de atualização automática dos switches Catalyst 3850 Series

Um cenário em que um novo switch é introduzido em uma pilha atual de Catalyst 3850 Series Switches é quando um novo switch é comprado para expandir o número de portas utilizáveis na pilha.

Para adicionar com êxito um novo switch a uma pilha, você deve assegurar que a mesma versão do software será executada nele. Antes do IOS® XE versão 3.3.1, a única maneira de garantir que as versões sejam compatíveis é preparar o novo switch antes da introdução na pilha.

Os switches Catalyst 3850 Series incluem um recurso chamado Atualização automática. O objetivo desse recurso é garantir que um switch recém-adicionado seja automaticamente provisionado pelos membros da pilha com a versão correta do IOS® XE.

Note: A atualização automática está desativada por padrão e não está disponível no modo de PACOTE.

Para usar o recurso de atualização automática, adicione o comando auto-update enable à configuração da pilha atual. Isso assegura que qualquer membro recém-adicionado à pilha seja atualizado automaticamente.

Configurar

Quando o switch é empilhado e inicializado, há uma indicação de que há uma incompatibilidade nas versões e o novo membro não entra totalmente na pilha.

Para observar o SYSLOG enquanto o switch tenta ingressar, observe que o recurso de Recomendação Automática alerta que o switch recém-adicionado executa uma versão e um modo de software diferentes.

Note: Para este exemplo, o novo switch executa o IOS® XE Versão 3.2.2 no modo BUNDLE.

%STACKMGR-1-STACK_LINK_CHANGE: STANDBY: 1 stack-mgr:

Stack port 2 on switch 1 is up  (3850-Stack-1)

%STACKMGR-1-STACK_LINK_CHANGE: 2 stack-mgr:

Stack port 1 on switch 2 is up

%STACKMGR-6-SWITCH_ADDED: 2 stack-mgr:

Switch 3 has been added to the stack.

%STACKMGR-6-SWITCH_ADDED: STANDBY:1 stack-mgr:

Switch 3 has been added to the stack.  (3850-Stack-1)

%INSTALLER-6-AUTO_ADVISE_SW_INITIATED: 2 installer:

Auto advise initiated for switch 3

%INSTALLER-6-AUTO_ADVISE_SW: 2 installer:

Switch 3 running bundled software has been added

%INSTALLER-6-AUTO_ADVISE_SW: 2 installer:

to the stack that is running installed software.

%INSTALLER-6-AUTO_ADVISE_SW: 2 installer:

The 'software auto-upgrade' command can be used to

%INSTALLER-6-AUTO_ADVISE_SW: 2 installer:

convert switch 3 to the installed running mode by

%INSTALLER-6-AUTO_ADVISE_SW: 2 installer:

installing its running software.

Quando o membro recém-ingressado é totalmente inicializado, uma incompatibilidade é detectada:

3850-Stack#show switch

Switch/Stack Mac Address : 0c27.24cf.ab80 - Local Mac Address

Mac persistency wait time: Indefinite

H/W   Current

Switch#   Role    Mac Address     Priority Version  State

------------------------------------------------------------

*1       Active   0c27.24cf.ab80     14      B0      Ready

2       Standby  f41f.c238.a800     13      B0      Ready

3       Member   b4e9.b0d3.6600     12      0       V-Mismatch

Ativar o recurso de atualização automática

No modo de Configuração Global, digite o comando auto-upgrade enable. Isso ativa o recurso para qualquer novo switch que entre na pilha.

3850-Stack(config)#software auto-upgrade enable

3850-Stack(config)#end

Recarregue somente o switch recém-adicionado; não é necessário recarregar toda a pilha. Neste caso, o switch recém-adicionado é o switch 3, então o comando reload slot 3 é digitado.

Tip: O slot mencionado nesses comandos designa o switch na pilha (slot 1 = switch 1).

3850-Stack#reload slot 3

Proceed with reload? [confirm]

%STACKMGR-1-RELOAD_REQUEST: 1 stack-mgr:

Received reload request for switch 3, reason Reload Slot Command

%STACKMGR-1-STACK_LINK_CHANGE: 1 stack-mgr:

Stack port 2 on switch 1 is down

%STACKMGR-6-SWITCH_REMOVED: 1 stack-mgr:

Switch 3 has been removed from the stack.

%STACKMGR-1-STACK_LINK_CHANGE: STANDBY:

2 stack-mgr:  Stack port 1 on switch 2 is down  (3850-Stack-2)

Starting SWITCH-DELETE sequence, switch 3

SWITCH-DELETE sequence complete, switch 3

%STACKMGR-6-SWITCH_REMOVED: STANDBY:2 stack-mgr:

Switch 3 has been removed from the stack.  (3850-Stack-2)

Starting SWITCH-DELETE sequence, switch 3 (3850-Stack-2)

SWITCH-DELETE sequence complete, switch 3 (3850-Stack-2)

O switch é recarregado em segundo plano momentaneamente. Então, você verá isto:

%STACKMGR-1-STACK_LINK_CHANGE: 1 stack-mgr:

Stack port 2 on switch 1 is up

3850-Stack#

%STACKMGR-1-STACK_LINK_CHANGE: STANDBY:2 stack-mgr:

Stack port 1 on switch 2 is up  (3850-Stack-2)

3850-Stack#

%STACKMGR-6-SWITCH_ADDED: 1 stack-mgr:

Switch 3 has been added to the stack.

%STACKMGR-6-SWITCH_ADDED: STANDBY:2 stack-mgr:

Switch 3 has been added to the stack.  (3850-Stack-2)

A conversão do modo BUNDLE para INSTALL ocorre, seguida por um recarregamento:

%INSTALLER-6-AUTO_UPGRADE_SW_INITIATED: 1 installer:

Auto upgrade initiated for switch 3

%INSTALLER-6-AUTO_UPGRADE_SW: 1 installer:

Converting switch 3 to installed mode by

%INSTALLER-6-AUTO_UPGRADE_SW: 1 installer:

installing its running software

%INSTALLER-6-AUTO_UPGRADE_SW: 1 installer:

Setting the boot var on switch 3

%INSTALLER-6-AUTO_UPGRADE_SW: 1 installer:

Finished installing the running software on switch 3

%INSTALLER-6-AUTO_UPGRADE_SW: 1 installer:

Reloading switch 3 to boot in installed mode

%STACKMGR-1-RELOAD_REQUEST: 1 stack-mgr:

Received reload request for switch 3, reason Auto upgrade

%STACKMGR-1-STACK_LINK_CHANGE: 1 stack-mgr:

Stack port 2 on switch 1 is down

%STACKMGR-6-SWITCH_REMOVED: 1 stack-mgr:

Switch 3 has been r

3850-Stack#emoved from the stack.

%STACKMGR-1-STACK_LINK_CHANGE: STANDBY:2 stack-mgr:

Stack port 1 on switch 2 is down  (3850-Stack-2)

Starting SWITCH-DELETE sequence, switch 3

SWITCH-DELETE sequence complete, switch 3

%STACKMGR-6-SWITCH_REMOVED: STANDBY:2 stack-mgr:

Switch 3 has been removed from the stack.  (3850-Stack-2)

3850-Stack#

Starting SWITCH-DELETE sequence, switch 3 (3850-Stack-2)

SWITCH-DELETE sequence complete, switch 3 (3850-Stack-2)

Após a reinicialização, a atualização continua:

%INSTALLER-6-AUTO_UPGRADE_SW_INITIATED: 1 installer:

Auto upgrade initiated for switch 3

%INSTALLER-6-AUTO_UPGRADE_SW: 1 installer:

Searching stack for software to upgrade switch 3

%INSTALLER-6-AUTO_UPGRADE_SW: 1 installer:

Found donor switch 1 to auto upgrade switch 3

%INSTALLER-6-AUTO_UPGRADE_SW: 1 installer:

Upgrading switch 3 with software from switch 1

%INSTALLER-6-AUTO_UPGRADE_SW: 1 installer:

Finished installing software on switch 3

%INSTALLER-6-AUTO_UPGRADE_SW: 1 installer:

Reloading switch 3 to complete the auto upgrade

%STACKMGR-1-RELOAD_REQUEST: 1 stack-mgr:

Received reload request for switch 3, reason Auto upgrade

%STACKMGR-1-STACK_LINK_CHANGE: 1 stack-mgr:

Stack port 2 on switch 1 is down

%STACKMGR-6-SWITCH_REMOVED: 1 stack-mgr:

Switch 3 has been removed from the stack.

%STACKMGR-1-STACK_LINK_CHANGE: STANDBY:2 stack-mgr:

Stack port

3850-Stack#t 1 on switch 2 is down  (3850-Stack-2)

Starting SWITCH-DELETE sequence, switch 3

SWITCH-DELETE sequence complete, switch 3

%STACKMGR-6-SWITCH_REMOVED: STANDBY:2 stack-mgr:

Switch 3 has been removed from the stack.  (3850-Stack-2)

Outra recarga é executada automaticamente. Quando o switch for inicializado, ele ingressará com êxito na pilha com a versão correta do IOSXE e o modo do software.

%STACKMGR-6-SWITCH_ADDED: 1 stack-mgr:

Switch 3 has been added to the stack.

%STACKMGR-6-SWITCH_ADDED: STANDBY:2 stack-mgr:

Switch 3 has been added to the stack.  (3850-Stack-2)

%STACKMGR-6-SWITCH_READY: STANDBY:2 stack-mgr:

Switch 3 is ready.  (3850-Stack-2)

%STACKMGR-6-SWITCH_READY: 1 stack-mgr:  Switch 3 is ready.

Starting SWITCH-ADD sequence, switch 3

%NGWC_USB_CONSOLE-6-CONFIG_ENABLE: Switch 3:

Console media-type changed to default

Starting SWITCH-ADD sequence, switch 3 (3850-Stack-2)

SWITCH-ADD sequence complete, switch 3 (3850-Stack-2)

SWITCH-ADD sequence complete, switch 3

Verificar

Use os comandos show switch e show version para verificar se o processo de atualização foi concluído corretamente:

3850-Stack#show switch

Switch/Stack Mac Address : 0c27.24cf.ab80 - Local Mac Address

Mac persistency wait time: Indefinite

H/W   Current

Switch#   Role    Mac Address     Priority Version  State

------------------------------------------------------------

*1       Active   0c27.24cf.ab80     14     B0      Ready

2       Standby  f41f.c238.a800     13     B0      Ready

3       Member   b4e9.b0d3.6600     12     B0      Ready

3850-Stack#show version

Switch Ports Model          SW Version    SW Image              Mode

------ ----- -----          ----------    ----------            ----

*    1 56    WS-C3850-48P   03.03.01SE    cat3k_caa-universalk9 INSTALL

2 56    WS-C3850-48P   03.03.01SE    cat3k_caa-universalk9 INSTALL

3 56    WS-C3850-48P   03.03.01SE    cat3k_caa-universalk9 INSTALL

Recuperar de uma falha de inicialização do switch 3850 Series

Esta seção descreve os possíveis métodos de recuperação para uma falha de inicialização do Switch 3850 Series, como uma imagem de inicialização corrompida, um arquivo packages.conf corrompido ou arquivos ausentes.

Note: Assegure-se de que você conhece os dois modos de inicialização possíveis, INSTALAÇÃO e PACOTE, antes de continuar.

Métodos de recuperação padrão

Esta seção descreve os dois métodos padrão usados para recuperar de uma falha de inicialização do switch Catalyst 3850 Series.

Recuperação por USB

Os switches 3850 Series têm uma porta USB na parte frontal que é usada para acesso ao console. Essa porta USB também é usada com flash drives para recuperação e backup de imagem.

Se travado no switch: com uma imagem corrompida ou um arquivo .conf, inicialize em um arquivo armazenado na unidade USB ou copie uma imagem do USB para a memória flash interna. Conclua essas etapas para recuperação da falha de inicialização:

1. Verifique se a unidade flash foi reconhecida e o arquivo .bin existe:

switch: dir usbflash0:

Directory of usbflash0:/

74  -rw-  223734376  cat3k_caa-universalk9.SPA.03.03.00.SE.150-1.EZ.bin

2. Inicialize com a imagem USB:

switch: boot usbflash0:cat3k_caa-universalk9.SPA.03.03.00.SE.150-1.EZ.bin

Note: Esse processo inicializa o switch no modo de PACOTE.

Tip: Também é possível copiar o arquivo .bin do usbflash0: para flash: e aponte a instrução boot em direção à flash interna.

Recuperação de arquivos corrompidos

Há instâncias em que os arquivos de chamadas de packages.conf não existem mais na flash. Você pode inicializar manualmente uma imagem do switch: prompt do arquivo; no entanto, após o recarregamento, ele chama o arquivo packages.conf novamente e falha ao inicializar.

Se isso ocorrer, a Cisco recomenda fazer backup do arquivo packages.conf atual e renomeá-lo ou excluí-lo. Esse processo é obrigatório, pois a próxima etapa falhará se um arquivo .conf já existir.

Depois que o arquivo .bin é extraído, um novo arquivo packages.conf é criado. Conclua estas etapas para recuperar um arquivo packages.conf corrompido:

1. Depois de inicializado (em modo de PACOTE), verifique os arquivos na memória flash:

Switch#dir flash:

Directory of flash:/

15500  -rwx        1243   Aug 1 2013 07:04:02 +00:00  packages.conf

2. Copie ou renomeie o arquivo packages.conf atual:

Switch#cp flash:packages.conf flash:packages.conf.badop

Destination filename [packages.conf.bad]?

Copy in progress...C

1243 bytes copied in 0.140 secs (8879 bytes/sec)

Switch#dir flash:

Directory of flash:/

15500  -rwx        1243   Aug 1 2013 07:04:02 +00:00  packages.conf

15502  -rw-        1243   Aug 1 2013 11:53:51 +00:00  packages.conf.bad

Switch#del flash:packages.conf

Delete filename [packages.conf]?

Delete flash:/packages.conf? [confirm]

3. Expanda o pacote para criar um novo arquivo packages.conf:

Switch#software expand running switch 1 to flash:

Preparing expand operation ...

[1]: Expanding the running bundle

[1]: Copying package files

[1]: Package files copied

[1]: Finished expanding the running bundle

4. Verificar a inicialização:

Switch#show boot

---------------------------

Switch 1

---------------------------

Current Boot Variables:

BOOT variable does not exist

Boot Variables on next reload:

BOOT variable = flash:packages.conf;

Manual Boot = no

Enable Break = no

5. Recarregue o switch:

Switch#reload

Reload command is being issued on Active unit, this will reload the whole stack

Proceed with reload? [confirm]

Recuperação de emergência

Se os métodos de recuperação anteriores falharem, os 3850 Series Switches têm um método trap door para recuperar o sistema. Um terminal deve ser conectado à porta de gerenciamento do switch que executa um servidor TFTP. Faça o download de um arquivo de imagem válido do CCO e armazene-o na raiz do servidor TFTP.

É provável que o switch esteja preso no switch: prompt. No entanto, se você estiver em um loop de inicialização, use o botão Mode na frente do switch para interromper o ciclo: segure o botão por aproximadamente dez segundos e o switch interromperá o ciclo e parará no switch: prompt.

Siga estas etapas para executar uma recuperação de emergência:

1. Defina o endereço IP do switch:

switch:  set IP_ADDR 192.0.2.123/255.255.255.0

2. Defina o gateway padrão:

switch: set DEFAULT_ROUTER 192.0.2.1

3. Faça ping no terminal que contém o servidor TFTP para testar a conectividade:

switch: ping 192.0.2.1

ping 192.0.2.1 with 32 bytes of data ...

Host 192.0.2.1 is alive.

4. Verifique se os arquivos de emergência existem no sistema de arquivos do switch:

switch: dir sda9:

Directory of sda9:/

2  drwx  1024       .

2  drwx  1024       ..

11  -rwx  18958824   cat3k_caa-recovery.bin

36903936 bytes available (20866048 bytes used)

5. Execute o recurso de instalação de emergência:

switch: emergency-install tftp://192.0.2.1/cat3k_caa-universalk9.

SPA.03.03.00.SE.150-1.EZ.bin

The bootflash will be erased during install operation, continue (y/n)?Y

Starting emergency recovery (tftp://192.0.2.1/cat3k_caa-universalk9.

SPA.03.02.02.SE.150-1.EX2.bin)...

Reading full image into memory......................done

Nova Bundle Image

--------------------------------------

Kernel Address    : 0x6042f5d8

Kernel Size       : 0x317ccc/3243212

Initramfs Address : 0x607472a4

Initramfs Size    : 0xdc6546/14443846

Compression Format: .mzip

Bootable image at @ ram:0x6042f5d8

Bootable image segment 0 address range [0x81100000, 0x81b80000]

is in range [0x80180000, 0x90000000].

@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@@

@@@@@@@@@@@@@@@@@@@

File "sda9:cat3k_caa-recovery.bin" uncompressed and installed,

entry point: 0x811060f0

Loading Linux kernel with entry point 0x811060f0 ...

Bootloader: Done loading app on core_mask: 0xf

### Launching Linux Kernel (flags = 0x5)

Initiating Emergency Installation of bundle tftp://192.0.2.1/

cat3k_caa-universalk9.SPA.03.03.00.SE.150-1.EZ.bin

Downloading bundle tftp://192.0.2.1/ cat3k_caa-universalk9.

SPA.03.03.00.SE.150-1.EZ.bin...

Validating bundle tftp://192.0.2.1/ cat3k_caa-universalk9.

SPA.03.03.00.SE.150-1.EZ.bin...

Installing bundle tftp://192.0.2.1/ cat3k_caa-universalk9.

SPA.03.03.00.SE.150-1.EZ.bin...

Verifying bundle tftp://192.0.2.1/ cat3k_caa-universalk9.

SPA.03.03.00.SE.150-1.EZ.bin...

Package cat3k_caa-base.SPA.03.03.00.SE.pkg is Digitally Signed

Package cat3k_caa-drivers.SPA.03.03.00.SE.pkg is Digitally Signed

Package cat3k_caa-infra.SPA.03.03.00.SE.pkg is Digitally Signed

Package cat3k_caa-iosd-universalk9.SPA.150-1.EX2.pkg is Digitally Signed

Package cat3k_caa-platform.SPA.03.03.00.SE.pkg is Digitally Signed

Package cat3k_caa-wcm.SPA.10.0.111.0.pkg is Digitally Signed

Preparing flash...

Syncing device...

Emergency Install successful... Rebooting

Restarting system.