Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Informações de Apoio

Configurar

Diagrama de Rede

Configurações

Verificar

Troubleshoot

Informações Relacionadas

Introduction

Este documento fornece uma configuração de exemplo para o Comutador de Diretor Multicamada (MDS - Multilayer Diretor Switch) Fibre Channel Over TCP/IP (FCIP) para MDS.

O FCIP descreve os mecanismos que permitem a interconexão de ilhas de SANs (Storage Area Networks, redes de armazenamento) Fibre Channel (FC) em redes baseadas em IP para formar uma SAN unificada em uma única malha FC. O FCIP depende de serviços de rede baseados em IP para fornecer a conectividade entre as ilhas de SAN através de redes locais, redes de área metropolitana ou redes de longa distância.

Figura 1: SANs Fibre Channel conectadas pelo FCIP

O FCIP usa o Transmission Control Protocol (TCP) na porta 3225 como um transporte da camada de rede.

Prerequisites

Requirements

Certifique-se de atender a estes requisitos antes de tentar esta configuração:

- O backbone IP deve estar operacional e fornecer a largura de banda necessária para suportar os aplicativos que são executados nos links FCIP—pode ser uma topologia de Camada 2 (L2) ou Camada 3 (L3).

- Se for uma topologia L3, os roteadores intermediários ou switches multicamada devem ser configurados e configurados para encaminhar adequadamente o tráfego IP entre os endereços IP origem e destino dos túneis FCIP. Se a Qualidade de Serviço (QoS - Quality of Service) ou a modelagem de tráfego for aplicada em qualquer dispositivo de rede no caminho entre os peers FCIP, o gerente de rede que administra a infraestrutura IP deve ser consultado para obter os detalhes necessários antes de configurar quaisquer parâmetros e recursos relacionados ao TCP no(s) perfil(s) FCIP do Switch Diretor Multicamada (MDS - Multilayer Diretor Switch).

- Os Switches Ethernet adjacentes aos MDSs devem suportar e ser configurados para entroncamento 802.1Q, se subinterfaces estiverem configuradas no módulo de serviços de armazenamento IP (IPS) MDS.

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- MDS 9509 com módulo de serviço IPS (DS-X9308-SMIP) que executa a versão 1.2.(2a)

- MDS 9216 com módulo de serviço IPS (DS-X9308-SMIP) que executa a versão 1.2.(2a)

- Catalyst 6509 que executa o Catalyst OS (CatOS) 7.4(3)

- Win2003 Server (HPQ Pro-Liant-P4) com Emulex LP9K HBA

- IBM Storage Array (ESS-2105-F20)

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Consulte as Convenções de Dicas Técnicas da Cisco para obter mais informações sobre convenções de documentos.

Informações de Apoio

O FCIP consiste nas seguintes especificações:

ANSI T11

1. FC-SW-2 descreve a operação e a interação de switches FC, incluindo E_Port e operação de estrutura.

2. FC-BB-2 é um mapeamento que diz respeito à extensão de redes comutadas FC através de um backbone de rede TCP e define modelos de referência que suportam E_Port e B_Port.

Grupo de Trabalho IPS IETF

1. FC sobre TCP cobre os requisitos de TCP/IP para transportar quadros FC através de uma rede IP.

2. O encapsulamento de quadro FC define o formato comum de encapsulamento de fibra.

Uma interconexão entre dois switches SAN ou malhas em FCIP é chamada de link FCIP e pode conter uma ou mais conexões TCP. Cada extremidade de um link FCIP é associada a uma porta E virtual (VE_port) ou a uma porta B_port, dependendo da implementação. FC-BB e FC-BB-2 estão descrevendo as diferenças entre as duas abordagens. O módulo de serviços IPS (DS-X9308-SMIP) suporta ambos os modos, mas assume como padrão VE_Port, que também é o modo recomendado para ser executado se todos os correspondentes relevantes forem módulos DS-X9308-SMIP. Neste exemplo de topologia, são discutidos parâmetros de configuração FCIP sobre PortChannels, TCP para configurar e FSF (quadro especial).

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Nos MDSes, você precisa familiarizar-se com os guias de configuração do IP para as duas plataformas. Você pode encontrar a versão mais recente dos manuais em Configuring IP Storage em Cisco.com.

Nota:Use a Command Lookup Tool (somente clientes registrados) para obter mais informações sobre os comandos usados neste documento.

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Figura 2 - Topologia 3

A topologia 3 descreve um canal de porta FCIP formado por dois túneis FCIP individuais; as interfaces de peer estão em uma nuvem IP. A nuvem IP é recolhida em um switch multicamada (Catalyst 6500) que roteia o tráfego da sub-rede A para a sub-rede C e da sub-rede C para a sub-rede A (e da sub-rede B para a sub-rede D e da sub-rede D para a sub-rede A). As sub-redes são definidas da seguinte forma:

- Sub-rede A: 100.100.100.0/30 - Bison int Gig4/1

- Sub-rede B: 100.100.100.4/30 - Bison int Gig4/2

- Sub-rede C: 200.200.200.0/30- Canterbury Gig2/1

- Sub-rede D: 200.200.200.4/30 - Canterbury Gig2/2

A topologia fornece uma largura de banda máxima conhecida de 100 Mbps e uma largura de banda mínima de 100 Mbps, que é o perfil sendo executado para nosso tráfego IP relevante por meio dessa nuvem IP . A configuração inicial mostra os aspectos do Port Channeling baseado em FCIP e do condicionamento de tráfego TCP. Nas seções seguintes FSF, as interfaces Passivas TCP e o Timestamp FCIP serão explicados mais adiante.

Configurações

Este documento utiliza as seguintes configurações:

- MDS 9509 (Bison) com módulo IPS-8

- MDS 9612 (Canterbury) com módulo IPS-8

MDS 9509 (Bison) com módulo IPS-8

bison# sh ver

Cisco Storage Area Networking Operating System (SAN-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2003 by Cisco Systems, Inc. All rights reserved.

The copyright for certain works contained herein are owned by

Andiamo Systems, Inc. and/or other third parties and are used and

distributed under license.

Software

BIOS: version 1.0.8

loader: version 1.2(2)

kickstart: version 1.2(2a)

system: version 1.2(2a)

BIOS compile time: 08/07/03

kickstart image file is: bootflash:/k122a

kickstart compile time: 9/23/2003 11:00:00

system image file is: bootflash:/s122a

system compile time: 10/8/2003 18:00:00

Hardware

RAM 1024584 kB

bootflash: 500736 blocks (block size 512b)

slot0: 0 blocks (block size 512b)

bison uptime is 1 days 15 hours 45 minute(s) 44 second(s)

Last reset

Reason: Unknown

System version: 1.2(2a)

Service:

bison# sh run

Building Configuration ...

fcip profile 1

ip address 100.100.100.1

tcp max-bandwidth-mbps 100 min-available-bandwidth-mbps 100 round-trip-time-ms 10

!--- TCP bandwidth parameters defined specifically for this FCIP tunnel. !--- Restricted to 100 Mbps max and min. See the Note on TCP Parameters !--- comment section in this table below for more details.

fcip profile 2

ip address 100.100.100.5

tcp max-bandwidth-mbps 100 min-available-bandwidth-mbps 100 round-trip-time-ms 10

!--- TCP max and min bandwidth parameter are configured here exactly the !--- same as for FCIP 1 because both tunnels are combined in one PortChannel !--- interface and are subject to the same bandwidth restrictions in the IP core.

vsan database

vsan 600

vsan 601

fcdomain domain 1 preferred vsan 600

fcdomain domain 1 preferred vsan 601

interface port-channel 1

switchport trunk allowed vsan 600-601

interface fcip1

channel-group 1 force

no shutdown

use-profile 1

peer-info ipaddr 200.200.200.1

!--- Interface FCIP 1 is a member of channel-group 1. The force keyword makes it !--- adopt the specific settings configured on interface port-channel 1.

interface fcip2

channel-group 1 force

no shutdown

use-profile 2

peer-info ipaddr 200.200.200.5

!--- Interface FCIP 2 is also member of channel-group 1.

boot system bootflash:/s122a sup-1

boot kickstart bootflash:/k122a sup-1

boot system bootflash:/s122a sup-2

boot kickstart bootflash:/k122a sup-2

ip domain-name cisco.com

ip name-server 144.254.10.123

ip route 200.200.200.0 255.255.255.252 100.100.100.2 distance 2

ip route 200.200.200.4 255.255.255.252 100.100.100.6 distance 2

!--- FCIP interfaces are on separate IP subnets, so in order to reach the FCIP !--- peer IP address, you need adequate static routes to an L3 device that !--- knows how to forward the packets to the final destination. Multiple routes !--- to the same destination IP subnet are allowed, and the distance parameter !--- can be used to specify a preferred next hop. Multiple next hops would !--- require a subnet mask providing for a larger number of host; for example, !--- a 28-bit subnet mask.

ssh key dsa 768 force

ssh server enable

switchname bison

zone default-zone permit vsan 600-601

interface GigabitEthernet4/1

ip address 100.100.100.1 255.255.255.252

switchport mtu 3000

no shutdown

!--- MTU size is defined as 3000 bytes. Make sure that all intermediate network !--- devices between this interface and the peer IP address are capable of !--- switching and routing Jumbo frames. In order to avoid FC Frame split, !--- an MTU value of 2300 is required; 3000 is used in the configuration example !--- for simplicity. FCIP TCP segments will normally never exceed 2264 bytes for !--- TE ports or 2256 bytes for E ports, regardless of the configured MTU size.

interface GigabitEthernet4/2

ip address 100.100.100.5 255.255.255.252

switchport mtu 3000

no shutdown

interface fc3/1

interface fc3/2

interface fc3/3

interface fc3/4

interface fc3/5

interface fc3/6

interface fc3/7

interface fc3/8

interface fc3/9

interface fc3/10

interface fc3/11

interface fc3/12

interface fc3/13

interface fc3/14

interface fc3/15

interface fc3/16

interface mgmt0

ip address 10.48.69.151 255.255.255.128

!--- Note on TCP Parameters !--- The following TCP parameters can be individually configured per FCIP profile:

bison(config-profile)# tcp ?

cwm Enable congestion window monitoring

keepalive-timeout Set keep alive timeout in sec

max-bandwidth-kbps Configure maximum available path bandwidth in Kbps

max-bandwidth-mbps Configure maximum available path bandwidth in Mbps

max-retransmissions Maximum number of retransmissions

min-retransmit-time Set minimum retransmit time in millisecond

pmtu-enable Enable PMTU Discovery

sack-enable Enable SACK option for TCP

send-buffer-size Send buffer size in KBytes

!--- The CWM parameter default value is 10K and should be left untouched under !--- normal conditions. Congestion window monitoring (CWM) is a way of !--- controlling burstiness after long idle times or loss of Acks.

!--- The keepalive-timeout is the TCP keepalive timeout value and is !--- set to 60 seconds by default, though it can range between 1 and 7200 seconds.

!--- The max- and min-bandwidth parameters program the TCP Maximum Window Size !--- (scaling factor) and engages an internal “shaper” functionality. !--- These values should be carefully chosen and requires understanding of the !--- intermediate network’s end-to-end topology. The default values are to be !--- changed according to the aforementioned requirements. !--- The Round-trip-time can be derived once you have your FCIP tunnel up and !--- running by issuing the following command:

bison# ips measure 200.200.200.1 interface gigabitethernet 4/1

Round trip time is 53 micro seconds (0.05 milliseconds )

!--- Always add an additional margin of at least a few microseconds to this value. !--- The max-retransmissions counter is set to 4 by default. In a healthy network !--- environment, this value should be left unchanged.

!--- The max-retransmission timer is set to 200 milliseconds. If you experience !--- extremely high retransmission counters, this value can be increased; but, !--- in general, changing this parameter is not required unless the RTT is !--- above 200 milliseconds.

!--- The PMTU (Path MTU discovery) is enabled by default. Best practice is to know !--- what is the maximum MTU size supported by all interfaces along the logical !--- path between both peers.

!--- The SACK feature (Selective Acknowledgment) is not enabled by default. !--- Consider enabling it when you have a lot of retransmissions occurring between !--- the two peers. SACK allows selective retransmissions of your window, which is !--- beneficial if larger maximum window sizes are configured and retransmissions !--- occur frequently. It is enabled in this sample configuration; when you do so, !--- make sure that it is enabled at both sides of the link.

!--- The send-buffer-size is the amount of buffers in addition to the TCP window !--- that are allowed to be transmitted out before starting to flow control the FC !--- sources. The default value is set to 0.

- Para obter mais detalhes sobre PMTU, consulte RFC 1191 - Path MTU discovery .

- Para obter mais detalhes sobre SACK, consulte RFC 2018 - Opções de confirmação seletiva do TCP e RFC 2883 - Uma extensão para a opção de confirmação seletiva (SACK) do TCP

MDS 9216 (Canterbury) com módulo IPS-8

canterbury# sh run

Building Configuration ...

fcip profile 200

ip address 200.200.200.1

tcp max-bandwidth-mbps 100 min-available-bandwidth-mbps 100 round-trip-time-ms 10

fcip profile 201

ip address 200.200.200.5

tcp max-bandwidth-mbps 100 min-available-bandwidth-mbps 100 round-trip-time-ms 10

!--- The TCP parameters are identical to what is configured on the peering !--- FCIP interfaces. Only in very specific cases should different values be !--- considered, for example, if the return-path(s) are running across a different !--- part of the network or if the application dictates asymmetrical values.

vsan database

vsan 600

vsan 601

fcdomain domain 2 preferred vsan 600

fcdomain domain 2 preferred vsan 601

interface port-channel 2

switchport trunk mode auto

switchport trunk allowed vsan 600-601

interface fcip1

channel-group 2 force

no shutdown

use-profile 200

peer-info ipaddr 100.100.100.1

interface fcip2

channel-group 2 force

no shutdown

use-profile 201

peer-info ipaddr 100.100.100.5

!--- Both FCIP 1 and FCIP 2 are bound to the same channel-group 2. Also note that !--- there is no strict relationship between profile-id and FCIP interface !--- numbering here, as this is not a requirement. From a management and !--- troubleshooting perspective, however, a “strict” relationship of both values !--- is recommended.

vsan database

vsan 600 interface fc1/1

vsan 601 interface fc1/8

boot system bootflash:/s122a

boot kickstart bootflash:/k122a

ip domain-name cisco.com

ip name-server 144.254.10.123

ip default-gateway 10.48.69.129

ip route 100.100.100.0 255.255.255.252 200.200.200.2 distance 2

ip route 100.100.100.4 255.255.255.252 200.200.200.6 distance 2

!--- IP routes are defined for both FCIP peer IP addresses. The next hop must be !--- aware of the best route to the peer’s addresses or to the relevant IP subnets.

ssh key dsa 768 force

ssh server enable

switchname canterbury

system default switchport trunk mode auto

username admin password 5 $1$KcCrqxlu$mtU03/60PRUIfjl.aeEEc0 role network-admin

zone default-zone permit vsan 600-601

zoneset distribute full vsan 1-4093

interface GigabitEthernet2/1

ip address 200.200.200.1 255.255.255.252

switchport mtu 3000

no shutdown

interface GigabitEthernet2/2

ip address 200.200.200.5 255.255.255.252

switchport mtu 3000

no shutdown

interface GigabitEthernet2/3

interface GigabitEthernet2/4

interface GigabitEthernet2/5

interface GigabitEthernet2/6

interface GigabitEthernet2/7

interface GigabitEthernet2/8

interface fc1/1

interface fc1/2

interface fc1/3

interface fc1/4

interface fc1/5

interface fc1/6

interface fc1/7

interface fc1/8

interface fc1/9

interface fc1/10

interface fc1/11

interface fc1/12

interface fc1/13

interface fc1/14

interface fc1/15

interface fc1/16

interface mgmt0

ip address 10.48.69.156 255.255.255.128

interface iscsi2/1

interface iscsi2/2

interface iscsi2/3

interface iscsi2/4

interface iscsi2/5

interface iscsi2/6

interface iscsi2/7

interface iscsi2/8

Verificar

Use esta seção para confirmar se a sua configuração funciona corretamente.

A Output Interpreter Tool ( somente clientes registrados) (OIT) oferece suporte a determinados comandos show. Use a OIT para exibir uma análise da saída do comando show.

- show interface gig x/y —Exibe o status da interface Gigabit relevante vinculada ao perfil FCIP.

- show ips stats tcp int gig x/y —Exibe as estatísticas do TCP e as conexões ativas para a interface Gigabit relevante.

- show ips arp int gig x/y —Exibe todas as entradas do Address Resolution Protocol (ARP) para a interface Gigabit relevante; o próximo salto ou peer deve estar presente nesta lista.

- show ips ip route int gig x/y —Exibe as rotas específicas que passam pela interface Gigabit relevante.

- show interface fcip x — Exibe o status da interface FCIP e todos os detalhes relacionados a este túnel FCIP.

- show profile fcip x — Exibe o endereço IP ao qual o perfil está vinculado e todos os parâmetros TCP configurados.

- show int fcip x counters —Usado para verificar se há algum quadro passando pelo túnel FCIP.

- show fcdomain vsan x — Lista todos os detalhes relacionados ao domínio; usado para verificar se a estrutura é formada através dos túneis FCIP.

- show fcns da vsan x — Exibe todos os tipos de pwwn, FC4 e FCIDs da VSAN relevante; usado para verificar se todas as entradas esperadas são distribuídas pelo(s) túnel(s) FCIP.

Troubleshoot

Use esta seção para resolver problemas de configuração.

Emita os comandos show várias vezes para criar um histórico de contadores. Os contadores que não estão relacionados a um ponto no tempo e são coletados apenas uma vez são, em sua maioria, inúteis.

Use as configurações mostradas abaixo para Troubleshooting adicional.

- MDS 9509 (Bison)

- MDS 9216 (Canterbury)

- Configuração especial de quadro (Bison)

- Configuração de Quadro Especial (Canterbury)

- Exibição de Bison e Canterbury - passivo de Canterbury

- Exibição de Bison e Canterbury - Conjunto de carimbo de data e hora

MDS 9509 (Bison)

bison# sh int gig 4/1

GigabitEthernet4/1 is up

Hardware is GigabitEthernet, address is 0005.3000.a85a

Internet address is 100.100.100.1/30

MTU 3000 bytes

Port mode is IPS

Speed is 1 Gbps

Beacon is turned off

Auto-Negotiation is turned on

5 minutes input rate 312 bits/sec, 39 bytes/sec, 0 frames/sec

5 minutes output rate 312 bits/sec, 39 bytes/sec, 0 frames/sec

8685 packets input, 976566 bytes

0 multicast frames, 0 compressed

0 input errors, 0 frame, 0 overrun 0 fifo

8679 packets output, 972382 bytes, 0 underruns

0 output errors, 0 collisions, 0 fifo

0 carrier errors

bison# sh int gig 4/2

GigabitEthernet4/2 is up

Hardware is GigabitEthernet, address is 0005.3000.a85b

Internet address is 100.100.100.5/30

MTU 3000 bytes

Port mode is IPS

Speed is 1 Gbps

Beacon is turned off

Auto-Negotiation is turned on

5 minutes input rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

5 minutes output rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

590 packets input, 46496 bytes

0 multicast frames, 0 compressed

0 input errors, 0 frame, 0 overrun 0 fifo

547 packets output, 30898 bytes, 0 underruns

0 output errors, 0 collisions, 0 fifo

0 carrier errors

bison# sh ips stats tcp int gig 4/1

TCP Statistics for port GigabitEthernet4/1

Connection Stats

14 active openings, 4 accepts

4 failed attempts, 0 reset received, 14 established

Segment stats

8897 received, 8505 sent, 0 retransmitted

0 bad segments received, 0 reset sent

TCP Active Connections

Local Address        Remote Address      State      Send-Q  Recv-Q

100.100.100.1:65480  200.200.200.1:3225  ESTABLISH  0       0

100.100.100.1:65482  200.200.200.1:3225  ESTABLISH  0       0

100.100.100.1:3225   0.0.0.0:0           LISTEN     0       0

bison# sh ips stats tcp int gig 4/2

TCP Statistics for port GigabitEthernet4/2

Connection Stats

2 active openings, 0 accepts

0 failed attempts, 0 reset received, 2 established

Segment stats

598 received, 43 sent, 0 retransmitted

0 bad segments received, 0 reset sent

TCP Active Connections

Local Address        Remote Address      State      Send-Q  Recv-Q

100.100.100.5:65531  200.200.200.5:3225  ESTABLISH  0       0

100.100.100.5:65533  200.200.200.5:3225  ESTABLISH  0       0

100.100.100.5:3225   0.0.0.0:0           LISTEN     0       0

bison# sh int fcip1-2

fcip1 is trunking

Hardware is GigabitEthernet

Port WWN is 20:c2:00:05:30:00:7a:de

Peer port WWN is 20:42:00:0c:30:6c:24:40

Admin port mode is auto, trunk mode is on

Port mode is TE

vsan is 1

Belongs to port-channel 1

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 1 (interface GigabitEthernet4/1)

Peer Information

Peer Internet address is 200.200.200.1 and port is 3225

Special Frame is disabled

Maximum number of TCP connections is 2

Time Stamp is disabled

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 100.100.100.1:65480, Remote 200.200.200.1:3225

Data connection: Local 100.100.100.1:65482, Remote 200.200.200.1:3225

28 Attempts for active connections, 7 close of connections

TCP Parameters

Path MTU 3000 bytes

Current retransmission timeout is 200 ms

Round trip time: Smoothed 5 ms, Variance: 6

Advertized window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 10 KB, Slow start threshold: 118 KB

5 minutes input rate 120 bits/sec, 15 bytes/sec, 0 frames/sec

5 minutes output rate 120 bits/sec, 15 bytes/sec, 0 frames/sec

4077 frames input, 379836 bytes

4071 Class F frames input, 379100 bytes

6 Class 2/3 frames input, 736 bytes

0 Error frames timestamp error 0

4077 frames output, 381064 bytes

4071 Class F frames output, 380364 bytes

6 Class 2/3 frames output, 700 bytes

0 Error frames 0 reass frames

fcip2 is trunking

Hardware is GigabitEthernet

Port WWN is 20:c6:00:05:30:00:7a:de

Peer port WWN is 20:46:00:0c:30:6c:24:40

Admin port mode is auto, trunk mode is on

Port mode is TE

vsan is 1

Belongs to port-channel 1

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 2 (interface GigabitEthernet4/2)

Peer Information

Peer Internet address is 200.200.200.5 and port is 3225

Special Frame is disabled

Maximum number of TCP connections is 2

Time Stamp is disabled

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 100.100.100.5:65531, Remote 200.200.200.5:3225

Data connection: Local 100.100.100.5:65533, Remote 200.200.200.5:3225

2 Attempts for active connections, 0 close of connections

TCP Parameters

Path MTU 3000 bytes

Current retransmission timeout is 200 ms

Round trip time: Smoothed 0 ms, Variance: 0

Advertized window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 8 KB, Slow start threshold: 118 KB

5 minutes input rate 32 bits/sec, 4 bytes/sec, 0 frames/sec

5 minutes output rate 32 bits/sec, 4 bytes/sec, 0 frames/sec

8 frames input, 1232 bytes

8 Class F frames input, 1232 bytes

0 Class 2/3 frames input, 0 bytes

0 Error frames timestamp error 0

8 frames output, 1228 bytes

8 Class F frames output, 1228 bytes

0 Class 2/3 frames output, 0 bytes

0 Error frames 0 reass frames

bison# sh fcip pro 1

FCIP Profile 1

Internet Address is 100.100.100.1 (interface GigabitEthernet4/1)

Listen Port is 3225

TCP parameters

SACK is enabled

PMTU discovery is enabled, reset timeout is 3600 sec

Keep alive is 60 sec

Minimum retransmission timeout is 200 ms

Maximum number of re-transmissions is 4

Send buffer size is 0 KB

Maximum allowed bandwidth is 100000 kbps

Minimum available bandwidth is 100000 kbps

Estimated round trip time is 10000 usec

Congestion window monitoring is enabled, burst size is 10 KB

bison# sh fcip pro 2

FCIP Profile 2

Internet Address is 100.100.100.5 (interface GigabitEthernet4/2)

Listen Port is 3225

TCP parameters

SACK is enabled

PMTU discovery is enabled, reset timeout is 3600 sec

Keep alive is 60 sec

Minimum retransmission timeout is 200 ms

Maximum number of re-transmissions is 4

Send buffer size is 0 KB

Maximum allowed bandwidth is 100000 kbps

Minimum available bandwidth is 100000 kbps

Estimated round trip time is 10000 usec

Congestion window monitoring is enabled, burst size is 10 KB

bison# sh int port-channel 1

port-channel 1 is trunking

Hardware is Fibre Channel

Port WWN is 24:01:00:05:30:00:7a:de

Admin port mode is auto, trunk mode is on

Port mode is TE

Port vsan is 1

Speed is 2 Gbps

Trunk vsans (admin allowed and active) (600-601)

Trunk vsans (up)                       (600-601)

Trunk vsans (isolated)                 ()

Trunk vsans (initializing)             ()

5 minutes input rate 120 bits/sec, 15 bytes/sec, 0 frames/sec

5 minutes output rate 120 bits/sec, 15 bytes/sec, 0 frames/sec

3969 frames input, 369812 bytes

3963 Class F frames input, 369076 bytes

6 Class 2/3 frames input, 736 bytes

0 Error frames timestamp error 0

3969 frames output, 371040 bytes

3963 Class F frames output, 370340 bytes

6 Class 2/3 frames output, 700 bytes

0 Error frames 0 reass frames

Member[1] : fcip1

Member[2] : fcip2

bison# sh ips ip route interface gigabitethernet 4/1

Codes: C - connected, S - static

No default gateway

S 200.200.200.0/30 via 100.100.100.2, GigabitEthernet4/1

C 100.100.100.0/30 is directly connected, GigabitEthernet4/1

bison# sh ips ip route interface gigabitethernet 4/2

Codes: C - connected, S - static

No default gateway

S 200.200.200.4/30 via 100.100.100.6, GigabitEthernet4/2

C 100.100.100.4/30 is directly connected, GigabitEthernet4/2

bison# sh ips arp int gig 4/1

Protocol         Address   Age (min)   Hardware Addr  Type   Interface

Internet   100.100.100.2        8     0008.e21e.c7bc  ARPA  GigabitEthernet4/1

!--- Verify that the hardware address listed belongs to the !--- next hop networking device.

bison# sh ips arp int gig 4/2

Protocol         Address   Age (min)   Hardware Addr  Type   Interface

Internet   100.100.100.6        5     0008.e21e.c7bc  ARPA  GigabitEthernet4/2

bison# sh int port-channel 1 trunk vsan 600-601

port-channel 1 is trunking

Vsan 600 is up, FCID is 0x010000

Vsan 601 is up, FCID is 0x010000

bison# sh fcdomain vsan 600

The local switch is the Principal Switch.

Local switch run time information:

State: Stable

Local switch WWN: 22:58:00:05:30:00:7a:df

Running fabric name: 22:58:00:05:30:00:7a:df

Running priority: 2

Current domain ID: 0x01(1)

Local switch configuration information:

State: Enabled

FCID persistence: Disabled

Auto-reconfiguration: Disabled

Contiguous-allocation: Disabled

Configured fabric name: 20:01:00:05:30:00:28:df

Configured priority: 128

Configured domain ID: 0x01(1) (preferred)

Principal switch run time information:

Running priority: 2

Interface        Role          RCF-reject

---------------- ------------- ------------

port-channel 1   Downstream    Disabled

---------------- ------------- ------------

bison# sh fcdomain vsan 601

The local switch is the Principal Switch.

Local switch run time information:

State: Stable

Local switch WWN: 22:59:00:05:30:00:7a:df

Running fabric name: 22:59:00:05:30:00:7a:df

Running priority: 2

Current domain ID: 0x01(1)

Local switch configuration information:

State: Enabled

FCID persistence: Disabled

Auto-reconfiguration: Disabled

Contiguous-allocation: Disabled

Configured fabric name: 20:01:00:05:30:00:28:df

Configured priority: 128

Configured domain ID: 0x01(1) (preferred)

Principal switch run time information:

Running priority: 2

Interface        Role          RCF-reject

---------------- ------------- ------------

port-channel 1   Downstream    Disabled

---------------- ------------- ------------

MDS 9216 (Canterbury)

canterbury# sh int gig 2/1-2

GigabitEthernet2/1 is up

Hardware is GigabitEthernet, address is 0005.3000.ade6

Internet address is 200.200.200.1/30

MTU 3000 bytes

Port mode is IPS

Speed is 1 Gbps

Beacon is turned off

Auto-Negotiation is turned on

5 minutes input rate 320 bits/sec, 40 bytes/sec, 0 frames/sec

5 minutes output rate 320 bits/sec, 40 bytes/sec, 0 frames/sec

8844 packets input, 993118 bytes

0 multicast frames, 0 compressed

0 input errors, 0 frame, 0 overrun 0 fifo

8855 packets output, 994686 bytes, 0 underruns

0 output errors, 0 collisions, 0 fifo

0 carrier errors

GigabitEthernet2/2 is up

Hardware is GigabitEthernet, address is 0005.3000.ade7

Internet address is 200.200.200.5/30

MTU 3000 bytes

Port mode is IPS

Speed is 1 Gbps

Beacon is turned off

Auto-Negotiation is turned on

5 minutes input rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

5 minutes output rate 8 bits/sec, 1 bytes/sec, 0 frames/sec

634 packets input, 39538 bytes

0 multicast frames, 0 compressed

0 input errors, 0 frame, 0 overrun 0 fifo

610 packets output, 47264 bytes, 0 underruns

0 output errors, 0 collisions, 0 fifo

0 carrier errors

canterbury# sh ips stats tcp int gig 2/1

TCP Statistics for port GigabitEthernet2/1

Connection Stats

18 active openings, 10 accepts

14 failed attempts, 0 reset received, 8 established

Segment stats

8919 received, 8923 sent, 0 retransmitted

0 bad segments received, 0 reset sent

TCP Active Connections

Local Address       Remote Address       State      Send-Q  Recv-Q

200.200.200.1:3225  100.100.100.1:65480  ESTABLISH  0       0

200.200.200.1:3225  100.100.100.1:65482  ESTABLISH  0       0

200.200.200.1:3225  0.0.0.0:0            LISTEN     0       0

canterbury# sh ips stats tcp int gig 2/2

TCP Statistics for port GigabitEthernet2/2

Connection Stats

498 active openings, 2 accepts

498 failed attempts, 0 reset received, 2 established

Segment stats

556 received, 579 sent, 0 retransmitted

0 bad segments received, 0 reset sent

TCP Active Connections

Local Address       Remote Address       State      Send-Q  Recv-Q

200.200.200.5:3225  100.100.100.5:65531  ESTABLISH  0       0

200.200.200.5:3225  100.100.100.5:65533  ESTABLISH  0       0

200.200.200.5:3225  0.0.0.0:0            LISTEN     0       0

canterbury# sh int fcip 1-2

fcip1 is trunking

Hardware is GigabitEthernet

Port WWN is 20:42:00:0c:30:6c:24:40

Peer port WWN is 20:c2:00:05:30:00:7a:de

Admin port mode is auto, trunk mode is auto

Port mode is TE

vsan is 1

Belongs to port-channel 2

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 200 (interface GigabitEthernet2/1)

Peer Information

Peer Internet address is 100.100.100.1 and port is 3225

Special Frame is disabled

Maximum number of TCP connections is 2

Time Stamp is disabled

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 200.200.200.1:3225, Remote 100.100.100.1:65480

Data connection: Local 200.200.200.1:3225, Remote 100.100.100.1:65482

18 Attempts for active connections, 2 close of connections

TCP Parameters

Path MTU 3000 bytes

Current retransmission timeout is 200 ms

Round trip time: Smoothed 5 ms, Variance: 6

Advertized window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 10 KB, Slow start threshold: 112 KB

5 minutes input rate 136 bits/sec, 17 bytes/sec, 0 frames/sec

5 minutes output rate 136 bits/sec, 17 bytes/sec, 0 frames/sec

4189 frames input, 391368 bytes

4183 Class F frames input, 390668 bytes

6 Class 2/3 frames input, 700 bytes

0 Error frames timestamp error 0

4189 frames output, 390140 bytes

4183 Class F frames output, 389404 bytes

6 Class 2/3 frames output, 736 bytes

0 Error frames 0 reass frames

fcip2 is trunking

Hardware is GigabitEthernet

Port WWN is 20:46:00:0c:30:6c:24:40

Peer port WWN is 20:c6:00:05:30:00:7a:de

Admin port mode is auto, trunk mode is auto

Port mode is TE

vsan is 1

Belongs to port-channel 2

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 201 (interface GigabitEthernet2/2)

Peer Information

Peer Internet address is 100.100.100.5 and port is 3225

Special Frame is disabled

Maximum number of TCP connections is 2

Time Stamp is disabled

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 200.200.200.5:3225, Remote 100.100.100.5:65531

Data connection: Local 200.200.200.5:3225, Remote 100.100.100.5:65533

498 Attempts for active connections, 0 close of connections

TCP Parameters

Path MTU 3000 bytes

Current retransmission timeout is 200 ms

Round trip time: Smoothed 10 ms, Variance: 5

Advertized window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 8 KB, Slow start threshold: 112 KB

5 minutes input rate 0 bits/sec, 0 bytes/sec, 0 frames/sec

5 minutes output rate 0 bits/sec, 0 bytes/sec, 0 frames/sec

8 frames input, 1228 bytes

8 Class F frames input, 1228 bytes

0 Class 2/3 frames input, 0 bytes

0 Error frames timestamp error 0

8 frames output, 1232 bytes

8 Class F frames output, 1232 bytes

0 Class 2/3 frames output, 0 bytes

0 Error frames 0 reass frames

canterbury# sh int port 2

port-channel 2 is trunking

Hardware is Fibre Channel

Port WWN is 24:02:00:0c:30:6c:24:40

Admin port mode is auto, trunk mode is auto

Port mode is TE

Port vsan is 1

Speed is 2 Gbps

Trunk vsans (admin allowed and active) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

5 minutes input rate 120 bits/sec, 15 bytes/sec, 0 frames/sec

5 minutes output rate 120 bits/sec, 15 bytes/sec, 0 frames/sec

4213 frames input, 394068 bytes

4207 Class F frames input, 393368 bytes

6 Class 2/3 frames input, 700 bytes

0 Error frames timestamp error 0

4213 frames output, 392844 bytes

4207 Class F frames output, 392108 bytes

6 Class 2/3 frames output, 736 bytes

0 Error frames 0 reass frames

Member[1] : fcip1

Member[2] : fcip2

canterbury# sh ips ip route interface gig 2/1

Codes: C - connected, S - static

No default gateway

S 100.100.100.0/30 via 200.200.200.2, GigabitEthernet2/1

C 200.200.200.0/30 is directly connected, GigabitEthernet2/1

canterbury# sh ips ip route interface gig 2/2

Codes: C - connected, S - static

No default gateway

S 100.100.100.4/30 via 200.200.200.6, GigabitEthernet2/2

C 200.200.200.4/30 is directly connected, GigabitEthernet2/2

canterbury# sh fcns da

VSAN 600:

--------------------------------------------------------------------------

FCID      TYPE  PWWN                     (VENDOR)  FC4-TYPE:FEATURE

--------------------------------------------------------------------------

0x010001  N     10:00:00:00:c9:32:a6:e3  (Emulex)  scsi-fcp:init

0x020001  N     50:05:07:63:00:d0:94:4c  (IBM)     scsi-fcp:target fc..

Total number of entries = 2

VSAN 601:

--------------------------------------------------------------------------

FCID      TYPE  PWWN                     (VENDOR)  FC4-TYPE:FEATURE

--------------------------------------------------------------------------

0x010100  N     10:00:00:00:00:05:00:00

0x020100  N     10:00:00:00:00:01:00:00

!--- Always verify that the fabric has formed with the expected neighbor(s) !--- through FCIP E or TE port when the configuration is completed.

Configuração especial de quadro (Bison)

!--- Special frames are used to improve security. !--- Before user-data is transmitted across an FCIP tunnel, FSF verifies that !--- the peer is defined on the configured wwn.

interface fcip1

channel-group 1 force

no shutdown

use-profile 1

peer-info ipaddr 200.200.200.1

special-frame peer-wwn 20:00:00:0c:30:6c:24:40 profile-id 200

interface fcip2

channel-group 1 force

no shutdown

use-profile 2

peer-info ipaddr 200.200.200.5

special-frame peer-wwn 20:00:00:0c:30:6c:24:40 profile-id 201

!--- The peer-wwn is derived from the peer MDS by issuing the following command:

canterbury# sh wwn switch

Switch WWN is 20:00:00:0c:30:6c:24:40

!--- This value is significant per peer switch, so it is used for all tunnels !--- towards this switch. This configuration shows the following:

bison# sh int fcip 1-2

fcip1 is trunking

Hardware is GigabitEthernet

Port WWN is 20:c2:00:05:30:00:7a:de

Peer port WWN is 20:42:00:0c:30:6c:24:40

Admin port mode is auto, trunk mode is on

Port mode is TE

vsan is 1

Belongs to port-channel 1

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 1 (interface GigabitEthernet4/1)

Peer Information

Peer Internet address is 200.200.200.1 and port is 3225

Special Frame is enabled

Peer switch WWN is 20:00:00:0c:30:6c:24:40

Peer profile id is 200

Maximum number of TCP connections is 2

Time Stamp is disabled

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 100.100.100.1:65372, Remote 200.200.200.1:3225

Data connection: Local 100.100.100.1:65374, Remote 200.200.200.1:3225

82 Attempts for active connections, 9 close of connections

TCP Parameters

Path MTU 3000 bytes

Current retransmission timeout is 200 ms

Round trip time: Smoothed 2 ms, Variance: 1

Advertized window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 106 KB, Slow start threshold: 118 KB

5 minutes input rate 46128 bits/sec, 5766 bytes/sec, 19 frames/sec

5 minutes output rate 194867736 bits/sec, 24358467 bytes/sec, 20732 frames/sec

5841 frames input, 1729836 bytes

4575 Class F frames input, 429444 bytes

1266 Class 2/3 frames input, 1300392 bytes

0 Error frames timestamp error 0

6339146 frames output, 7447938520 bytes

4576 Class F frames output, 431800 bytes

6334570 Class 2/3 frames output, 7447506720 bytes

0 Error frames 0 reass frames

fcip2 is trunking

Hardware is GigabitEthernet

Port WWN is 20:c6:00:05:30:00:7a:de

Peer port WWN is 20:46:00:0c:30:6c:24:40

Admin port mode is auto, trunk mode is on

Port mode is TE

vsan is 1

Belongs to port-channel 1

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 2 (interface GigabitEthernet4/2)

Peer Information

Peer Internet address is 200.200.200.5 and port is 3225

Special Frame is enabled

Peer switch WWN is 20:00:00:0c:30:6c:24:40

Peer profile id is 201

Maximum number of TCP connections is 2

Time Stamp is disabled

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 100.100.100.5:3225, Remote 200.200.200.5:64535

Data connection: Local 100.100.100.5:3225, Remote 200.200.200.5:64537

58 Attempts for active connections, 1 close of connections

TCP Parameters

Path MTU 3000 bytes

Current retransmission timeout is 200 ms

Round trip time: Smoothed 2 ms, Variance: 1

Advertized window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 106 KB, Slow start threshold: 112 KB

5 minutes input rate 0 bits/sec, 0 bytes/sec, 0 frames/sec

5 minutes output rate 0 bits/sec, 0 bytes/sec, 0 frames/sec

415 frames input, 398160 bytes

16 Class F frames input, 2460 bytes

399 Class 2/3 frames input, 395700 bytes

0 Error frames timestamp error 0

6078322 frames output, 7147327176 bytes

16 Class F frames output, 2460 bytes

6078306 Class 2/3 frames output, 7147324716 bytes

0 Error frames 0 reass frames

Configuração de Quadro Especial (Canterbury)

interface fcip1

channel-group 2 force

no shutdown

use-profile 200

peer-info ipaddr 100.100.100.1

special-frame peer-wwn 20:00:00:05:30:00:7a:de profile-id 1

interface fcip2

channel-group 2 force

no shutdown

use-profile 201

peer-info ipaddr 100.100.100.5

special-frame peer-wwn 20:00:00:05:30:00:7a:de profile-id 2

canterbury# sh int fcip 1

fcip1 is trunking

Hardware is GigabitEthernet

Port WWN is 20:42:00:0c:30:6c:24:40

Peer port WWN is 20:c2:00:05:30:00:7a:de

Admin port mode is auto, trunk mode is auto

Port mode is TE

vsan is 1

Belongs to port-channel 2

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 200 (interface GigabitEthernet2/1)

Peer Information

Peer Internet address is 100.100.100.1 and port is 3225

Special Frame is enabled

Peer switch WWN is 20:00:00:05:30:00:7a:de

Peer profile id is 1

Maximum number of TCP connections is 2

Time Stamp is disabled

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 200.200.200.1:3225, Remote 100.100.100.1:65372

Data connection: Local 200.200.200.1:3225, Remote 100.100.100.1:65374

2 Attempts for active connections, 0 close of connections

TCP Parameters

Path MTU 3000 bytes

Current retransmission timeout is 200 ms

Round trip time: Smoothed 2 ms, Variance: 1

Advertized window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 10 KB, Slow start threshold: 112 KB

5 minutes input rate 94347400 bits/sec, 11793425 bytes/sec, 10031 frames/sec

5 minutes output rate 144 bits/sec, 18 bytes/sec, 0 frames/sec

3985861 frames input, 4685834196 bytes

219 Class F frames input, 25228 bytes

3985642 Class 2/3 frames input, 4685808968 bytes

0 Error frames timestamp error 0

1043 frames output, 866780 bytes

218 Class F frames output, 23448 bytes

825 Class 2/3 frames output, 843332 bytes

0 Error frames 0 reass frames

canterbury# sh int fcip 2

fcip2 is trunking

Hardware is GigabitEthernet

Port WWN is 20:46:00:0c:30:6c:24:40

Peer port WWN is 20:c6:00:05:30:00:7a:de

Admin port mode is auto, trunk mode is auto

Port mode is TE

vsan is 1

Belongs to port-channel 2

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 201 (interface GigabitEthernet2/2)

Peer Information

Peer Internet address is 100.100.100.5 and port is 3225

Special Frame is enabled

Peer switch WWN is 20:00:00:05:30:00:7a:de

Peer profile id is 2

Maximum number of TCP connections is 2

Time Stamp is disabled

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 200.200.200.5:64535, Remote 100.100.100.5:3225

Data connection: Local 200.200.200.5:64537, Remote 100.100.100.5:3225

500 Attempts for active connections, 0 close of connections

TCP Parameters

Path MTU 3000 bytes

Current retransmission timeout is 300 ms

Round trip time: Smoothed 10 ms, Variance: 5

Advertized window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 8 KB, Slow start threshold: 118 KB

5 minutes input rate 94399712 bits/sec, 11799964 bytes/sec, 10034 frames/sec

5 minutes output rate 0 bits/sec, 0 bytes/sec, 0 frames/sec

9769115 frames input, 11486944196 bytes

16 Class F frames input, 2460 bytes

9769099 Class 2/3 frames input, 11486941736 bytes

0 Error frames timestamp error 0

415 frames output, 398160 bytes

16 Class F frames output, 2460 bytes

399 Class 2/3 frames output, 395700 bytes

0 Error frames 0 reass frames

Exibição de Bison e Canterbury - passivo de Canterbury

interface fcip1

channel-group 2 force

no shutdown

use-profile 200

passive-mode

peer-info ipaddr 100.100.100.1

special-frame peer-wwn 20:00:00:05:30:00:7a:de profile-id 1

interface fcip2

channel-group 2 force

no shutdown

use-profile 201

passive-mode

peer-info ipaddr 100.100.100.5

special-frame peer-wwn 20:00:00:05:30:00:7a:de profile-id 2

canterbury# sh ips stats tcp int gig 2/1

TCP Statistics for port GigabitEthernet2/1

Connection Stats

20 active openings, 14 accepts

14 failed attempts, 0 reset received, 14 established

Segment stats

12042719 received, 3181301 sent, 0 retransmitted

0 bad segments received, 0 reset sent

TCP Active Connections

Local Address       Remote Address       State      Send-Q  Recv-Q

200.200.200.1:3225  100.100.100.1:65368  ESTABLISH  0       0

200.200.200.1:3225  100.100.100.1:65370  ESTABLISH  0       0

200.200.200.1:3225  100.100.100.1:65372  TIME_WAIT  0       0

200.200.200.1:3225  0.0.0.0:0            LISTEN     0       0

!--- Both FCIP interfaces for Canterbury are configured to be passive; this !--- results in the above TCP statistics where Canterbury, despite being !--- configured with the highest IP addresses for both tunnels, did not !--- initiate the TCP connections. Its peer, Bison, initiates.

canterbury# sh ips stats tcp int gig 2/2

TCP Statistics for port GigabitEthernet2/2

Connection Stats

500 active openings, 4 accepts

498 failed attempts, 0 reset received, 6 established

Segment stats

11933351 received, 3144627 sent, 0 retransmitted

0 bad segments received, 0 reset sent

TCP Active Connections

Local Address       Remote Address       State      Send-Q  Recv-Q

200.200.200.5:3225  100.100.100.5:65415  ESTABLISH  0       0

200.200.200.5:3225  100.100.100.5:65417  ESTABLISH  0       0

200.200.200.5:64535 100.100.100.5:3225   TIME_WAIT  0       0

200.200.200.5:3225  0.0.0.0:0            LISTEN     0       0

Exibição de Bison e Canterbury - Conjunto de carimbo de data e hora

!--- FCIP Time Stamp is enabled to allow the peer to drop FCIP userdata if it !--- exceeds the specified time-difference. The time difference is the maximum !--- value in transit of user data frames between two peer FCIP entities.

bison(config-if)# time-stamp acceptable-diff 1000

Please enable NTP with a common time source on both MDS Switches that are on

either side of the FCIP link

!--- Note that the value specified is in milliseconds and, because a !--- time difference is specified, both ends of the FCIP tunnel must have access !--- to the same clock source through NTP.

interface fcip1

channel-group 1 force

no shutdown

use-profile 1

peer-info ipaddr 200.200.200.1

time-stamp acceptable-diff 1000

special-frame peer-wwn 20:00:00:0c:30:6c:24:40 profile-id 200

interface fcip2

channel-group 1 force

no shutdown

use-profile 2

peer-info ipaddr 200.200.200.5

time-stamp acceptable-diff 1000

special-frame peer-wwn 20:00:00:0c:30:6c:24:40 profile-id 201

bison# sh int fcip 1

fcip1 is trunking

Hardware is GigabitEthernet

Port WWN is 20:c2:00:05:30:00:7a:de

Peer port WWN is 20:42:00:0c:30:6c:24:40

Admin port mode is auto, trunk mode is on

Port mode is TE

vsan is 1

Belongs to port-channel 1

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 1 (interface GigabitEthernet4/1)

Peer Information

Peer Internet address is 200.200.200.1 and port is 3225

Special Frame is enabled

Peer switch WWN is 20:00:00:0c:30:6c:24:40

Peer profile id is 200

Maximum number of TCP connections is 2

Time Stamp is enabled, acceptable time difference 1000 ms

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 100.100.100.1:65368, Remote 200.200.200.1:3225

Data connection: Local 100.100.100.1:65370, Remote 200.200.200.1:3225

84 Attempts for active connections, 10 close of connections

TCP Parameters

Path MTU 3000 bytes

Current retransmission timeout is 200 ms

Round trip time: Smoothed 2 ms, Variance: 3

Advertized window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 10 KB, Slow start threshold: 118 KB

5 minutes input rate 0 bits/sec, 0 bytes/sec, 0 frames/sec

5 minutes output rate 0 bits/sec, 0 bytes/sec, 0 frames/sec

5988 frames input, 1743840 bytes

4719 Class F frames input, 443184 bytes

1269 Class 2/3 frames input, 1300656 bytes

0 Error frames timestamp error 0

15337275 frames output, 18028320932 bytes

4720 Class F frames output, 445544 bytes

15332555 Class 2/3 frames output, 18027875388 bytes

0 Error frames 0 reass frames

canterbury(config-if)# time-stamp acceptable-diff 1000

Please enable NTP with a common time source on both MDS Switches that are on

either side of the FCIP link

interface fcip1

channel-group 2 force

no shutdown

use-profile 200

passive-mode

peer-info ipaddr 100.100.100.1

time-stamp acceptable-diff 1000

special-frame peer-wwn 20:00:00:05:30:00:7a:de profile-id 1

interface fcip2

channel-group 2 force

no shutdown

use-profile 201

passive-mode

peer-info ipaddr 100.100.100.5

time-stamp acceptable-diff 1000

special-frame peer-wwn 20:00:00:05:30:00:7a:de profile-id 2

canterbury# sh int fcip 1

fcip1 is trunking

Hardware is GigabitEthernet

Port WWN is 20:42:00:0c:30:6c:24:40

Peer port WWN is 20:c2:00:05:30:00:7a:de

Admin port mode is auto, trunk mode is auto

Port mode is TE

vsan is 1

Belongs to port-channel 2

Trunk vsans (allowed active) (600-601)

Trunk vsans (operational) (600-601)

Trunk vsans (up) (600-601)

Trunk vsans (isolated) ()

Trunk vsans (initializing) ()

Using Profile id 200 (interface GigabitEthernet2/1)

Peer Information

Peer Internet address is 100.100.100.1 and port is 3225

Passive mode is enabled

Special Frame is enabled

Peer switch WWN is 20:00:00:05:30:00:7a:de

Peer profile id is 1

Maximum number of TCP connections is 2

Time Stamp is enabled, acceptable time difference 1000 ms

QOS control code point is 0

QOS data code point is 0

B-port mode disabled

TCP Connection Information

2 Active TCP connections

Control connection: Local 200.200.200.1:3225, Remote 100.100.100.1:65368

Data connection: Local 200.200.200.1:3225, Remote 100.100.100.1:65370

2 Attempts for active connections, 0 close of connections

TCP Parameters

Path MTU 3000 bytes

Current retransmission timeout is 200 ms

Round trip time: Smoothed 6 ms, Variance: 6

Advertized window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 10 KB, Slow start threshold: 112 KB

5 minutes input rate 0 bits/sec, 0 bytes/sec, 0 frames/sec

5 minutes output rate 0 bits/sec, 0 bytes/sec, 0 frames/sec

9427366 frames input, 11084654892 bytes

295 Class F frames input, 32716 bytes

9427071 Class 2/3 frames input, 11084622176 bytes

145359 Error frames timestamp error 145359

1122 frames output, 874528 bytes

294 Class F frames output, 30932 bytes

828 Class 2/3 frames output, 843596 bytes

0 Error frames 0 reass frames

Informações Relacionadas

- Página principal T11

- Problemas na reinicialização lenta do TCP após inatividade

- RFC 1191 - descoberta de MTU de caminho

- RFC 1323 - Extensões TCP para alto desempenho

- RFC 2018 - Opções de confirmação seletiva do TCP

- RFC 2883 - Uma extensão da opção de confirmação seletiva (SACK) para TCP

- RFC 3821 – Canal de fibra por TCP/IP (FCIP)

- Suporte Técnico e Documentação - Cisco Systems