Contents

Introduction

Prerequisites

Requirements

Configurar

Configurações

Verificar

Introduction

Este documento descreve como desativar o IPV6 no Linux Operator System.

Contribuição de Gustavo Bell, engenheiro do Cisco TAC.

Prerequisites

Requirements

- Acesso ao sistema como usuário root.

- SO (sistema operacional)

Configurar

Configurações

Etapa 1. Conecte-se ao SO como root

Etapa 2. Verifique se o sistema tem um ip IPV6.

ip add | grep inet6

saída possível

inet6 ::1/128 scope host

inet6 fe80::18e2:36ec:dd69:6c3f/64 scope link

Etapa 3. Modifique o arquivo /etc/sysctl.conf e adicione as seguintes linhas/

echo "net.ipv6.conf.eth0.disable_ipv6 = 1" >> /etc/sysctl.conf

echo "net.ipv6.conf.default.disable_ipv6 = 1" >> /etc/sysctl.conf

echo "net.ipv6.conf.all.disable_ipv6 = 1" >> /etc/sysctl.conf

echo "net.ipv6.conf.lo.disable_ipv6 = 1" >> /etc/sysctl.conf

Etapa 4. Reinicialize o sistema

systemctl reboot

Verificar

Etapa 1. Verifique se PV6 está em execução. A saída deve estar vazia

ip add | grep inet6