Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Notas importantes

Configurar

Diagrama de Rede

Configurações

Verificar

Catalyst 5500 Switch

Catalyst 5000 Switch

Troubleshoot

Informações Relacionadas

Introduction

Este documento fornece configurações de exemplo no Inter-Switch Link (ISL) entre um Catalyst 5500 e um Catalyst 5000 Switch, ambos executando o Catalyst OS (CatOS). Qualquer membro da família Catalyst 5000 ou 6000 executando CatOS pode ser usado neste cenário para obter os mesmos resultados.

Em resumo, o truncamento é um modo de transferir tráfego de vários VLANs em um link ponto-a-ponto entre dois dispositivos. Há duas maneiras pelas quais o entroncamento Ethernet pode ser implementado:

- ISL (Inter-Switch Link Protocol proprietário da Cisco)

- 802.1q (padrão IEEE)

Este documento mostrará somente os arquivos de configuração dos switches e a saída dos comandos relacionados do exemplo show. Para obter detalhes sobre como configurar um tronco ISL entre os switches Catalyst, consulte Configurando o Entroncamento ISL nos Switches da Família Catalyst 5500/5000 e 6500/6000.

Prerequisites

Requirements

Não existem requisitos específicos para este documento.

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- Switch Catalyst 5500 executando o Software Catalyst OS 6.1(1)

- Switch Catalyst 5000 executando o Software Catalyst OS 6.1(1)

The information in this document was created from the devices in a specific lab environment. If your network is live, make sure that you understand the potential impact of any command. As configurações em todos os dispositivos foram limpas com os comandos clear config all e write erase para garantir uma configuração padrão.

Conventions

For more information on document conventions, refer to the Cisco Technical Tips Conventions.

Notas importantes

A família Catalyst 4000 (incluindo Catalyst 2948G e Catalyst 2980G) executando CatOS suporta apenas entroncamento 802.1Q, não entroncamento ISL.

Qualquer porta Ethernet em um membro da família Catalyst 6000 suporta encapsulamento 802.1Q e ISL.

Dependendo do módulo, as portas com capacidade de tronco Catalyst 5000 podem suportar somente encapsulamento ISL ou ISL e 802.1Q. A melhor maneira de verificar é emitir o comando show port capabilities. A capacidade de truncamento é declarada explicitamente. Por exemplo:

cat5000> show port capabilities 3

Model                    WS-X5225R

Port                     3/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  3/1-2,3/1-4

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off,on)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(none),tx-(none)

CoS rewrite              yes

ToS rewrite              IP-Precedence

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

Certifique-se de que os modos de entroncamento correspondam ao longo do link de tronco. Se um lado do enlace estiver configurado como um tronco ISL, o outro lado também deverá estar configurado como ISL; De forma semelhante, se um lado do link estiver configurado como 802.1Q, o outro lado do link também deve ser configurado como 802.1Q.

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Observação: para encontrar informações adicionais sobre os comandos usados neste documento, use a ferramenta Command Lookup Tool (somente clientes registrados).

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Configurações

Este documento utiliza as seguintes configurações:

- Catalyst 5500

- Catalyst 5000

Catalyst 5500

#version 6.1(1)

!

set option fddi-user-pri enabled

set password $2$q.J7$O5n.pwx7aEC6NHWJfXadx1

set enablepass $2$o.h/$bAxfjJ4XUA/RMUHqBr1YQ0

!

#errordetection

set errordetection portcounter enable

!

#system

set system name  cat5500

!

#frame distribution method

set port channel all distribution mac both

!

#vtp

!--- In this example, the VLAN Trunking Protocol (VTP) mode is set to be transparent. !--- Depending on your network, set the VTP mode accordingly.

set vtp mode transparent

!--- For details on VTP, refer to Configuring VTP.

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state active stp ieee

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state active stp ibm

set vlan 2

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state acti

ve mode srb aremaxhop 7 stemaxhop 7 backupcrf off

!

#ip

!--- IP address used for management.

set interface sc0 1 10.10.10.2/255.255.255.0 10.10.10.255

!

#set boot command

set boot config-register 0x2102

set boot system flash slot0:cat5000-sup3.6-1-1.bin

!

# default port status is enable

!

!

#module 1 empty

!

#module 2 : 2-port 1000BaseSX Supervisor

!

#module 3 empty

!

#module 4 : 24-port 10/100BaseTX Ethernet

!--- Ports 4/13-24 are assigned to VLAN 2.

set vlan 2 4/13-24

!--- The ISL trunking mode is set to on. !--- Depending on your network and requirements, set the trunking mode accordingly.

set trunk 4/1 on isl 1-1005

!--- For details on different trunking modes, refer to !--- Configuring VLAN Trunks on Fast Ethernet and Gigabit Ethernet Ports !--- Portfast has been enabled on the ports connected to the workstations.

set spantree portfast 4/2-24 enable

!--- For details on why to enable portfast, refer to !--- Using Portfast and Other Commands to Fix Workstation Startup Connectivity Delays

!

#module 5 empty

!

#module 6 empty

!

#module 7 empty

!

#module 8 empty

!

#module 9 empty

!

#module 10 empty

!

#module 11 empty

!

#module 12 empty

!

#module 13 empty

end

Catalyst 5000

#Version 6.1(1)

!

set option fddi-user-pri enabled

set password $2$J75L$Ug4163kfeHTDcLJZ/L9es1

set enablepass $2$h/BN$i3S54iNvIXknFelh6gOve0

!

#errordetection

set errordetection portcounter enable

!

#system

set system name  cat5000

!

#frame distribution method

set port channel all distribution Mac both

!

#vtp

!--- In this example, the VTP mode is set to be transparent. !--- Depending on your network and requirements, set the VTP mode accordingly.

set vtp mode transparent

!--- For details on VTP, refer to Configuring VTP.

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state active stp IEEE

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state active stp IBM

set vlan 2

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state acti

ve mode srb aremaxhop 7 stemaxhop 7 backupcrf off

!

#ip

!--- IP address used for management.

set interface sc0 1 10.10.10.3/255.255.255.0 10.10.10.255

!

#set boot command

set boot config-register 0x2102

set boot system flash slot0:cat5000-sup3.6-1-1.bin

!

# default port status is enable

!

!

#module 1 : 0-port Supervisor III

!

#module 2 : 12-port 10/100BaseTX Ethernet

!

#module 3 : 24-port 10/100BaseTX Ethernet

!--- Ports 3/13-24 have been assigned to VLAN 2.

set vlan 2 3/13-24

!--- The ISL trunking mode is set to on. !--- Depending on your network and requirements, set the trunking mode accordingly.

set trunk 3/1 on isl 1-1005

!--- For details on different trunking modes, refer to !--- Configuring VLAN Trunks on Fast Ethernet and Gigabit Ethernet Ports !--- Portfast has been enabled on the ports connected to the workstations.

set spantree portfast 3/2-24 enable

!--- For details on why to enable portfast, refer to !--- Using Portfast and Other Commands to Fix Workstation Startup Connectivity Delays

!

!

#module 4 : 24-port 10/100BaseTX Ethernet

!

#module 5 : 12-port 10BaseFL Ethernet

end

Verificar

Esta seção fornece informações que você pode usar para confirmar se sua configuração está funcionando adequadamente.

Determinados comandos show—em particular, show tech-support—são suportados pela Output Interpreter Tool (somente clientes registrados) , que permite que você veja uma análise da saída do comando.

Catalyst 5500 Switch

show port capabilities module/port —Emita este comando para verificar se a porta é capaz de entroncamento.

cat5500> (enable)  show port capabilities 4/1

Model                    WS-X5234

Port                     4/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  4/1-2,4/1-4

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off,on)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(none),TX(1q4t)

COs rewrite              yes

ToS rewrite              IP-Precedence

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

show port module/port —Emita este comando para determinar o status de uma porta específica e se ela está ou não em tronco.

cat5500> (enable) show port 4/1

Port  Name               Status     Vlan       Level  Duplex Speed Type

----- ------------------ ---------- ---------- ------ ------ ----- ------------

4/1                     connected  trunk      normal a-full a-100 10/100BaseTX

Port  AuxiliaryVlan AuxVlan-Status

----- ------------- --------------

4/1  none          none

Port  Security Violation Shutdown-Time Age-Time Max-Addr Trap     IfIndex

----- -------- --------- ------------- -------- -------- -------- -------

4/1  disabled  shutdown             0        0        1 disabled      11

Port  Num-Addr Secure-Src-Addr   Age-Left Last-Src-Addr     Shutdown/Time-Left

----- -------- ----------------- -------- ----------------- ------------------

4/1         0                 -        -                 -        -         -

!--- Output suppressed.

show trunk — Emita este comando para verificar o status e a configuração do entroncamento.

cat5500> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

4/1      on           isl            trunking      1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

4/1      1-1005

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

4/1      1-2

Port      Vlans in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

4/1      1-2

show vtp domain—Emita este comando para verificar as informações do VTP.

cat5500> (enable) show vtp domain

Domain Name                      Domain Index VTP Version Local Mode  Password

-------------------------------- ------------ ----------- ----------- ----------

1            2           Transparent -

Vlan-count Max-vlan-storage Config Revision Notifications

---------- ---------------- --------------- -------------

6          1023             0               disabled

Last Updater    V2 Mode  Pruning  PruneEligible on Vlans

--------------- -------- -------- -------------------------

10.10.10.2      disabled disabled 2-1000

Catalyst 5000 Switch

show port capabilities module/port —Emita este comando para verificar se a porta é capaz de entroncamento.

cat5000> (enable) show port capabilities 3/1

Model                    WS-X5225R

Port                     3/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  3/1-2,3/1-4

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off,on)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(none),TX(none)

COs rewrite              yes

ToS rewrite              IP-Precedence

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

show port module/port —Emita este comando para determinar o status de uma porta específica e se ela está ou não em tronco.

cat5000> (enable) show port 3/1

Port  Name               Status     Vlan       Level  Duplex Speed Type

----- ------------------ ---------- ---------- ------ ------ ----- ------------

3/1                     connected  trunk      normal a-full a-100 10/100BaseTX

Port  AuxiliaryVlan AuxVlan-Status

----- ------------- --------------

3/1  none          none

Port  Security Violation Shutdown-Time Age-Time Max-Addr Trap     IfIndex

----- -------- --------- ------------- -------- -------- -------- -------

3/1  disabled  shutdown             0        0        1 disabled      57

!--- Output suppressed.

show trunk — Emita este comando para verificar o status e a configuração do entroncamento.

cat5000> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

3/1      on           isl            trunking      1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

3/1      1-1005

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

3/1      1-2

Port      Vlans in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

3/1      1-2

show vtp domain—Emita este comando para verificar as informações do VTP.

cat5000> (enable) show vtp domain

Domain Name                      Domain Index VTP Version Local Mode  Password

-------------------------------- ------------ ----------- ----------- ----------

1            2           Transparent -

Vlan-count Max-vlan-storage Config Revision Notifications

---------- ---------------- --------------- -------------

6          1023             0               disabled

Last Updater    V2 Mode  Pruning  PruneEligible on Vlans

--------------- -------- -------- -------------------------

10.10.10.3      disabled disabled 2-1000

Troubleshoot

Atualmente, não existem informações disponíveis específicas sobre Troubleshooting para esta configuração.

Informações Relacionadas

- Páginas de Suporte de Produtos de LAN

- Página de suporte da switching de LAN

- Suporte Técnico e Documentação - Cisco Systems