Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Conventies

Achtergrondinformatie

Configureren

Configuraties

Verifiëren

Problemen oplossen

Gerelateerde informatie

Inleiding

Dit document beschrijft de problemen die worden veroorzaakt wanneer u een MTU-pakket (Jumbo Maximum Transmission Unit) configureert in een Nexus 5000 Series Switch.

Voorwaarden

Verifiëren

Vereisten

Er zijn geen specifieke vereisten van toepassing op dit document.

Gebruikte componenten

De informatie in dit document is gebaseerd op deze serie van Nexus switches:

- Nexus 5020 switch

- NX-OS versie 4.1(3)N2(1a)

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u zorgen dat u de potentiële impact van elke opdracht begrijpt.

Conventies

Raadpleeg Cisco Technical Tips Conventions (Conventies voor technische tips van Cisco) voor meer informatie over documentconventies.

Achtergrondinformatie

Dit document beschrijft de problemen die zich voordoen wanneer u Jumbo Packet in een Nexus 5000 Series Switch moet gebruiken. Het beschreven scenario kan optreden wanneer u jumbopakketten probeert over te dragen tussen Nexus 5000 en/of Nexus 7000 switches.

Configureren

Het pakketverlies kan optreden tussen twee Nexus 5000 switches of tussen een Nexus 5000 switch en Nexus 7000 switch.

Wanneer u een host pingelt met de pakketgrootte van 9216 bytes, kunt u pakketverlies van 50 procent zien.

Nexus-5000#ping 172.16.0.1 packet-size 9216 count 20

PING 172.16.0.1 (172.16.0.1): 9216 data bytes

9224 bytes from 172.16.0.1: icmp_seq=0 ttl=254 time=6.094 ms

Request 1 timed out

9224 bytes from 172.16.0.1: icmp_seq=2 ttl=254 time=5.507 ms

Request 3 timed out

9224 bytes from 172.16.0.1: icmp_seq=4 ttl=254 time=5.529 ms

Request 5 timed out

9224 bytes from 172.16.0.1: icmp_seq=6 ttl=254 time=10.09 ms

Request 7 timed out

9224 bytes from 172.16.0.1: icmp_seq=8 ttl=254 time=5.597 ms

Request 9 timed out

9224 bytes from 172.16.0.1: icmp_seq=10 ttl=254 time=5.497 ms

Request 11 timed out

9224 bytes from 172.16.0.1: icmp_seq=12 ttl=254 time=5.491 ms

Request 13 timed out

9224 bytes from 172.16.0.1: icmp_seq=14 ttl=254 time=5.555 ms

Request 15 timed out

9224 bytes from 172.16.0.1: icmp_seq=16 ttl=254 time=6.021 ms

Request 17 timed out

9224 bytes from 172.16.0.1: icmp_seq=18 ttl=254 time=5.51 ms

--- 172.16.0.1 ping statistics ---

20 packets transmitted, 10 packets received, 50.00% packet loss

round-trip min/avg/max = 5.491/6.089/10.09 ms

Configuraties

Als een Jumbo-pakket een Nexus 5020 en een Nexus 7010 moet doorkruisen, moet u de Policy-map configureren in Nexus 5020 en de  system jumbomtu size in de Nexus 7010 Series Switch.

Voltooi de volgende stappen om de Policy-map in Nexus 5020 te configureren:

Nexus 5020 switch

!--- You can enable the Jumbo MTU for the whole switch by setting the MTU to its maximum size (9216 bytes)

!--- in the policy map for the default Ethernet system class (class-default).

switch(config)#policy-map type network-qos jumbo

switch(config-pmap-nq)#class type network-qos class-default

switch(config-pmap-c-nq)#mtu 9216

switch(config-pmap-c-nq)#exit

switch(config-pmap-nq)#exit

switch(config)#system qos

switch(config-sys-qos)#service-policy type network-qos jumbo

Raadpleeg de configuratiehandleiding voor Cisco Nexus 5000 Series NX-OS Layer 2 Switching, release 4.2(1)N1(1) voor meer informatie.

Voltooi de volgende stappen om het jumboframe in een Nexus 7010-Switch in te stellen:

Nexus 7010 switch

!--- Set the MTU to its maximum size (9216 bytes) in order to enable the Jumbo MTU for the whole switch.

switch(config)#system jumbomtu 9216

!--- Set the MTU specification for an interface.

switch(config)#interface ethernet x/x

!--- By default, Cisco NX-OS configures Layer 3 parameters. In order to configure Layer 2 parameters, use this command.

switch(config-if)#switchport

switch(config-if)#mtu 9216

switch(config-if)#exit

Verifiëren

Om te verifiëren, kunt u pingen met een pakketgrootte van meer dan 1500 bytes: Ping -l 9000 x.x.x.x .

U kunt ook de  show interface ethernet port/slot  opdracht om te controleren of het Jumbo-frame is ingesteld.

Voer op de Nexus 5000 de volgende informatie in:  show queuing interface ethernet 1/1  opdracht:

Nexus5000#show queuing interface ethernet 1/1

Ethernet1/1 queuing information:

TX Queuing

qos-group  sched-type  oper-bandwidth

0       WRR             50

1       WRR             50

RX Queuing

qos-group 0

q-size: 243200, HW MTU: 9280 (9216 configured)

Voer op de Nexus 7000 de volgende informatie in:  show interface ethernet 1/9  opdracht:

Nexus-7010#show interface ethernet 1/9

Ethernet1/9 is up

Hardware: 10000 Ethernet, address: 0000.0000.0000 (bia 0000.0000.0000)

MTU 9216 bytes, BW 10000000 Kbit, DLY 10 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA

Port mode is access

full-duplex, 10 Gb/s, media type is 10g

Beacon is turned off

Auto-Negotiation is turned off

Input flow-control is off, output flow-control is off

Rate mode is dedicated

Switchport monitor is off

Last link flapped 00:57:24

Last clearing of "show interface" counters 00:56:14

30 seconds input rate 0 bits/sec, 0 packets/sec

30 seconds output rate 360 bits/sec, 0 packets/sec

Load-Interval #2: 5 minute (300 seconds)

input rate 0 bps, 0 pps; output rate 448 bps, 0 pps

RX

5894254 unicast packets  0 multicast packets  0 broadcast packets

5894254 input packets  29108950332 bytes

0 jumbo packets  0 storm suppression packets

0 runts  0 giants  0 CRC  0 no buffer

0 input error  0 short frame  0 overrun   0 underrun  0 ignored

0 watchdog  0 bad etype drop  0 bad proto drop  0 if down drop

0 input with dribble  0 input discard

0 Rx pause

TX

5894228 unicast packets  2225 multicast packets  0 broadcast packets

5896453 output packets  29109001641 bytes

0 jumbo packets

0 output error  0 collision  0 deferred  0 late collision

0 lost carrier  0 no carrier  0 babble

0 Tx pause

0 interface resets

Opmerking: de Jumboteller op Nexus 7000-serie wordt niet ondersteund en de Tx- en Rx-frames tonen nulwaarde, maar als u de MTU-grootte opmerkt, geeft het het ingestelde Jumboframe weer.

Problemen oplossen

Er is momenteel geen informatie beschikbaar om deze configuratie problemen op te lossen.

Gerelateerde informatie

- Cisco Nexus 5000 Series Switches

- Cisco Nexus 7000 Series ondersteuningspagina voor Switches

- Cisco technische ondersteuning en downloads