Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Configurar

Diagrama de Rede

Configuração

Verificar

Troubleshoot

Informações Relacionadas

Introduction

Este documento fornece uma configuração de exemplo para um servidor Cisco TN3270 que está usando comutação de sessão com um Dependent Logical Unit Requester (DLUR) e um Dependent Logical Unit Server (DLUS) que está usando links estáticos e Unidades Físicas dinâmicas (PUs).

Prerequisites

Requirements

Não existem requisitos específicos para este documento.

Componentes Utilizados

Este documento não se restringe a versões de software e hardware específicas.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Para obter mais informações sobre convenções de documento, consulte as Convenções de dicas técnicas Cisco.

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Observação: para encontrar informações adicionais sobre os comandos usados neste documento, use a ferramenta Command Lookup Tool (somente clientes registrados).

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Configuração

Isso está em vigor para esta configuração de exemplo:

- Duas partições lógicas (LPARs) que estão executando o MVS (Multiple Virtual Storage, Armazenamento virtual múltiplo) em um mainframe de EmIF (Multiple Image Facility, instalação de várias imagens) do Enterprise System Connection (ESCON):

- LPAR nº 1: Sistema MVS1. Esse sistema deve ser configurado apenas como um nó de rede (NN).

- LPAR nº 2: Sistema MVS2. Esse sistema deve ser configurado como um NN e um DLUS principal.

- Nenhum subsistema APPN (Advanced Peer-to-Peer Networking) no roteador, exceto o DLUR do servidor Cisco TN3270, que é usado como um nó final.

- O endereço IP de escuta do servidor Cisco TN3270 172.26.19.99 conectado ao DLUS (MVS2).

- Links estáticos configurados no Cisco TN3270 Server DLUR para conexão com o MVS1 e o MVS2.

- MVS1 conectado ao MVS2 através do link Channel To Channel (CTC).

- Conexão Ponto de Controle para Ponto de Controle (CP-CP) estabelecida entre MVS1 e MVS2 sobre o link CTC via MPC (Multi-Path Channel, canal de multi-caminho). (As definições de Transport Resource List [TRL] e LOCAL Major Node são necessárias em MVS1 e MVS2.)

Este documento utiliza as seguintes configurações:

- Configuração do roteador

- Nó principal do adaptador de comunicação externa (XCA) em MVS1: XCAMVS1

- Nó principal XCA em MVS2: XCAMVS2

- Nó principal da unidade lógica (LU) em MVS2: LUCPCP

- Nó principal da rede comutada (SWNET) no MVS2: SW1TSYSP

- Nó de rede TRL em MVS1 para a conexão CTC: MPCM1ICN

- Nó principal LOCAL em MVS1 para a conexão CTC: TRLM1ICN

- Nó de rede TRL em MVS2 para a conexão CTC: MPCM2NN

- Nó principal LOCAL em MVS2 para a conexão CTC: TRLM2NN

Configuração do roteador

!

version 11.2

service udp-small-servers

service tcp-small-servers

!

interface TokenRing0/0

ip address 172.26.7.16 255.255.255.0

ring-speed 16

!

interface Channel1/0

csna C010 70

!--- This is the Cisco Systems Network Architecture (SNA) connection to MVS1.

csna C020 71

!--- This is the Cisco SNA connection to MVS2.

!

interface Channel1/2

ip address 172.26.19.98 255.255.255.224

no keepalive

lan TokenRing 0

adapter 1 4000.1241.1000

!--- This is bound to the TN3270 server.

adapter 30 4000.aaaa.0000

!--- This is bound to the MVS1 Cisco SNA connection.

adapter 31 4000.bbbb.0000

!--- This is bound to the MVS2 Cisco SNA connection.

tn3270-server

dlur NETA.WALL NETA.MVS2

!--- The DLUR: NETA.WALL and the DLUS: NETA.MVS2.

lsap token-adapter 1

link CPAC  lsap C0   rmac 4000.aaaa.0000 rsap 04

link MVS2  lsap C0   rmac 4000.bbbb.0000 rsap 04

pu dlurpup eeeeffff 172.26.19.99

!

router eigrp 109

network 172.26.0.0

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

password cisco

login

!

end

Nó principal XCA em MVS1: XCAMVS1

MVS1870 VBUILD TYPE=XCA

PR870   PORT   ADAPNO=30,CUADDR=870,SAPADDR=04,MEDIUM=RING,TIMER=60

*

GRP870  GROUP  ANSWER=ON,                                              X

AUTOGEN=(5,U,P),                                        X

CALL=INOUT,                                             X

DIAL=YES,                                               X

DYNPU=YES,                                              X

DYNPUFX=CN,                                             X

ISTATUS=ACTIVE

Nó principal XCA em MVS2: XCAMVS2

MVS871  VBUILD TYPE=XCA

PR871   PORT   ADAPNO=31,CUADDR=871,SAPADDR=04,MEDIUM=RING,TIMER=60

*

GRP871  GROUP  ANSWER=ON,                                              X

AUTOGEN=(5,U,P),                                        X

CALL=INOUT,                                             X

DIAL=YES,                                               X

DYNPU=YES,                                              X

DYNPUPFX=CN,                                            X

ISTATUS=ACTIVE

Nó principal da LU em MVS2: LUCPCP

LUGRL    VBUILD TYPE=LUGROUP

DLUSYED  LUGROUP

327802   LU    DLOGMOD=D4C32782,LOGAPPL=NETTESTR,                      X

MODETAB=ISTINCLM,USSTAB=USSL3270,SSCPFM=USS3270

327804E  LU    DLOGMOD=D4C32784,LOGAPPL=NETTESTR,                      X

MODETAB=ISTINCLM,USSTAB=USSL3270,SSCPFM=USS3270

@        LU    DLOGMOD=D4C32782,LOGAPPL=NETTMVS2,                      X

MODETAB=ISTINCLM,USSTAB=USSL3270,SSCPFM=USS3270

!--- The NETTESTR application is on MVS1. !--- This is specified with LOGAPPL=NETTESTR.

Nó principal da rede comutada (SWNET) no MVS2: SW1TSYSP

SW1TSYS  VBUILD TYPE=SWNET

*

*

TSYSPU   PU    ADDR=02,                                                X

IDBLK=EEE,IDNUM=EFFFF,                                  X

ISTATUS=ACTIVE,                                         X

LUGROUP=DLUSYED,LUSEED=M3270L##,                        X

PUTYPE=2,DLOGMOD=D4C32784,MODETAB=ISTINCLM,             X

SSCPFM=USS3270,PACING=8,VPACING=8

M3270L01 LU    LOCADDR=01,LOGAPPL=TSOMVS1

!--- PU TSYSPU is used for the Cisco TN3270 Server !--- session switching connection.

Nó de rede TRL em MVS1 para a conexão CTC: MPCM1ICN

************************************************************************

*  MVS1 READ  CUAS: A60,A70 CTC UNITAD 20,30                           *

*  MVS2 WRITE CUAS: B20,B30 CNC UNITAD 20,30                           *

*  MVS1 WRITE CUAS: B40,B50 CNC UNITAD 00,10                           *

*  MVS2 READ  CUAS: A00,A10 CTC UNITAD 00,10                           *

************************************************************************

MPCM1ICN VBUILD TYPE=TRL

MPCM1M2  TRLE  LNCTL=MPC,MAXBFRU=16,                                   X

READ=(A60,A70),                                         X

WRITE=(B40,B50)

Nó principal LOCAL em MVS1 para a conexão CTC: TRLM1ICN

TRLM1ICN VBUILD TYPE=LOCAL

*       XID=YES,HPR=YES FOR NN ONLY

TRLM1PU1 PU    TRLE=MPCM1M2,                                           X

ISTATUS=ACTIVE,VPACING=0, *XID=YES,HPR=YES              X

SSCPFM=USSSCS,CONNTYPE=APPN,CPCP=YES

Nó de rede TRL em MVS2 para a conexão CTC: MPCM2NN

************************************************************************

*  MVS1 READ  CUAS: A60,A70 CTC UNITAD 20,30                           *

*  MVS2 WRITE CUAS: B20,B30 CNC UNITAD 20,30                           *

*  MVS1 WRITE CUAS: B40,B50 CNC UNITAD 00,10                           *

*  MVS2 READ  CUAS: A00,A10 CTC UNITAD 00,10                           *

************************************************************************

MPCM2NN  VBUILD TYPE=TRL

MPCM2M1  TRLE  LNCTL=MPC,MAXBFRU=16,

READ=(A00,A10),

WRITE=(B20,B30)

Nó principal LOCAL em MVS2 para a conexão CTC: TRLM2NN

TRLM2NN  VBUILD TYPE=LOCAL

*******      USE XID=YES,HPR=YES  IF OTHER MVS IS NN

TRLM2PU1 PU    TRLE=MPCM2M1,                                           X

ISTATUS=ACTIVE,VPACING=0,  *XID=YES,HPR=YES,            X

SSCPFM=USSSCS,CONNTYPE=APPN,CPCP=YES

Verificar

No momento, não há procedimento de verificação disponível para esta configuração.

Troubleshoot

Atualmente, não existem informações disponíveis específicas sobre Troubleshooting para esta configuração.

Informações Relacionadas

- Suporte de tecnologia

- Suporte de Produto

- Suporte Técnico - Cisco Systems