Inhoud

Inleiding

Achtergrondinformatie

Voorwaarden

Vereisten

Gebruikte componenten

Netwerkdiagram

Configuraties voor NBMA (Use Network Type Broadcast)

Verificatietips

Configuraties voor NBMA (Use Neighbour Statements)

Verificatietips

Configuraties voor point-to-multipoint

Verificatietips

Gerelateerde informatie

Inleiding

Dit document beschrijft eerste configuraties voor Open Shortest Path First (OSPF) via niet-broadcast koppelingen.

Achtergrondinformatie

Op niet-uitgezonden media zoals Frame Relay, X.25, ATM en Switched Multiflex Data Service (SMDS) kan OSPF op twee modi worden uitgevoerd:

- Nonbroadcast Multiaccess (NBMA): simuleert een uitzendmodel door de selectie van een aangewezen router (DR) en een back-upaangewezen router (BDR). Er zijn twee manieren om een uitzendingsmodel op een NBMA-netwerk te simuleren: definieer het netwerktype als uitzending met de subopdracht ip ospf-netwerkuitzendinterface of configureer de buurverklaringen die de router ospf-opdracht gebruiken.

- Point-to-Multipoint: behandelt niet-broadcast netwerk als een verzameling point-to-point links door configuratie van de ip Ospf-netwerkopdracht point-to-multipoint .

U moet het netwerktype op niet-uitzendingsnetwerken definiëren om configuratie van buurverklaringen te voorkomen. Dit document biedt voorbeeldconfiguraties voor OSPF via niet-broadcast links. Gebruik het showip ospf interfacebevel om het netwerktype van een interface te controleren die OSPF in werking stelt en het bevel toont ip ospf buur wordt gebruikt om de status van de buurrouter te kennen.

Voorwaarden

Vereisten

Cisco raadt u aan de basisconfiguratie van het OSPF-routeringsprotocol te begrijpen.

Gebruikte componenten

De informatie in dit document is gebaseerd op de volgende software- en hardware-versies:

- Cisco 2500 routers

- Cisco IOS®-softwarerelease 12.2(24a) dat op routers werkt

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u zorgen dat u de potentiële impact van elke opdracht begrijpt.

Netwerkdiagram

Dit is het netwerkdiagram dat in de configuratievoorbeelden in dit document wordt gebruikt.

Configuraties voor NBMA (Use Network Type Broadcast)

Router1

interface Loopback0

ip address 192.0.2.3 255.255.255.255

!

!

interface Serial2

ip address 192.0.2.1 255.255.255.0

encapsulation frame-relay

ip ospf network broadcast

no keepalive

frame-relay map ip 192.0.2.1 16 broadcast

!

!

router ospf 1

network 192.0.2.0 0.0.0.255 area 0

Router2

interface Loopback0

ip address 192.0.2.2 255.255.255.255

!

interface Serial1/0

ip address 192.0.2.1 255.255.255.0

encapsulation frame-relay

ip ospf network broadcast

no keepalive

clockrate 2000000

frame-relay map ip 192.0.2.1 16 broadcast

!

router ospf 1

network 192.0.2.0 0.0.0.255 area 0

!

Verificatietips

Dit is de output van het showbevel voor router1.

Router1# show ip ospf neighbor

Neighbor ID     Pri   State           Dead Time   Address         Interface

192.0.2.2           1   FULL/BDR        00:00:37    192.0.2.1         Serial2

Router1# show ip ospf interface s2

Serial2 is up, line protocol is up

Internet Address 192.0.2.1/24, Area 0

Process ID 1, Router ID 192.0.2.3, Network Type BROADCAST, Cost: 64

Transmit Delay is 1 sec, State DR, Priority 1

Designated Router (ID) 192.0.2.3, Interface address 192.0.2.1

Backup Designated router (ID) 192.0.2.2, Interface address 192.0.2.1

Timer intervals configured, Hello 10, Dead 40, Wait 40, Retransmit 5

Hello due in 00:00:00

Index 1/1, flood queue length 0

Next 0x0(0)/0x0(0)

Last flood scan length is 1, maximum is 2

Last flood scan time is 0 msec, maximum is 4 msec

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 192.0.2.2  (Backup Designated Router)

Suppress hello for 0 neighbor(s)

En de output voor Router2 is als volgt.

Router2# show ip ospf neighbor

Neighbor ID     Pri   State           Dead Time   Address         Interface

192.0.2.3           1   FULL/DR         00:00:38     192.0.2.1         Serial1/0

Router2# show ip ospf interface s1/0

Serial1/0 is up, line protocol is up

Internet Address 192.0.2.1/24, Area 0

Process ID 1, Router ID 192.0.2.2, Network Type BROADCAST, Cost: 64

Transmit Delay is 1 sec, State BDR, Priority 1

Designated Router (ID) 192.0.2.3, Interface address 192.0.2.1

Backup Designated router (ID) 192.0.2.2, Interface address 192.0.2.1

Timer intervals configured, Hello 10, Dead 40, Wait 40, Retransmit 5

Hello due in 00:00:03

Index 1/1, flood queue length 0

Next 0x0(0)/0x0(0)

Last flood scan length is 1, maximum is 2

Last flood scan time is 0 msec, maximum is 4 msec

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 192.0.2.3  (Designated Router)

Suppress hello for 0 neighbor(s)

Configuraties voor NBMA (Use Neighbour Statements)

Router1

interface Loopback0

ip address 192.0.2.3 255.255.255.255

!

interface Serial2

ip address 192.0.2.1 255.255.255.0

encapsulation frame-relay

ip ospf priority 2

no keepalive

frame-relay map ip 192.0.2.1 16

!

router ospf 1

network 192.0.2.0 0.0.0.255 area 0

neighbor 192.0.2.1

!

Router2

interface Loopback0

ip address 192.0.2.2 255.255.255.255

!

interface Serial1/0

ip address 192.0.2.1 255.255.255.0

encapsulation frame-relay

no keepalive

clockrate 2000000

frame-relay map ip 192.0.2.1 16

!

router ospf 1

network 192.0.2.0 0.0.0.255 area 0

neighbor 192.0.2.1

!

Opmerking: in de zojuist getoonde configuraties stelt de opdracht ip ospf prioriteit 2 op Router1 een hogere interfaceprioriteit in dan de standaardprioriteitswaarde van 1, waardoor het een DR en router2 is als BDR voor het NBMA-netwerk. Indien nodig kunt u de prioriteitswaarde op 0 instellen om een router zo te configureren dat deze nooit een DR/BDR wordt. Dit is nodig in hub and spoke-netwerken waarbij de hub moet worden geconfigureerd om DR te worden, waarbij de spokes noch DR noch BDR moeten zijn. Alhoewel de configuratie van de buurverklaring op één eind volstaat om nabijheid te vormen, is het een goede praktijk om het te hebben gevormd op beide einden zoals getoond. Ook hoeven de opdrachten voor Frame Relay-kaarten niet de broadcast-parameter te hebben omdat de OSPF-pakketten zijn unicasted met de buurmelding.

Verificatietips

Dit is de output van het showbevel voor router1.

Router1# show ip ospf neighbors

Neighbor ID     Pri   State           Dead Time   Address         Interface

192.0.2.2           1   FULL/BDR        00:01:39    192.0.2.1         Serial2

Router1# show ip ospf interface s2

Serial2 is up, line protocol is up

Internet Address 192.0.2.1/24, Area 0

Process ID 1, Router ID 192.0.2.3, Network Type NON_BROADCAST, Cost: 64

Transmit Delay is 1 sec, State DR, Priority 1

Designated Router (ID) 192.0.2.3, Interface address 192.0.2.1

Backup Designated router (ID) 192.0.2.2, Interface address 192.0.2.1

Timer intervals configured, Hello 30, Dead 120, Wait 120, Retransmit 5

Hello due in 00:00:19

Index 1/1, flood queue length 0

Next 0x0(0)/0x0(0)

Last flood scan length is 2, maximum is 2

Last flood scan time is 0 msec, maximum is 0 msec

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 192.0.2.2  (Backup Designated Router)

Suppress hello for 0 neighbor(s)

En de output voor Router2 is als volgt.

Router2# show ip ospf neighbor

Neighbor ID     Pri   State           Dead Time   Address         Interface

192.0.2.3           1   FULL/DR         00:01:49     192.0.2.1         Serial1/0

Router2# show ip ospf interface s1/0

Serial1/0 is up, line protocol is up

Internet Address 192.0.2.1/24, Area 0

Process ID 1, Router ID 192.0.2.2, Network Type NON_BROADCAST, Cost: 64

Transmit Delay is 1 sec, State BDR, Priority 1

Designated Router (ID) 192.0.2.3, Interface address 192.0.2.1

Backup Designated router (ID) 192.0.2.2, Interface address 192.0.2.1

Timer intervals configured, Hello 30, Dead 120, Wait 120, Retransmit 5

Hello due in 00:00:01

Index 1/1, flood queue length 0

Next 0x0(0)/0x0(0)

Last flood scan length is 2, maximum is 2

Last flood scan time is 0 msec, maximum is 0 msec

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 192.0.2.3  (Designated Router)

Suppress hello for 0 neighbor(s)

Configuraties voor point-to-multipoint

Router1

interface Loopback0

ip address 192.0.2.3 255.255.255.255

!

interface Serial2

ip address 192.0.2.1 255.255.255.0

encapsulation frame-relay

ip ospf network point-to-multipoint

no keepalive

frame-relay map ip 192.0.2.1 16 broadcast

!

router ospf 1

network 192.0.2.0 0.0.0.255 area 0

!

Router2

interface Loopback0

ip address 192.0.2.2 255.255.255.255

!

interface Serial1/0

ip address 192.0.2.1 255.255.255.0

encapsulation frame-relay

ip ospf network point-to-multipoint

no keepalive

clockrate 2000000

frame-relay map ip 192.0.2.1 16 broadcast

!

router ospf 1

network 192.0.2.0 0.0.0.255 area 0

Verificatietips

Dit is de output van het showbevel voor router1.

Router1# show ip ospf neighbors

Neighbor ID     Pri   State           Dead Time   Address         Interface

192.0.2.2           1   FULL/  -        00:01:53    192.0.2.1         Serial2

Router1# show ip ospf interface s2

Serial2 is up, line protocol is up

Internet Address 192.0.2.1/24, Area 0

Process ID 1, Router ID 192.0.2.3, Network Type POINT_TO_MULTIPOINT, Cost: 64

Transmit Delay is 1 sec, State POINT_TO_MULTIPOINT,

Timer intervals configured, Hello 30, Dead 120, Wait 120, Retransmit 5

Hello due in 00:00:18

Index 1/1, flood queue length 0

Next 0x0(0)/0x0(0)

Last flood scan length is 1, maximum is 1

Last flood scan time is 0 msec, maximum is 0 msec

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 192.0.2.2

Suppress hello for 0 neighbor(s)

En de output voor Router2 is als volgt.

Router2# show ip ospf neighbor

Neighbor ID     Pri   State           Dead Time   Address         Interface

192.0.2.3           1   FULL/  -        00:01:58     192.0.2.1         Serial1/0

Router2# show ip ospf interface s1/0

Serial1/0 is up, line protocol is up

Internet Address 192.0.2.1/24, Area 0

Process ID 1, Router ID 192.0.2.2, Network Type POINT_TO_MULTIPOINT, Cost: 64

Transmit Delay is 1 sec, State POINT_TO_MULTIPOINT,

Timer intervals configured, Hello 30, Dead 120, Wait 120, Retransmit 5

Hello due in 00:00:18

Index 1/1, flood queue length 0

Next 0x0(0)/0x0(0)

Last flood scan length is 1, maximum is 1

Last flood scan time is 0 msec, maximum is 0 msec

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 192.0.2.3

Suppress hello for 0 neighbor(s)

Opmerking: er zijn geen DR en BDR geselecteerd wanneer het NBMA-netwerk is geconfigureerd als Point-to-Multipoint zoals in de uitgangen wordt getoond, omdat het wordt behandeld als een verzameling point-to-point links.

Zie OSPF configureren voor meer informatie.

Gerelateerde informatie

- Ondersteuningspagina voor OSPF

- Ondersteuningspagina voor IP-routingprotocollen

- Technische ondersteuning en documentatie – Cisco Systems