Inhoud

Lopbacks gebruiken om Ethernet-interfaces te testen

Interne loopback

De loopback configureren

clear counters

Het lokale IP pingen

Interfacetellers controleren

Controleer de controllertellers

Externe loopback

De loopback configureren

clear counters

Het lokale IP pingen

Interfacetellers controleren

Controllertellers controleren

Referenties

Lopbacks gebruiken om Ethernet-interfaces te testen

Indien nodig kunnen loopbacks worden gebruikt om problemen op te sporen met lijnkaarten, fabric, netwerkprocessors (NP’s), transceivers of optische doorvoerpaden.

Er zijn twee primaire soorten loopbacks: intern en extern.

Interne lussen kunnen op afstand worden gedaan, maar geven niet zoveel informatie.

Externe lussen moeten worden uitgevoerd op de site, maar geven de grootste hoeveelheid informatie.

De onderstaande voorbeelden gebruiken deze interface:

RP/0/RSP0/CPU0:ASR9001-F# show run int tenGigE 0/0/1/1

interface TenGigE0/0/1/1

ipv4 address 10.100.101.1 255.255.255.0

!

Interne loopback

Dit is een basistest die kan worden uitgevoerd zonder toegang tot een externe site. Het kan problemen vinden met de CPU, fabric path, NP en transceiver, maar het kan geen optische of doorvoerproblemen vinden.

De loopback configureren

Dit heeft invloed op het verkeer

RP/0/RSP0/CPU0:ASR9001-F# configure

RP/0/RSP0/CPU0:ASR9001-F(config)# int tenGigE 0/0/1/1

RP/0/RSP0/CPU0:ASR9001-F(config-if)# loopback internal

RP/0/RSP0/CPU0:ASR9001-F(config-if)# commit

RP/0/RSP0/CPU0:ASR9001-F(config-if)# end

clear counters

Dit ontruimt tellers op zowel de interface als het controlemechanisme.

RP/0/RSP0/CPU0:ASR9001-F# clear counters tenGigE 0/0/1/1

Clear "show interface" counters on this interface [confirm]

Het lokale IP pingen

RP/0/RSP0/CPU0:ASR9001-F# ping 10.100.101.1 count 10000 size 1500 timeout 0

pings with timeout=0 may result in system instability and

control protocol flaps resulting in traffic impact.

DO you really want to continue[confirm with only 'y' or 'n'] [y/n] :y

Type escape sequence to abort.

Sending 10000, 1500-byte ICMP Echos to 10.100.101.1, timeout is 0 seconds:

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

[output omitted]

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Success rate is 100 percent (10000/10000), round-trip min/avg/max = 1/1/5 ms

Interfacetellers controleren

RP/0/RSP0/CPU0:ASR9001-F# show interfaces tenGigE 0/0/1/1

TenGigE0/0/1/1 is up, line protocol is up

Interface state transitions: 3

Hardware is TenGigE, address is 70e4.2217.ba65 (bia 70e4.2217.ba65)

Layer 1 Transport Mode is LAN

Internet address is 10.100.101.1/24

MTU 1514 bytes, BW 10000000 Kbit (Max: 10000000 Kbit)

reliability 255/255, txload 0/255, rxload 0/255

Encapsulation ARPA,

Full-duplex, 10000Mb/s, link type is force-up

output flow control is off, input flow control is off

loopback set (External),

ARP type ARPA, ARP timeout 04:00:00

Last input 00:00:00, output 00:00:00

Last clearing of "show interface" counters 00:02:40

5 minute input rate 685000 bits/sec, 126 packets/sec

5 minute output rate 685000 bits/sec, 126 packets/sec

10003 packets input, 15140657 bytes, 0 total input drops

0 drops for unrecognized upper-level protocol

Received 0 broadcast packets, 3 multicast packets

0 runts, 0 giants, 0 throttles, 0 parity

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

10003 packets output, 15140657 bytes, 0 total output drops

Output 0 broadcast packets, 3 multicast packets

0 output errors, 0 underruns, 0 applique, 0 resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Controleer de controllertellers

RP/0/RSP0/CPU0:ASR9001-F# show controllers tenGigE 0/0/1/1 stats

Statistics for interface TenGigE0/0/1/1 (cached values):

Ingress:

Input total bytes           = 15140657

Input good bytes            = 15140657

Input total packets         = 10003

Input 802.1Q frames         = 0

Input pause frames          = 0

Input pkts 64 bytes         = 0

Input pkts 65-127 bytes     = 0

Input pkts 128-255 bytes    = 3

Input pkts 256-511 bytes    = 0

Input pkts 512-1023 bytes   = 0

Input pkts 1024-1518 bytes  = 10000

Input pkts 1519-Max bytes   = 0

Input good pkts             = 10003

Input unicast pkts          = 10000

Input multicast pkts        = 3

Input broadcast pkts        = 0

Input drop overrun          = 0

Input drop abort            = 0

Input drop invalid VLAN     = 0

Input drop invalid DMAC     = 0

Input drop invalid encap    = 0

Input drop other            = 0

Input error giant           = 0

Input error runt            = 0

Input error jabbers         = 0

Input error fragments       = 0

Input error CRC             = 0

Input error collisions      = 0

Input error symbol          = 0

Input error other           = 0

Input MIB giant             = 0

Input MIB jabber            = 0

Input MIB CRC               = 0

Egress:

Output total bytes          = 15140657

Output good bytes           = 15140657

Output total packets        = 10003

Output 802.1Q frames        = 0

Output pause frames         = 0

Output pkts 64 bytes        = 0

Output pkts 65-127 bytes    = 0

Output pkts 128-255 bytes   = 3

Output pkts 256-511 bytes   = 0

Output pkts 512-1023 bytes  = 0

Output pkts 1024-1518 bytes = 10000

Output pkts 1519-Max bytes  = 0

Output good pkts            = 10003

Output unicast pkts         = 10000

Output multicast pkts       = 3

Output broadcast pkts       = 0

Output drop underrun        = 0

Output drop abort           = 0

Output drop other           = 0

Output error other          = 0

Externe loopback

Deze test verifieert de volgende componenten: linecard Central Processing Unit (CPU), fabric path, NP, transceiver en optics.

Deze test vereist een lengte van glasvezelkabel om de zend- (Tx) signalen fysiek om te leiden naar de ontvangstpoort (Rx).

De loopback configureren

Dit heeft invloed op het verkeer

RP/0/RSP0/CPU0:ASR9001-F# configure

RP/0/RSP0/CPU0:ASR9001-F(config)# interface tenGigE 0/0/1/1

RP/0/RSP0/CPU0:ASR9001-F(config-if)# loopback external

RP/0/RSP0/CPU0:ASR9001-F(config-if)# commit

RP/0/RSP0/CPU0:ASR9001-F(config-if)# end

clear counters

Dit ontruimt tellers op zowel de interface als het controlemechanisme.

RP/0/RSP0/CPU0:ASR9001-F# clear counters

Clear "show interface" counters on all interfaces [confirm]

Het lokale IP pingen

RP/0/RSP0/CPU0:ASR9001-F# ping 10.100.101.1 count 10000 size 1500 timeout 0

pings with timeout=0 may result in system instability and

control protocol flaps resulting in traffic impact.

DO you really want to continue[confirm with only 'y' or 'n'] [y/n] :y

Type escape sequence to abort.

Sending 10000, 1500-byte ICMP Echos to 10.100.101.1, timeout is 0 seconds:

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

[output omitted]

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Success rate is 100 percent (10000/10000), round-trip min/avg/max = 1/1/5 ms

Interfacetellers controleren

RP/0/RSP0/CPU0:ASR9001-F# show interfaces tenGigE 0/0/1/1

TenGigE0/0/1/1 is up, line protocol is up

Interface state transitions: 7

Hardware is TenGigE, address is 70e4.2217.ba65 (bia 70e4.2217.ba65)

Layer 1 Transport Mode is LAN

Internet address is 10.100.101.1/24

MTU 1514 bytes, BW 10000000 Kbit (Max: 10000000 Kbit)

reliability 255/255, txload 0/255, rxload 0/255

Encapsulation ARPA,

Full-duplex, 10000Mb/s, link type is force-up

output flow control is off, input flow control is off

loopback set (Internal),

ARP type ARPA, ARP timeout 04:00:00

Last input 00:00:00, output 00:00:00

Last clearing of "show interface" counters 00:00:32

5 minute input rate 504000 bits/sec, 52 packets/sec

5 minute output rate 504000 bits/sec, 52 packets/sec

10001 packets input, 15140219 bytes, 0 total input drops

0 drops for unrecognized upper-level protocol

Received 0 broadcast packets, 1 multicast packets

0 runts, 0 giants, 0 throttles, 0 parity

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

10001 packets output, 15140219 bytes, 0 total output drops

Output 0 broadcast packets, 1 multicast packets

0 output errors, 0 underruns, 0 applique, 0 resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Controllertellers controleren

RP/0/RSP0/CPU0:ASR9001-F# show controllers tenGigE 0/0/1/1 stats

Statistics for interface TenGigE0/0/1/1 (cached values):

Ingress:

Input total bytes           = 15140219

Input good bytes            = 15140219

Input total packets         = 10001

Input 802.1Q frames         = 0

Input pause frames          = 0

Input pkts 64 bytes         = 0

Input pkts 65-127 bytes     = 0

Input pkts 128-255 bytes    = 1

Input pkts 256-511 bytes    = 0

Input pkts 512-1023 bytes   = 0

Input pkts 1024-1518 bytes  = 10000

Input pkts 1519-Max bytes   = 0

Input good pkts             = 10001

Input unicast pkts          = 10000

Input multicast pkts        = 1

Input broadcast pkts        = 0

Input drop overrun          = 0

Input drop abort            = 0

Input drop invalid VLAN     = 0

Input drop invalid DMAC     = 0

Input drop invalid encap    = 0

Input drop other            = 0

Input error giant           = 0

Input error runt            = 0

Input error jabbers         = 0

Input error fragments       = 0

Input error CRC             = 0

Input error collisions      = 0

Input error symbol          = 0

Input error other           = 0

Input MIB giant             = 0

Input MIB jabber            = 0

Input MIB CRC               = 0

Egress:

Output total bytes          = 15140219

Output good bytes           = 15140219

Output total packets        = 10001

Output 802.1Q frames        = 0

Output pause frames         = 0

Output pkts 64 bytes        = 0

Output pkts 65-127 bytes    = 0

Output pkts 128-255 bytes   = 1

Output pkts 256-511 bytes   = 0

Output pkts 512-1023 bytes  = 0

Output pkts 1024-1518 bytes = 10000

Output pkts 1519-Max bytes  = 0

Output good pkts            = 10001

Output unicast pkts         = 10000

Output multicast pkts       = 1

Output broadcast pkts       = 0

Output drop underrun        = 0

Output drop abort           = 0

Output drop other           = 0

Output error other          = 0

Referenties

Cisco ASR 9000 Series aggregatieservices router-interface en verwijzing naar opdracht voor hardwarecomponent, release 4.3.x, hoofdstuk: Ethernet-interfaceopdrachten op de Cisco ASR 9000 Series router