Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Informações de Apoio

Configurar

Diagrama de Rede

Configurações

Adição de um Switch ao Domínio VTP

Verificar

Troubleshoot

Informações Relacionadas

Introduction

Este documento fornece um exemplo de configuração de como migrar a rede de um campus de switches completamente no modo transparente do VLAN Trunking Protocol (VTP) para uma rede com servidores e clientes VTP. Este documento também pode ser usado para reestruturar os domínios VTP existentes.

Prerequisites

Requirements

Certifique-se de atender a estes requisitos antes de tentar esta configuração:

- Conhecimentos básicos de administração do Catalyst Switch

- Conhecimentos de VTP

Componentes Utilizados

As informações neste documento são baseadas no Cisco IOS® Software Versão 12.2(25)SEC2 e no Catalyst OS (CatOS) Versão 8.1(2).

As informações deste documento se aplicam a todos os dispositivos Cisco que oferecem suporte ao VLAN Trunk Protocol versão 2.

The information in this document was created from the devices in a specific lab environment. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Consulte as Convenções de Dicas Técnicas da Cisco para obter mais informações sobre convenções de documentos.

Informações de Apoio

O VTP reduz a administração em uma rede com switches. Quando você configura um VLAN novo em um servidor VTP, o VLAN é distribuído por meio de todos os switches no domínio. Isso reduz a necessidade de configurar a mesma VLAN em todos os lugares. O VTP é um protocolo de propriedade da Cisco que está disponível na maioria dos produtos Cisco Catalyst Series.

Observação: este documento não cobre o VTP versão 3. O VTP versão 3 difere do VTP versão 1 (v1) e versão 2 (v2). Ele está disponível somente no CatOS 8.1(1) ou posterior. O VTP versão 3 incorpora várias alterações do VTP v1 e v2. É importante que você compreenda as diferenças entre o VTP versão 3 e as versões anteriores antes de alterar a configuração da rede. Consulte uma destas seções de Configurando o VTP para obter mais informações:

- Compreendendo Como o VTP Versão 3 Funciona

- Interação com o VTP Versão 1 e o VTP Versão 2

Configurar

Nesta seção serão apresentadas as informações necessárias para você migrar a rede do seu campus de uma configuração de VTP completamente transparente para uma configuração servidor-cliente. A seção também mostra os passos rápidos usados para acrescentar um novo switch ao domínio VTP existente.

Nota:Use a Command Lookup Tool (somente clientes registrados) para obter mais informações sobre os comandos usados neste documento.

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

A rede inclui:

- Dois switches da camada de distribuição — DistributionA e DistributionB, ambos executando o Cisco IOS Software.

- Dois switches da camada de acesso — AccessA executa o Cisco IOS Software e AccessB executa o CatOS Software.

O banco de dados da VLAN inicial possui estas VLANs Ethernet:

- DistributionA—VLANs 1, 10 e 11

- DistributionB—VLANs 1, 20 e 21

- AccessA—VLANs 1, 30 e 31

- AccessB—VLANs 1, 40 e 41

Configurações

Esta seção consiste em três sub-seções:

- Verificações Pré-Migração

- Planejamento da Migração

- Procedimento de Migração

Verificações Pré-Migração

Esta seção contém uma lista de verificação para garantir que a rede esteja pronta para o processo de migração. Para receber o status atual da configuração de VTP no switch, execute o comando show vtp status para o Cisco IOS e o comando show vtp domain para o CatOS.

Cisco IOS

DistributionA#show vtp status

VTP Version                     : 2

Configuration Revision          : 0

Maximum VLANs supported locally : 1005

Number of existing VLANs        : 7

VTP Operating Mode              : Transparent

VTP Domain Name                 : migration

VTP Pruning Mode                : Disabled

VTP V2 Mode                     : Disabled

VTP Traps Generation            : Disabled

MD5 digest                      : 0xE5 0x9F 0x80 0x70 0x73 0x62 0xC0 0x54

Configuration last modified by 0.0.0.0 at 3-1-93 04:23:21

DistributionA#

Catalyst OS

AccessB> (enable) show vtp domain

Version      : running VTP1 (VTP3 capable)

Domain Name  : migration                        Password  : not configured

Notifications: disabled                         Updater ID: 0.0.0.0

Feature        Mode           Revision

-------------- -------------- -----------

VLAN           Client         0

Pruning             : disabled

VLANs prune eligible: 2-1000

AccessB> (enable)

1. Verifique se todos os switches estão no modo transparente do VTP. Execute estes comandos para alterar o modo:

Cisco IOS

AccessA#conf t

AccessA(config)#vtp mode transparent

Setting device to VTP TRANSPARENT mode

AccessA(config)#exit

AccessA#

Catalyst OS

AccessB> (enable) set vtp mode transparent

Changing VTP mode for all features

VTP domain migration modified

AccessB> (enable)

2. Verifique se todos os switches possuem o mesmo nome de domínio VTP. Execute estes comandos para alterar o nome de domínio VTP:

Cisco IOS

DistributionB(config)#vtp domain migration

Changing VTP domain name from aaaa to migration

DistributionB(config)#

Catalyst OS

AccessB> (enable) set vtp domain migration

VTP domain migration modified

AccessB> (enable)

3. Verifique se todos os switches estão executando a mesma versão do VTP. Execute estes comandos para alterar a versão do VTP:

Cisco IOS

vtp version 2

Catalyst OS

set vtp v2 enable

or

set vtp version 2

4. Verifique se todos os switches possuem a mesma senha do VTP (se houver alguma configurada). Execute estes comandos para alterar a senha do VTP:

Cisco IOS

vtp password vtp_password

Catalyst OS

AccessB> (enable) set vtp passwd ?

<passwd>                   Password (0 to clear)

AccessB> (enable) set vtp passwd vtp_password

Generating the secret associated to the password.

VTP domain migration modified

5. Verifique se todos os switches estão conectados por links de troncos.

Cisco IOS

DistributionA#show interfaces trunk

Port        Mode         Encapsulation  Status        Native vlan

Gi2/0/1     auto         n-isl          trunking      1

Gi2/0/5     auto         n-802.1q       trunking      1

Gi2/0/9     desirable    n-isl          trunking      1

Gi2/0/10    desirable    n-isl          trunking      1

Port      Vlans allowed on trunk

Gi2/0/1     1-4094

Gi2/0/5     1-4094

Gi2/0/9     1-4094

Gi2/0/10    1-4094

Port        Vlans allowed and active in management domain

Gi2/0/1     1,10-11

Gi2/0/5     1,10-11

Gi2/0/9     1,10-11

Gi2/0/10    1,10-11

Port        Vlans in spanning tree forwarding state and not pruned

Gi2/0/1     1,10-11

Gi2/0/5     1,10-11

Gi2/0/9     1,10-11

!--- Rest of output elided.

Catalyst OS

AccessB> (enable) show trunk

* - indicates vtp domain mismatch

# - indicates dot1q-all-tagged enabled on the port

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

3/25     desirable    n-isl          trunking      1

3/26     desirable    n-isl          trunking      1

6/1      nonegotiate  dot1q          trunking      1

6/2      nonegotiate  dot1q          trunking      1

6/3      nonegotiate  dot1q          trunking      1

6/4      nonegotiate  dot1q          trunking      1

16/1      nonegotiate  isl            trunking      1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

3/25     1-1005,1025-4094

3/26     1-1005,1025-4094

6/1

6/2

6/3

6/4

16/1      1-1005,1025-4094

Port      Vlans allowed and active in management domain

!--- Rest of output elided.

Planejamento da Migração

- Determine o número de VLANs necessárias para a rede. O número máximo de VLANs aceitas pelos Catalyst Switches varia de acordo com os modelos.

AccessA#show vtp status

VTP Version                     : 2

Configuration Revision          : 0

Maximum VLANs supported locally : 250

Number of existing VLANs        : 7

VTP Operating Mode              : Transparent

VTP Domain Name                 : migration

VTP Pruning Mode                : Disabled

VTP V2 Mode                     : Disabled

VTP Traps Generation            : Disabled

MD5 digest                      : 0xC8 0xB7 0x36 0xC3 0xBD 0xC6 0x56 0xB2

Configuration last modified by 0.0.0.0 at 3-1-93 04:23:21

AccessA#

- Determine os switches, como DistributionA e DistributionB, que serão os servidores VTP. Um ou mais switches podem ser os servidores VTP em um domínio. Selecione um switch, como DistributionA, para iniciar a migração.

Procedimento de Migração

Conclua estes passos para configurar a rede do campus com o modo de servidor e cliente do VTP:

1. Altere o modo de VTP de DistributionA para Server.

DistributionA#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

DistributionA(config)#vtp mode server

Setting device to VTP SERVER mode

DistributionA(config)#exit

DistributionA#

2. Crie as VLANs necessárias no domínio.

!--- Before creating VLANs

DistributionA#show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Gi2/0/2, Gi2/0/3, Gi2/0/4

Gi2/0/6, Gi2/0/7, Gi2/0/8

Gi2/0/11, Gi2/0/12, Gi2/0/13

Gi2/0/14, Gi2/0/15, Gi2/0/16

Gi2/0/17, Gi2/0/18, Gi2/0/19

Gi2/0/20, Gi2/0/21, Gi2/0/22

10   VLAN0010                         active    Gi2/0/23

11   VLAN0011                         active    Gi2/0/24

1002 fddi-default                     act/unsup

1003 token-ring-default               act/unsup

1004 fddinet-default                  act/unsup

1005 trnet-default                    act/unsup

VLAN Type  SAID       MTU   Parent RingNo BridgeNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ -------- ---- -------- ------ ------

1    enet  100001     1500  -      -      -        -    -        0      0

10   enet  100010     1500  -      -      -        -    -        0      0

11   enet  100011     1500  -      -      -        -    -        0      0

1002 fddi  101002     1500  -      -      -        -    -        0      0

1003 tr    101003     1500  -      -      -        -    srb      0      0

!--- Rest of output elided.

!--- Creating required VLANs

DistributionA#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

DistributionA(config)#vlan 20-21,30-31,40-41

DistributionA(config-vlan)#exit

DistributionA(config)#exit

DistributionA#

!--- After creating VLANs

DistributionA#show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Gi2/0/2, Gi2/0/3, Gi2/0/4

Gi2/0/6, Gi2/0/7, Gi2/0/8

Gi2/0/11, Gi2/0/12, Gi2/0/13

Gi2/0/14, Gi2/0/15, Gi2/0/16

Gi2/0/17, Gi2/0/18, Gi2/0/19

Gi2/0/20, Gi2/0/21, Gi2/0/22

10   VLAN0010                         active    Gi2/0/23

11   VLAN0011                         active    Gi2/0/24

20   VLAN0020                         active

21   VLAN0021                         active

30   VLAN0030                         active

31   VLAN0031                         active

40   VLAN0040                         active

41   VLAN0041                         active

1002 fddi-default                     act/unsup

1003 token-ring-default               act/unsup

1004 fddinet-default                  act/unsup

1005 trnet-default                    act/unsup

VLAN Type  SAID       MTU   Parent RingNo BridgeNo Stp  BrdgMode Trans1 Trans2

!--- Rest of output elided.

Se nenhuma VLAN nova precisar ser configurada, crie uma VLAN fictícia.

Isso aumenta a Revisão da Configuração para '1', o que permite que o banco de dados da VLAN seja propagado pela rede.

DistributionA#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

DistributionA(config)#vlan 100

DistributionA(config-vlan)#name dummy

DistributionA(config-vlan)#exit

DistributionA(config)#exit

DistributionA#

3. Altere o modo de VTP de DistributionB para Client, seguido por AccessA e AccessB.

Cisco IOS

DistributionB#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

DistributionB(config)#vtp mode client

Setting device to VTP CLIENT mode.

DistributionB(config)#exit

DistributionB#

DistributionB#show vtp status

VTP Version                     : 2

Configuration Revision          : 0

Maximum VLANs supported locally : 1005

Number of existing VLANs        : 13

VTP Operating Mode              : Client

VTP Domain Name                 : migration

VTP Pruning Mode                : Disabled

VTP V2 Mode                     : Disabled

VTP Traps Generation            : Disabled

MD5 digest                      : 0xBD 0xA4 0x94 0xE6 0xE3 0xC7 0xA7 0x86

Configuration last modified by 0.0.0.0 at 3-1-93 04:23:21

Catalyst OS

AccessB> (enable) set vtp mode client

Changing VTP mode for all features

VTP domain migration modified

4. Verifique se todas as VLANs foram propagadas pelo domínio.

Cisco IOS

DistributionB#show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa1/0/1, Fa1/0/3, Fa1/0/4

Fa1/0/5, Fa1/0/7, Fa1/0/8

Fa1/0/11, Fa1/0/12, Fa1/0/13

Fa1/0/14, Fa1/0/15, Fa1/0/16

Fa1/0/17, Fa1/0/18, Fa1/0/19

Fa1/0/20, Fa1/0/21, Fa1/0/22

Fa1/0/23, Fa1/0/24

10   VLAN0010                         active

11   VLAN0011                         active

20   VLAN0020                         active    Gi1/0/1

21   VLAN0021                         active    Gi1/0/2

30   VLAN0030                         active

31   VLAN0031                         active

40   VLAN0040                         active

41   VLAN0041                         active

1002 fddi-default                     act/unsup

1003 token-ring-default               act/unsup

1004 fddinet-default                  act/unsup

1005 trnet-default                    act/unsup

!--- Rest of output elided.

Catalyst OS

AccessB> (enable) show vlan

VLAN Name                             Status    IfIndex Mod/Ports, Vlans

---- -------------------------------- --------- ------- ------------------------

1    default                          active    64      2/1-2

3/1-24,3/27-46

4/1-8

10   VLAN0010                         active    107

11   VLAN0011                         active    108

20   VLAN0020                         active    105

21   VLAN0021                         active    106

30   VLAN0030                         active    109

31   VLAN0031                         active    110

40   VLAN0040                         active    111     3/47

41   VLAN0041                         active    112     3/48

1002 fddi-default                     active    65

1003 token-ring-default               active    68

1004 fddinet-default                  active    66

1005 trnet-default                    active    67

VLAN Type  SAID       MTU   Parent RingNo BrdgNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ ------ ---- -------- ------ ------

1002 fddi  101002     1500  -      -      -      -    -        0      0

1003 trcrf 101003     1500  -      -      -      -    -        0      0

!--- Rest of output elided.

5. Verifique se alguma porta do switch está no estado Inativo.

Uma porta de switch pode entrar no estado Inativo quando a VLAN configurada para tal porta não existe no switch. Crie as VLANs apropriadas, conforme o necessário, no switch servidor VTP.

Cisco IOS

A saída do comando show interfaces switchport permite determinar se uma porta de switch está no modo Inativo quando ela possui a palavra-chave Inactive para o atributo Access Mode VLAN.

DistributionB#show interfaces switchport

Name: Fa1/0/1

Switchport: Enabled

Administrative Mode: dynamic auto

Operational Mode: down

Administrative Trunking Encapsulation: negotiate

Negotiation of Trunking: On

Access Mode VLAN: 1 (default)

Trunking Native Mode VLAN: 1 (default)

Administrative Native VLAN tagging: enabled

Voice VLAN: none

Administrative private-vlan host-association: none

Administrative private-vlan mapping: none

Administrative private-vlan trunk native VLAN: none

Administrative private-vlan trunk Native VLAN tagging: enabled

Administrative private-vlan trunk encapsulation: dot1q

Administrative private-vlan trunk normal VLANs: none

Administrative private-vlan trunk private VLANs: none

Operational private-vlan: none

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Capture Mode Disabled

Capture VLANs Allowed: ALL

!--- Part of output elided.

Name: Fa1/0/24

Switchport: Enabled

Administrative Mode: dynamic auto

Operational Mode: down

Administrative Trunking Encapsulation: negotiate

Negotiation of Trunking: On

Access Mode VLAN: 50 (Inactive)

Trunking Native Mode VLAN: 1 (default)

Administrative Native VLAN tagging: enabled

Voice VLAN: none

Administrative private-vlan host-association: none

Administrative private-vlan mapping: none

Administrative private-vlan trunk native VLAN: none

Administrative private-vlan trunk Native VLAN tagging: enabled

Administrative private-vlan trunk encapsulation: dot1q

Administrative private-vlan trunk normal VLANs: none

Administrative private-vlan trunk private VLANs: none

Operational private-vlan: none

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Capture Mode Disabled

Capture VLANs Allowed: ALL

Protected: false

Unknown unicast blocked: disabled

!--- Rest of output elided.

Crie a VLAN 50 no switch servidor VTP (DistributionA).

DistributionA#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

DistributionA(config)#vlan 50

DistributionA(config-vlan)#name Vlan50

DistributionA(config-vlan)#end

DistributionA#

!--- Verify the switchport status in the DistributionB switch.

DistributionB#show interfaces fa1/0/24 switchport

Name: Fa1/0/24

Switchport: Enabled

Administrative Mode: dynamic auto

Operational Mode: down

Administrative Trunking Encapsulation: negotiate

Negotiation of Trunking: On

Access Mode VLAN: 50 (Vlan50)

Trunking Native Mode VLAN: 1 (default)

Administrative Native VLAN tagging: enabled

Voice VLAN: none

Administrative private-vlan host-association: none

Administrative private-vlan mapping: none

Administrative private-vlan trunk native VLAN: none

Administrative private-vlan trunk Native VLAN tagging: enabled

Administrative private-vlan trunk encapsulation: dot1q

Administrative private-vlan trunk normal VLANs: none

Administrative private-vlan trunk private VLANs: none

Operational private-vlan: none

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Capture Mode Disabled

Capture VLANs Allowed: ALL

!--- Rest of output elided.

6. Altere o modo de VTP do switch DistributionB para Server.

Todos os switches servidores VTP devem possuir o mesmo número de revisão de configuração e devem ser os mais altos no domínio VTP.

Adição de um Switch ao Domínio VTP

Um switch recém adicionado pode causar problemas na rede. Esse pode ser um switch usado anteriormente no laboratório, e um nome de domínio VTP bom foi fornecido. O switch foi configurado como um cliente VTP e conectado ao resto da rede. Em seguida, o link do tronco foi ativado para o restante da rede. Em apenas alguns segundos, a rede inteira pode ser desativada.

Se o número de revisão de configuração do switch que você inseriu for superior ao número de revisão de configuração do domínio VTP, ele propagará seu banco de dados de VLAN no domínio VTP.

Isso ocorre se o switch é um cliente VTP ou um servidor VTP. Um cliente VTP pode apagar informações de VLAN em um servidor VTP. Você poderá saber que isso ocorreu quando várias portas da rede entram no estado Inativo, mas continuam a ser atribuídas a uma VLAN inexistente.

Observação: consulte Animação em Flash: VTP para uma demonstração deste problema.

Conclua estes passos para evitar esse problema ao adicionar um switch à rede:

1. Antes de conectar o novo switch à rede, altere o modo VTP do switch para Transparent.

Isso redefine o número de revisão da configuração para zero ('0').

2. Conecte o switch à rede e configure os links de tronco apropriados.

3. Configure os atributos de VTP:

1. Configure o nome do domínio VTP para coincidir com o nome de domínio VTP da rede.

2. Configure a versão e a senha do VTP (se houver).

4. Altere o modo de VTP para Client.

O número de revisão da configuração ainda é zero ('0'). As VLANs começam a propagar dos servidores VTP existentes na rede.

5. Verifique se todas as VLANs necessárias estão disponíveis no novo switch e nos servidores VTP da rede.

6. Se alguma VLAN estiver ausente, uma alternativa rápida é adicioná-la de um dos servidores VTP.

Consulte Como um Switch Recém Inserido Pode Causar Problemas de Rede para obter mais informações.

Verificar

Não há procedimento de verificação separado disponível para esta configuração. Use os passos de verificação fornecidos como parte do exemplo de configuração.

A Output Interpreter Tool ( somente clientes registrados) (OIT) oferece suporte a determinados comandos show. Use a OIT para exibir uma análise da saída do comando show.

- show vtp status [Cisco IOS] — Exibe o status atual do domínio VTP.

- show vtp domain [Catalyst OS] — Exibe o status atual do domínio VTP.

- show vlan — Exibe as informações de VLAN.

Troubleshoot

Atualmente, não existem informações disponíveis específicas sobre Troubleshooting para esta configuração.

Consulte Troubleshooting e Advertências de VTP para obter informações sobre problemas comuns de VTP.

Informações Relacionadas

- Como Entender O VLAN Trunk Protocol (VTP)

- Suporte a Produtos de LAN

- Suporte de tecnologia de switching de LAN

- Suporte Técnico e Documentação - Cisco Systems