Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Configurar

Diagrama de Rede

Configurações

Verificar

Troubleshoot

Informações Relacionadas

Introduction

Este documento fornece uma visão geral da configuração necessária para permitir que um roteador Cisco executando o software Cisco IOS® e um Cisco VPN 5000 Series Concentrator abram um túnel GRE (Generic Routing Encapsulation).

Prerequisites

Requirements

Não existem requisitos específicos para este documento.

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- Software Cisco IOS versão 12.0(7)T

- Software Cisco VPN 5000 Concentrator versão 5.2.19US

- Cisco VPN 5002 Concentrator

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Para obter mais informações sobre convenções de documento, consulte as Convenções de dicas técnicas Cisco.

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Observação: para encontrar informações adicionais sobre os comandos usados neste documento, use a ferramenta Command Lookup Tool (somente clientes registrados).

Diagrama de Rede

Este documento utiliza a configuração de rede mostrada neste diagrama.

Configurações

Este documento utiliza as configurações mostradas aqui.

- Cisco VPN 5002 Concentrator

- Roteador executando o software Cisco IOS

Cisco VPN 5002 Concentrator

[ General ]

IPSecGateway             = 200.1.1.2

DeviceName               = "omar5002"

EthernetAddress          = 00:00:a5:

e9:c8:00

DeviceType               = VPN 5002/8 Concentrator

ConfiguredOn             = Timeserver not configured

ConfiguredFrom           = Command Line, from Console

EnablePassword           =

Password                 =

[ IP Ethernet 1:0 ]

Mode                     = Routed

SubnetMask               = 255.255.255.0

IPAddress                = 200.1.1.1

[ IP Ethernet 0:0 ]

Mode                     = Routed

SubnetMask               = 255.255.255.0

IPAddress                = 10.10.10.1

[ Tunnel Partner VPN 1 ]

EncryptMethod            = None

Encryption               = Off

Authentication           = Off

KeyManage                = Manual

Mode                     = Main

Partner                  = 100.1.1.1

LocalAccess              = "10.10.10.0/24"

BindTo                   = "ethernet1:0"

Peer                     = "20.20.20.0/24"

[ IP Static ]

20.20.20.0 255.255.255.0 vpn 1 1

[ IP VPN 1 ]

Numbered                 = Off

Mode                     = Routed

Configuration size is 1107 out of 65500 bytes.

omar5002#

Roteador executando o software Cisco IOS

Router Configuration:

Router#show running-config

Building configuration...

Current configuration:

!

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Router

!

!

ip subnet-zero

!

!

!

interface Tunnel0

ip unnumbered Ethernet1

no ip directed-broadcast

tunnel source 100.1.1.1

tunnel destination 200.1.1.1

!

interface Ethernet0

ip address 100.1.1.1 255.255.255.0

no ip directed-broadcast

!

interface Ethernet1

ip address 20.20.20.1 255.255.255.0

no ip directed-broadcast

!

!

ip classless

ip route 0.0.0.0 0.0.0.0 100.1.1.2 1

ip route 10.10.10.0 255.255.255.0 Tunnel0

no ip http server

!

!

line con 0

transport input none

line aux 0

line vty 0 4

login

!

end

Verificar

Esta seção fornece informações que você pode usar para confirmar se sua configuração está funcionando adequadamente.

A Output Interpreter Tool (somente clientes registrados) oferece suporte a determinados comandos show, o que permite exibir uma análise da saída do comando show.

- show vpn statistics verbose —Fornece informações detalhadas do túnel.

- show interface —Fornece estatísticas de interface.

Este é um exemplo de saída do comando show vpn statistics verbose retirado do Cisco VPN 5002 Concentrator.

omar5002#show vpn statistic verbose

Current  In       High     Running  Tunnel   Tunnel   Tunnel

Active   Negot    Water    Total    Starts   OK       Error

--------------------------------------------------------------

Users     0        0        0        0        0        0        0

Partners  1        0        1        1        0        0        0

Total     1        0        1        1        0        0        0

Stats             VPN0:1

Wrapped              697

Unwrapped            697

BadEncap               0

BadAuth                0

BadEncrypt             0

rx IP                718

rx IPX                 0

rx Other               0

tx IP                734

tx IPX                 0

tx Other               0

IKE rekey              0

Input VPN pkts dropped due to no SA: 0

Input VPN pkts dropped due to no free queue entries: 0

ISAKMP Negotiation stats

Admin packets in        0

Fastswitch packets in   0

No cookie found         0

Can't insert cookie     0

Inserted cookie(L)      0

Inserted cookie(R)      0

Cookie not inserted(L)  0

Cookie not inserted(R)  0

Cookie conn changed     0

Cookie already inserted  0

Deleted cookie(L)       0

Deleted cookie(R)       0

Cookie not deleted(L)   0

Cookie not deleted(R)   0

Forwarded to RP         0

Forwarded to IOP        0

Bad UDP checksum        0

Not fastswitched        0

Este é um exemplo de saída do comando show interface retirado do roteador.

Router#show interface tunnel 0

Tunnel0 is up, line protocol is up

Hardware is Tunnel

Interface is unnumbered. Using address of Ethernet1 (20.20.20.1)

MTU 1476 bytes, BW 9 Kbit, DLY 500000 usec,

reliability 255/255, txload 55/255, rxload 113/255

Encapsulation TUNNEL, loopback not set

Keepalive set (10 sec)

Tunnel source 100.1.1.1, destination 200.1.1.1

Tunnel protocol/transport GRE/IP, key disabled, sequencing disabled

Checksumming of packets disabled,  fast tunneling enabled

Last input 00:00:15, output 00:00:15, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/0, 1 drops; input queue 0/75, 0 drops

5 minute input rate 4000 bits/sec, 5 packets/sec

5 minute output rate 11000 bits/sec, 5 packets/sec

1309 packets input, 129264 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

1348 packets output, 316468 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

Router#

Troubleshoot

Atualmente, não existem informações disponíveis específicas sobre Troubleshooting para esta configuração.

Informações Relacionadas

- Página de suporte de Cisco VPN 5000 Series Concentrators

- Página de suporte do Cisco VPN 5000 Client

- Página de suporte do IPSec (protocolo de segurança IP)

- Suporte Técnico - Cisco Systems