Contents

Introdução

Pré-requisitos

Requisitos

Componentes Utilizados

Informações de Apoio

Informações do chassi

Serial Number

Versão do FXOS

Versão do carregador de inicialização

Horário da verificação

show clock

Verificar servidor Ntp

Monitorando a integridade do chassi

Verificar Ambiente

Mostrar falha

Problemas de fonte de alimentação

Problemas com o ventilador

Mostrar evento

Show System Reset-reason

Problemas de alimentação na placa-mãe

Dispositivos lógicos

Instância de monitoramento

Mostrar Status do Servidor

Mostrar slot

Mostrar Instância do Aplicativo

Show Logical-device

Mostrar instância do aplicativo

Mostrar Detalhes da Instância do Aplicativo

Mostrar Detalhes do Recurso

Acesso do gerenciador de chassi

Acesso ao Servidor Web Local

Interfaces do monitor

Verificar o IP de gerenciamento do chassi

Show Mgmt-port

Definir Captura na Interface de Gerenciamento

show interface

Show Port-channel

Informações Relacionadas

Introdução

Este documento descreve as etapas para ajudar a confirmar se o estado básico do Cisco Secure Firewall eXtensible Operating (FXOS) e a configuração estão corretos.

Pré-requisitos

Requisitos

A Cisco recomenda que você tenha conhecimento sobre:

- Cisco Secure Firewall eXtensible Operating (FXOS)

- Defesa contra ameaças (FTD) do Cisco Secure Firewall

Componentes Utilizados

As informações neste documento foram criadas a partir de dispositivos em um ambiente de laboratório específico. Todos os dispositivos usados neste documento começaram com uma configuração limpa (padrão). Se a rede estiver ativa, certifique-se de que você entenda o impacto potencial de qualquer comando.

- Cisco Secure Firewall eXtensible Operating 4110, versão 2.10.(1.179)

- Cisco Secure Firewall Threat Defense, versão 7.0.5

As informações neste documento foram criadas a partir de dispositivos em um ambiente de laboratório específico. Todos os dispositivos utilizados neste documento foram iniciados com uma configuração (padrão) inicial. Se a rede estiver ativa, certifique-se de que você entenda o impacto potencial de qualquer comando.

Informações de Apoio

O chassi do Cisco Secure Firewall é uma plataforma de última geração para soluções de segurança de rede e de contato. Um dispositivo lógico permite executar uma instância de aplicativo, ASA ou Cisco Secure Firewall Threat Defense (FTD).

Dependendo do dispositivo lógico adicionado, o tipo e a versão da instância do aplicativo são definidos.

Informações do chassi

Esses comandos ajudam a obter informações gerais do seu chassi (esteja tudo operável ou não) que informações coletam para o TAC para solucionar o erro do chassi.

Serial Number

O número de série é usado como um identificador do chassi. É necessário no caso de uma RMA de todo o chassi

FPR4110-04-A# scope chassis 1

FPR4110-04-A /chassis # show inventory

Chassis     PID          Vendor            Serial (SN)  HW Revision

-------    -----------   ----------------- -----------  -----------

1          FPR-4110-K9   Cisco Systems Inc JMX2136L03W  0

Versão do FXOS

FPR4110-04-A# show version

Version: 2.10(1.179)

Startup-Vers: 2.10(1.179)

Há duas maneiras de saber a versão do FXOS, esta inclui o firmware.

FPR4110-04-A# show fabric-interconnect firmware

Fabric Interconnect A:

Running-Kern-Vers: 5.0(3)N2(4.101.103)

Running-Sys-Vers: 5.0(3)N2(4.101.103)

Package-Vers: 2.10(1.179)

Startup-Kern-Vers: 5.0(3)N2(4.101.103)

Startup-Sys-Vers: 5.0(3)N2(4.101.103)

Act-Kern-Status: Ready

Act-Sys-Status: Ready

Bootloader-Vers:

Versão do carregador de inicialização

FPR4110-04-A# scope chassis 1

FPR4110-04-A /chassis # scope server 1

FPR4110-04-A /chassis/server # scope adapter 1

FPR4110-04-A /chassis/server/adapter # show version detail

Adapter 1:

Running-Vers: 5.10(1.53)

Package-Vers: 2.10(1.179)

Update-Status: Ready

Activate-Status: Ready

Bootloader-Update-Status: Ready

Startup-Vers: 5.10(1.53)

Backup-Vers: 5.10(1.57)

Bootloader-Vers: 4.0(1.62)

Horário da verificação

FPR4110-04-A# connect fxos

FPR4110-04-A(fxos)# show system uptime

System start time: Mon Oct 23 16:45:36 2023

System uptime: 98 days, 1 hours, 49 minutes, 36 seconds

Kernel uptime: 98 days, 1 hours, 40 minutes, 19 seconds

Active supervisor uptime: 98 days, 1 hours, 49 minutes, 36 second

show clock

FPR4110-04-A# show clock

Tue Jan 30 17:07:50 EST 2024

Verificar servidor Ntp

FPR4110-04-A# scope system

FPR4110-04-A /system # scope services

FPR4110-04-A /system/services # show ntp-server

NTP server hostname:

Name Time         Sync Status

--------------    ----------------

172.16.254.131    Time Synchronized

Monitorando a integridade do chassi

Estes são alguns comandos para ajudar a solucionar problemas de status do hardware do chassi.

Verificar Ambiente

FPR4110-04-A# scope chassis 1

FPR4110-04-A /chassis # show environment expand detail

Chassis 1:

Overall Status: Power Problem

Operability: Operable

Power State: Redundancy Failed

Thermal Status: Ok

PSU 1:

Threshold Status: N/A

Overall Status: N/A

Operability: N/A

Power State: Off

Thermal Status: OK

Voltage Status: N/A

PSU 2:

Threshold Status: OK

Overall Status: Operable

Operability: Operable

Power State: On

Thermal Status: OK

Voltage Status: OK

Tray 1 Module 1:

Threshold Status: OK

Overall Status: Operable

Operability: Operable

Power State: On

Thermal Status: OK

Voltage Status: OK

Fan Module Stats:

Ambient Temp (C): 27.000000

Fan 1:

Threshold Status: OK

Overall Status: Operable

Operability: Operable

Power State: On

Thermal Status: OK

Voltage Status: OK

Fan 2:

Threshold Status: OK

Overall Status: Operable

Operability: Operable

Power State: On

Thermal Status: OK

Voltage Status: OK

...

Server 1:

Name:

User Label:

Overall Status: Ok

Operability: Operable

Oper Power: On

Adapter 1:

Threshold Status: N/A

Overall Status: Operable

Operability: Operable

Power State: On

Thermal Status: N/A

Voltage Status: N/A

Motherboard:

Threshold Status: OK

Overall Status: N/A

Operability: N/A

Oper Power: On

Power State: Ok

Thermal Status: OK

Voltage Status: OK

CMOS Battery Voltage Status: Ok

Mother Board Power Usage Status: Ok

Motherboard Temperature Statistics:

Motherboard Front Temperature (C): 19.000000

Motherboard Rear Temperature (C): 26.000000

Memory Array 1:

Threshold Status: N/A

Overall Status: N/A

Operability: N/A

Power State: N/A

Thermal Status: N/A

Voltage Status: N/A

DIMMs:

DIMM Threshold Status Overall Status Operability Power State Thermal Status Voltage Status

---- ---------------- --------------- ----------- ----------- --------------- --------------

1 N/A Operable N/A N/A OK N/A

2 N/A Removed N/A N/A N/A N/A

3 N/A Removed N/A N/A N/A N/A

4 N/A Operable N/A N/A OK N/A

5 N/A Removed N/A N/A N/A N/A

...

CPU 1:

Threshold Status: N/A

Overall Status: Operable

Operability: Operable

Power State: N/A

Thermal Status: OK

Voltage Status: N/A

Mostrar falha

A lista de falhas mostra todos os problemas de hardware identificados nas plataformas Secure Firewall. Ela ajuda a obter um resumo das falhas ativas, bem como das falhas já eliminadas.

As falhas são mostradas em ordem cronológica. A gravidade reflete a importância da falha, enquanto a descrição fornece um breve resumo. O foco está principalmente na gravidade, no carimbo de hora e na descrição. A ordem de gravidade da falha da mais grave para a menos grave é:

- Crítico

- Principal

- Menor

- Aviso

- Informações/condição

- Limpo

FPR4110-04-A# show fault

Severity Code Last Transition Time ID Description

--------- ----- ----------------------- ------ -----------

Major F0276 2023-12-14T18:26:29.505 507308 ether port 2/2 on fabric interconnect A oper state: link-down, reason: Link failure or not-connected

Major F0276 2023-11-13T14:07:37.720 221350 ether port 1/1 on fabric interconnect A oper state: link-down, reason: Link failure or not-connected

Info F0279 2023-11-13T14:07:37.720 446504 ether port 1/7 on fabric interconnect A oper state: sfp-not-present

Major F0276 2023-11-07T08:10:50.143 434090 ether port 1/6 on fabric interconnect A oper state: link-down, reason: Link failure or not-connected

Major F0276 2023-11-07T08:10:49.941 434081 ether port 1/5 on fabric interconnect A oper state: link-down, reason: Link failure or not-connected

Major F0282 2023-07-31T17:52:04.764 201600 lan port-channel 7 on fabric interconnect A oper state: failed, reason: No operational members

Major F0282 2023-07-31T17:51:03.325 201446 lan port-channel 4 on fabric interconnect A oper state: failed, reason: No operational members

Major F0282 2023-07-31T17:49:00.451 201281 lan port-channel 2 on fabric interconnect A oper state: failed, reason: No operational members

Major F0282 2023-07-31T17:42:34.236 200638 lan port-channel 1 on fabric interconnect A oper state: failed, reason: No operational members

Major F0909 2023-06-19T14:02:55.642 99113 default Keyring's certificate is invalid, reason: expired.

Warning F1781 2012-01-11T02:21:44.215 90296 The password encryption key has not been set.

Info F0461 2011-12-31T21:32:43.448 35793 Log capacity on Management Controller on server 1/1 is very-low

Major F0408 2011-12-31T21:32:32.787 35497 Power state on chassis 1 is redundancy-failed

Warning F0528 2011-12-31T21:32:32.787 35498 Power supply 1 in chassis 1 power: off

Minor F1437 2011-12-31T21:31:08.462 32663 Config backup may be outdated

FPR4110-04-A#

As falhas podem ser filtradas com base em causa, detalhes, gravidade ou falhas suprimidas.

FPR4110-04-A# show fault ?

0-18446744073709551615 ID

<CR>

> Redirect it to a file

>> Redirect it to a file in append mode

cause Cause

detail Detail

severity Severity

suppressed Fault Suppressed

| Pipe command output to filter

FPR4110-04-A# show fault severity major

Severity Code Last Transition Time ID Description

--------- ----- ----------------------- ------ -----------

Major F0276 2023-12-14T18:26:29.505 507308 ether port 2/2 on fabric interconnect A oper state: link-down, reason: Link failure or not-connected

Major F0276 2023-11-13T14:07:37.720 221350 ether port 1/1 on fabric interconnect A oper state: link-down, reason: Link failure or not-connected

Major F0276 2023-11-07T08:10:50.143 434090 ether port 1/6 on fabric interconnect A oper state: link-down, reason: Link failure or not-connected

Major F0276 2023-11-07T08:10:49.941 434081 ether port 1/5 on fabric interconnect A oper state: link-down, reason: Link failure or not-connected

Major F0282 2023-07-31T17:52:04.764 201600 lan port-channel 7 on fabric interconnect A oper state: failed, reason: No operational members

Major F0282 2023-07-31T17:51:03.325 201446 lan port-channel 4 on fabric interconnect A oper state: failed, reason: No operational members

Major F0282 2023-07-31T17:49:00.451 201281 lan port-channel 2 on fabric interconnect A oper state: failed, reason: No operational members

Major F0282 2023-07-31T17:42:34.236 200638 lan port-channel 1 on fabric interconnect A oper state: failed, reason: No operational members

Major F0282 2023-07-31T17:41:34.673 200660 lan port-channel 3 on fabric interconnect A oper state: failed, reason: No operational members

Major F0408 2011-12-31T21:32:32.787 35497 Power state on chassis 1 is redundancy-faile

Problemas de fonte de alimentação

Para problemas de fonte de alimentação, um status de Problema de voltagem é o indicador de um problema.

FPR4110-04-A# scope chassis 1

FPR4110-04-A /chassis # show psu

PSU:

PSU Type Wattage (W) Overall Status

--- ---- ----------- --------------

1 DV 0 N/A

2 DV 1100 Operable

Problemas com o ventilador

Se houver falhas térmicas, provavelmente elas são um problema legítimo de hardware com resfriamento/ventiladores ou um falso positivo devido a um defeito de software. Se o status do ventilador for Inoperable ou degradado, entre em contato com o TAC para obter assistência adicional.

FPR4110-04-A# scope chassis 1

FPR4110-04-A /chassis # show fan-module

Fan Module:

Tray Module Overall Status

----------- --------- --------------

1 1 Operable

1 2 Operable

1 3 Operable

1 4 Operable

1 5 Operable

1 6 Operable

Mostrar evento

É importante verificar se há falhas no aplicativo FXOS para ver se o problema está no próprio blade ou se o aplicativo não consegue inicializar devido a um problema relacionado ao software.

FPR4110-04-A# scope chassis

FPR4110-04-A /chassis # scope server

FPR4110-04-A /chassis/server # scope fxos

FPR4110-04-A /chassis/server/fxos # show event

Creation Time ID Code Description

----------------------- ------- -------- -----------

2024-01-25T14:09:32.783 588408 E4197910 [FSM:STAGE:END]: Waiting for install license complete from blade 1/1(FSM-STAGE:sam:dme:OsControllerInitOS:HostWaitForLicInstalledComplete)

2024-01-25T14:09:32.783 588409 E4197611 [FSM:STAGE:SKIP]: Reboot blade 1/1(FSM-STAGE:sam:dme:OsControllerInitOS:RebootHostAfterUpgrade)

2024-01-25T14:09:32.783 588410 E4197611 [FSM:STAGE:END]: Reboot blade 1/1(FSM-STAGE:sam:dme:OsControllerInitOS:RebootHostAfterUpgrade)

2024-01-25T14:09:32.783 588411 E4197612 [FSM:END]: Init OS on blade 1/1(FSM:sam:dme:OsControllerInitOS)

2024-01-25T14:09:32.783 588412 E4197612 [FSM:STAGE:END]: (FSM-STAGE:sam:dme:OsControllerInitOS:success)

2024-01-25T14:09:32.782 588405 E4197909 [FSM:STAGE:STALE-SUCCESS]: Request for upgrade to blade 1/1(FSM-STAGE:sam:dme:OsControllerInitOS:RequestToInstallLicense)

2024-01-25T14:09:32.782 588406 E4197909 [FSM:STAGE:END]: Request for upgrade to blade 1/1(FSM-STAGE:sam:dme:OsControllerInitOS:RequestToInstallLicense)

2024-01-25T14:09:32.782 588407 E4197910 [FSM:STAGE:SKIP]: Waiting for install license complete from blade 1/1(FSM-STAGE:sam:dme:OsControllerInitOS:HostWaitForLicInstalledComplete)

2024-01-25T14:09:32.773 588404 E4197909 [FSM:STAGE:ASYNC]: Request for upgrade to blade 1/1(FSM-STAGE:sam:dme:OsControllerInitOS:RequestToInstallLicense)

2024-01-25T14:09:32.768 588401 E4197609 [FSM:STAGE:END]: Request for upgrade to blade 1/1(FSM-STAGE:sam:dme:OsControllerInitOS:RequestToUpgrade)

2024-01-25T14:09:32.768 588402 E4197610 [FSM:STAGE:SKIP]: Waiting for upgrade complete from blade 1/1(FSM-STAGE:sam:dme:OsControllerInitOS:HostWaitForUpgradeComplete)

2024-01-25T14:09:32.768 588403 E4197610 [FSM:STAGE:END]: Waiting for upgrade complete from blade 1/1(FSM-STAGE:sam:dme:OsControllerInitOS:HostWaitForUpgradeComplete)

FPR4110-04-A /chassis/server/fxos #

Show System Reset-reason

Para recarregamentos inesperados de aplicativos/dispositivos, verifique se não existem núcleos para nenhum processo (FTD) e verifique crashinfo do ASA/Lina usando o comando show crash. Se eles não existirem, o problema provavelmente está relacionado ao FXOS e pode ser roteado usando a palavra-chave FXOS.

FPR4110-04-A# connect fxos

FPR4110-04-A(fxos)# show system reset-reason

----- reset reason for Supervisor-module 1 (from Supervisor in slot 1) ---

1) No time

Reason: Unknown

Service:

Version: 5.0(3)N2(4.101)

2) No time

Reason: Unknown

Service:

Version: 5.0(3)N2(4.101)

...

Problemas de alimentação na placa-mãe

FPR4110-04-A# scope chassis 1

FPR4110-04-A /chassis # scope server 1/1

FPR4110-04-A /chassis/server # show fsm status

Slot: 1

Server: sys/chassis-1/blade-1

FSM 1:

Remote Result: Not Applicable

Remote Error Code: None

Remote Error Description:

Status: Nop

Previous Status: Turnup Success

Timestamp: 2023-10-23T16:48:19.299

Try: 0

Flags: 0

Progress (%): 100

Current Task:

FSM 2:

Status: Nop

Previous Status: Identify Success

Timestamp: 2023-10-23T16:47:33.592

Try: 0

Progress (%): 100

Current Task:

FSM 3:

Status: Nop

Previous Status: Configure Success

Timestamp: 2023-10-23T16:48:16.739

Try: 0

Flags: 0

Progress (%): 100

Current Task:

FPR4110-04-A /chassis/server # show fault

Severity Code Last Transition Time ID Description

--------- ------- ------------------------ -------- -----------

Info F0461 2011-12-31T21:32:43.448 35793 Log capacity on Management Controller on server 1/1 is very-low

Dispositivos lógicos

Conforme indicado nas informações em segundo plano, um dispositivo lógico permite executar uma instância do aplicativo, seja ASA ou FTD.

Estes são alguns comandos para confirmar o status da instância do aplicativo instalada no chassi.

Instância de monitoramento

Mostrar Status do Servidor

Verifique se o slot e o status da detecção estão corretos.

FPR4110-04-A# show server status

Server Slot Status Overall Status Discovery

------- ------------ ------- ---------

1/1 Equipped Ok Complete

Mostrar slot

Visualize o nível de Log, o estado admin e o estado operável do slot.

FPR4110-04-A# scope ssa

FPR4110-04-A /ssa # show slot

Slot:

Slot ID Log Level Admin State Oper State

------- --------- ------------ ----------

1 Info Ok Online

Mostrar Instância do Aplicativo

Visualize o nome, a versão, o autor, quais tipos de implantação são suportados, o tipo de CSP e se é o aplicativo padrão usado.

FPR4110-04-A# scope ssa

FPR4110-04-A /ssa # show app

Name Version Author Supported Deploy Types CSP Type Is Default App

---- -------- ------ ---------------------- ----------- --------------

ftd 7.0.4-55 cisco Native,Container Application No

ftd 7.0.5-72 cisco Native,Container Application Yes

Show Logical-device

FPR4110-04-A# scope ssa

FPR4110-04-A /ssa # show logical-device

Logical Device:

Name Description Slot ID Mode Oper State Template Name

---- ----------- ------- ---------- ---------- -------------

FTD1 1 Standalone Ok ftd

Mostrar instância do aplicativo

Exiba as informações completas do estado operacional da instância do aplicativo, use show app-instance no escopo do slot.

Esse comando ajuda particularmente quando você cria ou atualiza a instância do aplicativo, como mostra o estado operacional se é Instalando ou On-line e a versão do software em execução.

FPR4110-04-A# scope ssa

FPR4110-04-A /ssa # scope slot 1

FPR4110-04-A /ssa/slot # show app-instance

Application Instance:

App Name Identifier Admin State Oper State Running Version Startup Version Deploy Type Turbo Mode Profile Name Cluster State Cluster Role

-------- ---------- ----------- ---------- --------------- --------------- ----------- ---------- ------------ -------------- ------------

ftd FTD1 Enabled Online 7.0.5-72 7.0.5-72 Native No Not Applicable None

Mostrar Detalhes da Instância do Aplicativo

FPR4110-04-A# scope ssa

FPR4110-04-A /ssa # show app-instance detail

App Name: ftd

Identifier: FTD1

Slot ID: 1

Admin State: Enabled

Oper State: Online

Running Version: 7.0.5-72

Startup Version: 7.0.5-72

Deploy Type: Native

Profile Name:

Cluster State: Not Applicable

Cluster Role: None

Current Job Type: Start

Current Job Progress: 100

Current Job State: Succeeded

Clear Log Data: Available

Error Msg:

Hotfixes:

Externally Upgraded: No

FPR4110-04-A /ssa #

Mostrar Detalhes do Recurso

Exibir alocação de recursos para a instância do aplicativo.

FPR4110-04-A# scope ssa

FPR4110-04-A /ssa # scope slot 1

FPR4110-04-A /ssa/slot # enter app-instance ftd FTD1

FPR4110-04-A /ssa/slot/app-instance # show resource detail

Resource:

Allocated Core NR: 22

Allocated RAM (MB): 52096

Allocated Data Disk (MB): 128685

Allocated Binary Disk (MB): 3907

Allocated Secondary Disk (MB): 0

Acesso do gerenciador de chassi

Acesso ao Servidor Web Local

Por padrão, o chassi Secure Firewall Threat Defense 4100/9300 nega todo o acesso ao servidor Web local. Você deve configurar sua lista de acesso de IP com uma lista de serviços permitidos para cada um dos seus blocos de IP.

A Lista de Acesso IP suporta protocolos:

- HTTPS

- SNMP

- SSH

FPR4110-04-A# scope system

FPR4110-04-A /system # scope services

FPR4110-04-A /system/services # show ip-block

Permitted IP Block:

IP Address Prefix Length Protocol

---------- ------------- --------

0.0.0.0 0 https

0.0.0.0 0 snmp

O comando enter serve para configurar uma nova entrada.

FPR4110-04-A /system/services # enter ?

dns Domain Name Server hostname

ip-block Permitted IP Block

ipv6-block Permitted IPv6 Block

ntp-server NTP server hostname

ssh-host SSH Server public keys

FPR4110-04-A /system/services # enter ip-block ?

a.b.c.d IP Address

FPR4110-04-A /system/services # enter ip-block 0.0.0.0 ?

0-32 Prefix Length

FPR4110-04-A /system/services # enter ip-block 0.0.0.0 0 ?

https Https

snmp Snmp

ssh Ssh

FPR4110-04-A /system/services/ # enter ip-block 0.0.0.0 0 ssh

FPR4110-04-A /system/services/ip-block* # commit-buffer

FPR4110-04-A /system/services/ip-block # up

FPR4110-04-A /system/services # show ip-block

Permitted IP Block:

IP Address Prefix Length Protocol

---------- ------------- --------

0.0.0.0 0 https

0.0.0.0 0 snmp

0.0.0.0 0 ssh

Interfaces do monitor

Verificar o IP de gerenciamento do chassi

FPR4110-04-A# show fabric-interconnect

Fabric Interconnect:

ID OOB IP Addr OOB Gateway OOB Netmask OOB IPv6 Address OOB IPv6 Gateway Prefix Operability Ingress VLAN Group Entry Count (Current/Max) Switch Forwarding Path Entry Count (Current/Max)

--- ------------ ------------ --------------- ---------------- ---------------- ------ ----------- -------------------------------------------- ------------------------------------------------

A 172.16.244.72 172.16.244.65 255.255.255.192 :: :: 64 Operable 0/500 53/102

Show Mgmt-port

Determine o status da interface de gerenciamento.

FPR4110-04-A# connect local-mgmt

FPR4110-04-A(local-mgmt)#

FPR4110-04-A(local-mgmt)# show mgmt-port

eth0 Link encap:Ethernet HWaddr 50:0f:80:8e:a5:cd

inet addr:172.16.244.72 Bcast:172.16.244.127 Mask:255.255.255.192

inet6 addr: fe80::520f:80ff:fe8e:a5cd/64 Scope:Link

inet6 addr: fe80::520f:80ff:fe8e:a5cd/64 Scope:Link

UP BROADCAST RUNNING MULTICAST MTU:1500 Metric:1

RX packets:7359566 errors:0 dropped:0 overruns:0 frame:0

TX packets:1147585 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:1000

RX bytes:1735874306 (1.6 GiB) TX bytes:360530127 (343.8 MiB)

O ping pode ser usado para testar a conectividade.

FPR4110-04-A(local-mgmt)# ping 172.16.244.65

PING 172.16.244.65 (172.16.244.65) from 172.16.244.72 eth0: 56(84) bytes of data.

64 bytes from 172.16.244.65: icmp_seq=1 ttl=254 time=1.15 ms

64 bytes from 172.16.244.65: icmp_seq=2 ttl=254 time=1.38 ms

^C

--- 172.16.244.65 ping statistics ---

6 packets transmitted, 6 received, 0% packet loss, time 12ms

rtt min/avg/max/mdev = 1.146/1.364/1.479/0.122 ms

FPR4110-04-A(local-mgmt)#

Definir Captura na Interface de Gerenciamento

Ative a interface de gerenciamento de MIO (capture on chassis, captura no chassi) (aplicável somente em FP41xx/FP93xx). Por padrão, ele captura apenas pacotes de 10 bits.

FPR4110-04-A# connect fxos

FPR4110-04-A(fxos)# ethanalyzer local interface mgmt

Capturing on 'eth0'

1 2024-01-30 16:15:56.149887591 fe80::6a9e:bff:fed5:678c → ff02::2 ICMPv6 70 Router Solicitation from 68:9e:0b:d5:67:8c

2 2024-01-30 16:15:56.635897727 80:b7:09:32:f2:a0 → ff:ff:ff:ff:ff:ff ARP 60 Who has 172.16.244.65? Tell 172.16.244.106

3 2024-01-30 16:15:56.650081622 c4:72:95:76:df:97 → 01:80:c2:00:00:00 STP 60 RST. Root = 0/12/2c:31:24:b1:6b:00 Cost = 4 Port = 0x8017

4 2024-01-30 16:15:57.170356692 172.16.244.72 → 172.16.254.131 NTP 90 NTP Version 3, client

5 2024-01-30 16:15:57.234298977 172.16.254.131 → 172.16.244.72 NTP 90 NTP Version 3, server

6 2024-01-30 16:15:58.656444769 c4:72:95:76:df:97 → 01:80:c2:00:00:00 STP 60 RST. Root = 0/12/2c:31:24:b1:6b:00 Cost = 4 Port = 0x8017

7 2024-01-30 16:15:59.170382028 172.16.244.72 → 172.16.254.131 NTP 90 NTP Version 3, client

8 2024-01-30 16:15:59.233556065 172.16.254.131 → 172.16.244.72 NTP 90 NTP Version 3, server

9 2024-01-30 16:15:59.352654266 0.0.0.0 → 255.255.255.255 DHCP 368 DHCP Discover - Transaction ID 0x328ec1b7

10 2024-01-30 16:16:00.150684560 fe80::6a9e:bff:fed5:678c → ff02::2 ICMPv6 70 Router Solicitation from 68:9e:0b:d5:67:8c

10 packets captured

Program exited with status 0

O Ethanalyzer também pode ser usado na interface de entrada. As opções são logs de alta ou baixa prioridade.

FPR4110-04-A(fxos)# ethanalyzer local interface ?

inbound-hi Inbound(high priority) interface

inbound-low Inbound(low priority) interface

mgmt Management interface

Um filtro pode ser usado na captura.

FPR4110-04-A(fxos)# ethanalyzer local interface ?

inbound-hi Inbound(high priority) interface

inbound-low Inbound(low priority) interface

mgmt Management interface

show interface

Esse comando mostra a lista e o estado atual da interface no chassi como uma breve descrição do motivo de cada estado operável.

Observação: as interfaces que atuam como portas em canais de porta não aparecem nesta lista.

FPR4110-04-A# scope eth-uplink

FPR4110-04-A /eth-uplink # scope fabric a

FPR4110-04-A /eth-uplink/fabric # show interface

Interface:

Port Name Port Type Admin State Oper State Allowed Vlan State Reason

----------- --------- ----------- ---------- ------------ ------------

Ethernet1/1 Data Enabled Link Down All Link failure or not-connected

Ethernet1/2 Data Disabled Admin Down All Administratively down

Ethernet1/3 Data Enabled Up All Port is enabled and up

Ethernet1/4 Data Enabled Up All Port is enabled and up

Ethernet1/5 Data Enabled Link Down All Link failure or not-connected

Ethernet1/6 Data Enabled Link Down All Link failure or not-connected

Ethernet1/7 Data Enabled Sfp Not Present All Unknown

Ethernet1/8 Mgmt Enabled Up All Port is enabled and up

Ethernet2/2 Data Enabled Link Down All Link failure or not-connected

Ethernet2/5 Data Disabled Sfp Not Present All Unknown

Ethernet2/6 Data Disabled Sfp Not Present All Unknown

Ethernet2/7 Data Disabled Sfp Not Present All Unknown

Ethernet2/8 Data Disabled Sfp Not Present All Unknow

Conforme mencionado anteriormente, as falhas indicam quaisquer problemas de hardware identificados nas plataformas do Secure Firewall. Você pode verificar as falhas em diferentes escopos para restringir os problemas em cada escopo. Este exemplo mostra as falhas no eth-uplink.

FPR4110-04-A# scope eth-uplink

FPR4110-04-A /eth-uplink # show fault

Severity Code Last Transition Time ID Description

--------- ------ ------------------------ ------- -----------

Major F0727 2024-01-29T20:31:54.282 597025 lan Member 2/3 of Port-Channel 1 on fabric interconnect A is down, membership: down

Major F0727 2024-01-29T20:31:54.282 597023 lan Member 2/4 of Port-Channel 1 on fabric interconnect A is down, membership: down

Major F0282 2023-07-31T17:52:04.764 201600 lan port-channel 7 on fabric interconnect A oper state: failed, reason: No operational members

Major F0282 2023-07-31T17:51:03.325 201446 lan port-channel 4 on fabric interconnect A oper state: failed, reason: No operational members

Major F0282 2023-07-31T17:49:00.451 201281 lan port-channel 2 on fabric interconnect A oper state: failed, reason: No operational members

Major F0282 2023-07-31T17:42:34.236 200638 lan port-channel 1 on fabric interconnect A oper state: failed, reason: No operational members

Major F0282 2023-07-31T17:41:34.673 200660 lan port-channel 3 on fabric interconnect A oper state: failed, reason: No operational member

Show Port-channel

Isso mostra o número de canais de porta configurados no chassi, bem como seu status geral.

Você pode ir para um escopo de canal de porta específico para obter as informações dos membros.

Se você vir o canal de porta como Failed, entre em contato com o TAC para obter assistência adicional, pois este é um exemplo de canal de porta defeituoso.

FPR4110-04-A# scope eth-uplink

FPR4110-04-A /eth-uplink # scope fabric a

FPR4110-04-A /eth-uplink/fabric # show port-channel

Port Channel:

Port Channel Id Name Port Type Admin State Oper State Port Channel Mode Allowed Vlan State Reason

--------------- -------------- --------- ----------- ---------- ----------------- ------------ ------------

1 Port-channel1 Data Enabled Failed Active All No operational members

2 Port-channel2 Data Enabled Failed Active All No operational members

3 Port-channel3 Data Enabled Failed Active All No operational members

4 Port-channel4 Data Enabled Failed Active All No operational members

7 Port-channel7 Data Enabled Failed Active All No operational members

FPR4110-04-A /eth-uplink/fabric # scope port-channel 1

FPR4110-04-A /eth-uplink/fabric/port-channel # show member

Member Port:

Port Name Membership Oper State State Reason

----------- ---------- ---------------- ------------

Ethernet2/3 Down Sfp Not Present Unknown

Ethernet2/4 Down Sfp Not Present Unknown

Use o comando show port-channel summary para exibir todos os canais de porta no dispositivo, bem como seus membros

FPR4110-04-A# connect fxos

FPR4110-04-A(fxos)# show port-channel summary

Flags:

D - Down

P - Up in port-channel (members)

I - Individual H - Hot-standby (LACP only)

s - Suspended r - Module-removed

S - Switched R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

--------------------------------------------------------------------------------

Group Port-Channel Type Protocol Member Ports

--------------------------------------------------------------------------------

1 Po1(SD) Eth LACP Eth2/3(D) Eth2/4(D)

2 Po2(SD) Eth NONE --

3 Po3(SD) Eth NONE --

4 Po4(SD) Eth NONE --

7 Po7(SD) Eth NONE --

Informações Relacionadas

- Gerar Arquivo de Solução de Problemas de FXOS

- Responda às perguntas frequentes sobre o Firepower eXtensible Operating System (FXOS)

- Definir e solucionar problemas de configurações de NTP em dispositivos Firepower

- Configurar e verificar o canal de porta em dispositivos Firepower