Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Conventies

Hoofdinterface

Multipoint subinterface

Point-to-Point subinterface

Gerelateerde informatie

Inleiding

Dit document illustreert de noodzaak om een virtueel pad-ID (VPI) en virtueel kanaal-ID (VCI) op een lokale ATM-interface te configureren om dit met succes te ping te bereiken.

Wanneer u een IP-adres op een ATM-interface toepast, wordt de interface eenvoudig ingesteld om een routed IP-interface te zijn. Voor pings om te werken, moet u ook een permanent virtueel circuit (PVC) configureren, zodat de router weet door welke virtueel circuit (VC) de ATM-cellen moet verzenden. Zonder een VC, rapporteert de router een insluitingsmislukking als debug opdrachten zijn ingeschakeld. Door insluiting verwijst de router naar Layer 2 (L2) header die zich rond het ping-pakket wikkelt.

Wanneer u een lokale interface pingt, worden de ATM cellen eigenlijk verzonden op de fysieke draad. Als het end-to-end circuit actief is, pingelt de cellen naar het afstandsbediening en dan loop terug. Alternatief, vorm een hardware of software loopback ergens langs het pad, inclusief op de lokale interface zelf. Gebruik de opdracht loopback diagnostiek om een software loopback te configureren.

Aangezien ATM VC’s point-to-point zijn, overweegt u de volgende punten over het type interface waarop u VC’s configureren:

- Hoofdinterface-Ondersteunt meerdere VC’s. Elke VC moet een statische of dynamische afbeelding maken die overeenkomt met de lokale PVC-waarden in het externe IP-adres. Zonder een mapping, zal de router een insluiting melden als er geen foutmelding is opgetreden nadat er defecten zijn geactiveerd.

- Multipoint subinterface-Ondersteunt meerdere VC’s. Elke VC moet een statische of dynamische afbeelding maken die overeenkomt met de lokale PVC-waarden in het externe IP-adres. Zonder een mapping, zal de router een insluiting melden als er geen foutmelding is opgetreden nadat er defecten zijn geactiveerd.

- Point-to-Point subinterface-Ondersteunt één VC. Aangezien de router per definitie veronderstelt dat er één apparaat aan het andere eind van de VC is, is geen expliciete mapping vereist. In plaats daarvan, door de router pakketten de VC op basis van een Routing- besluit door. In andere woorden, vertelt de routingtabel de router dat de volgende hop voor het IP-pakket het externe eind van de VC is.

Voorwaarden

Vereisten

Er zijn geen specifieke vereisten van toepassing op dit document.

Gebruikte componenten

Dit document is niet beperkt tot specifieke software- en hardware-versies.

Conventies

Raadpleeg Cisco Technical Tips Conventions (Conventies voor technische tips van Cisco) voor meer informatie over documentconventies.

Hoofdinterface

De volgende tabellen illustreren de benodigde configuratieopdrachten om de lokale interface te bellen, afhankelijk van de vraag of het om een punt- of een multipoint type gaat.

Configureer alleen een IP-adres en geen VPI/VCI op de hoofdATM-interface

!

interface ATM4/0

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

no atm ilmi-keepalive

!

cs-7204-15a#show atm vc

VCD /                                     Peak Avg/Min Burst

Interface      Name         VPI   VCI  Type   Encaps     Kbps   Kbps  Cells Sts

cs-7204-15a#show atm map

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

4w2d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending

4w2d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, encapsulation failed

!--- Router reports encapsulation failure messages because there is no VPI/VCI !--- on which to send the packet.

Een PVC configureren op de hoofdATM-interface

interface ATM4/0

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

no atm ilmi-keepalive

pvc 1/32

encapsulation aal5snap

cs-7204-15a#show atm vc

VCD /                                     Peak Avg/Min Burst

Interface      Name         VPI   VCI  Type   Encaps     Kbps   Kbps  Cells Sts

4/0            4              1    32   PVC    SNAP     149760                UP

cs-7204-15a#show atm map

cs-7204-15a#

debug ip packet

IP packet debugging is on

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

4w2d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending

4w2d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, encapsulation failed

!--- Although this configures a PVC, either a dynamic or !--- static mapping is still needed between the L2 and Layer 3 (L3) addresses.

Configuratie van een Statische Kaartverklaring op PVC

interface ATM4/0

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

no atm ilmi-keepalive

pvc 1/32

protocol ip 10.1.1.1

!--- This configures a static map back to the local interface. !--- Normally, the map statement points to the remote IP address.

encapsulation aal5snap

cs-7204-15a#show atm map

Map list ATM4/0pvc4 : PERMANENT

ip 10.1.1.1 maps to VC 4, VPI 1, VCI 32, ATM4/0

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending.

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending.

!--- The router now sends the packets. However, since there is not a !--- remote end in the lab setup, the pings fail.

Loopback-diagnostiek op de hoofdinterface configureren

interface ATM4/0

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

loopback diagnostic

!--- This configures a software loopback with the loopback diag command.

no atm ilmi-keepalive

pvc 1/32

protocol ip 10.1.1.1

encapsulation aal5snap

cs-7204-15a#show atm map

Map list ATM4/0pvc4 : PERMANENT

ip 10.1.1.1 maps to VC 4, VPI 1, VCI 32, ATM4/0

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/2/4 ms

cs-7204-15a#

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending

5w1d: IP: s=10.1.1.1 (ATM4/0), d=10.1.1.1 (ATM4/0), len 100, rcvd 3

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending

5w1d: IP: s=10.1.1.1 (ATM4/0), d=10.1.1.1 (ATM4/0), len 100, rcvd 3

!--- The pings are successful. Note that the local interface both !--- receives its own Internet Control Message Protocol (ICMP) echo and echo-reply.

Multipoint subinterface

Een ATM multipoint interface configureren

interface ATM4/0

no ip address

no ip directed-broadcast

loopback diagnostic

no atm ilmi-keepalive

!

interface ATM4/0.1 multipoint

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

pvc 1/32

protocol ip 10.1.1.1

!--- This configures a static map or use inverse Address Resolution Protocol (ARP) on a multipoint subinterface.

encapsulation aal5snap

cs-7204-15a#show atm map

Map list ATM4/0.1pvc5 : PERMANENT

ip 10.1.1.1 maps to VC 5, VPI 1, VCI 32, ATM4/0.1

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/2/4 ms

cs-7204-15a#

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0.1), len 100, sending

5w1d: IP: s=10.1.1.1 (ATM4/0.1), d=10.1.1.1 (ATM4/0.1), len 100, rcvd 3

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0.1), len 100, sending

5w1d: IP: s=10.1.1.1 (ATM4/0.1), d=10.1.1.1 (ATM4/0.1), len 100, rcvd 3

Point-to-Point subinterface

Point-to-Point subinterface

interface ATM4/0

no ip address

no ip directed-broadcast

loopback diagnostic

!--- Use the loopback diagnostic command if !--- the PVC is not configured end to end.

no atm ilmi-keepalive

!

interface ATM4/0.2 point-to-point

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

pvc 1/32

encapsulation aal5snap

!--- Point-to-point interfaces do not need a static mapping or inverse ARP.

cs-7204-15a#show atm map

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/2/4 ms

cs-7204-15a#

00:11:03: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0.2), len 100, sending

00:11:03: IP: s=10.1.1.1 (ATM4/0.2), d=10.1.1.1 (ATM4/0.2), len 100, rcvd 3

00:11:03: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0.2), len 100, sending

00:11:03: IP: s=10.1.1.1 (ATM4/0.2), d=10.1.1.1 (ATM4/0.2), len 100, rcvd 3

Gerelateerde informatie

- Meervoudige routeringsprotocollen via ATM PVC’s met LLC-insluiting

- Meervoudige routeringsprotocollen via ATM PVC’s met behulp van VC-multiplexing

- Basisconfiguratie van PVC met behulp van een overbrugde RFC 1483

- Verkorte PVC-verbinding tussen een router en een Catalyst switch

- Technische ondersteuning van ATM (asynchrone overdrachtmodus)

- Meer ATM-informatie

- Technische ondersteuning - Cisco-systemen