목차

질문:

질문:

증상: Cisco WSA(Web Security Appliance)를 통해 웹 사이트에 액세스하려고 하면 프록시 라이센스가 없는 프록시라는 오류 메시지가 표시됩니다.

This Page Cannot Be Displayed

----------------------

Internet access is not available without proper licensing of the

security device.

Please contact your corporate network administrator and provide

the code shown below.

Note: To access the management interface of the security device,

enter the configured IP address with port 8080.

---------------------

Notification code: PROXY_UNLICENSED

기능 키가 만료되지 않았습니다. 뭐가 문제죠?

환경: Cisco WSA(Web Security Appliance), 모든 버전의 AsyncOS

EULA(최종 사용자 사용권 계약)에 동의하지 않았지만 동의해야 합니다.

다음과 같은 두 가지 방법으로 이 수락을 달성할 수 있습니다.

1. 시스템 설정 마법사를 실행하고 안내 설정 프로세스를 진행합니다. 'System Administration'(시스템 관리) 탭 > 'System Setup'(시스템 설정) > 'System Setup Wizard'(시스템 설정 마법사).

2. 'Security Services(보안 서비스)' 탭 > 'Web Proxy(웹 프록시)' > 'Edit Settings(설정 수정)'로 이동합니다. EULA가 나타나면 아직 수락되지 않은 것이므로 이 작업을 수행해야 합니다. Edit Settings(설정 수정) 버튼을 클릭하여 프록시 옵션을 수정할 수 있는 경우 이미 수락된 것입니다.