목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

관련 제품

표기 규칙

배경 정보

구성

네트워크 다이어그램

Cisco IOS 구성

CatOS 컨피그레이션

다음을 확인합니다.

문제 해결

Polycom IP Phone으로 인한 스패닝 트리 루프

관련 정보

소개

이 문서에서는 Polycom IP Conference Station 7935/7936 및 Polycom SoundPoint IP 430에 연결하기 위한 Catalyst 스위치의 샘플 컨피그레이션을 제공합니다. 이 문서에는 QoS(Power Inline) 및 QoS(Quality of Service) 컨피그레이션이 포함되지 않습니다.

사전 요구 사항

요구 사항

이 구성을 시도하기 전에 다음 요구 사항을 충족해야 합니다.

- IP Phone 컨피그레이션

자세한 내용은 빠른 시작 가이드 Cisco IP Conference Station 7935 또는 Cisco Unified IP Conference Station 7936 전화 설명서를 참조하십시오.

- 가상 LAN 구성

자세한 내용은 VLAN/VTP(Virtual LAN/VLAN Trunking Protocol) - 소개를 참조하십시오.

사용되는 구성 요소

이 문서의 정보는 Supervisor Engine 720을 사용하는 Cisco Catalyst 6500 Series Switch와 Cisco IOS® Software Release 12.2(18)SXD6 및 Cisco Catalyst 6500 Series Switch with Supervisor Engine 2를 실행하고 Cisco CatOS Software Release 8.4(4)를 실행하는 것을 기반으로 합니다.

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 현재 네트워크가 작동 중인 경우, 모든 명령어의 잠재적인 영향을 미리 숙지하시기 바랍니다.

관련 제품

이 구성은 Cisco 2900XL 및 3500XL 시리즈를 제외하고 Cisco IOS 소프트웨어를 실행하는 Cisco Catalyst 스위치에서도 사용할 수 있습니다. CatOS 구성은 Catalyst OS 소프트웨어를 실행하는 모든 Cisco Catalyst 스위치와 함께 사용할 수 있습니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 규칙을 참조하십시오.

배경 정보

이 문서에서는 스위치 포트에서 PC 및 IP phone Polycom SoundPoint IP 430을 연결하는 스위치의 컨피그레이션에 대해 설명합니다. 이 문서에서는 Polycom IP Conference Station 7935/7936 스위치 포트에 연결하는 스위치의 구성에 대해서도 설명합니다.

Polycom IP Conference Station 7935/7936은 RJ-45 케이블 인터페이스를 통해 네트워크에 단일 10/100BaseTx 이더넷 LAN 연결을 제공하며, 다른 Cisco Unified IP Phone 7900 Series와 달리 PC에 연결하기 위해 10/100BaseTx 이더넷 LAN 연결이 없습니다.

Cisco 7935/7936 IP Conference Phone에서 10/100BaseTx 이더넷 LAN 연결을 사용하는 PC에 연결할 수 있는 프로비저닝이 없기 때문에 음성 또는 보조 VLAN의 개념이 직접 적용되지 않으며 문제를 일으킬 수 있습니다. Cisco IP Conference Station 7935/7936에서 이 장치를 스위치 포트에 연결하기 위해 사용한 단일 10/100BaseTx 이더넷 LAN 연결 이 연결은 음성에만 트래픽을 전달하므로 스위치 포트는 단일 VLAN에 속해야 합니다.

Polycom SoundPoint IP 430에는 듀얼 10/100Mbps 이더넷 포트가 있습니다. 한 포트는 스위치에 연결되고 다른 포트는 PC에 연결됩니다. 이 연결에서 포트는 다음 두 VLAN에 대한 트래픽을 전달합니다.

- 데이터(PC) 트래픽

- 음성(IP Phone) 트래픽

이 시나리오에서는 둘 이상의 VLAN에 대한 트래픽을 전달하려면 트렁크 포트가 필요합니다.

참고: Polycom IP Conference Station 7935/7936에는 외부 전원 공급 장치가 없으므로 스위치가 PoE 포트를 통해 전원을 공급해야 하거나 별도의 전원 관리 장치를 사용해야 합니다.

구성

이 섹션에는 이 문서에서 설명하는 기능을 구성하기 위한 정보가 표시됩니다.

참고: 이 섹션에 사용된 명령에 대한 자세한 내용을 보려면 명령 조회 도구(등록된 고객만 해당)를 사용하십시오.

네트워크 다이어그램

이 문서에서는 다음 네트워크 설정을 사용합니다.

Cisco IOS 구성

이 문서에서는 다음 구성을 사용합니다.

- Catalyst 6500

기본 Cisco IOS 모드의 Catalyst 6500

Cat6500#show running-config

Building configuration...

Current configuration : 5869 bytes

!

version 12.1

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname cat6500

!

boot system sup-bootflash:s72033-psv-mz.122-18.SXD6.bin

main-cpu

auto-sync standard

ip subnet-zero

!

!

no ip finger

!

!

!

!

vlan 1

name DataVlan

!

vlan 2

name VoiceVlan

!

interface FastEthernet4/1

no ip address

switchport

switchport trunk encapsulation dot1q

switchport trunk native vlan 1

switchport trunk allowed vlan 1,2

switchport mode trunk

spanning-tree portfast

!--- Use PortFast only when you connect a single end station to a !--- Layer 2 access port. Otherwise, you create a network loop. !--- Refer to Using Portfast and Other Commands to Fix Workstation Startup !--- Connectivity Delays for more information on how to enable portfast.

!

interface FastEthernet4/2

no ip address

switchport

switchport access vlan 2

switchport mode access

spanning-tree portfast

!--- Use PortFast only when you connect a single end station to a Layer 2 access port. Otherwise, you create a network loop.

!

interface FastEthernet4/3

no ip address

shutdown

!

!--- Output suppressed.

!

ip classless

no ip http server

!

!

!

line con 0

transport input none

line vty 0 4

!

end

CatOS 컨피그레이션

이 예에서는 스위치 포트에서 PC 및 IP phone Polycom SoundPoint IP 430을 연결하는 하이브리드 모드의 스위치 컨피그레이션에 대해 설명합니다. 이 문서에서는 Polycom IP Conference Station 7935/7936 스위치 포트에 연결하는 스위치의 구성에 대해서도 설명합니다. 이 구성에서는 이전 예와 동일한 다이어그램을 사용합니다.

하이브리드 모드의 Catalyst 6500

!--- Set the VLAN Trunk Protocol (VTP) mode. !--- In this example, the mode is set to transparent. !--- Dependent upon your network, set the VTP mode accordingly. !--- Refer to Understanding and Configuring VLAN Trunk Protocol (VTP) !--- for more information on VTP.

Catalyst6500> (enable) set vtp mode transparent

VTP domain modified

!--- Add VLAN 2. VLAN 1 already exists by default.

Catalyst6500> (enable) set vlan 2

VLAN 2 configuration successful

!--- Add port 4/2 to VLAN 2.

Catalyst6500> (enable) set vlan 2 4/2

VLAN 2 modified.

VLAN 1 modified.

VLAN  Mod/Ports

---- -----------------------

2     4/2

!--- Enable trunking on port 4/1.

Catalyst6500> (enable) set trunk 4/1 1,2 dot1q on

Vlan(s) 1,2 already allowed on the trunk

Please use the 'clear trunk' command to remove vlans from allowed list.

Port(s)  4/1 trunk mode set to on.

Port(s)  4/1 trunk type set to dot1q.

Catalyst6500> (enable)

!--- Enable spanning tree portfast on the ports. Refer to !--- Using Portfast and Other Commands to Fix Workstation Startup Connectivity Delays !--- for more information on how to enable portfast.

Catalyst6500> (enable) set spantree portfast 4/1 enable

Warning: Connecting Layer 2 devices to a fast start port can cause

temporary spanning tree loops. Use with caution.

Spantree port  4/1 fast start enabled.

Catalyst6500> (enable) set spantree portfast 4/2 enable

Warning: Connecting Layer 2 devices to a fast start port can cause

temporary spanning tree loops. Use with caution.

Spantree port  4/2 fast start enabled.

Catalyst6500> (enable)

!--- If you want to ONLY allow VLAN 1 and VLAN 2 on trunk port 4/1, do this. !--- A trunk port allows all VLANs by default.

Catalyst6500> (enable) show trunk 4/1

* - indicates vtp domain mismatch

# - indicates dot1q-all-tagged enabled on the port

$ - indicates non-default dot1q-ethertype value

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

4/1      on           dot1q          not-trunking  1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

4/1      1-4094

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

4/1      1

Port      Vlans in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

4/1

Catalyst6500> (enable) clear trunk 4/1 1-4094

Removing Vlan(s) 1-4094 from allowed list.

Port  4/1 allowed vlans modified to none.

!--- Allow only VLAN 1 and VLAN 2 on trunk port 4/1.

Catalyst6500> (enable) set trunk 4/1 1,2 dot1q on

Adding vlans 1,2 to allowed list.

Port(s)  4/1 allowed vlans modified to 1,2.

Port(s)  4/1 trunk mode set to on.

Port(s)  4/1 trunk type set to dot1q.

Catalyst6500> (enable) show trunk 4/1

* - indicates vtp domain mismatch

# - indicates dot1q-all-tagged enabled on the port

$ - indicates non-default dot1q-ethertype value

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

4/1      on           dot1q          not-trunking  1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

4/1      1,2

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

4/1      1

Port      Vlans in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

4/1

!--- Refer to Configuring Ethernet VLAN Trunks for more !--- information on how to configure trunk ports.

!--- Issue the show config

command !--- in order to check the configuration.

Catalyst6500> (enable) show config 4

This command shows non-default configurations only.

Use 'show config <mod> all' to show both default and non-default configurations.

.................................

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Thu Jun 21 2007, 23:37:51

!

# default port status is enable

!

!

#module 4 : 16-port 1000BaseX Ethernet

set vlan 2    4/2

clear trunk 4/1  1-9,11-39,41-4094

set trunk 4/1  on dot1q 1,2

set spantree portfast    4/1-2 enable

end

Catalyst6500> (enable)

다음을 확인합니다.

현재 이 구성에 대해 사용 가능한 확인 절차가 없습니다.

문제 해결

이 섹션에서는 컨피그레이션 문제를 해결하는 데 사용할 수 있는 정보를 제공합니다.

Polycom IP Phone으로 인한 스패닝 트리 루프

IP Phone을 스위치에 연결할 때 STP 루프가 발생할 수 있으며, 이로 인해 스위치의 CPU가 사용률이 100%까지 증가합니다. IP Phone이 연결된 스위치 포트에서 portfast가 활성화된 경우에도 STP 루프가 발생할 수 있습니다.

1. 스위치 포트 컨피그레이션을 확인합니다. IP Phone이 연결된 포트가 err-disabled 상태로 전환되고 물리적 루프가 없는 경우 err-disabled 상태에서 포트를 복구해 볼 수 있습니다. 자세한 내용은 Cisco IOS 플랫폼의 Errdisable Port State Recovery를 참조하십시오.

2. 최종 사용자가 실수로 물리적 루프를 생성할 위험이 있는 경우 포트가 err-disabled 상태로 이동하지 않도록 하기 위해 err-disable 복구를 활성화하면 비활성화된 포트를 수동으로 재설정할 필요가 없습니다. STP Loop Guard에 대한 자세한 내용은 Loop Guard 및 BPDU Skew Detection 기능을 사용한 Spanning-Tree Protocol Enhancements를 참조하십시오.

관련 정보

- Cisco IP Phone 연결을 위해 IOS Catalyst 스위치 구성 컨피그레이션 예

- Cisco IP Phone 10/100 이더넷 인라인 전원 감지 알고리즘 이해

- Catalyst 6500/6000 스위치의 IP Phone In-Line 전력 프로비저닝 이해

- LAN 제품 지원

- LAN 스위칭 기술 지원

- 기술 지원 및 문서 − Cisco Systems