Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Hipóteses

Configurar

Diagrama de Rede

Configurações

Troubleshoot

Informações Relacionadas

Introduction

Este documento mostra uma configuração de exemplo de LAN emulation (LANE), circuit emulation service (CES) e variable bit rate (VBR) Permanent Virtual Connections (PVCs) em túneis de caminho virtual moldado (VP). Na configuração mostrada neste documento, LANE, CES e PVCs de taxa de bits variável não em tempo real (VBR-nrt) são transportados através da WAN. Esses exemplos usam túneis VP moldados para garantir a conformidade com os contratos de tráfego. Ao usar túneis VP moldados com parâmetros de tráfego idênticos ao provedor de serviços, a rede ATM do provedor de serviços não deve descartar nenhuma célula.

O túnel VP deve ser da categoria de serviço de taxa de bits constante (CBR - Constant Bit Rate) para ser modelado: é o único túnel modelado que a Cisco suporta atualmente. Você deve ter três túneis VP porque a LANE usa conexões virtuais comutadas (SVCs) de taxa de bits não especificada (UBR), o CES usa PVCs CBR, você tem um PVC VBR e você está usando túneis VP moldados. Você tem um para cada categoria de serviço: Canais virtuais (VCs) CBR e VCs UBR. Você poderia ter usado um túnel usando túneis VP hierárquicos.

Prerequisites

Requirements

Os leitores deste documento devem estar cientes destes tópicos:

- LANE

- Recomendações de projeto LANE

- Configurando LANE

- CES

- Introdução aos serviços de simulação de circuito

- Configurando serviços de emulação de circuito

- VBR

- Entendendo a categoria de serviço de tempo real da taxa de bits variável (VBR-rt) para ATM VCs

- Entendendo a categoria de serviço de VBR-nrt e modelagem de tráfego para ATM VCs

- Túneis de VP

- Configurando túneis e switching de VP

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- Cisco IOS® Software Release 11.3(0.8)TWA4 ASP ou posterior para o LightStream 1010 (LS1010)

- Qualquer versão do Cisco 8540-MSR

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Para obter mais informações sobre convenções de documento, consulte as Convenções de dicas técnicas Cisco.

Hipóteses

O exemplo mostrado neste documento presume estes fatos:

- Os túneis modelados devem ser da categoria de serviço CBR, portanto este exemplo tem um túnel VP CBR que só pode conter VCs CBR. É usado para PVCs CES CBR (rotulados como VPI1 no diagrama de rede). Observe que o número VPI (Virtual Path Identifier, identificador de caminho virtual) é significativo localmente na porta do switch, portanto, você pode ter o mesmo número VPI no mesmo switch, mas duas portas de switch diferentes.

- Como os túneis VP modelados não podem transportar simultaneamente VCs de várias categorias de serviço, o primeiro túnel VP usado para VCs CBR não pode ser usado para VCs UBR LANE ou PVC VBR-nrt. Você deve criar outro túnel VP para LANE (que usa VCs de categoria de serviço UBR). Portanto, o segundo túnel VP (rotulado como VPI2 no diagrama de rede) é um túnel VP em forma de CBR através do qual somente VCs UBR são permitidos.

- Um terceiro túnel de VP modelado transporta o PVC VBR-nrt (rotulado como VPI3 no diagrama de rede).

- Você precisa comprar três VPs CBR do provedor de serviços.

- Parte-se do pressuposto de que os três VPs CBR têm uma taxa de pico de célula (PCR - Peak Cell Rate) de 10 Mbps e uma tolerância de variação de retardo de célula (CDVT - Cell Delay Variation Tolence) de 500 células. Observe que a soma dos PCRs de todos os túneis VP definidos na mesma interface física deve ser menor que 95% da taxa de linha da interface física (supondo que somente túneis VP estejam configurados na interface física).

- Para o PVC VBR, a taxa de célula sustentada (SCR) do PVC deve ser menor que 95% do PCR do túnel VP em forma de CBR. Em outras palavras, o PVC SCR deve ser menor que 9,5 Mbps para o VBR-nrt. Se houver vários PVCs VBR passando pelo túnel CBR, a soma dos SCRs de todos os PVCs VBR deve ser menor que 95% do PCR do túnel VP moldado. Os 5% restantes são reservados para sinalização e outros protocolos obrigatórios.

- O dispositivo 5500-asp-f é para switching VP. O provedor de serviços normalmente executa essa função.

- os serviços LANE são definidos em 8540-MSR; Os LAN Emulation Clients (LECs) são definidos em 8540-MSR e 5500-asp-e.

Observação: neste exemplo, os serviços LANE são colocados no switch ATM para simplificar. Esse não é, no entanto, o local ideal para os serviços LANE. O melhor lugar para um Servidor de Emulação LAN (LES - LAN Emulation Server) ou servidor de broadcast e desconhecido (BUS - Broadcom Server) é no módulo LANE de um Catalyst 5500. O local ideal para um LEC é um roteador da série Cisco 7500.

- As duas centrais telefônicas privadas (PBXs) no diagrama usam um circuito CES CBR. Para obter detalhes sobre como configurar a emulação de circuito, consulte Configuração de Serviços de Emulação de Circuito.

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Observação: para encontrar informações adicionais sobre os comandos usados neste documento, use a ferramenta Command Lookup Tool (somente clientes registrados).

Diagrama de Rede

Clique nos switches neste diagrama para ver as configurações de exemplo:

Configurações

Este documento utiliza as seguintes configurações:

- 5500-asp-e

- 5500-asp-f

- 8540-MSR

Exemplo de configuração 5500-asp-e

5500-asp-e

5500-asp-e# show running-config

Building configuration...

Current configuration:

!

version 11.3

no service pad

service timestamps debug datetime msec

service timestamps log uptime

no service password-encryption

!

hostname 5500-asp-e

!

boot system flash slot0:LS1010-wp-mz.120-3c.W5.9.bin

!

ip host-routing

!

atm connection-traffic-table-row index 63997 vbr-nrt pcr 20480 scr10 9000  mbs 100

atm connection-traffic-table-row index 64000 cbr pcr 10240  cdvt 500

atm lecs-address-default 47.0091.8100.0000.0090.2144.8401.0090.2144.8405.00 1

atm address 47.0091.8100.0000.0050.537e.1401.0050.537e.1401.00

atm router pnni

no aesa embedded-number left-justified

node 1 level 56 lowest

redistribute atm-static

!

!

!

interface CBR10/0/0

no ip address

ces circuit 0 circuit-name test

ces pvc 0 interface ATM11/0/1.6 vpi 6 vci 100

!

interface ATM11/0/1

no atm signaling enable

no ip address

atm pvp 5 shaped rx-cttr 64000 tx-cttr 64000

atm pvp 6 shaped rx-cttr 64000 tx-cttr 64000

atm pvp 7 shaped rx-cttr 64000 tx-cttr 64000

!

interface ATM11/0/1.5 point-to-point

atm cac service-category cbr deny

atm cac service-category ubr permit

!

interface ATM11/0/1.6 point-to-point

!

interface ATM11/0/1.7 point-to-point

atm cac service-category cbr deny

atm cac service-category vbr-nrt permit

atm pvc 7 100 rx-cttr 63997 tx-cttr 63997  interface  ATM10/1/0 0 100

!

interface ATM11/0/2

no ip address

!

interface ATM11/0/3

no ip address

!

interface ATM11/1/0

no ip address

!

interface ATM11/1/1

no ip address

!

interface ATM11/1/2

no ip address

!

interface ATM11/1/3

no ip address

!

interface ATM13/0/0

no ip address

atm maxvp-number 0

!

interface ATM13/0/0.1 multipoint

ip address 100.100.100.2 255.255.255.0

lane client ethernet test

!

interface Ethernet13/0/0

no ip address

!

no ip classless

logging buffered 16000 debugging

!

line con 0

line aux 0

line vty 0 4

login

!

end

Descrição dos recursos

Você pode usar os comandos show nesta seção para verificar os recursos de configuração no dispositivo. A Output Interpreter Tool (somente clientes registrados) oferece suporte a determinados comandos show, o que permite exibir uma análise da saída do comando show.

Observação: você pode usar comandos show adicionais para verificar a configuração; nem todos estão incluídos neste documento.

Para garantir que todos os VCs LANE atravessem o túnel VP correto (em outras palavras, para impedir que a sinalização seja iniciada através da interface principal), a sinalização é desativada na interface atm11/0/1 usando o comando no atm signaling enable. A mesma operação foi executada no 8540-MSR.

Para ver quais VCs estão passando pelo túnel VP com um VPI de 7, emita o comando show atm vc interface interface-number:

5500-asp-e# show atm vc interface atm11/0/1.7

Interface    VPI   VCI   Type    X-Interface  X-VPI X-VCI  Encap Status

ATM11/0/1.7  7     3      PVC     ATM13/0/0    0     181   SNAP   UP

ATM11/0/1.7  7     4      PVC     ATM13/0/0    0     182   SNAP   UP

ATM11/0/1.7  7     5      PVC     ATM13/0/0    0     180   QSAAL  UP

ATM11/0/1.7  7     16     PVC     ATM13/0/0    0     179   ILMI   UP

ATM11/0/1.7  7     18     PVC     ATM13/0/0    0     183   PNNI   UP

ATM11/0/1.7  7     100    PVC     ATM10/1/0    0     100          UP

5500-asp-e# show atm interface resource atm11/0/1.7

Resource Management configuration:

Service Categories supported: vbr-nrt

Link Distance: 0 kilometers

Best effort connection limit: disabled  0 max connections

Max traffic parameters by service (rate in Kbps, tolerance in cell-times):

Peak-cell-rate RX: none vbr,

Peak-cell-rate TX: none vbr,

Sustained-cell-rate: none vbr RX, none vbr TX

Minimum-cell-rate RX:

Minimum-cell-rate TX:

CDVT RX: none vbr,

CDVT TX: none vbr,

MBS: none vbr RX, none vbr TX

Resource Management state:

Available bit rates (in Kbps):

0 cbr RX, 0 cbr TX, 613 vbr RX, 613 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

Allocated bit rates:

0 cbr RX, 0 cbr TX, 9114 vbr RX, 9114 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

5500-asp-e# show atm interface resource atm11/0/1

Resource Management configuration:

Service Classes:

Service Category map: c1 cbr, c2 vbr-rt, c3 vbr-nrt, c4 abr, c5 ubr

Scheduling: RS c1 WRR c2, WRR c3, WRR c4, WRR c5

WRR Weight: 8 c2, 1 c3, 1 c4, 1 c5

Pacing: disabled   0 Kbps rate configured, 0 Kbps rate installed

Service Categories supported: cbr,vbr-rt,vbr-nrt,abr,ubr

Link Distance: 0 kilometers

Controlled Link sharing:

Max aggregate guaranteed services: none RX,  none TX

Max bandwidth: none cbr RX, none cbr TX, none vbr RX, none vbr TX,

none abr RX, none abr TX, none ubr RX, none ubr TX

Min bandwidth: none cbr RX, none cbr TX, none vbr RX, none vbr TX,

none abr RX, none abr TX, none ubr RX, none ubr TX

Best effort connection limit: disabled  0 max connections

Max traffic parameters by service (rate in Kbps, tolerance in cell-times):

Peak-cell-rate RX: none cbr, none vbr, none abr, none ubr

Peak-cell-rate TX: none cbr, none vbr, none abr, none ubr

Sustained-cell-rate: none vbr RX, none vbr TX

Minimum-cell-rate RX: none abr, none ubr

Minimum-cell-rate TX: none abr, none ubr

CDVT RX: none cbr, none vbr, none abr, none ubr

CDVT TX: none cbr, none vbr, none abr, none ubr

MBS: none vbr RX, none vbr TX

Resource Management state:

Available bit rates (in Kbps):

117023 cbr RX, 117023 cbr TX, 117023 vbr RX, 117023 vbr TX,

117023 abr RX, 117023 abr TX, 117023 ubr RX, 117023 ubr TX

Allocated bit rates:

30720 cbr RX, 30720 cbr TX, 0 vbr RX, 0 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

Best effort connections: 0 pvcs,  4 svcs

Exemplo de configuração 5500-asp-f

O switch está configurado para switching VP.

5500-asp-f

5500-asp-f# show running-config

Building configuration...

Current configuration:

!

version 11.3

no service padservice timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 5500-asp-f

!

!

!

atm connection-traffic-table-row index 63997 vbr-nrt pcr 20480 scr10 9000  mbs 100

atm connection-traffic-table-row index 64000 cbr pcr 10240  cdvt 500

atm address 47.0091.8100.0000.0050.5308.2401.0050.5308.2401.00

atm router pnni

no aesa embedded-number left-justified

node 1 level 56 lowest

redistribute atm-static

!

!

!

interface ATM11/0/0

no ip address

!

interface ATM11/0/1

no ip address

atm pvp 5  interface  ATM11/0/0 10

atm pvp 6 rx-cttr 64000 tx-cttr 64000 interface ATM11/0/0 6 rx-cttr 64000 tx-cttr 64000

atm pvp 7 rx-cttr 63997 tx-cttr 63997 interface ATM11/0/0 7 rx-cttr 63997 tx-cttr 63997

!

interface ATM13/0/0

no ip address

atm maxvp-number 0

!

interface Ethernet13/0/0

no ip address

!

ip classless

!

!

line con 0

line aux 0

line vty 0 4

login

!

end

Exibição de recursos

Para verificar se o VP está operacional, emita o comando show atm vp:

5500-asp-f# show atm vp

Interface    VPI    Type  X-Interface     X-VPI     Status

ATM11/0/0    6       PVP     ATM11/0/1    6         UP

ATM11/0/0    7       PVP     ATM11/0/1    7         UP

ATM11/0/0    10      PVP     ATM11/0/1    5         UP

ATM11/0/1    5       PVP     ATM11/0/0    10        UP

ATM11/0/1    6       PVP     ATM11/0/0    6         UP

ATM11/0/1    7       PVP     ATM11/0/0    7         UP

Exemplo de configuração 8540-MSR

8540-MSR

8540-MSR# show running-config

Building configuration...

Current configuration:

!

version 12.0

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 8540-MSR

!

logging buffered 4096 debugging

!

redundancy

main-cpu

sync config startup

sync config running

facility-alarm core-temperature major 53

facility-alarm core-temperature minor 45

ip subnet-zero

!

atm connection-traffic-table-row index 63997 vbr-nrt pcr 20480 scr10 9000  mbs 100

atm connection-traffic-table-row index 63998 cbr pcr 10000

atm connection-traffic-table-row index 63999 cbr pcr 10240  cdvt 500

atm lecs-address-default 47.0091.8100.0000.0090.2144.8401.0090.2144.8405.00 1

atm address 47.0091.8100.0000.0090.2144.8401.0090.2144.8401.00

atm router pnni

no aesa embedded-number left-justified

node 1 level 56 lowest

redistribute atm-static

!

!

lane database PVP

name test server-atm-address 47.009181000000009021448401.009021448403.01

!

!

interface CBR1/0/0

no ip address

no ip directed-broadcast

shutdown

ces circuit 0 circuit-name test

ces pvc 0 interface ATM2/1/0.6 vpi 6 vci 100

!

interface ATM2/1/0

no atm signaling enable

no ip address

no ip directed-broadcast

atm pvp 6 shaped rx-cttr 63999 tx-cttr 63999

atm pvp 7 shaped rx-cttr 63999 tx-cttr 63999

atm pvp 10 shaped rx-cttr 63999 tx-cttr 63999

!

interface ATM2/1/0.6 point-to-point

no ip directed-broadcast

!

interface ATM2/1/0.7 point-to-point

no ip directed-broadcast

atm cac service-category cbr deny

atm cac service-category vbr-nrt permit

atm pvc 7 100 rx-cttr 63997 tx-cttr 63997  interface  ATM1/1/0 0 100

!

interface ATM2/1/0.10 point-to-point

no ip directed-broadcast

atm cac service-category cbr deny

atm cac service-category ubr permit

!

interface ATM2/1/1

no ip address

no ip directed-broadcast

!

interface ATM2/1/2

no ip address

no ip directed-broadcast

!

interface ATM2/1/3

no ip address

no ip directed-broadcast

!

interface ATM0

no ip address

no ip directed-broadcast

atm maxvp-number 0

lane config auto-config-atm-address

lane config database PVP

!

interface ATM0.1 multipoint

ip address 100.100.100.1 255.255.255.0

no ip directed-broadcast

lane server-bus ethernet test

lane client ethernet test

!

interface Ethernet0

no ip address

no ip directed-broadcast

!

ip classless

!

!

line con 0

transport input none

line aux 0

line vty 0 4

!

end

Descrição dos recursos

Você pode usar os comandos show nesta seção para verificar os recursos de configuração no dispositivo.

8540-MSR# show atm interface resource atm2/1/0.7

Resource Management configuration:

Service Categories supported: vbr-nrt

Link Distance: 0 kilometers

Best effort connection limit: disabled  0 max connections

Max traffic parameters by service (rate in Kbps, tolerance in cell-times):

Peak-cell-rate RX: none vbr,

Peak-cell-rate TX: none vbr,

Sustained-cell-rate: none vbr RX, none vbr TX

Minimum-cell-rate RX:

Minimum-cell-rate TX:

CDVT RX: none vbr,

CDVT TX: none vbr,

MBS: none vbr RX, none vbr TX

Resource Management state:

Available bit rates (in Kbps):

0 cbr RX, 0 cbr TX, 613 vbr RX, 613 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

Allocated bit rates:

0 cbr RX, 0 cbr TX, 9114 vbr RX, 9114 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

8540-MSR# show atm interface resource atm2/1/0

Resource Management configuration:

Service Classes:

Service Category map: c2 cbr, c2 vbr-rt, c3 vbr-nrt, c4 abr, c5 ubr

Scheduling: RS c1 WRR c2, WRR c3, WRR c4, WRR c5

WRR Weight: 8 c2, 1 c3, 1 c4, 1 c5

Pacing: disabled   0 Kbps rate configured, 0 Kbps rate installed

Service Categories supported: cbr,vbr-rt,vbr-nrt,abr,ubr

Link Distance: 0 kilometers

Controlled Link sharing:

Max aggregate guaranteed services: none RX,  none TX

Max bandwidth: none cbr RX, none cbr TX, none vbr RX, none vbr TX,

none abr RX, none abr TX, none ubr RX, none ubr TX

Min bandwidth: none cbr RX, none cbr TX, none vbr RX, none vbr TX,

none abr RX, none abr TX, none ubr RX, none ubr TX

Best effort connection limit: disabled  0 max connections

Max traffic parameters by service (rate in Kbps, tolerance in cell-times):

Peak-cell-rate RX: none cbr, none vbr, none abr, none ubr

Peak-cell-rate TX: none cbr, none vbr, none abr, none ubr

Sustained-cell-rate: none vbr RX, none vbr TX

Minimum-cell-rate RX: none abr, none ubr

Minimum-cell-rate TX: none abr, none ubr

CDVT RX: none cbr, none vbr, none abr, none ubr

CDVT TX: none cbr, none vbr, none abr, none ubr

MBS: none vbr RX, none vbr TX

Resource Management state:

Available bit rates (in Kbps):

117023 cbr RX, 117023 cbr TX, 117023 vbr RX, 117023 vbr TX,

117023 abr RX, 117023 abr TX, 117023 ubr RX, 117023 ubr TX

Allocated bit rates:

30720 cbr RX, 30720 cbr TX, 0 vbr RX, 0 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

Best effort connections: 0 pvcs,  0 svcs

8540-MSR# show atm interface resource atm2/1/0.6

Resource Management configuration:

Service Categories supported: cbr

Link Distance: 0 kilometers

Best effort connection limit: disabled  0 max connections

Max traffic parameters by service (rate in Kbps, tolerance in cell-times):

Peak-cell-rate RX: none cbr,

Peak-cell-rate TX: none cbr,

Minimum-cell-rate RX:

Minimum-cell-rate TX:

CDVT RX: none cbr,

CDVT TX: none cbr,

Resource Management state:

Available bit rates (in Kbps):

9727 cbr RX, 9727 cbr TX, 0 vbr RX, 0 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

Allocated bit rates:

1741 cbr RX, 1741 cbr TX, 0 vbr RX, 0 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

8540-MSR# show atm interface resource atm2/1/0.7

Resource Management configuration:

Service Categories supported: vbr-nrt

Link Distance: 0 kilometers

Best effort connection limit: disabled  0 max connections

Max traffic parameters by service (rate in Kbps, tolerance in cell-times):

Peak-cell-rate RX: none vbr,

Peak-cell-rate TX: none vbr,

Sustained-cell-rate: none vbr RX, none vbr TX

Minimum-cell-rate RX:

Minimum-cell-rate TX:

CDVT RX: none vbr,

CDVT TX: none vbr,

MBS: none vbr RX, none vbr TX

Resource Management state:

Available bit rates (in Kbps):

0 cbr RX, 0 cbr TX, 613 vbr RX, 613 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

Allocated bit rates:

0 cbr RX, 0 cbr TX, 9114 vbr RX, 9114 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

8540-MSR# show atm interface resource atm2/1/0.10

Resource Management configuration:

Service Categories supported: ubr

Link Distance: 0 kilometers

Best effort connection limit: disabled  0 max connections

Max traffic parameters by service (rate in Kbps, tolerance in cell-times):

Peak-cell-rate RX: none ubr

Peak-cell-rate TX: none ubr

Minimum-cell-rate RX: none ubr

Minimum-cell-rate TX: none ubr

CDVT RX: none ubr

CDVT TX: none ubr

Resource Management state:

Available bit rates (in Kbps):

0 cbr RX, 0 cbr TX, 0 vbr RX, 0 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

Allocated bit rates:

0 cbr RX, 0 cbr TX, 0 vbr RX, 0 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

Troubleshoot

Atualmente, não existem informações disponíveis específicas sobre Troubleshooting para esta configuração.

Informações Relacionadas

- Suporte à tecnologia de switching e túneis VP (caminho virtual)

- Suporte à tecnologia LANE (LAN Emulation)

- Suporte à tecnologia CES (Circuit Emulation Service)

- Suporte Técnico e Documentação - Cisco Systems