Contents

Introduction

Prerequisites

Components Used

Problem

Solution

Related Information

Introduction

This document describes potential image issues with the Tidal Enterprise Orchestrator (TEO) Console.

Prerequisites

Components Used

The information in this document is based on the TEO 2.2 or later and IIS 7.0 or later.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Problem

The TEO console works, but images do not appear properly.

Solution

Make sure all the proper HTTP role services are enabled, including Static Content, Default Document, Directory Browsing, HTTP Errors, and HTTP Redirection under Common HTTP Features in IIS 7.0 or later.

Related Information

- Technical Support & Documentation - Cisco Systems