Contents

Introduction

Informações de Apoio

Prerequisites

Requirements

Componentes Utilizados

Problema

Localizar máquina virtual nome completo

Gerenciar máquinas virtuais

Verificar

Introduction

Este documento descreve como fazer o gerenciamento básico da máquina virtual (VM) no Network Function Virtualization Infrastructure Software (NFVIS) através da interface de linha de comando (CLI).

Informações de Apoio

O NFVIS faz parte da Enterprise Network Function Virtualization (ENFV). O NFVIS é a plataforma de software que implementa o gerenciamento de ciclo de vida completo do orquestrador e controlador central (APIC-EM e ESA) para serviços virtualizados. O NFVIS permite a conectividade entre serviços virtuais e interfaces externas, bem como o suporte ao hardware subjacente.

Prerequisites

Requirements

A Cisco recomenda que você tenha conhecimento destes tópicos:

- ENFV

- NFVIS

Componentes Utilizados

As informações neste documento são baseadas nestes softwares:

- Enterprise NFV Infrastructure Software versão 3.5.1

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Problema

O comando show system Deployment mostra a lista de VMs e seu status.

bdsol-encs-01# show system deployments deployment

NAME              ID  STATE

-------------------------------

1494763184.ISRv   2   running

1495371059.Linux  -   shut

O problema é que os nomes na coluna NAME não são os nomes completos das VMs. Para o gerenciamento de VM, você precisa encontrar o nome completo para executar ações com ele.

Localizar máquina virtual nome completo

Para encontrar o nome completo da VM, você precisa executar o comando show vm_lifetime opdata locants. Você verá o nome da VM em uma linha que começa com o nome, bem como na coluna VM NAME.

Tip: Se você procurar VMs em um espaço específico, poderá adicionar o nome do espaço ao final do comando.

bdsol-encs-01# show vm_lifecycle opdata tenants tenant

vm_lifecycle opdata tenants tenant admin

tenant_id AdminTenantId

networks network int-mgmt-net

netid                 085d726e-3193-469b-b9f8-7415e3e8b880

shared                true

admin_state           true

provider_network_type local

status                active

subnets subnet int-mgmt-net-subnet

subnetid   c56aa2e2-fd96-4e25-8744-0684acc2b14f

cidr       10.20.0.0/24

gateway    10.20.0.1

no_gateway false

dhcp       false

ipversion  4

deployments 1494763184 - -

deployment_id SystemAdminTenantId1494763184

vm_group ISRv

vm_instance ae521a5b-f173-4b22-9b05-2130b346fbe3

name     SystemAdminTena_ISRv_0_1989b9c8-311a-43d6-94e1-385752a3cc44

host_id  NFVIS

hostname bdsol-encs-01

interfaces interface 0

model       virtio

port_id     vnic0

network     int-mgmt-net

subnet      N/A

ip_address  10.20.0.2

mac_address 52:54:00:60:44:a6

netmask     255.255.255.0

gateway     10.20.0.1

interfaces interface 1

model       virtio

port_id     vnic1

network     N/A

subnet      N/A

ip_address  127.0.0.1

mac_address 52:54:00:0b:b9:95

interfaces interface 2

model       virtio

port_id     vnic2

network     N/A

subnet      N/A

ip_address  127.0.0.1

mac_address 52:54:00:ab:32:cd

state_machine state SERVICE_ACTIVE_STATE

VM NAME                                                      STATE

-----------------------------------------------------------------------------

SystemAdminTena_ISRv_0_1989b9c8-311a-43d6-94e1-385752a3cc44  VM_ALIVE_STATE

deployments 1495371059 - -

deployment_id SystemAdminTenantId1495371059

vm_group Linux

vm_instance 82030189-61d2-4675-9ea5-2f2c9a0514c6

name     SystemAdminTena_Linux_0_58b32552-37ba-4759-8c25-28065fc6158d

host_id  NFVIS

hostname bdsol-encs-01

interfaces interface 0

model   virtio

port_id vnic3

network lan-net

subnet  N/A

state_machine state SERVICE_INERT_STATE

VM NAME                                                       STATE

--------------------------------------------------------------------------------

SystemAdminTena_Linux_0_58b32552-37ba-4759-8c25-28065fc6158d  VM_SHUTOFF_STATE

Gerenciar máquinas virtuais

Para gerenciar uma VM, você pode usar o comando vmAction, seguido por actionType e vmName.

bdsol-encs-01# vmAction

Possible completions:

actionType  vmName

Digite o comando vmActionType para obter a lista de ações possíveis.

bdsol-encs-01# vmAction actionType

Possible completions:

DISABLE_MONITOR  ENABLE_MONITOR  REBOOT  START  STOP

Por exemplo, para iniciar uma VM denominada SystemAdminTena_Linux_0_58b32552-37ba-4759-8c25-28065fc6158d use este comando.

bdsol-encs-01# vmAction actionType START vmName SystemAdminTena_Linux_0_58b32552-37ba-4759-8c25-28065fc6158d

Verificar

Você tem estas opções para verificar o status da VM:

- Usar o comando NFVIS CLI show system implementations

- Usar o comando NFVIS CLI show vm_lifetime opdata locants

- Na GUI, navegue para VM Life Cycle -> Manage e veja o status da VM

- Últimos eventos de log no arquivo de log /var/log/messages

Um exemplo de evento gerado no arquivo de log /var/log/messages:

Jul  4 12:13:20 bdsol-encs-01 esc-manager-event: 2017-07-04 12:13:17,987 UI_INFO [LogContextService.java:outputDecoratedLog():185] [tid=4422933a-d335-456f-afa7-b02156be4438] [cl=esc ] [tags=eventType:rest_in] @event{"label": "rest_in",","data":{"Message":"Post back for starting VM:","ESC-Transaction-Id:  ":"4422933a-d335-456f-afa7-b02156be4438","OP-Status-Code: ":"200","OP-Status-Message: ":"VM successfully powered on."}}

Jul  4 12:13:20 bdsol-encs-01 esc-manager-event: 2017-07-04 12:13:17,997 UI_INFO [LogContextService.java:outputDecoratedLog():185] [tid=4422933a-d335-456f-afa7-b02156be4438] [cl=esc ] [tags=wf:create_vm,eventType:VM_START_EVENT,tenant:admin,depName:1495371059,vmGrpName:Linux,vmName:SystemAdminTena_Linux_0_58b32552-37ba-4759-8c25-28065fc6158d,eventType:rest_out] @event{"label": "rest_out",","data":{"headers":"{ESC-Transaction-Id=4422933a-d335-456f-afa7-b02156be4438, REMOTE_ADDR=127.0.0.1, OP-Status-Message=VM successfully powered on., OP-Status-Code=200}"}}